
 cls-file Version 2.0
 GPS week: 1547   Day: 0   MJD: 55073                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 brd |    96     0   2849      0     462   -1030   2696   2696      0   4438   4438      0    0.00
 cod |   288     0  24204    937    -465    -184     27     29     26    100     74    111   11.96
 emr |   288     0  22760    783    3256   -1153     14     15     14     91    119     71   24.70
 esa |   288     0  32365    578   -1202     430     14     13     14     76     83     74   26.41
 gfz |   288     0  32221   2613     290    -865     21     22     21     90     94     89   16.56
 iga |    96     0   2849      4  -15572    -945     84     84      0    149    149      0    0.00
 igu |    96     0   2753      4  -15574    -294   1643   1643      0   3582   3582      0    0.00
 jpl |   288     0  27441   1416    2661   -1359     18     19     17    100    114     94   20.37
 usn |   288     0  24863    143    -431   -1611     55     56     55    133    124    137    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   usn |
 -----+-------------------------------------------------------+
    2 |  -689   -46    98   -13   -36   124  1871   -45    30 |
    3 | -7269     X    11     X   -24   204-12738     6  -218 |
    4 |  1382   -11    19   -49    54   -73   394     3    55 |
    6 | -4051     X     X    66   -67    91 -3264   -35   -66 |
    7 | -2438    25   -39  -161   176  -197 -1868    98   161 |
    8 | -2457   -34   198   -67   -23   128  6280  -114    42 |
    9 | -6299    86   106   -21   -76    95 -3202   -95    78 |
   10 | -5391   -51   255    22  -184    74 -1233  -157    50 |
   11 |  4311   -97   -79   -34    60  -169   129   148   -84 |
   12 | -2062   -17  -228    58   119   -40   -84   114  -100 |
   13 |   573    26   -72    51    10  -245  -801    -1    84 |
   14 |  3448   -14   -99    79   -70   -27   512    68   -85 |
   15 |  -901    68  -162    13    69    50  2181    95    61 |
   16 |  3298   -20   192  -170   -73    28   229    59   200 |
   17 |  1589   101   -43  -201     X  -169  -624   254    10 |
   18 |  6570   140    27  -119   -86    67  1175   108    95 |
   19 |   698   -46    13   -21     X  -148   -60    38  -145 |
   20 |  2493    17   147   -95  -122   -51  -108    34   158 |
   21 |  3417   -45    38   -72     X    92   876    70    61 |
   22 |  -807    24   -10   -18    20    12 -2305     5   114 |
   23 |  -740   -39   -32   -52    35  -125  -772   105   178 |
   24 |  1041    -6   109    17  -114   106 -1943   -57    94 |
   25 | -2229    69     -   -76    77   -10     -     -     - |
   26 | -1172    50     X    30   -91  -149 -1026     X    25 |
   27 |  -897     4   124   -13   -63   134  3220   -84    16 |
   28 |  5699   -84    55    34     1   171  3186   -62   188 |
   29 |  -523   -46    -8  -149     X   -32  -347   228    81 |
   30 |  6947    79   -79   -41    92    87  5777    37    43 |
   31 |  -897   -50  -193   -58   153  -159  1056   213  -122 |
   32 | -3824   -31    32     2   -29   128  1594     X     7 |
 -----+-------------------------------------------------------+
 ABPO |     -     -     -     -   -59     -     -    48     - |
 ALGO |     -    22    39   -53    41     -     -   -25   -44 |
 ALIC |     -    56     -    45    11     -     -  -100     - |
 AMC2 |     -    48     -    45     -     -     -   -86   -59 |
 AREQ |     -     -   -37    20    24     -     -     X     - |
 ASPA |     -    23     -   -96    23     -     -    94     - |
 AUCK |     -   117     -    42    40     -     -  -154     - |
 BOR1 |     -  -237     -   152   -71     -     -     -  -295 |
 BRFT |     -   -54     -    59   -62     -     -     6     - |
 BRUS |     -   -19     9     -     -     -     -     -   -49 |
 CAS1 |     -     -     -    56   229     -     -  -219   137 |
 CCJM |     -     -     -    96  -153     -     -     -     - |
 CEDU |     -    15     -    73   -72     -     -   -40    50 |
 CHPI |     -     -     -    18     -     -     -   -23   -72 |
 CHUR |     -     1   117   -66   104     -     -  -142     - |
 COCO |     -   116     -     -   -84     -     -     -    94 |
 CONZ |     -     -     -   -15     -     -     -    19     - |
 CRO1 |     -     -    66   -74     1     -     -    16  -101 |
 DAEJ |     -   -26     -    12     -     -     -     -     - |
 DARW |     -   118  -203   104    81     -     -   -24     - |
 DAV1 |     -   -96     -    25    30     -     -     -     - |
 DGAR |     -     -     -   -15   -25     -     -    40    -7 |
 DRAO |     -    98   -23   -23     -     -     -     -    88 |
 FAA1 |     -  -107     -    48     X     -     -     -     - |
 FAIR |     -     -    31     -   -47     -     -     -     - |
 FLIN |     -     -     -    -3     4     -     -     -     - |
 GLPS |     -     -     -    -3    -7     -     -    10     - |
 GLSV |     -    89     -   -45   112     -     -   -84     - |
 GODE |     -     -    20     6   -40     -     -     -    -2 |
 GOLD |     -     -     -    72    67     -     -  -148   -11 |
 GRAS |     -     -     -   -18    29     -     -     -     - |
 GRAZ |     -  -209   -72     -   258     -     -     -     - |
 GUAM |     -     -     -    47   -38     -     -   -30   -17 |
 GUAT |     -    45     -   225   -13     -     -  -309     - |
 HARB |     -     X   -63     X     -     -     -    77     - |
 HLFX |     -     -    28   -26     -     -     -     -  -230 |
 HOB2 |     -   125     -   -29   -45     -     -     -   124 |
 HOFN |     -    38     -   -66     X     -     -    63   -12 |
 HRAO |     -     -     -   -18    29     -     -     -   432 |
 HYDE |     -     -     -     -    81     -     -   -66     - |
 IENG |     -  -110    53     -     -     -     -     -   -94 |
 IISC |     -     -     -    28   -44     -     -     -   -34 |
 IRKT |     -     -   -53     -    79     -     -     -   -50 |
 ISPA |     -     -     -   -10    14     -     -     1   -64 |
 JPLM |     -     -    -9     -    13     -     -     -     4 |
 KARR |     -    58     -    72   -45     -     -   -87     - |
 KERG |     -     -   -53    50     -     -     -     -   172 |
 KIRU |     -     -  -108   101     -     -     -     -     - |
 KIT3 |     -     -     -   -24  -167     -     -   167   -13 |
 KOKB |     -     -    66   -42     -     -     -   -26   -37 |
 KOUR |     -     -    69    11  -167     -     -    39    10 |
 LAMA |     -   -94     -     -    68     -     -     -     - |
 LPGS |     -     -   -14    22    47     -     -   -51   -15 |
 MAC1 |     -     -     -    -1   -90     -     -    75     0 |
 MAL2 |     -    12     -    -5     -     -     -     -     - |
 MAS1 |     -   -14   -19    20     X     -     -     5   -63 |
 MATE |     -     -   -55     -    81     -     -     -     - |
 MAW1 |     -     -     -     5    39     -     -   -38     - |
 MBAR |     -    18     -     0  -142     -     -   105    23 |
 MCM4 |     -     -     8   -58    20     -     -    49    -6 |
 MDO1 |     -     -    15    18   -14     -     -   -31     - |
 METS |     -    10     -    -5     -     -     -     -   -10 |
 MIZU |     -    61   -30     -     -     -     -     -   -43 |
 MKEA |     -     -     -    30   -48     -     -     -     - |
 NICO |     -   -77     -   116    72     -     -  -163     - |
 NIST |     -   137   -66     -     -     -     -     -     - |
 NLIB |     -     -   -29    80  -134     -     -    40  -373 |
 NNOR |     -     -  -107   131     -     -     -   -40   -17 |
 NRC1 |     -     -    43   -34   -11     -     -     -  -104 |
 NTUS |     -   -87     -    28    60     -     -   -34   -44 |
 NYA1 |     -   379     -  -172     -     -     -     -   402 |
 NYAL |     -     -   -74     -   198     -     -   -71     - |
 OHI2 |     -     -     -     -    45     -     -   -37     - |
 ONSA |     -    -3   -17   -17    20     -     -    29   -14 |
 OUS2 |     -     -     -   -34     -     -     -    44     - |
 PDEL |     -     -     -   118   -72     -     -   -87     - |
 PIE1 |     -     -   125   -44  -116     -     -     -     - |
 PIMO |     -     -     -    -3   -36     -     -    34     - |
 POL2 |     -     -     -   -24    39     -     -    -1     - |
 POTS |     -    55     -     -   -40     -     -     -   -22 |
 PRDS |     -     -    39     -     -     -     -   -48  -106 |
 PTBB |     -   -15     7     -     -     -     -     -    -9 |
 QAQ1 |     -     -   -18    13     -     -     -     5     - |
 RABT |     -     -     -   -15     -     -     -    19     - |
 RESO |     -    38     -     -   -27     -     -     -     - |
 REUN |     -    91     -    14   -88     -     -     -     - |
 SANT |     -   -13     -     4     2     -     -     -     - |
 SCH2 |     -     -    61   -83    85     -     -   -35   -50 |
 SCUB |     -     -     -  -102     -     -     -   132     - |
 SEY1 |     -     -     -  -117   -23     -     -   171     - |
 SHAO |     -     -     -     -   -47     -     -    38    34 |
 SPT0 |     -   -22    11     -     -     -     -     -   -56 |
 SSIA |     -  -299     -     -   216     -     -     -     - |
 SUTH |     -   -94     -     -     -     -     -    55     - |
 SUTM |     -     -   -16     -    23     -     -     -     - |
 SUWN |     -     -    15     -     -     -     -   -19  -168 |
 SYOG |     -    35  -226   224     -     -     -    31     - |
 THTI |     -     -    51    -8   -36     -     -   -22    -8 |
 THU3 |     -   -54    55  -100   117     -     -     -   -31 |
 TIDB |     -     -   -79    37   -47     -     -    87   -32 |
 TOW2 |     -     -     -    60    -6     -     -   -70     - |
 TSKB |     -    11   -69    64    92     -     -   -58  -154 |
 UNSA |     -     -     -   -39     X     -     -    50   -67 |
 USN3 |     -   -29    14     -     -     -     -     -   -77 |
 USUD |     -     -   -44     -    65     -     -     -     - |
 VILL |     -     -    24    39   -99     -     -     -     - |
 WAB2 |     -   -21     -     -    15     -     -     -   -19 |
 WHIT |     -   -22     -    30     -     -     -   -25   -20 |
 WILL |     -   -31    20    -5     -     -     -     -   -36 |
 WSRT |     -    79    39     -  -115     -     -     -     9 |
 WTZR |     -   -83     X   248   -58     -     -  -226    23 |
 XMIS |     -     -     -   -11    18     -     -     -     - |
 YELL |     -   -39    22   -33    48     -     -     X     - |
 ZECK |     -   -87     -     -     -     -     -    51     - |
 ZWE2 |     -     9     -     -    -7     -     -     X     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   usn | NEPO    RMS
 -----+-------------------------------------------------------+-------------
    2 |   616    22    11    14    10    46   942    18    28 |  288    250
    3 |  4565     X    28     X    32   330  3737    53    61 |  272   3282
    4 |  2605    16    12    18    16    54  1269    28    26 |  288    746
    6 |   580     X     X    25    36    49  1884    59   107 |  261    371
    7 |  1297    22    12    19    14    85  1410     8    70 |  288    245
    8 |  7158    23    18     7    16    62  2783    11    58 |  288   2244
    9 |  7427    27    11     9    13    58  3926    13    85 |  288   3183
   10 |  3569    22    12    13     8    42  1771    11    57 |  288   2136
   11 |   763    21    14    11    22    54   573    12    32 |  288    439
   12 |   595    37    15    17    13    60   478    14    77 |  288    321
   13 |  1151    20    17    13    51    65   489    14    56 |  288    228
   14 |  1450    25    13     9    24    83   696    14    62 |  288    316
   15 |  1366    17     9    11    17    47  1278    10    62 |  288    220
   16 |   504    22    15    11    14    80   358    12    32 |  288    343
   17 |  1125    26    18     9     X    75   487     9    37 |  288    353
   18 |  1150    21    12    12    19    69   814    13    29 |  288    229
   19 |   883    23    12    12     X    56   539     9    53 |  288    366
   20 |   912    36    13     9    11    43   403    11    43 |  288    252
   21 |   853    68    15    18     X    63   693    11    60 |  288    318
   22 |   876    16    13     9    19    61  1249    10    28 |  288    295
   23 |   551    39    16    17    40    62   408    20    56 |  288    241
   24 |  2830    31    14     8     9    69  2216    12    42 |  288   2636
   25 |  1589    51     -    28    24    58     -     -     - |  288    471
   26 |  1005    16     X    14    19    84   405     X    47 |  242    595
   27 |  4097    24    10     8    17    58  2654    10    80 |  288   4560
   28 |   902    24    26    10    16    71  1319     8    30 |  288    781
   29 |   838    29    15     9     X    59   357     9    66 |  288    236
   30 |  4832    43    14    15    36    49  2881    11    59 |  288   2294
   31 |  1932    23    12    11    17    77  1469    21    44 |  288    550
   32 |  1013    41    12    10    18    49   826     X    55 |  288    419
 -----+-------------------------------------------------------+-------------
 ABPO |     -     -     -     -    17     -     -    14     - |  285   8807
 ALGO |     -    35    10    10    17     -     -    11    15 |  288     29
 ALIC |     -    28     -    24    11     -     -    23     - |  288   3621
 AMC2 |     -    18     -     7     -     -     -    12    22 |  288     23
 AREQ |     -     -    24    17    20     -     -     X     - |  287    >>>
 ASPA |     -    27     -    20    32     -     -    20     - |  288   5266
 AUCK |     -    29     -    23    34     -     -    22     - |  287   3696
 BOR1 |     -    18     -     7    15     -     -     -    18 |  288   4974
 BRFT |     -    13     -    12    15     -     -    14     - |  288     94
 BRUS |     -    21    10     -     -     -     -     -    23 |  288     26
 CAS1 |     -     -     -    10    14     -     -    10    49 |  288   3148
 CCJM |     -     -     -    15    23     -     -     -     - |  288    860
 CEDU |     -    35     -    12    15     -     -    26    18 |  288    390
 CHPI |     -     -     -    10     -     -     -    13    53 |  288  11871
 CHUR |     -    30    11    14    18     -     -    13     - |  288  12047
 COCO |     -    25     -     -    18     -     -     -    47 |  287   5031
 CONZ |     -     -     -     6     -     -     -     8     - |  288     31
 CRO1 |     -     -    12    17    17     -     -    15    22 |  288     46
 DAEJ |     -    19     -     8     -     -     -     -     - |  216   1453
 DARW |     -    29    17    19    20     -     -    22     - |  288   4031
 DAV1 |     -    34     -    11    12     -     -     -     - |  288   3799
 DGAR |     -     -     -    17    16     -     -    18    20 |  288   9063
 DRAO |     -    12     7     8     -     -     -     -    13 |  288   1687
 FAA1 |     -    29     -    13     X     -     -     -     - |  274   5471
 FAIR |     -     -    39     -    58     -     -     -     - |  275   7438
 FLIN |     -     -     -     8    12     -     -     -     - |  288   4221
 GLPS |     -     -     -    10    16     -     -     7     - |  288   8018
 GLSV |     -    27     -    10    23     -     -    13     - |  288   3035
 GODE |     -     -    22    17    34     -     -     -    15 |  288     75
 GOLD |     -     -     -     9    13     -     -     9    29 |  288  10074
 GRAS |     -     -     -    19    30     -     -     -     - |  276   6421
 GRAZ |     -    20    10     -    10     -     -     -     - |  288   5063
 GUAM |     -     -     -    25    28     -     -    22    71 |  288   9567
 GUAT |     -    41     -    16    32     -     -    24     - |  288   3559
 HARB |     -     X    15     X     -     -     -    18     - |  250  53621
 HLFX |     -     -    16    15     -     -     -     -    27 |  288  62219
 HOB2 |     -    37     -    19    18     -     -     -    95 |  288     63
 HOFN |     -    23     -     6     X     -     -    11    24 |  287    >>>
 HRAO |     -     -     -    17    28     -     -     -    62 |  288     32
 HYDE |     -     -     -     -    17     -     -    14     - |  288   3160
 IENG |     -    17     8     -     -     -     -     -    21 |  288     33
 IISC |     -     -     -     9    14     -     -     -    36 |  288   7794
 IRKT |     -     -    16     -    24     -     -     -    93 |  288    199
 ISPA |     -     -     -    13    23     -     -    11    58 |  288   9040
 JPLM |     -     -     6     -     8     -     -     -    62 |  260   4686
 KARR |     -    22     -    15    19     -     -    15     - |  288   5457
 KERG |     -     -     8     7     -     -     -     -    22 |  288   1057
 KIRU |     -     -     9     8     -     -     -     -     - |  237  23613
 KIT3 |     -     -     -    12    20     -     -     9    20 |  288  11812
 KOKB |     -     -     9    12     -     -     -    19    46 |  288    112
 KOUR |     -     -    18    16    18     -     -    23    44 |  288    130
 LAMA |     -    16     -     -    11     -     -     -     - |  288   4139
 LPGS |     -     -    26    13    26     -     -    16    59 |  287  22286
 MAC1 |     -     -     -    21    50     -     -    20    76 |  288   5256
 MAL2 |     -    17     -     8     -     -     -     -     - |  288   6008
 MAS1 |     -    16    12    11     X     -     -    16    27 |  288   4903
 MATE |     -     -     8     -    12     -     -     -     - |  288     70
 MAW1 |     -     -     -     7    11     -     -    12     - |  286   3837
 MBAR |     -    32     -     9    17     -     -    22    27 |  288   9777
 MCM4 |     -     -    12    11    21     -     -     8    87 |  288   5810
 MDO1 |     -     -    10    10    14     -     -     9     - |  288   6302
 METS |     -    54     -    24     -     -     -     -    88 |  280    >>>
 MIZU |     -    43    21     -     -     -     -     -    28 |  265    404
 MKEA |     -     -     -     8    13     -     -     -     - |  288  10649
 NICO |     -    21     -     8     9     -     -     9     - |  288   4171
 NIST |     -    28    13     -     -     -     -     -     - |  288     26
 NLIB |     -     -    10    11    15     -     -    11    20 |  288     69
 NNOR |     -     -    12    18     -     -     -    14    17 |  288    329
 NRC1 |     -     -    10    13    17     -     -     -    25 |  288     33
 NTUS |     -    29     -    26    28     -     -    24    30 |  288   2818
 NYA1 |     -     8     -     4     -     -     -     -    28 |  288    126
 NYAL |     -     -     9     -     9     -     -     9     - |  288    125
 OHI2 |     -     -     -     -    56     -     -    45     - |  287    >>>
 ONSA |     -    15     9     9    13     -     -    10    31 |  288     33
 OUS2 |     -     -     -     9     -     -     -    11     - |  288   1522
 PDEL |     -     -     -     8    13     -     -    12     - |  288   3511
 PIE1 |     -     -    12    15    11     -     -     -     - |  288     14
 PIMO |     -     -     -    26    14     -     -    30     - |  288   7801
 POL2 |     -     -     -    13    17     -     -    10     - |  288   8649
 POTS |     -    18     -     -    13     -     -     -   207 |  288    >>>
 PRDS |     -     -     7     -     -     -     -     8    20 |  288    >>>
 PTBB |     -    19     9     -     -     -     -     -    25 |  288    268
 QAQ1 |     -     -    16    11     -     -     -     9     - |  288   6842
 RABT |     -     -     -     7     -     -     -     9     - |  288  10084
 RESO |     -    16     -     -    12     -     -     -     - |  288   6275
 REUN |     -    24     -     9    17     -     -     -     - |  288   4769
 SANT |     -    18     -    11    13     -     -     -     - |  288   1141
 SCH2 |     -     -     9     8    14     -     -     9    18 |  288  14029
 SCUB |     -     -     -    15     -     -     -    20     - |  288  17991
 SEY1 |     -     -     -    15    22     -     -    13     - |  288   8069
 SHAO |     -     -     -     -    18     -     -    15    71 |  288     98
 SPT0 |     -    13     6     -     -     -     -     -    29 |  288     50
 SSIA |     -    20     -     -    15     -     -     -     - |  288   5587
 SUTH |     -    29     -     -     -     -     -    17     - |  288   7927
 SUTM |     -     -    20     -    31     -     -     -     - |  288  16755
 SUWN |     -     -    30     -     -     -     -    36    73 |  288   5589
 SYOG |     -    41    13    19     -     -     -    14     - |  267    794
 THTI |     -     -    16    19    30     -     -    19    58 |  288  10234
 THU3 |     -    23    16    13     9     -     -     -    16 |  288   7888
 TIDB |     -     -    14    20    11     -     -    18    65 |  288   8872
 TOW2 |     -     -     -    22    16     -     -    22     - |  288   3273
 TSKB |     -    32    20    16    29     -     -    28    80 |  288   1161
 UNSA |     -     -     -    22     X     -     -    29   153 |  256    >>>
 USN3 |     -    23    11     -     -     -     -     -    19 |  288     35
 USUD |     -     -    11     -    17     -     -     -     - |  288     41
 VILL |     -     -    13    11    14     -     -     -     - |  288   7296
 WAB2 |     -    23     -     -    17     -     -     -    38 |  288    387
 WHIT |     -    26     -     8     -     -     -    12    21 |  288   2763
 WILL |     -    28     7    14     -     -     -     -    17 |  288  26346
 WSRT |     -    23    11     -    12     -     -     -    24 |  288    507
 WTZR |     -    26     X     9    10     -     -    12    18 |  288     39
 XMIS |     -     -     -    15    24     -     -     -     - |  288   3126
 YELL |     -    28    15    11    12     -     -     X     - |  288     25
 ZECK |     -    19     -     -     -     -     -    11     - |  288   9231
 ZWE2 |     -    17     -     -    12     -     -     X     - |  288    >>>
 -----+-------------------------------------------------------+-------------
 TOT  |  2697    27    15    14    22    84  1643    18    56 |




CLOCK JUMP CORRECTIONS APPLIED
------------------------------

CEN | STA/SAT | EPOCH           |     JUMP(ps)
----+---------+-----------------+-------------
cod |     25  | 1547-0 23:30:00 |        -559
esa |   MCM4  | 1547-0  8:25:00 |        1481
esa |   MCM4  | 1547-0  8:40:00 |       -1439
esa |   SYOG  | 1547-0 22:30:00 |         672



---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288    9.08   | 3.11e-14  5.07e-15  1.04e-15 |
 WTZR |   288     0     0   288    7.83   | 3.72e-14  6.29e-15  2.09e-15 |
 PIE1 |   288     0     0   288    7.52   | 4.12e-14  6.50e-15  1.75e-15 |
 IENG |   288     0     0   288    7.43   | 3.73e-14  9.15e-15  1.35e-15 |
 USN3 |   288     0     0   288    6.24   | 5.11e-14  1.45e-14  3.39e-15 |
 NLIB |   288     0     0   288    5.99   | 3.99e-14  7.93e-15  9.13e-15 |
 CONZ |   288     0     0   288    5.98   | 3.48e-14  7.09e-15  1.67e-15 |
 YELL |   288     0     0   288    5.89   | 3.02e-14  9.20e-15  1.41e-15 |
 ONSA |   288     0     0   288    5.66   | 4.91e-14  9.85e-15  2.22e-15 |
 AMC2 |   288     0     0   288    5.04   | 3.81e-14  9.18e-15  1.53e-15 |
 NRC1 |   288     0     0   288    4.73   | 4.25e-14  1.58e-14  2.25e-15 |
 NIST |   288     0     0   143    4.52   | 3.80e-14  7.56e-15  1.82e-15 |
 SPT0 |   288     0     0   287    3.79   | 5.65e-14  1.12e-14  4.71e-15 |
 WSRT |   288     1     0   287    2.93   | 3.04e-14  1.01e-14  2.12e-15 |
 BRFT |   288     0     0   288    2.20   | 3.77e-14  1.06e-14  9.00e-15 |
 NYA1 |   288     0     0   288    2.16   | 3.80e-14  3.26e-14  7.49e-15 |
 ALGO |   288     1     0   217    1.77   | 2.72e-14  5.72e-15  3.88e-15 |
 CRO1 |   288     0     2   227    1.75   | 1.17e-13  1.79e-14  3.62e-15 |
 GODE |   288     0     0   288    1.67   | 6.34e-14  1.26e-14  5.14e-15 |
 HOB2 |   288     1     0   287    1.41   | 4.54e-14  1.39e-14  4.57e-15 |
 MATE |   288     0     0   288    1.17   | 5.12e-14  1.87e-14  8.93e-15 |
 HRAO |   288     0     0   288    1.09   | 3.68e-14  6.85e-15  3.48e-15 |
 USUD |   288     0     0   166    1.05   | 8.55e-14  1.09e-14  1.99e-15 |
 KOKB |   288     0     0   288    0.93   | 8.90e-14  1.06e-14  7.78e-15 |
 NYAL |   288     0     0   288    0.47   | 4.50e-14  3.26e-14  7.48e-15 |
 IRKT |   288     0     0   288    0.44   | 1.09e-13  2.80e-14  1.74e-14 |
 KOUR |   288     0     0   288    0.29   | 5.76e-14  1.80e-14  1.28e-14 |
 METS |   280     1     0   275    0.16   | 2.45e-13  3.28e-14  3.71e-14 |
 G25  |   288     0     0   288    0.16   | 2.11e-13  6.12e-14  6.31e-14 |
 PTBB |   288     4     3   127    0.12   | 3.46e-13  6.31e-14  2.34e-14 |
 WAB2 |   288     0     0   288    0.11   | 3.16e-13  1.22e-13  3.78e-14 |
 G32  |   288     0     0   288    0.11   | 2.39e-13  7.14e-14  5.44e-14 |
 CEDU |   288     0     0   288    0.05   | 2.55e-13  6.08e-14  2.40e-14 |
 G04  |   288     0     0   288    0.05   | 4.28e-13  1.26e-13  8.72e-14 |
 G26  |   242     0     0   241    0.03   | 4.76e-13  1.14e-13         - |
 SHAO |   288     0     0   288    0.03   | 7.43e-14  1.30e-14  6.14e-15 |
 G06  |   261     0     2    71    0.03   | 4.84e-13  1.15e-13  2.14e-14 |
 MIZU |   265     1     0   137    0.02   | 3.96e-13  1.13e-13  2.39e-14 |
 KERG |   288     0     0   288    0.02   | 8.09e-13  2.01e-13  1.13e-13 |
 SYOG |   267     0     0   267    0.01   | 9.65e-13  2.57e-13  8.69e-14 |
 SANT |   288     0     0   288    0.01   | 9.45e-13  2.32e-13  1.09e-13 |
 TSKB |   288     0     0   288    0.01   | 1.18e-12  3.52e-13  7.84e-14 |
 HARB |   250     1     0   246    0.01   | 1.27e-12  3.16e-13         - |
 CCJM |   288     0     0   143    0.01   | 8.85e-13  2.00e-13  8.26e-14 |
 G24  |   288     0     0   288    0.00   | 1.47e-12  4.41e-13  3.11e-13 |
 G03  |   272     0     0   269    0.00   | 1.26e-12  4.41e-13  4.02e-13 |
 G30  |   288     0     0   288    0.00   | 1.35e-12  5.00e-13  2.06e-13 |
 DRAO |   288     0     0   288    0.00   | 6.00e-13  2.16e-13  1.15e-13 |
 DAEJ |   216     0     0    71    0.00   | 1.65e-12  4.83e-13         - |
 OUS2 |   288     0     2    63    0.00   | 5.08e-13  1.44e-13  1.68e-13 |
 GPST |   288     0     0     0    0.00   | 2.18e-14  3.97e-15  1.31e-15 |
 UNSA |   256     2     0     0    0.00   |        -         -         - |
 OHI2 |   287     0     0     0    0.00   |        -         -         - |
 HOFN |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   287     0     0     0    0.00   |        -         -         - |
 G31  |   288     0     6     0    0.00   | 6.17e-13  6.25e-14  3.77e-14 |
 G29  |   288     0     6     0    0.00   | 6.57e-13  7.74e-14  2.25e-14 |
 G28  |   288     0     6     0    0.00   | 6.83e-13  7.89e-14  5.21e-14 |
 G27  |   288     0     0     0    0.00   | 1.36e-12  5.93e-13  6.28e-13 |
 G23  |   288     0     6     0    0.00   | 5.38e-13  6.30e-14  2.29e-14 |
 G22  |   288     2     6     0    0.00   | 1.18e-12  1.38e-13  5.46e-14 |
 G21  |   288     1     6     0    0.00   | 9.41e-13  1.08e-13  2.33e-14 |
 G20  |   288     0     6     0    0.00   | 8.35e-13  9.32e-14  1.88e-14 |
 G19  |   288     0     6     0    0.00   | 6.54e-13  7.38e-14  4.42e-14 |
 G18  |   288     0     6     0    0.00   | 7.05e-13  6.86e-14  2.23e-14 |
 G17  |   288     0     6     0    0.00   | 6.46e-13  7.85e-14  1.92e-14 |
 G16  |   288     0     6     0    0.00   | 5.91e-13  5.98e-14  4.22e-14 |
 G15  |   288     1     6     0    0.00   | 5.61e-13  6.68e-14  1.84e-14 |
 G14  |   288     0     6     0    0.00   | 5.57e-13  6.39e-14  2.64e-14 |
 G13  |   288     0     6     0    0.00   | 5.53e-13  6.77e-14  2.41e-14 |
 G12  |   288     0     6     0    0.00   | 6.00e-13  6.59e-14  3.58e-14 |
 G11  |   288     0     6     0    0.00   | 6.96e-13  6.87e-14  3.87e-14 |
 G10  |   288     0     0     0    0.00   | 1.29e-12  4.02e-13  1.58e-13 |
 G09  |   288     0     0     0    0.00   | 1.31e-12  4.37e-13  3.39e-13 |
 G08  |   288     0     0     0    0.00   | 1.46e-12  3.70e-13  2.73e-13 |
 G07  |   288     0     6     0    0.00   | 5.68e-13  6.97e-14  2.39e-14 |
 G02  |   288     0     6     0    0.00   | 5.50e-13  7.54e-14  2.76e-14 |
 ZWE2 |   288     0     0     0    0.00   |        -         -         - |
 ZECK |   288     0     0     0    0.00   |        -         -         - |
 XMIS |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 TIDB |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     2     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   |        -         -         - |
 SUWN |   288     0     0     0    0.00   |        -         -         - |
 SUTM |   288     1     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SSIA |   288     0     0     0    0.00   |        -         -         - |
 SEY1 |   288     0     0     0    0.00   |        -         -         - |
 SCUB |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 REUN |   288     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 RABT |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 PRDS |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     2     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   288     0     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     6     0    0.00   | 1.23e-12  1.02e-13  2.76e-14 |
 NICO |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     0     0    0.00   |        -         -         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   286     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 2.21e-13  5.60e-13  5.50e-13 |
 MAL2 |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   287     0     0     0    0.00   |        -         -         - |
 LAMA |   288     0     0     0    0.00   |        -         -         - |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   237     0     0     0    0.00   |        -         -         - |
 KARR |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   260     0     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HYDE |   288     0     0     0    0.00   |        -         -         - |
 HLFX |   288     0     1     0    0.00   | 2.44e-13  6.09e-13  3.50e-12 |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GRAS |   276     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLSV |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 FLIN |   288     0     0     0    0.00   |        -         -         - |
 FAIR |   275     0     0     0    0.00   |        -         -         - |
 FAA1 |   274     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   |        -         -         - |
 COCO |   287     0     0     0    0.00   |        -         -         - |
 CHUR |   288     0     1     0    0.00   | 3.62e-13  3.03e-13  1.00e-12 |
 CHPI |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOR1 |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   287     0     0     0    0.00   | 1.60e-12  1.11e-12  5.19e-13 |
 ALIC |   288     0     0     0    0.00   |        -         -         - |
 ABPO |   285     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.80e-17  3.36e-16  2.02e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     ALGO      BRUS      BRUS |
------------------------------------------+------------------------------+
