
 GPS week: 1402   Day: 2   MJD: 54060                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2876     16     0.49    -0.70     3.29     0.00      0
 cod |   288     0  24293      1     0.28    -0.39     0.04    31.15      0
 emr |   288     0  19995    272   -57.96    -0.37     0.05    21.39      0
 esa |   288     0  18413    371     2.75     0.95     0.06    18.21      0
 gfz |   285     0  26377     62     0.44    -1.04     0.04    29.25      0
 iga |    96     0   2874     48     0.85    -1.32     0.06     0.00      0
 igu |    96     0   2783      0     0.85    -1.26     3.33     0.00      0
 jpl |   288     0  16834     29     2.18     0.76     0.10     0.00      0
 ngs |    96     0   2781     10     0.69    -0.98     2.65     0.00      0
 usn |   288     3  26379    464     1.02     0.67     0.09     0.00      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------------+
    1 |  1626   -25    10    10    14    25  4913   -19    34 -2639 |
    2 |   -14  -116   -34    71   110    42  1875    48   161  -877 |
    3 | -4843   -11   -15   -57    59    18-12635   -19 -4193 -4008 |
    4 | -3497   -48  -277   338    30    -2 -1082    60 -3373 -3033 |
    5 | -1851   -88   -24    42    86   -77 -8987   -70 -2016 -3572 |
    6 |   147    17  -113   210   -67    94 -2110    -1  -668 -4285 |
    7 |  -344  -161   -43   136   120     0 -2585  -206  -758 -2737 |
    8 | -6518   -29    -8    44    10   -42 -7296   -12 -4691 -3279 |
    9 | -4044    26   -82    46     5   -21  4590    11 -3041 -3173 |
   10 | -1862  -160    58     2   128  -103  2789  -155 -1297 -3217 |
   11 |  7445    56   119   -85   -99    76  3734   163  6741 -1918 |
   13 |  4117    66  -209   194   -39    35  3513   146  4053 -3013 |
   14 |  3729    43   -35   -76    27    37  1637    54  3977 -2728 |
   15 |  4847    19     X   -76    23   150     -   -82  -187 -2989 |
   16 |  3745   -33    24    37    -5  -104  2169   -42  3726 -3162 |
   17 |  3193   154  -280   200   -84   -31  2744   236  2381  -904 |
   18 |  4327   -66    33   -93   105    20  2641     7  4214 -2453 |
   19 |  2301  -235   172    24   110  -202  1155    95  2131 -1017 |
   20 |  4671  -176   124    23    83   -79  1033  -131  4211 -2537 |
   21 |  4290   -63     2   -11    76   -68  2482    21  4414 -3016 |
   22 | -2180     9    37  -138    50    68 -1671   -17 -2179 -1445 |
   23 |  1321    43    84  -197    15   -13  1316   230   987  -735 |
   24 |  -921  -114  -166   266    74   -46  1910    58 -1142 -3571 |
   25 | -2810    -4   -53    18    33    84 -9509    33 -3483 -3030 |
   26 | -1851    31  -173   173   -14   -48  4086    34 -1835 -3104 |
   27 | -4852   -40   -79    50    71    10  9500   -35 -4615 -3598 |
   28 |  4041    58    34  -146     4    49   929    36  3854 -1705 |
   29 | -4753    72   -57     -   -39   218 -6009   142     - -3105 |
   30 | -7186    17  -176    97    51   105  1219   195 -6351 -3727 |
   31 | -1301   224   141    63  -385   -88 -2411   384 -1058 -1322 |
 -----+-------------------------------------------------------------+
 ALGO |     -     1   -76    88     -     -     -     -     -  1072 |
 ALIC |     -    43     -     -   -46     -     -  -112     -  1136 |
 AMC2 |     -   -60   114   -30     -     -     -   -58     -  1271 |
 AREQ |     -     -   -17     -    12     -     -   -35     -  1215 |
 AUCK |     -  -240     -     -   255     -     -     -     -  1066 |
 BAHR |     -   -28   -69     -    81     -     -     -     -  1207 |
 BOGT |     -     -     -    46   -28     -     -     -     -  1097 |
 BOR1 |     -    65     -     -   -70     -     -     -     -  1072 |
 BRFT |     -    34     -     -   -36     -     -     -     -     - |
 BRUS |     -    51     -     -   -54     -     -     -     -  1206 |
 CAS1 |     -  -121     -    25   114     -     -   -69     -  1203 |
 CHUR |     -    17   -24     -     -     -     -     -     -  1168 |
 COCO |     -    94     -  -121   -25     -     -   -63     -  1256 |
 CRO1 |     -     -    63  -123    31     -     -    19     -  1243 |
 DAEJ |     -   -11   220  -239     -     -     -     -     -     - |
 DARW |     -   394   238     -  -603     -     -   297     -     - |
 DAV1 |     -  -155     -     -   165     -     -     -     -     - |
 DGAR |     -   -27     -     5    26     -     -     -     -  1222 |
 DRAO |     -    63   -29     -   -46     -     -    25     -  1320 |
 FAIR |     -   -25    70    15   -34     -     -     3     -     - |
 GLPS |     -     7     -     -    -7     -     -    -5     -  1141 |
 GODE |     -     -   -23     -    17     -     -     -     -  1185 |
 GOLD |     -     -     -     2    -2     -     -  -184     -  1174 |
 GRAZ |     -  -280    93     -   230     -     -     -     -  1319 |
 GUAM |     -     -     -   -18    11     -     -   -57     -  1072 |
 HARB |     -    15     -     -   -16     -     -     -     -  1267 |
 HOB2 |     -   -29    15  -187   138     -     -  -252     -  1195 |
 IISC |     -     -     -   -66    41     -     -     -     -     - |
 ISPA |     -     6     -     -    -7     -     -    34     -  1154 |
 JPLM |     -     -    75     -   -55     -     -   170     -  1611 |
 KARR |     -    42     -     -   -45     -     -    62     -  1292 |
 KERG |     -     -     -    32   -20     -     -     -     -  1529 |
 KIRU |     -    11     -   -19     -     -     -   -32     -  1285 |
 KOKB |     -     -    24     -   -18     -     -    95     -  1058 |
 KOUR |     -    52     -   -90     -     -     -     -     -  1292 |
 LAMA |     -   -21     -     -    23     -     -     -     -     - |
 LHAS |     -    17     -     -   -18     -     -     -     -  1105 |
 LPGS |     -   -71    90     X    10     -     -     -     -  1251 |
 MAC1 |     -    68     -   -69   -30     -     -   -26     -  1194 |
 MALI |     -    94     -  -142   -10     -     -     -     -     - |
 MAS1 |     -     -    23  -111    53     -     -   -37     -  1219 |
 MATE |     -   113     -  -164   -19     -     -     -     -  1429 |
 MBAR |     -    45     -     -   -48     -     -     -     -  1243 |
 MCM4 |     -     -  -236  -173   284     -     -  -367     -     - |
 MDO1 |     -     -    80     -   -58     -     -   115     -  1565 |
 MKEA |     -     -     -    10    -6     -     -  -154     -   891 |
 NISU |     -   245   409     -  -561     -     -   192     -     - |
 NLIB |     -     -   -47     -    35     -     -  -116     -  1103 |
 NYAL |     -     -    16     -   -12     -     -     -     -  1114 |
 OHI2 |     -    46     -     -   -49     -     -     -     -  1076 |
 ONSA |     -    14     -  -151    72     -     -     -     -     - |
 PDEL |     -    28     -   -37    -7     -     -     -     -     - |
 PERT |     -     -    18   -21     -     -     -     -     -  1239 |
 PETS |     -     -     -   -81    51     -     -     -     -     - |
 PIMO |     -     -     -  -166   103     -     -     -     -  1151 |
 POTS |     -   -16     -     -    17     -     -     -     -     - |
 PRDS |     -   -10    15     -     -     -     -     -     -  1335 |
 PTBB |     -     2    -4     -     -     -     -     -     -  1282 |
 QAQ1 |     -   -25    37     -     -     -     -     -     -  1325 |
 RBAY |     -    40     -     -   -43     -     -     -     -  1457 |
 RIOG |     -   -68     -   234   -74     -     -     -     -  1150 |
 SANT |     -   -32     -   236   -88     -     -     -     -     - |
 SCH2 |     -     3    -4     -     -     -     -     -     -  1317 |
 STJO |     -    12   -18     -     -     -     -     -     -  1376 |
 SYOG |     -     -    42     -   -31     -     -   -34     -  1255 |
 THTI |     -     -     -    40   -25     -     -     -     -  1279 |
 THU3 |     -     2     -     -    -2     -     -     -     -  1199 |
 TIDB |     -     -   -21   131   -67     -     -     -     -  1360 |
 TOW2 |     -    48     -     -   -51     -     -  -103     -  1364 |
 TSKB |     -   -23    56     -   -17     -     -  -115     -  1221 |
 TWTF |     -    25   -37     -     -     -     -     -     -  1249 |
 ULAB |     -     -     -  -190   119     -     -     -     -     - |
 UNSA |     -     -     -   -47    29     -     -     -     -  1391 |
 USN3 |     -     6    -8     -     -     -     -     -     -     - |
 USNO |     -    23   -34     -     -     -     -     -     -  1168 |
 USUD |     -     -   -30     4    20     -     -     -     -  1222 |
 WES2 |     -     -    82     -   -60     -     -     -     -     - |
 WILL |     -    17   -25     -     -     -     -     -     -  1260 |
 WSRT |     -    65   -44     -   -37     -     -     -     -  1097 |
 YAR2 |     -     7    68     -   -58     -     -  -370     -  1203 |
 YELL |     -   -22  -132   192     -     -     -     -     -   978 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  6325    66    79    65    55    39  6134    90  4846    97 |  288   3.97
    2 |   815    39    84    70    34    60  1492   199   776    73 |  288   0.16
    3 |  3636    26    50    31    29    36  7215    47  3321    93 |  288   1.20
    4 |  1066   113   124   136   142    91   958   149  1270   166 |  288   0.98
    5 |   788    23    28    48    23    41  5524    34   885    60 |  288   0.99
    6 |  2192    27    46    50    31    49  2609    83  2359    58 |  288   1.30
    7 |  1905    44    57    68    21    41  1118    51  1653    87 |  288   0.82
    8 |  5967    56    50    69    68    32  6179    81  4375   138 |  288   2.56
    9 |  2765    56    76    75    54    41  2121    35  2824   138 |  288   2.05
   10 |  4936    33    61    88    45    28  3499    82  4357   145 |  288   3.08
   11 |  1784    70    89    62    43    74  2360   135  1785    68 |  288   0.47
   13 |   837    56    77    59    56    60  2018   162   790   223 |  288   0.30
   14 |   735    52    66    62    51    29  1455   190   623    85 |  288   0.16
   15 |  9434   117     X   106   126   107     -   232  5463   278 |  279   8.30
   16 |   640    17    34    41    30    45  1481    76   567    65 |  288   0.27
   17 |  1366    37    86   105    43    58  2078   144  1273    82 |  288   0.24
   18 |   804    46    88    34    30    27  1834   194   846    69 |  288   0.28
   19 |   437    42    74    59    51    58   802   113   676   142 |  288   0.25
   20 |  1156    57    63    55    43    82   788   139  1261    70 |  288   0.30
   21 |   893    51    90   102    43    41  1567   222   904    63 |  288   0.31
   22 |  1318    48    78    34    37    31  1037   177  1528    87 |  288   0.38
   23 |   978    53    80    61    47    65   932   145   990   109 |  288   0.23
   24 |  4791    56    79    85    60    66  2861   128  4927   313 |  288   3.07
   25 |  7345    51    79   124    74    38  5229    45  5318    71 |  288   1.77
   26 |   682    54    54    47    46    85  1824    32   440    98 |  288   0.46
   27 |  3322    46    56    83    79    42  3749   100  3179   167 |  288   3.26
   28 |   993    45    37    74    35    42   528    88  1177   123 |  288   0.29
   29 |  1455    53    86     -    45   165  4564   136     -   144 |  285   1.38
   30 |  4338    16    50    82    39    34  5940    42  3106   120 |  288   1.70
   31 |   591    52    82   105    51    42  1584   209   748   135 |  288   0.65
 -----+-------------------------------------------------------------+--------------
 ALGO |     -    21    15    31     -     -     -     -     -    28 |  288   0.05
 ALIC |     -    14     -     -    15     -     -    46     -    42 |  285   9.68
 AMC2 |     -    11    31    42     -     -     -    27     -    33 |  288   0.03
 AREQ |     -     -    19     -    14     -     -    36     -    28 |  285  13.06
 AUCK |     -    18     -     -    19     -     -     -     -   115 |  285   6.05
 BAHR |     -    26    34     -    31     -     -     -     -    47 |  288   0.37
 BOGT |     -     -     -    25    16     -     -     -     -    90 |  285  10.57
 BOR1 |     -    20     -     -    22     -     -     -     -    58 |  285   1.13
 BRFT |     -    22     -     -    24     -     -     -     -     - |  285   0.10
 BRUS |     -    23     -     -    25     -     -     -     -    48 |  285   0.05
 CAS1 |     -    15     -    18    12     -     -    29     -    55 |  288   7.29
 CHUR |     -    14    20     -     -     -     -     -     -    33 |  288   5.04
 COCO |     -    22     -    34    20     -     -    44     -    65 |  288  12.91
 CRO1 |     -     -    31    27    17     -     -    33     -    41 |  288   0.06
 DAEJ |     -    22    17    29     -     -     -     -     -     - |  288   5.10
 DARW |     -    41    23     -    48     -     -    43     -     - |  288  17.81
 DAV1 |     -    26     -     -    27     -     -     -     -     - |  285   4.18
 DGAR |     -    20     -    34    23     -     -     -     -    67 |  288  12.16
 DRAO |     -    34    21     -    28     -     -    30     -    78 |  288   0.06
 FAIR |     -    18    21    22    15     -     -    18     -     - |  288   6.91
 GLPS |     -    24     -     -    25     -     -    38     -    40 |  285  17.74
 GODE |     -     -    29     -    21     -     -     -     -    24 |  285   0.05
 GOLD |     -     -     -    27    17     -     -    26     -    33 |  285   8.52
 GRAZ |     -    28    28     -    19     -     -     -     -    70 |  276   3.94
 GUAM |     -     -     -    44    27     -     -    66     -   105 |  285  13.36
 HARB |     -    36     -     -    39     -     -     -     -   170 |  260  31.51
 HOB2 |     -    39    31    43    48     -     -    37     -    48 |  288   0.18
 IISC |     -     -     -    22    14     -     -     -     -     - |  285  17.94
 ISPA |     -    22     -     -    23     -     -    58     -    62 |  285   8.65
 JPLM |     -     -    54     -    39     -     -   169     -    54 |  285    >>>
 KARR |     -    14     -     -    15     -     -    43     -    47 |  285  11.22
 KERG |     -     -     -    96    60     -     -     -     -   359 |  179   6.80
 KIRU |     -    21     -    37     -     -     -    48     -    64 |  288   5.80
 KOKB |     -     -    23     -    17     -     -    30     -   101 |  285   0.04
 KOUR |     -    23     -    39     -     -     -     -     -    52 |  288   3.10
 LAMA |     -    18     -     -    19     -     -     -     -     - |  285   7.71
 LHAS |     -    16     -     -    17     -     -     -     -    52 |  285  19.79
 LPGS |     -    42    34     X    48     -     -     -     -    61 |  288  17.63
 MAC1 |     -    15     -    31    16     -     -    34     -    64 |  288   7.85
 MALI |     -    29     -    37    26     -     -     -     -     - |  288  13.14
 MAS1 |     -     -    26    44    20     -     -    40     -    47 |  288  14.36
 MATE |     -    25     -    20    27     -     -     -     -    78 |  288   0.17
 MBAR |     -    53     -     -    57     -     -     -     -   136 |  280  14.82
 MCM4 |     -     -    21    39    16     -     -    36     -     - |  288   4.36
 MDO1 |     -     -    73     -    54     -     -    83     -   118 |  284    >>>
 MKEA |     -     -     -    16    10     -     -    30     -    47 |  285  17.64
 NISU |     -    13    27     -    15     -     -    21     -     - |  270   0.02
 NLIB |     -     -    28     -    20     -     -    33     -    41 |  283   0.05
 NYAL |     -     -    21     -    15     -     -     -     -    49 |  285   0.09
 OHI2 |     -    19     -     -    20     -     -     -     -    47 |  285   9.16
 ONSA |     -    17     -    26    23     -     -     -     -     - |  288   0.07
 PDEL |     -    19     -    22    15     -     -     -     -     - |  288  51.17
 PERT |     -     -    19    23     -     -     -     -     -    55 |  288   1.76
 PETS |     -     -     -    29    18     -     -     -     -     - |  285   9.06
 PIMO |     -     -     -    52    32     -     -     -     -    69 |  285  18.46
 POTS |     -    20     -     -    21     -     -     -     -     - |  285  10.87
 PRDS |     -    13    19     -     -     -     -     -     -    33 |  288   3.95
 PTBB |     -    21    31     -     -     -     -     -     -    47 |  288   0.20
 QAQ1 |     -    16    24     -     -     -     -     -     -    38 |  288   5.53
 RBAY |     -   109     -     -   116     -     -     -     -   128 |  237 430.65
 RIOG |     -    23     -    27    26     -     -     -     -    55 |  288   8.95
 SANT |     -    27     -    33    27     -     -     -     -     - |  288  12.87
 SCH2 |     -    13    19     -     -     -     -     -     -    31 |  288  93.46
 STJO |     -    14    21     -     -     -     -     -     -    33 |  288   0.06
 SYOG |     -     -    21     -    15     -     -    30     -    35 |  285   0.90
 THTI |     -     -     -    92    57     -     -     -     -   104 |  222   2.55
 THU3 |     -    25     -     -    27     -     -     -     -    34 |  285   5.47
 TIDB |     -     -    23    21    12     -     -     -     -    33 |  288   0.50
 TOW2 |     -    27     -     -    29     -     -    42     -    36 |  285   6.97
 TSKB |     -    27    18     -    32     -     -    30     -    47 |  288   1.17
 TWTF |     -    22    31     -     -     -     -     -     -    54 |  288   0.09
 ULAB |     -     -     -    24    15     -     -     -     -     - |  223  16.47
 UNSA |     -     -     -    29    18     -     -     -     -    48 |  285  18.85
 USN3 |     -    18    26     -     -     -     -     -     -     - |  288   0.03
 USNO |     -    13    18     -     -     -     -     -     -    30 |  288   0.03
 USUD |     -     -    19    22    10     -     -     -     -    50 |  288   0.09
 WES2 |     -     -    21     -    15     -     -     -     -     - |  285   0.04
 WILL |     -    10    15     -     -     -     -     -     -    25 |  286  16.09
 WSRT |     -    25    32     -    22     -     -     -     -    59 |  288   0.04
 YAR2 |     -    19    24     -    20     -     -    38     -    45 |  288  11.39
 YELL |     -    17    17    24     -     -     -     -     -    22 |  288   0.03
 -----+-------------------------------------------------------------+--------------
 TOT  |  3290    39    51    58    40    58  3332   100  2652    92 |


 BEST CLOCK FIT: NISU   270   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 AMC2 |   288     0     0   288   11.34   | 2.87e-14  4.64e-15  1.10e-15 |
 BRUS |   285     0     0   285   10.83   | 4.14e-14  1.15e-14  2.90e-15 |
 NLIB |   283     0     0   282   10.28   | 3.55e-14  7.01e-15  2.68e-15 |
 USNO |   288     0     0   288   10.28   | 3.02e-14  5.29e-15  1.20e-15 |
 ALGO |   288     0     0   288    9.99   | 3.09e-14  5.78e-15  4.03e-15 |
 NISU |   270     0     0   270    9.07   | 4.59e-14  7.49e-15  2.21e-15 |
 USN3 |   288     0     0   288    8.38   | 3.86e-14  6.42e-15  1.20e-15 |
 ONSA |   288     0     0   288    6.42   | 3.50e-14  1.03e-14  4.89e-15 |
 STJO |   288     0     0   143    4.26   | 3.39e-14  8.43e-15  2.69e-15 |
 YELL |   288     0     0   288    3.63   | 2.54e-14  3.58e-15  1.67e-15 |
 CRO1 |   288     0     0   288    3.09   | 1.19e-13  1.99e-14  5.02e-15 |
 WSRT |   288     0     0   288    2.79   | 3.98e-14  8.34e-15  2.18e-15 |
 WES2 |   285     0     0   140    1.79   | 4.33e-14  6.45e-15  3.78e-15 |
 TWTF |   288     0     0   288    1.58   | 5.15e-14  1.40e-14  4.36e-15 |
 DRAO |   288     0     0   288    1.28   | 3.31e-14  7.59e-15  4.33e-15 |
 HOB2 |   288     0     0   288    1.00   | 1.94e-13  3.91e-14  1.61e-14 |
 MATE |   288     0     0   143    0.73   | 4.59e-14  1.63e-14  1.40e-14 |
 KOKB |   285     0     0   285    0.56   | 6.72e-14  1.61e-14  5.74e-15 |
 GODE |   285     0     0   285    0.51   | 4.34e-14  9.81e-15  4.58e-15 |
 NYAL |   285     0     0   140    0.43   | 2.94e-14  6.88e-15  6.58e-15 |
 TIDB |   288     0     0   288    0.29   | 1.05e-13  6.85e-14  3.12e-14 |
 PTBB |   288     0     0   288    0.28   | 2.78e-13  6.82e-14  1.46e-14 |
 G26  |   288     0     0   288    0.23   | 3.91e-13  8.69e-14  2.80e-14 |
 G05  |   288     0     0   288    0.21   | 1.84e-13  5.61e-14  5.60e-14 |
 G31  |   288     0     2   126    0.14   | 5.47e-13  6.00e-14  4.36e-14 |
 G25  |   288     0     0   288    0.10   | 4.21e-13  1.41e-13  1.13e-13 |
 G11  |   288     0     3   133    0.08   | 6.09e-13  6.37e-14  5.88e-14 |
 BOR1 |   285     0     0   285    0.07   | 4.42e-13  1.12e-13  9.14e-14 |
 G03  |   288     0     0   288    0.07   | 3.08e-13  1.19e-13  8.74e-14 |
 BAHR |   288     0     0   288    0.06   | 3.74e-13  1.00e-13  2.67e-14 |
 G07  |   288     0     0   288    0.05   | 2.97e-13  1.10e-13  1.02e-13 |
 G06  |   288     0     0   288    0.04   | 5.91e-13  1.60e-13  1.06e-13 |
 BRFT |   285     0     0   140    0.04   | 5.88e-14  1.43e-14  9.84e-15 |
 SYOG |   285     0     0   285    0.03   | 7.78e-13  2.11e-13  9.36e-14 |
 G04  |   288     0     0   288    0.02   | 4.67e-13  1.39e-13  1.14e-13 |
 G29  |   285     0     0   285    0.02   | 2.23e-13  9.85e-14  1.41e-13 |
 USUD |   288     0     6    21    0.01   | 2.85e-13  4.62e-14  4.28e-15 |
 G30  |   288     0     0   288    0.01   | 1.27e-12  3.61e-13  1.50e-13 |
 TSKB |   288     0     0   288    0.01   | 9.77e-13  2.99e-13  9.49e-14 |
 G15  |   279     0     1   143    0.01   | 2.44e-13  1.25e-13  4.94e-13 |
 G09  |   288     0     0   250    0.00   | 1.44e-12  4.82e-13  2.47e-13 |
 THTI |   222     0     0   219    0.00   | 3.82e-13  1.88e-13         - |
 KOUR |   288     0     0   143    0.00   | 1.37e-12  4.74e-13  3.51e-13 |
 GPST |   288     0     0     0    0.00   | 2.84e-14  6.94e-15  2.06e-15 |
 HARB |   260     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 6.27e-13  6.17e-14  2.58e-14 |
 G27  |   288     0     0     0    0.00   | 1.20e-12  4.51e-13  3.74e-13 |
 G24  |   288     0     0     0    0.00   | 1.26e-12  4.59e-13  3.13e-13 |
 G23  |   288     0     4     0    0.00   | 5.13e-13  6.01e-14  1.86e-14 |
 G22  |   288     3     6     0    0.00   | 7.64e-13  1.03e-13  4.52e-14 |
 G21  |   288     0     6     0    0.00   | 1.06e-12  1.48e-13  2.49e-14 |
 G20  |   288     0     6     0    0.00   | 6.11e-13  7.42e-14  2.96e-14 |
 G19  |   288     1     6     0    0.00   | 6.08e-13  8.13e-14  4.17e-14 |
 G18  |   288     0     6     0    0.00   | 7.18e-13  6.72e-14  2.83e-14 |
 G17  |   288     0     6     0    0.00   | 6.18e-13  6.27e-14  2.50e-14 |
 G16  |   288     0     6     0    0.00   | 5.06e-13  5.84e-14  3.40e-14 |
 G14  |   288     0     6     0    0.00   | 5.68e-13  5.95e-14  1.58e-14 |
 G13  |   288     0     6     0    0.00   | 7.05e-13  1.41e-13  2.41e-14 |
 G10  |   288     0     0     0    0.00   | 1.26e-12  4.34e-13  3.93e-13 |
 G08  |   288     0     0     0    0.00   | 1.39e-12  4.31e-13  2.77e-13 |
 G02  |   288     0     6     0    0.00   | 5.59e-13  5.52e-14  1.57e-14 |
 G01  |   288     0     0     0    0.00   | 1.71e-12  6.72e-13  4.02e-13 |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WILL |   286     0     0     0    0.00   |        -         -         - |
 UNSA |   285     0     0     0    0.00   |        -         -         - |
 ULAB |   223     0     0     0    0.00   |        -         -         - |
 TOW2 |   285     0     0     0    0.00   |        -         -         - |
 THU3 |   285     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   288     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 RBAY |   237     2     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 PRDS |   288     0     0     0    0.00   |        -         -         - |
 POTS |   285     0     0     0    0.00   |        -         -         - |
 PIMO |   285     0     0     0    0.00   |        -         -         - |
 PETS |   285     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 2.07e-12  5.36e-13  1.74e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   285     0     0     0    0.00   |        -         -         - |
 MKEA |   285     0     0     0    0.00   |        -         -         - |
 MDO1 |   284     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     0     0    0.00   | 8.35e-13  4.82e-13  2.62e-13 |
 MBAR |   280     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   |        -         -         - |
 MALI |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 LHAS |   285     0     0     0    0.00   |        -         -         - |
 LAMA |   285     0     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 KERG |   179     0     0     0    0.00   |        -         -         - |
 KARR |   285     0     0     0    0.00   |        -         -         - |
 JPLM |   285     1     0     0    0.00   | 8.21e-13  2.67e-13  3.73e-13 |
 ISPA |   285     0     0     0    0.00   |        -         -         - |
 IISC |   285     0     0     0    0.00   |        -         -         - |
 GUAM |   285     0     0     0    0.00   |        -         -         - |
 GRAZ |   276     0     0     0    0.00   |        -         -         - |
 GOLD |   285     0     0     0    0.00   |        -         -         - |
 GLPS |   285     0     0     0    0.00   |        -         -         - |
 FAIR |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   285     0     0     0    0.00   | 2.08e-13  5.99e-13  4.21e-13 |
 DARW |   288     0     0     0    0.00   |        -         -         - |
 DAEJ |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   |        -         -         - |
 CHUR |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   285     0     0     0    0.00   |        -         -         - |
 AUCK |   285     0     0     0    0.00   |        -         -         - |
 AREQ |   285     0     0     0    0.00   |        -         -         - |
 ALIC |   285     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.06e-17  2.47e-16  1.48e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     YELL      YELL      AMC2 |
------------------------------------------+------------------------------+
