
 GPS week: 1354   Day: 1   MJD: 53723                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2770     29     0.08    -0.36     3.10     0.00      0
 cod |   288     0  25309      1    -0.35     0.61     0.05    22.15      0
 emr |   288     0  20813    708   -48.52    -1.93     0.10     9.47      0
 esa |   288    10  17698    668 99999.99    19.35     0.08    11.28      0
 gfz |   288     0  28464      0    -0.43     0.42     0.03    30.33      0
 iga |    96     0   2768    175  2429.44 -8521.25     0.22     0.00      0
 igu |    96     0   2770     22    -0.58     1.73     4.44     0.00      0
 jpl |   288     0  15629    934    -1.77    -0.38     0.07    14.59      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  25245    904    -1.81    -0.45     0.08    12.18      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -1445     3    68  -251   -12  -153 -9264    74     -   113 |
    2 | -2359   -60   -70  -146    46    40  -620   145     -    10 |
    3 | -1772  -197  -137    71    96   267 -6404    82     -    64 |
    4 |  -506    80   -60   151   -53   156  3052    23     -  -139 |
    5 |  -277  -185  -132    90    75   275 -3226    30     -   136 |
    6 |   851  -156  -193   249    49   306 -4086   102     -   -33 |
    7 |  -420   -37  -158   138    11   122  -281    63     -   -48 |
    8 | -6650    80  -209     1    20   196 -3098     -     -   -34 |
    9 | -8880    35  -182   143  -126-13443 -9577   251     -     0 |
   10 |  -780   -81   -71   -94    45   142  4837   -24     -   198 |
   11 |  4576    50   -44   -93    80   137 -1076   -34     -  -132 |
   13 |  2393   279   -97  -243    38   167 -2529    51     -  -402 |
   14 |  4997     3    14  -185    43  -162 -1789    29     -     7 |
   15 | -2692  -206     9   153   122  -178 -1098    -2     -   -63 |
   16 |  3468  -149    52   -53    99   -69   813    23     -     7 |
   17 | -1350    26     X     -    15     X  2586    39     -  -132 |
   18 |  3312   -99   -58   -33   118   315  -794    37     -   -82 |
   19 |  -327  -127  -356   196   122    46   465    73     -   -58 |
   20 |  2898    11   -83  -142    26    65   990    77     -    16 |
   21 |  3098   -78    60   -15    87    75  -163   -62     -   -29 |
   22 | -2576   -74   107  -145    90   -84  2099    87     -  -144 |
   23 |  -786    38   249  -246    26  -101  -496    12     -   -93 |
   24 | -4515     3   -78   149    43    -6 17605  -159     -     1 |
   25 |  5598   -66  -101    29    29  -159  9610   127     -   -46 |
   26 | -2043    78   -69   -82   -53    96 -3872   163     -   -79 |
   27 |  1848   -29  -120    28    26   158  6880   120     -   -85 |
   28 |  6434    23     X  -110    98  -133 -3523   -54     -  -123 |
   29 | -3340    93   -42   107    -8   231 -2573    69     -  -294 |
   30 | -2618  -153   -13   186    39   132  2133   177     -  -189 |
 -----+-------------------------------------------------------------+
 ALBH |     -   148     3     -     -     -     -  -233     -     - |
 ALGO |     -     -   -88   447  -194     -     -     7     -   146 |
 ALRT |     -  -211     -     -   -22     -     -     -     -   439 |
 AMC2 |     -    -3     -     -     -     -     -   -60     -    78 |
 AREQ |     -     -   150     -    54     -     -     -     -  -251 |
 ARTU |     -     -     -   182   -28     -     -     -     -   -91 |
 AUCK |     -     -     -  -525   193     -     -     -     -   -13 |
 BAHR |     -   -29   127     -    -1     -     -     -     -   -43 |
 BOGT |     -    91     -   -15     -     -     -     -     -  -152 |
 BOR1 |     -    92   -25     -   -59     -     -     X     -     - |
 BRFT |     -   125     -     -   -91     -     -     -     -     - |
 BRUS |     -     8     -     -     -     -     -     -     -   -14 |
 CAS1 |     -    11     -    80    26     -     -     -     -  -156 |
 CEDU |     -     -     -   193   -72     -     -     -     -     - |
 CHAT |     -     -     -     -    35     -     -     -     -   -87 |
 CHUR |     -     -    88     -   -84     -     -     -     -   141 |
 COCO |     -    83     -  -106    43     -     -     -     -  -164 |
 CRO1 |     -   -73   -18    15    -1     -     -     4     -   132 |
 DAEJ |     -   134  -288     -     -     -     -     -     -   -19 |
 DGAR |     -     -     -   -78   146     -     -   105     -  -418 |
 DRAO |     -   111     3     -   -74     -     -   -78     -    74 |
 DUBO |     -    98     -     -     -     -     -  -149     -     - |
 FAIR |     -     -    92    10   -32     -     -     -     -     - |
 FLIN |     -    80     -     -   -58     -     -     -     -     - |
 GMAS |     -     -     1     -     -     -     -   -23     -    27 |
 GODE |     -     -   147    87   -78     -     -     -     -     3 |
 GOLD |     -    70     -     0  -184     -     -    43     -   280 |
 GRAS |     -   -82     -     -   -53     -     -   235     -     - |
 GUAM |     -     -     -  -195   228     -     -     -     -  -394 |
 HARB |     -    52     -     -   -38     -     -     -     -     - |
 HLFX |     -     -   310     -     -     -     -  -201     -     - |
 HOB2 |     -   143   168     -  -135     -     -     -     -   -55 |
 HOFN |     -     -     -     -    15     -     -    17     -   -57 |
 HOLM |     -    84     -     -     -     -     -  -128     -     - |
 HRAO |     -     -     -     -   -98     -     -     X     -   245 |
 IISC |     -   108     -  -122   -35     -     -     -     -     - |
 INVK |     -   -96     -     -     -     -     -   -43     -   226 |
 ISPA |     -     -     -     -   152     -     -   -80     -  -285 |
 JOZE |     -     -     -     -    -9     -     -     -     -    23 |
 JPLM |     -     -   301     -   -27     -     -  -142     -     - |
 KGN0 |     -    -5    11     -     -     -     -     -     -     - |
 KIT3 |     -     -     -  -142    53     -     -     -     -     - |
 KOUR |     -   198     -    66  -168     -     -     -     -     - |
 LPGS |     -  -133   -31  -268     -     -     -     -     -   446 |
 MAC1 |     -  -122     -     X     5     -     -     -     -   207 |
 MATE |     -     -     -   107   -97     -     -     -     -   120 |
 MAUI |     -     -     -     -    86     -     -  -178     -     - |
 MAW1 |     -     -     -     -    14     -     -     -     -   -35 |
 MBAR |     -    37     -     -   -27     -     -     -     -     X |
 MCM4 |     -  -231  -661   -55   383     -     -     -     -     - |
 MDO1 |     -   197   160     -  -196     -     -     -     -     5 |
 MIZU |     -     1    -3     -     -     -     -     -     -     - |
 MKEA |     -    78     -  -134   -41     -     -    86     -   -27 |
 MSKU |     -   -33     -     -    24     -     -     -     -     - |
 NKLG |     -     -     -     X   -65     -     -     X     -   162 |
 NLIB |     -     1   251     -  -112     -     -     -     -    83 |
 NNOR |     -     -  -135   114     -     -     -     -     -     - |
 NOT1 |     -   -16     -     -     -     -     -    24     -     - |
 NRC1 |     -   159    76     -  -113     -     -     -     -   -67 |
 NRIL |     -   -53     -     -   -30     -     -     -     -   170 |
 NTUS |     -  -112     -   134   174     -     -     -     -  -348 |
 OHI2 |     -    56     -     -   -18     -     -     -     -   -57 |
 ONSA |     -     3    41    33   -26     -     -     -     -     - |
 PDEL |     -   -45     -     -    33     -     -     -     -     - |
 PERT |     -     -   120     -     -     -     -     -     -   -93 |
 PETP |     -     -     -     -    69     -     -     -     -  -171 |
 PIE1 |     -     -   367     X     -     -     -  -238     -     - |
 PIMO |     -     -     -  -331   123     -     -     -     -     - |
 POL2 |     -     -     -     -   -43     -     -   -18     -   129 |
 POTS |     -     -     -   -38    14     -     -     -     -     - |
 PRDS |     -   -34    79     -     -     -     -     -     -     - |
 PTBB |     -     1    -3     -     -     -     -     -     -     - |
 RIOG |     -    39   160   -70   -45     -     -     -     -   -20 |
 SANT |     -   -52     -   421  -113     -     -     -     -     - |
 SCH2 |     -    62    95     -  -165     -     -     -     -   226 |
 SCUB |     -   109     -     -     -     -     -  -165     -     - |
 SHAO |     -     -     -   163   -61     -     -     -     -     - |
 STJO |     -     -   229     -   -88     -     -     -     -    42 |
 SUTH |     -   -66     -     -   -74     -     -     -     -   305 |
 SUTM |     -     -     7     -    -2     -     -     -     -     - |
 THTI |     -     -   267    66  -106     -     -     -     -     X |
 THU3 |     -     5     -     -   212     -     -  -440     -     - |
 TIDB |     -    11    80    86  -122     -     -     -     -   145 |
 TOW2 |     -    -4     -     -   -42     -     -     -     -   111 |
 TSKB |     -    36  -102   -22    56     -     -     -     -  -106 |
 TWTF |     -    20   -46     -     -     -     -     -     -     - |
 UNSA |     -     -     -   -69    30     -     -     -     -   -15 |
 USN3 |     -     4    52     -     -     -     -  -102     -    75 |
 USNO |     -   -13    30     -     -     -     -     -     -     - |
 USUD |     -   -55  -156    13     -     -     -   138     -    44 |
 VILL |     -     -     -   105   -44     -     -     -     -    17 |
 WHIT |     -   -52     -     -     -     -     -     -     -    94 |
 WILL |     -   -41    96     -     -     -     -     -     -     - |
 WSRT |     -     -   -75     -  -205     -     -     -     -   568 |
 WTZR |     -   -23    53     -     1     -     -     -     -     - |
 WUHN |     -     -  -224     -    70     -     -     -     -     X |
 YAR2 |     -    -5   141     -   -72     -     -     -     -    78 |
 YELL |     -    -3    22  -114    18     -     -     -     -    45 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5273    50   197   147    30   233  9778    66     -    36 |  288   3.27
    2 |   552    55   148    35    24   187   633   103     -    44 |  288   0.18
    3 |  1224    44   142    69    42   172  4247    45     -    52 |  288   1.23
    4 |  2554   109   126   132    53   256  2118    74     -    92 |  284   1.02
    5 |   964    73   113    41    37   264  1502    99     -    32 |  288   1.52
    6 |  1669    49   108    76    27   255  2505    82     -    66 |  288   0.94
    7 |  3266    36   168    49    26   178  1533    79     -    53 |  288   0.81
    8 |  5224    63    56    71    24   159  6131     -     -    95 |  288   2.34
    9 | 12182   112   193   149    51   816 14026   125     -    80 |  252    >>>
   10 |  2319    73   138   101    25   159  2730    80     -    89 |  288   2.01
   11 |  1032    61   167    49    42   202   925    49     -    37 |  288   0.38
   13 |   618    81    99    41    44   170  1351    88     -   177 |  288   0.28
   14 |  1465    56   118   125    17   196  1418    57     -   105 |  288   0.37
   15 |  4195   126    93   139   105   213  2928   173     -   176 |  288   2.70
   16 |   443    51   179   123    35   151   991    25     -    48 |  288   0.25
   17 |  1928    52     X     -    16     X  2395   101     -    52 |  288   0.27
   18 |   824    54    75    53    22   233   553    37     -    45 |  288   0.28
   19 |  1089    44    85   156    26   291   873    90     -    48 |  288   0.20
   20 |   719    42    78    40    40   151  1190    57     -   122 |  288   0.19
   21 |   835    58   136    71    26   144   782    38     -    61 |  288   0.35
   22 |  3074    44    77    49    38   194  4441    78     -    26 |  288   2.20
   23 |   662    55   112    60    46   173   552   138     -    63 |  288   0.27
   24 |  2781    96    99    99    34   194 11237    91     -    96 |  288   2.63
   25 |  5958   128    76    97    44   245  7878   111     -    85 |  288   2.38
   26 |  1231    38    38    61    35   167  2549    44     -    44 |  288   1.07
   27 |  2249   152    75   208    85   413  4093    96     -   148 |  283   1.86
   28 |  4219    54     X    99    35   172  2683   111     -    91 |  288   0.41
   29 |  1576    58    63    56    21   327   953    57     -   161 |  288   0.54
   30 |  1041    61    88    72    30   217  2672    87     -   109 |  288   0.59
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    24    45     -     -     -     -    59     -     - |  286   0.04
 ALGO |     -     -    42    49    16     -     -    48     -    57 |  287   0.04
 ALRT |     -    16     -     -    26     -     -     -     -    62 |  288   5.65
 AMC2 |     -    14     -     -     -     -     -    49     -    57 |  288   0.03
 AREQ |     -     -   127     -    26     -     -     -     -    51 |  285  11.75
 ARTU |     -     -     -    73    27     -     -     -     -    71 |  277    >>>
 AUCK |     -     -     -    97    35     -     -     -     -    73 |  288    >>>
 BAHR |     -    23    74     -    23     -     -     -     -    47 |  288   0.40
 BOGT |     -    28     -    32     -     -     -     -     -    43 |  288  10.23
 BOR1 |     -    74    83     -    70     -     -     X     -     - |  288   0.88
 BRFT |     -    30     -     -    22     -     -     -     -     - |  288   0.06
 BRUS |     -    26     -     -     -     -     -     -     -    46 |  288   0.02
 CAS1 |     -    35     -    38    14     -     -     -     -    46 |  288   6.58
 CEDU |     -     -     -    52    19     -     -     -     -     - |  271   0.57
 CHAT |     -     -     -     -    17     -     -     -     -    43 |  287  11.97
 CHUR |     -     -    47     -    19     -     -     -     -    67 |  288   0.08
 COCO |     -    41     -    43    24     -     -     -     -    81 |  288  16.40
 CRO1 |     -    30    57    34    26     -     -    39     -    35 |  288   0.18
 DAEJ |     -    26   111     -     -     -     -     -     -    69 |  288   5.77
 DGAR |     -     -     -    98    29     -     -    49     -    86 |  287  14.06
 DRAO |     -    22    38     -    27     -     -    76     -   108 |  288   0.03
 DUBO |     -    23     -     -     -     -     -    35     -     - |  288  22.56
 FAIR |     -     -    70    82    48     -     -     -     -     - |  283   0.03
 FLIN |     -    23     -     -    17     -     -     -     -     - |  270  19.78
 GMAS |     -     -    77     -     -     -     -    29     -    76 |  288   2.04
 GODE |     -     -    27    41    19     -     -     -     -    60 |  288   0.12
 GOLD |     -    18     -    38    33     -     -    40     -    49 |  288  12.04
 GRAS |     -    10     -     -    15     -     -    28     -     - |  288   6.05
 GUAM |     -     -     -    74    32     -     -     -     -    61 |  288  16.13
 HARB |     -    39     -     -    28     -     -     -     -     - |  287  29.06
 HLFX |     -     -    30     -     -     -     -    20     -     - |  281  11.35
 HOB2 |     -    21    53     -    29     -     -     -     -    50 |  288   0.09
 HOFN |     -     -     -     -    28     -     -    33     -    47 |  287    >>>
 HOLM |     -    24     -     -     -     -     -    36     -     - |  288   7.77
 HRAO |     -     -     -     -    49     -     -     X     -   123 |  284   0.57
 IISC |     -    30     -    58    16     -     -     -     -     - |  288  18.25
 INVK |     -    27     -     -     -     -     -    28     -    29 |  288   7.88
 ISPA |     -     -     -     -    29     -     -    50     -    42 |  288  11.78
 JOZE |     -     -     -     -    30     -     -     -     -    75 |  288    >>>
 JPLM |     -     -    47     -    18     -     -    45     -     - |  288  21.20
 KGN0 |     -    37    87     -     -     -     -     -     -     - |  287   0.34
 KIT3 |     -     -     -    58    21     -     -     -     -     - |  265  11.75
 KOUR |     -    35     -    54    21     -     -     -     -     - |  288  10.69
 LPGS |     -    42    92    62     -     -     -     -     -    63 |  216  18.30
 MAC1 |     -    33     -     X    28     -     -     -     -    59 |  264   9.73
 MATE |     -     -     -   103    44     -     -     -     -   125 |  251   0.14
 MAUI |     -     -     -     -    87     -     -   181     -     - |  241  15.13
 MAW1 |     -     -     -     -    30     -     -     -     -    74 |  285   8.44
 MBAR |     -    60     -     -    44     -     -     -     -     X |  287  13.19
 MCM4 |     -    21    82    62    24     -     -     -     -     - |  288  22.00
 MDO1 |     -    36    42     -    19     -     -     -     -    67 |  288  24.51
 MIZU |     -    36    85     -     -     -     -     -     -     - |  288    >>>
 MKEA |     -    38     -    90    31     -     -    41     -   102 |  288  17.82
 MSKU |     -    22     -     -    16     -     -     -     -     - |  288  14.62
 NKLG |     -     -     -     X    19     -     -     X     -    48 |  276    >>>
 NLIB |     -    18    43     -    16     -     -     -     -    68 |  288   0.03
 NNOR |     -     -    83    70     -     -     -     -     -     - |  265  11.17
 NOT1 |     -     9     -     -     -     -     -    14     -     - |  230   0.16
 NRC1 |     -    33    26     -    18     -     -     -     -    60 |  288   0.02
 NRIL |     -    33     -     -    15     -     -     -     -    73 |  267   5.39
 NTUS |     -    47     -    66    38     -     -     -     -   127 |  288  10.20
 OHI2 |     -    31     -     -    52     -     -     -     -   164 |  288   9.38
 ONSA |     -    34   110    58    39     -     -     -     -     - |  288   0.03
 PDEL |     -    18     -     -    13     -     -     -     -     - |  288  53.74
 PERT |     -     -   165     -     -     -     -     -     -   128 |  246   2.13
 PETP |     -     -     -     -    14     -     -     -     -    34 |  287   5.86
 PIE1 |     -     -    84     X     -     -     -    54     -     - |  150   0.27
 PIMO |     -     -     -    41    15     -     -     -     -     - |  271  14.78
 POL2 |     -     -     -     -    27     -     -    51     -    73 |  280    >>>
 POTS |     -     -     -   245    91     -     -     -     -     - |  159   9.54
 PRDS |     -    16    38     -     -     -     -     -     -     - |  288   1.46
 PTBB |     -    19    45     -     -     -     -     -     -     - |  288   0.17
 RIOG |     -    95   115    64    69     -     -     -     -    85 |  245   8.71
 SANT |     -    19     -    38    22     -     -     -     -     - |  288   5.15
 SCH2 |     -    19    35     -    37     -     -     -     -    84 |  288  96.11
 SCUB |     -    17     -     -     -     -     -    26     -     - |  288  12.58
 SHAO |     -     -     -    21     8     -     -     -     -     - |  271  33.67
 STJO |     -     -    44     -    18     -     -     -     -    63 |  288   0.03
 SUTH |     -    26     -     -    25     -     -     -     -    77 |  288  11.42
 SUTM |     -     -    57     -    18     -     -     -     -     - |  288  11.28
 THTI |     -     -   109    58    39     -     -     -     -     X |  288   2.23
 THU3 |     -    26     -     -    15     -     -    48     -     - |  277   6.87
 TIDB |     -    33    79    70    23     -     -     -     -    69 |  288   0.32
 TOW2 |     -    31     -     -    31     -     -     -     -    43 |  288   2.29
 TSKB |     -    58   142    79    21     -     -     -     -    98 |  288   1.86
 TWTF |     -    46   108     -     -     -     -     -     -     - |  287   0.05
 UNSA |     -     -     -    53    23     -     -     -     -    50 |  288  16.72
 USN3 |     -    22    30     -     -     -     -    18     -    38 |  288   0.04
 USNO |     -    13    31     -     -     -     -     -     -     - |  288   0.03
 USUD |     -    35   128    53     -     -     -    39     -    36 |  288   0.10
 VILL |     -     -     -    54    33     -     -     -     -   120 |  288  11.03
 WHIT |     -    54     -     -     -     -     -     -     -    99 |  288   2.38
 WILL |     -    17    40     -     -     -     -     -     -     - |  288  24.15
 WSRT |     -     -    47     -    23     -     -     -     -    50 |  288   0.05
 WTZR |     -    19    73     -    24     -     -     -     -     - |  287    >>>
 WUHN |     -     -   111     -    35     -     -     -     -     X |  287  16.32
 YAR2 |     -    36   109     -    26     -     -     -     -   138 |  288   8.69
 YELL |     -    51    56    30    22     -     -     -     -   147 |  288   0.03
 -----+-------------------------------------------------------------+--------------
 TOT  |  3097    51    96    83    34   222  4441    73     -    82 |


 BEST CLOCK FIT: NRC1   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 AMC2 |   288     0     0   288   11.87   | 3.35e-14  6.44e-15  1.75e-15 |
 USNO |   288     0     0   288   11.39   | 2.76e-14  6.49e-15  1.64e-15 |
 NLIB |   288     0     0   288   11.32   | 2.33e-14  5.24e-15  2.44e-15 |
 WSRT |   288     0     0   288   10.54   | 2.85e-14  8.83e-15  3.46e-15 |
 BRFT |   288     0     0   288    6.64   | 4.77e-14  8.52e-15  5.39e-15 |
 FAIR |   283     0     0   282    6.51   | 5.01e-14  8.41e-15  3.47e-15 |
 ONSA |   288     0     0   143    5.90   | 3.67e-14  8.60e-15  2.50e-15 |
 ALGO |   287     0     0   286    4.65   | 3.11e-14  6.20e-15  1.77e-15 |
 TWTF |   287     0     0   286    4.14   | 3.82e-14  1.03e-14  3.96e-15 |
 USN3 |   288     0     0   288    4.13   | 1.10e-13  1.47e-14  3.98e-15 |
 BRUS |   288     0     0   143    3.84   | 3.82e-14  9.12e-15  3.70e-15 |
 YELL |   288     0     0   288    3.20   | 2.89e-14  6.39e-15  2.85e-15 |
 ALBH |   286     0     0   143    2.50   | 4.07e-14  1.22e-14  3.80e-15 |
 CHUR |   288     0     0   288    2.47   | 4.52e-14  9.78e-15  6.55e-15 |
 NRC1 |   288     0     0   288    2.04   | 2.36e-14  7.13e-15  2.38e-15 |
 HOB2 |   288     0     0   288    1.14   | 1.55e-13  2.00e-14  5.51e-15 |
 MATE |   251     0     0   248    1.01   | 5.64e-14  2.38e-14         - |
 PIE1 |   150     0     0   146    0.81   | 2.57e-13  3.75e-14         - |
 USUD |   288     0     0   261    0.77   | 2.44e-13  2.42e-14  1.04e-14 |
 GODE |   288     0     0   288    0.73   | 3.59e-14  8.97e-15  9.69e-15 |
 TIDB |   288     0     0   288    0.55   | 1.12e-13  4.63e-14  2.83e-14 |
 CRO1 |   288     0     0   288    0.49   | 1.71e-13  3.93e-14  1.61e-14 |
 DRAO |   288     0     0   288    0.44   | 2.59e-14  1.03e-14  1.97e-15 |
 PTBB |   288     0     0   288    0.44   | 2.55e-13  4.46e-14  9.93e-15 |
 G07  |   288     0     0   288    0.35   | 2.87e-13  7.79e-14  5.41e-14 |
 NOT1 |   230     0     0    99    0.25   | 4.12e-14  1.42e-14         - |
 KGN0 |   287     0     0   286    0.20   | 3.31e-13  1.05e-13  2.71e-14 |
 G30  |   288     0     0   288    0.17   | 2.94e-13  9.36e-14  6.89e-14 |
 G11  |   288     0     1   171    0.15   | 5.77e-13  6.06e-14  3.89e-14 |
 G29  |   288     0     0   288    0.15   | 3.60e-13  1.17e-13  7.33e-14 |
 G26  |   288     0     0   288    0.15   | 3.43e-13  9.83e-14  8.36e-14 |
 BAHR |   288     0     0   288    0.14   | 3.85e-13  1.17e-13  3.17e-14 |
 G06  |   288     0     0   288    0.14   | 4.85e-13  1.80e-13  8.55e-14 |
 HRAO |   284     0     0   283    0.13   | 1.38e-13  5.62e-14  4.59e-14 |
 G05  |   288     0     0   288    0.11   | 1.99e-13  8.09e-14  9.99e-14 |
 G28  |   288     0     1   144    0.11   | 6.17e-13  7.13e-14  3.67e-14 |
 G13  |   288     0     2    50    0.09   | 5.77e-13  6.82e-14  2.89e-14 |
 BOR1 |   288     0     0   288    0.08   | 4.07e-13  1.11e-13  7.40e-14 |
 G19  |   288     0     1    74    0.07   | 5.64e-13  7.07e-14  1.12e-14 |
 G04  |   284     0     0   283    0.04   | 4.30e-13  1.34e-13  1.22e-13 |
 PRDS |   288     0     0   288    0.04   | 5.93e-13  2.26e-13  1.36e-13 |
 G22  |   288     0     1   144    0.03   | 5.36e-13  8.61e-14  1.55e-13 |
 TSKB |   288     0     0   288    0.02   | 9.82e-13  2.90e-13  1.75e-13 |
 GMAS |   288     0     0   288    0.02   | 9.09e-13  3.34e-13  2.28e-13 |
 G03  |   288     0     0   288    0.01   | 1.31e-12  4.57e-13  8.70e-14 |
 G10  |   288     0     0   288    0.01   | 1.17e-12  4.08e-13  1.83e-13 |
 G27  |   283     0     0   281    0.01   | 1.27e-12  3.84e-13  2.00e-13 |
 G25  |   288     0     0   288    0.01   | 1.51e-12  4.96e-13  2.04e-13 |
 STJO |   288     0     0   288    0.01   | 4.01e-14  7.84e-15  3.05e-15 |
 PERT |   246     0     0   245    0.01   | 1.85e-12  4.81e-13         - |
 THTI |   288     0     0   288    0.00   | 3.85e-13  1.68e-13  2.61e-13 |
 GPST |   288     0     0     0    0.00   | 3.33e-14  7.03e-15  2.44e-15 |
 SHAO |   271     0     0     0    0.00   |        -         -         - |
 POTS |   159     0     0     0    0.00   |        -         -         - |
 PIMO |   271     0     0     0    0.00   |        -         -         - |
 NNOR |   265     0     0     0    0.00   |        -         -         - |
 KIT3 |   265     0     0     0    0.00   |        -         -         - |
 CEDU |   271     0     0     0    0.00   | 2.10e-13  6.06e-14  6.09e-14 |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 MAUI |   241     0     0     0    0.00   |        -         -         - |
 MAC1 |   264     0     0     0    0.00   |        -         -         - |
 HOFN |   287     0     0     0    0.00   |        -         -         - |
 HARB |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 G24  |   288     0     0     0    0.00   | 1.35e-12  3.84e-13  3.11e-13 |
 G23  |   288     0     3     0    0.00   | 5.64e-13  6.03e-14  3.09e-14 |
 G21  |   288     0     6     0    0.00   | 1.01e-12  1.24e-13  2.75e-14 |
 G20  |   288     0     6     0    0.00   | 6.14e-13  7.08e-14  1.86e-14 |
 G18  |   288     0     6     0    0.00   | 8.40e-13  7.76e-14  2.74e-14 |
 G17  |   288     0     6     0    0.00   | 6.28e-13  6.39e-14  1.77e-14 |
 G16  |   288     0     4     0    0.00   | 5.63e-13  6.24e-14  2.57e-14 |
 G15  |   288     0     0     0    0.00   | 1.58e-12  5.61e-13  2.97e-13 |
 G14  |   288     0     4     0    0.00   | 5.43e-13  6.01e-14  3.52e-14 |
 G09  |   252     0     0     0    0.00   |        -         -         - |
 G08  |   288     0     0     0    0.00   | 1.60e-12  5.02e-13  1.86e-13 |
 G02  |   288     0     5     0    0.00   | 6.16e-13  5.71e-14  1.65e-14 |
 G01  |   288     0     0     0    0.00   | 2.16e-12  6.23e-13  3.99e-13 |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WTZR |   287     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 5.10e-13  2.56e-13  2.30e-13 |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   | 4.45e-13  5.35e-13  1.03e-13 |
 THU3 |   277     0     0     0    0.00   |        -         -         - |
 SUTM |   288     0     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SCUB |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   288     0     0     0    0.00   |        -         -         - |
 RIOG |   245     0     0     0    0.00   |        -         -         - |
 POL2 |   280     3     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   267     0     0     0    0.00   |        -         -         - |
 NKLG |   276     2     0     0    0.00   |        -         -         - |
 MSKU |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MIZU |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     1     0    0.00   | 6.56e-13  4.95e-13  1.66e-12 |
 MBAR |   287     0     0     0    0.00   |        -         -         - |
 MAW1 |   285     0     0     0    0.00   |        -         -         - |
 LPGS |   216     0     0     0    0.00   |        -         -         - |
 KOUR |   288     1     0     0    0.00   |        -         -         - |
 JPLM |   288     0     1     0    0.00   |        -         -         - |
 JOZE |   288     0     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 INVK |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HOLM |   288     0     0     0    0.00   |        -         -         - |
 HLFX |   281     0     0     0    0.00   | 2.04e-13  1.96e-13  7.66e-13 |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GRAS |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 FLIN |   270     0     0     0    0.00   |        -         -         - |
 DUBO |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   287     0     0     0    0.00   |        -         -         - |
 DAEJ |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.35e-13  9.22e-13  1.41e-12 |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 AUCK |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   277     3     0     0    0.00   |        -         -         - |
 AREQ |   285     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.23e-17  2.67e-16  1.60e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NLIB      NLIB      USNO |
------------------------------------------+------------------------------+
