
 GPS week: 1338   Day: 2   MJD: 53612                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2776      0    -0.47     1.37     4.13     0.00      0
 cod |   288     0  25096    562    -0.74     0.47     0.04    16.50      0
 emr |   288     0  23401    369  1108.21     8.88     0.03    21.72      0
 esa |   288     0  18407   1403  1108.21     8.97     0.06    10.07      0
 gfz |   281     0  25996    405   107.06    -0.25     0.04    16.78      0
 iga |    96     0   2776    162    -2.01     3.64     0.49     0.00      0
 igu |    96     0   2776      0    -0.55     1.47     3.15     0.00      0
 jpl |   288     0  18305   1727     2.70    -2.14     0.06     9.76      0
 ngs |    96     0   2776      9    -0.55     1.26     3.29     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  33105    639     2.69    -2.19     0.03    25.16      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |  -214   -46    26    94   -46    21 -5202   131 -1753     -   -51 |
    2 | -3016    37     4  -120    33    64  1326    49 -2874     -   -21 |
    3 | -2271   -16  -137   147   104   -36  2648   104 -1500     -   -38 |
    4 | -5448    12   -44     7   123   323   860     X -4711     -   -52 |
    5 |  5497     X   -81     X    48   164-11784   -53  3724     -    53 |
    6 |  2029    25   -16   -44   105   -73 -9731   -80   409     -   -22 |
    7 | -3875     0  -153    52    85   229 -2080    78 -2947     -    25 |
    8 |   597    58   -63   143   -18   237 13180   112 -1352     -   -73 |
    9 | -6845    65   -40   -59    72  -134  4824   -29 -3435     -   -20 |
   10 |  3196   -32     8   -29     4  -273  2918   -97  2754     -    62 |
   11 |  1193     8   -42   -28    36   215  1479     -  2323     -    19 |
   13 |  2285    94   -97    34     0   138  1968   331  3109     -  -116 |
   14 |  4880    17   -44   -27    67   -37  1846   102  5073     -   -45 |
   15 | -4511   -98     X   -79    75   409  6623     X -3997     -    47 |
   16 |  2107    46   -70   214    27   559  1079   112  2679     -  -118 |
   18 |  4275   -41     4   -83    55   483   930    97  4662     -   -15 |
   19 | -1803   224  -161   248   -76  -263  1790   221 -1580     -  -143 |
   20 |  3817   -16  -129   175    51   391   896     X  4283     -    21 |
   21 |  3184    47    81  -111    33    33  1709   -92  3362     -   -42 |
   22 | -4748   -63    23   -22    96   313  -171    64 -4391     -   -53 |
   23 | -3336   232     3   200   -84   180  1245     X -2477     -  -179 |
   24 | -6074   -73   -79    86   126  1041   716     X -5308     -     X |
   25 | -5035    86   -40   153    32   -65 -7190   -12 -1868     -   -99 |
   26 | -3912     9    -1  -129    95  -136  -991   -10 -3354     -   -11 |
   27 | -4600    25   -61    -3    64  -427 -7746    37 -3478     -   -19 |
   28 |  7949   -35   -21    66     9   416 -1126   141  5455     -   -46 |
   29 | -1409     0     -    63   101 -5459 -2049   -33 -1332     -   -79 |
   30 | -2352     X  -111     X   126   357 -3571    72 -1895     -   -26 |
   31 | 18546    83  -134   -19   220   994  4911     X 11564     -   -73 |
 -----+-------------------------------------------------------------------+
 ALBH |     -   139   -78     -     -     -     -    16     -     -   -30 |
 ALGO |     -     -    -6   -58  -109     -     -   218     -     -    15 |
 AMC2 |     -  -155   131     -     -     -     -  -310     -     -   109 |
 AREQ |     -     -     -    94   -26     -     -     -     -     -   -21 |
 ARTU |     -    13     -    81   -68     -     -   -97     -     -    41 |
 ASPA |     -     -     -     -    72     -     -     -     -     -   -48 |
 AUCK |     -     -     -     -    16     -     -     -     -     -   -11 |
 BAHR |     -    11     5   -75   -10     -     -   -12     -     -    30 |
 BILI |     -    12     -     -  -138     -     -     -     -     -    82 |
 BJFS |     -     -     -     -   -84     -     -     -     -     -    56 |
 BOGT |     -    29     -   246     -     -     -     -     -     -  -117 |
 BOR1 |     -   -14    10     -     -     -     -     -     -     -     - |
 BREW |     -     -   -17     -     -     -     -     -     -     -    15 |
 BRMU |     -     -     -     -    92     -     -     -     -     -   -61 |
 BRUS |     -   -93    71     -     -     -     -     -     -     -     - |
 CAS1 |     -    99     -   -21  -102     -     -    56     -     -   -12 |
 CEDU |     -   -14     -     X  -163     -     -   -28     -     -   126 |
 CHAT |     -    20     -     -   -27     -     -     -     -     -     5 |
 COCO |     -   -68     -    36   -20     -     -    71     -     -    16 |
 CORD |     -  -235     -     -     -     -     -   -60     -     -   179 |
 DAEJ |     -   147  -153     -     -     -     -     -     -     -    36 |
 DGAR |     -  -114     -     -     8     -     -    27     -     -    59 |
 DRAO |     -   159   -60    46  -180     -     -   131     -     -   -22 |
 DWH1 |     -   222    18     -     -     -     -     -     -     -  -161 |
 FAIR |     -    -6    13     7   -30     -     -    24     -     -     - |
 FORT |     -     -    82  -246   -16     -     -     -     -     -    38 |
 GLPS |     -    17     -   -18    -4     -     -   -37     -     -    13 |
 GMAS |     -     -   280     -     -     -     -  -377     -     -   -96 |
 GODE |     -     -    66  -147   -91     -     -     -     -     -    58 |
 GOLD |     -    17     -    21  -108     -     -    30     -     -    39 |
 GRAS |     -   -27     -     -    65     -     -     -     -     -   -25 |
 GRAZ |     -  -198   150     X     -     -     -     -     -     -     - |
 GUAM |     -     -     -  -120    95     -     -     -     -     -   -14 |
 GUAT |     -    12     -     -  -144     -     -     -     -     -    77 |
 HARB |     -     -     -     -   -33     -     -     -     -     -    22 |
 HLFX |     -     -    25     -     -     -     -     -     -     -   -22 |
 HRAO |     -     -     -     -   -54     -     -    74     -     -     6 |
 IENG |     -  -144   109     -     -     -     -     -     -     -     - |
 IISC |     -     -     -  -102    61     -     -     -     -     -     - |
 ISPA |     -     -     -     -    79     -     -   136     -     -  -105 |
 JPLM |     -     -    44     -  -161     -     -     -     -     -    66 |
 KELY |     -     -     -     -   151     -     -  -260     -     -     - |
 KERG |     -    40  -112    18    64     -     -    58     -     -    -1 |
 KGN0 |     -   -36    74     -     -     -     -     -     -     -   -41 |
 KIRU |     -     -     -   -99   -83     -     -   -80     -     -   125 |
 KOKB |     -     -    -3     -     2     -     -     -     -     -     2 |
 KOUR |     -   210     -  -186     X     -     -     -     -     -   -63 |
 LPGS |     -   -70    53     -     -     -     -     -     -     -     - |
 MAC1 |     -     -     -     X   -73     -     -     -     -     -    49 |
 MAD2 |     -     -     8     -     -     -     -     -     -     -    -7 |
 MADR |     -     -     -     -    24     -     -     -     -     -   -16 |
 MAG0 |     -    -8     -     -     -     -     -    13     -     -     - |
 MATE |     -     -     -   -20     -     -     -     -     -     -     8 |
 MAW1 |     -   118     -     -   -60     -     -     9     -     -   -42 |
 MBAR |     -   -36     -     -  -117     -     -  -152     -     -   158 |
 MCM4 |     -  -262     -  -354   556     -     -     -     -     -     - |
 MDO1 |     -   103   -78     -  -181     -     -     -     -     -   118 |
 MEDI |     -     -    11     -     -     -     -     -     -     -    -9 |
 MIZU |     -    32   -24     -     -     -     -     -     -     -     - |
 MKEA |     -     -     -   122    14     -     -    87     -     -   -91 |
 NLIB |     -  -163   120     -   -95     -     -     -     -     -    65 |
 NOT1 |     -     -     -     -     -     -     -   -95     -     -    37 |
 NPLD |     -  -109    83     -     -     -     -     -     -     -     - |
 NRC1 |     -     -    -2     -   -38     -     -     -     -     -    26 |
 NRIL |     -  -191     -     -   -56     -     -  -174     -     -   229 |
 NSSP |     -   -19     -     -     -     -     -     -     -     -    12 |
 PERT |     -     -    46    43    12     -     -     -     -     -   -64 |
 PIE1 |     -     -   138  -144  -189     -     -   -41     -     -    77 |
 POL2 |     -    46     -     -   -40     -     -  -102     -     -    35 |
 PRDS |     -     -    -8     -     -     -     -     -     -     -     7 |
 PTBB |     -   -56    42     -     -     -     -     -     -     -     - |
 QAQ1 |     -   -91    22     -     -     -     -     -     -     -    40 |
 RABT |     -    35     -     -     -     -     -     -     -     -   -23 |
 RBAY |     -     -     -     -  -152     -     -     -     -     -   101 |
 RIOG |     -  -124   118     -   -31     -     -     -     -     -     - |
 SANT |     -   -38     -   112   -31     -     -     -     -     -     X |
 SCH2 |     -    57    32     -  -162     -     -     -     -     -    40 |
 SFER |     -   -52    39     -     -     -     -     -     -     -     - |
 SHAO |     -     -     -  -121   -93     -     -     -     -     -   109 |
 SPT0 |     -   138  -105     -     -     -     -     -     -     -     - |
 STJO |     -    47   -11     -  -115     -     -   -24     -     -    62 |
 STR1 |     -     -    -2     -     -     -     -     -     -     -     2 |
 SUTH |     -  -108     -     -   -14     -     -     -     -     -    80 |
 SUTM |     -     -  -168     -   218     -     -     -     -     -     - |
 THTI |     -     -    25  -178   -78     -     -     -     -     -   100 |
 THU3 |     -    82   129     -   123     -     -     -     -     -  -246 |
 TID1 |     -     -     -     -     -     -     -    43     -     -   -17 |
 TID2 |     -     -     -     -   -58     -     -     -     -     -    39 |
 TIDB |     -     -    92    77  -115     -     -     -     -     -   -36 |
 TIXI |     -     -     -   198    60     -     -    11     -     -  -122 |
 TLSE |     -     -    13     -     -     -     -     -     -     -   -11 |
 TOW2 |     -   -38     -     -  -143     -     -   -28     -     -   129 |
 TSKB |     -     3   -49    13   220     -     -   -70     -     -   -82 |
 TWTF |     -  -100     9     -     -     -     -   -64     -     -    83 |
 USN3 |     -    17    64     -     -     -     -     7     -     -   -70 |
 USNO |     -    60   -12     -     -     -     -     -     -     -   -29 |
 USUD |     -     -   -34   -35     -     -     -     -     -     -    43 |
 VILL |     -     -     -   -70   -60     -     -     -     -     -    67 |
 WES2 |     -     -   -23     -     -     -     -     -     -     -    20 |
 WHIT |     -   -16     -     -     -     -     -     -     -     -    10 |
 WILL |     -    68    44     -     -     -     -     -     -     -   -82 |
 WUHN |     -     -     -     -    91     -     -     -     -     -   -61 |
 YAKT |     -   -25     -    41     -     -     -     -     -     -     - |
 YEBE |     -     -    61     -     -     -     -  -200     -     -    25 |
 YELL |     -    53     4  -117   -92     -     -     -     -     -    69 |
 ZIMM |     -     -     -     -    28     -     -     -     -     -   -19 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  7417    46    29    36    25   185  3954    36  4514     -    19 |  287   3.14
    2 |  1057    42    17    91    30   169   767    37   867     -    56 |  287   0.19
    3 |  4322    51    60    41    40   258  3728    34  4336     -    48 |  287   3.02
    4 |   985    47    54    41    65   216   700     X  1017     -    54 |  287   0.78
    5 |  5057     X    76     X    92   320  4265   123  3135     -    49 |  275   3.20
    6 |  6972    26    21    42    26   166  7372    25  6248     -    35 |  287   0.83
    7 |  1012    31    43    53    33   108  1428   157  1310     -    18 |  287   0.60
    8 |  5321    26    19    46   114    92  8070   118  6829     -    31 |  288   3.96
    9 |  7959    34    25    62    28   190  4220    55  4668     -    23 |  287   3.00
   10 |  2016    97    33    54    48   582  2221   122  2900     -    30 |  287   2.26
   11 |  1883    48    21    65    31   185   748     -  1500     -    24 |  287   0.28
   13 |   867    41    41    50    57   170   507   123   827     -    45 |  287   0.33
   14 |  1436    43    32    36    30   191   799    43  1158     -    43 |  287   0.27
   15 |  1930    62     X    50    59  1399  3641     X  2251     -    53 |  287   2.10
   16 |   801    40    62    73    70   410   709    72   828     -    44 |  288   0.32
   18 |   818    68    38    85    20   539   636    45   748     -    26 |  287   0.31
   19 |  1008    43    56    75    43   342   905    63   771     -    71 |  287   0.22
   20 |   999    60    40    58    50   210   564     X   854     -    31 |  287   0.33
   21 |  1389    27    47    63    31   331   828    40   751     -    32 |  287   0.26
   22 |  2262    70    34    60    30   525  1030    37  1963     -    30 |  287   0.40
   23 |   859    37    72    81    56   163   859     X   828     -    24 |  287   0.30
   24 |  2276    24    29    35    39   939  1739     X  2287     -     X |  287   1.92
   25 |  8086    60    43    58    15   175  2881    20  6129     -    29 |  287   2.63
   26 |  1105    37    25    49    24   421   639    44   964     -    42 |  287   0.55
   27 |  3797    59    46    78    31   569  4947   129  2874     -    14 |  287   2.60
   28 |  5060    81    93    63    70   407  2656    99  2430     -    27 |  287   1.39
   29 |   711    46     -    44    22  2644  1141    45  1068     -    28 |  287   0.80
   30 |  1119     X    54     X   127   396  2424    90  1265     -    66 |  275   0.45
   31 | 10902   104    36   133    60   894  5298     X  8758     -    71 |  287   4.05
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    25    26     -     -     -     -    41     -     -    23 |  288   0.07
 ALGO |     -     -    30    23    30     -     -    46     -     -    21 |  288   0.04
 AMC2 |     -    28    23     -     -     -     -    20     -     -    19 |  288   0.03
 AREQ |     -     -     -    73    35     -     -     -     -     -    17 |  287  10.51
 ARTU |     -    30     -    64    26     -     -    47     -     -    38 |  287  10.32
 ASPA |     -     -     -     -    24     -     -     -     -     -    16 |  280    >>>
 AUCK |     -     -     -     -    30     -     -     -     -     -    20 |  257  10.85
 BAHR |     -    38    47    44    25     -     -    52     -     -    15 |  287   0.45
 BILI |     -    31     -     -    29     -     -     -     -     -    35 |  286   8.63
 BJFS |     -     -     -     -    68     -     -     -     -     -    45 |  280  10.02
 BOGT |     -    25     -    36     -     -     -     -     -     -    24 |  288  12.05
 BOR1 |     -    24    19     -     -     -     -     -     -     -     - |  288   0.52
 BREW |     -     -    32     -     -     -     -     -     -     -    28 |  288   0.04
 BRMU |     -     -     -     -    26     -     -     -     -     -    18 |  280    >>>
 BRUS |     -    24    18     -     -     -     -     -     -     -     - |  288   0.03
 CAS1 |     -    20     -    66    24     -     -    59     -     -    25 |  287   8.34
 CEDU |     -    33     -     X    33     -     -    44     -     -    13 |  287    >>>
 CHAT |     -    27     -     -    24     -     -     -     -     -    16 |  286  10.58
 COCO |     -    42     -    34    28     -     -    47     -     -    26 |  287  11.74
 CORD |     -    27     -     -     -     -     -    32     -     -    17 |  288   7.17
 DAEJ |     -    30    47     -     -     -     -     -     -     -    26 |  288   7.94
 DGAR |     -    43     -     -    38     -     -    36     -     -    22 |  287  17.51
 DRAO |     -    26    30    33    40     -     -    28     -     -    19 |  280   0.08
 DWH1 |     -    18    16     -     -     -     -     -     -     -    11 |  288   0.22
 FAIR |     -    17    24    21    16     -     -    60     -     -     - |  287   0.09
 FORT |     -     -    27    51    36     -     -     -     -     -    29 |  287   0.15
 GLPS |     -    25     -    47    46     -     -    25     -     -    10 |  287  12.67
 GMAS |     -     -    28     -     -     -     -    25     -     -    27 |  288   3.90
 GODE |     -     -    34    34    26     -     -     -     -     -    23 |  288   0.09
 GOLD |     -    70     -    91    34     -     -   100     -     -    35 |  287  12.43
 GRAS |     -    27     -     -    63     -     -     -     -     -    38 |  287   7.63
 GRAZ |     -    36    28     X     -     -     -     -     -     -     - |  284   6.97
 GUAM |     -     -     -    82    47     -     -     -     -     -    25 |  280  19.70
 GUAT |     -    29     -     -    24     -     -     -     -     -    23 |  239    >>>
 HARB |     -     -     -     -    28     -     -     -     -     -    19 |  280  29.56
 HLFX |     -     -    20     -     -     -     -     -     -     -    17 |  286  33.27
 HRAO |     -     -     -     -    39     -     -    27     -     -    28 |  284   0.52
 IENG |     -    22    17     -     -     -     -     -     -     -     - |  288   0.68
 IISC |     -     -     -    53    32     -     -     -     -     -     - |  280  13.16
 ISPA |     -     -     -     -    29     -     -    75     -     -    22 |  275   8.97
 JPLM |     -     -    49     -   103     -     -     -     -     -    44 |  287    >>>
 KELY |     -     -     -     -    24     -     -    42     -     -     - |  280   7.37
 KERG |     -    24    24    79    28     -     -    37     -     -    15 |  287   1.23
 KGN0 |     -    37    17     -     -     -     -     -     -     -    21 |  287   0.39
 KIRU |     -     -     -    37    21     -     -    41     -     -    18 |  287   7.41
 KOKB |     -     -    25     -    35     -     -     -     -     -    16 |  287   0.06
 KOUR |     -    46     -   115     X     -     -     -     -     -    27 |  287    >>>
 LPGS |     -    29    22     -     -     -     -     -     -     -     - |  288  20.10
 MAC1 |     -     -     -     X    23     -     -     -     -     -    16 |  257  11.01
 MAD2 |     -     -    22     -     -     -     -     -     -     -    19 |  288   0.08
 MADR |     -     -     -     -    25     -     -     -     -     -    17 |  280  15.38
 MAG0 |     -    14     -     -     -     -     -    23     -     -     - |  287   8.88
 MATE |     -     -     -    97     -     -     -     -     -     -    39 |  134   0.26
 MAW1 |     -    24     -     -    18     -     -    57     -     -    34 |  287   8.15
 MBAR |     -    23     -     -    73     -     -    48     -     -    37 |  287  17.35
 MCM4 |     -    32     -    46    41     -     -     -     -     -     - |  284  15.24
 MDO1 |     -    34    30     -    40     -     -     -     -     -    35 |  287  27.52
 MEDI |     -     -    36     -     -     -     -     -     -     -    31 |  288   1.78
 MIZU |     -    36    27     -     -     -     -     -     -     -     - |  288    >>>
 MKEA |     -     -     -    42    19     -     -    27     -     -    15 |  287  26.60
 NLIB |     -    33    35     -    19     -     -     -     -     -    18 |  287   0.06
 NOT1 |     -     -     -     -     -     -     -    90     -     -    35 |  286   0.16
 NPLD |     -    24    19     -     -     -     -     -     -     -     - |  287   0.04
 NRC1 |     -     -    23     -    22     -     -     -     -     -    26 |  288   0.03
 NRIL |     -    74     -     -    68     -     -    36     -     -    78 |  287   7.68
 NSSP |     -    21     -     -     -     -     -     -     -     -    14 |  288   9.35
 PERT |     -     -    19    32    19     -     -     -     -     -    15 |  287   2.41
 PIE1 |     -     -    20    32    25     -     -    25     -     -    19 |  287   0.07
 POL2 |     -    25     -     -    23     -     -    56     -     -    14 |  287   8.78
 PRDS |     -     -    26     -     -     -     -     -     -     -    22 |  288   0.12
 PTBB |     -    31    23     -     -     -     -     -     -     -     - |  288   0.37
 QAQ1 |     -    40    11     -     -     -     -     -     -     -    19 |  288    >>>
 RABT |     -    20     -     -     -     -     -     -     -     -    13 |  287  12.69
 RBAY |     -     -     -     -    35     -     -     -     -     -    23 |  175  72.33
 RIOG |     -    33    19     -    43     -     -     -     -     -     - |  287   6.68
 SANT |     -   107     -   155    36     -     -     -     -     -     X |  287  12.23
 SCH2 |     -    22    17     -    19     -     -     -     -     -    26 |  288  23.09
 SFER |     -    41    31     -     -     -     -     -     -     -     - |  263 940.39
 SHAO |     -     -     -    46    40     -     -     -     -     -    13 |  287  23.62
 SPT0 |     -    24    18     -     -     -     -     -     -     -     - |  228   0.04
 STJO |     -    26    31     -    26     -     -    45     -     -    16 |  288   0.03
 STR1 |     -     -    26     -     -     -     -     -     -     -    23 |  288   0.91
 SUTH |     -    59     -     -    30     -     -     -     -     -    34 |  287   9.84
 SUTM |     -     -    19     -    24     -     -     -     -     -     - |  280  16.64
 THTI |     -     -    32    30    40     -     -     -     -     -    14 |  287   3.72
 THU3 |     -    19    20     -    20     -     -     -     -     -    29 |  287   6.77
 TID1 |     -     -     -     -     -     -     -    38     -     -    15 |  288   0.06
 TID2 |     -     -     -     -    39     -     -     -     -     -    26 |  280   0.14
 TIDB |     -     -    42    60    30     -     -     -     -     -    19 |  287   0.06
 TIXI |     -     -     -    32    23     -     -    36     -     -    16 |  286   7.85
 TLSE |     -     -    14     -     -     -     -     -     -     -    12 |  288   0.52
 TOW2 |     -    45     -     -    31     -     -    51     -     -    18 |  287   3.99
 TSKB |     -    34    33    71    55     -     -    52     -     -    22 |  287   1.57
 TWTF |     -    27    19     -     -     -     -    32     -     -    28 |  288   0.09
 USN3 |     -    52    20     -     -     -     -    61     -     -    31 |  288   0.03
 USNO |     -    22    29     -     -     -     -     -     -     -    29 |  288   0.03
 USUD |     -     -    21    56     -     -     -     -     -     -    19 |  288   0.13
 VILL |     -     -     -    29    52     -     -     -     -     -    30 |  287  15.84
 WES2 |     -     -    24     -     -     -     -     -     -     -    21 |  286   0.06
 WHIT |     -    19     -     -     -     -     -     -     -     -    12 |  288   0.86
 WILL |     -    21    30     -     -     -     -     -     -     -    20 |  288 174.27
 WUHN |     -     -     -     -    20     -     -     -     -     -    13 |  280  16.68
 YAKT |     -    33     -    54     -     -     -     -     -     -     - |  288   0.74
 YEBE |     -     -    28     -     -     -     -    40     -     -    24 |  288   0.45
 YELL |     -    14    18    24    17     -     -     -     -     -    16 |  287   0.02
 ZIMM |     -     -     -     -    27     -     -     -     -     -    18 |  280    >>>
 -----+-------------------------------------------------------------------+--------------
 TOT  |  4133    42    34    62    43   488  3149    62  3288     -    30 |


 BEST CLOCK FIT: YELL   287   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288    9.15   | 3.15e-14  6.29e-15  1.99e-15 |
 AMC2 |   288     0     0   288    8.57   | 3.53e-14  7.27e-15  9.22e-16 |
 YELL |   287     0     0   286    6.71   | 3.20e-14  5.55e-15  9.18e-16 |
 ALGO |   288     0     0   288    6.23   | 4.34e-14  1.87e-14  4.01e-15 |
 NLIB |   287     0     0   286    5.37   | 3.62e-14  1.11e-14  3.99e-15 |
 USNO |   288     0     0   288    5.26   | 4.72e-14  8.60e-15  3.68e-15 |
 NRC1 |   288     0     0   288    5.08   | 3.59e-14  1.06e-14  1.92e-15 |
 PIE1 |   287     0     0   286    4.89   | 5.61e-14  8.76e-15  3.12e-15 |
 BREW |   288     0     0   143    4.88   | 5.14e-14  8.25e-15  1.85e-15 |
 SPT0 |   228     1     0   227    4.66   | 5.02e-14  8.59e-15         - |
 KOKB |   287     0     0   286    4.44   | 5.00e-14  1.54e-14  4.12e-15 |
 NPLD |   287     0     0   142    4.37   | 4.21e-14  8.99e-15  4.24e-15 |
 ALBH |   288     0     0   288    4.18   | 3.76e-14  1.31e-14  3.54e-15 |
 GODE |   288     0     0   288    3.70   | 4.86e-14  9.81e-15  4.99e-15 |
 USN3 |   288     0     0   288    3.58   | 7.10e-14  1.22e-14  2.25e-15 |
 TID1 |   288     0     0   288    2.95   | 7.53e-14  1.50e-14  4.73e-15 |
 STJO |   288     1     0   287    2.93   | 2.90e-14  9.10e-15  1.79e-15 |
 DRAO |   280     0     0   279    2.39   | 3.37e-14  9.92e-15  4.95e-15 |
 TWTF |   288     0     0   288    2.09   | 5.32e-14  2.17e-14  6.14e-15 |
 WES2 |   286     0     0   141    1.42   | 4.96e-14  1.45e-14  3.43e-15 |
 FAIR |   287     0     0   286    1.29   | 5.23e-14  8.37e-15  5.40e-15 |
 TID2 |   280     1     0   278    0.99   | 6.04e-14  1.53e-14  5.14e-15 |
 TIDB |   287     0     0   286    0.98   | 2.02e-13  2.15e-14  4.39e-15 |
 MAD2 |   288     0     0   143    0.67   | 5.27e-14  1.14e-14  6.77e-15 |
 NOT1 |   286     0     0   141    0.62   | 6.48e-14  2.52e-14  1.25e-14 |
 MATE |   134     0     0   124    0.58   | 5.92e-14  1.12e-14         - |
 FORT |   287     0     0   286    0.46   | 5.51e-14  2.74e-14  1.42e-14 |
 PTBB |   288     0     0   288    0.25   | 2.55e-13  4.67e-14  2.64e-14 |
 PRDS |   288     0     0   288    0.21   | 7.52e-14  1.97e-14  9.50e-15 |
 DWH1 |   288     0     0   288    0.12   | 2.95e-13  9.10e-14  1.54e-14 |
 G16  |   288     0     0   277    0.12   | 5.52e-13  7.98e-14  3.12e-14 |
 YEBE |   288     0     0   288    0.12   | 5.53e-14  1.99e-14  4.63e-14 |
 G06  |   287     0     0   286    0.09   | 4.23e-13  1.30e-13  5.72e-14 |
 BAHR |   287     0     0   286    0.08   | 3.47e-13  9.69e-14  3.97e-14 |
 G07  |   287     0     0   286    0.06   | 2.76e-13  8.81e-14  7.16e-14 |
 KGN0 |   287     0     0   286    0.06   | 3.41e-13  9.20e-14  3.98e-14 |
 G26  |   287     0     0   286    0.06   | 3.81e-13  1.05e-13  6.38e-14 |
 BOR1 |   288     0     0   288    0.05   | 4.59e-13  1.50e-13  3.36e-14 |
 G30  |   275     0     0   272    0.05   | 2.78e-13  9.30e-14  4.86e-14 |
 G04  |   287     0     0   286    0.04   | 5.07e-13  1.46e-13  9.35e-14 |
 TLSE |   288     0     0   143    0.04   | 3.96e-13  1.27e-13  5.72e-14 |
 HRAO |   284     0     0   282    0.03   | 1.23e-13  2.91e-14  4.73e-14 |
 SFER |   263     1     0   138    0.03   | 4.21e-13  1.35e-13  2.99e-14 |
 G29  |   287     0     0   286    0.03   | 4.04e-13  1.15e-13  9.84e-14 |
 MEDI |   288     0     0   288    0.03   | 4.28e-14  5.40e-14  1.42e-13 |
 YAKT |   288     0     0   143    0.02   | 4.44e-13  1.31e-13  5.15e-14 |
 IENG |   288     0     0   143    0.02   | 5.56e-13  1.78e-13  5.24e-14 |
 TSKB |   287     0     0   286    0.01   | 1.02e-12  2.81e-13  1.93e-13 |
 STR1 |   288     0     0   143    0.01   | 6.46e-13  1.81e-13  7.65e-14 |
 KERG |   287     0     0   286    0.01   | 1.24e-12  3.28e-13  1.38e-13 |
 G25  |   287     0     0   286    0.01   | 1.41e-12  3.92e-13  2.78e-13 |
 G09  |   287     0     0   286    0.01   | 1.39e-12  4.74e-13  2.37e-13 |
 G15  |   287     0     0   286    0.00   | 1.60e-12  5.33e-13  2.52e-13 |
 GMAS |   288     0     0   288    0.00   | 1.21e-12  3.30e-13  3.00e-13 |
 G10  |   287     0     0   286    0.00   | 1.20e-12  3.55e-13  2.58e-13 |
 G03  |   287     0     0   286    0.00   | 1.31e-12  4.72e-13  2.15e-13 |
 G28  |   287     0     2     7    0.00   | 6.53e-13  6.87e-14  8.59e-14 |
 G23  |   287     0     4     3    0.00   | 5.66e-13  6.02e-14  3.35e-14 |
 G13  |   287     0     3     3    0.00   | 5.59e-13  1.08e-13  2.93e-14 |
 GPST |   288     0     0     0    0.00   | 2.91e-14  4.86e-15  1.08e-15 |
 RBAY |   175     0     0     0    0.00   |        -         -         - |
 ISPA |   275     0     0     0    0.00   |        -         -         - |
 ZIMM |   280     0     0     0    0.00   |        -         -         - |
 WUHN |   280     0     0     0    0.00   |        -         -         - |
 SUTM |   280     0     0     0    0.00   |        -         -         - |
 MADR |   280     0     0     0    0.00   |        -         -         - |
 MAC1 |   257     1     0     0    0.00   |        -         -         - |
 KELY |   280     0     0     0    0.00   |        -         -         - |
 IISC |   280     0     0     0    0.00   |        -         -         - |
 HARB |   280     0     0     0    0.00   |        -         -         - |
 BRMU |   280     0     0     0    0.00   |        -         -         - |
 BJFS |   280     0     0     0    0.00   |        -         -         - |
 AUCK |   257     0     0     0    0.00   |        -         -         - |
 ASPA |   280     0     0     0    0.00   |        -         -         - |
 TIXI |   286     0     0     0    0.00   |        -         -         - |
 MAG0 |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   286     0     0     0    0.00   |        -         -         - |
 BILI |   286     0     0     0    0.00   |        -         -         - |
 G31  |   287     0     0     0    0.00   |        -         -         - |
 G27  |   287     0     0     0    0.00   | 1.28e-12  3.44e-13  3.26e-13 |
 G24  |   287     0     0     0    0.00   | 1.20e-12  4.16e-13  2.18e-13 |
 G22  |   287     0     6     0    0.00   | 6.20e-13  7.62e-14  2.15e-14 |
 G21  |   287     2     6     0    0.00   | 9.79e-13  1.39e-13  4.34e-14 |
 G20  |   287     0     5     0    0.00   | 5.74e-13  7.92e-14  2.63e-14 |
 G19  |   287     0     6     0    0.00   | 6.39e-13  6.70e-14  1.82e-14 |
 G18  |   287     1     6     0    0.00   | 1.36e-12  1.42e-13  3.10e-14 |
 G14  |   287     0     6     0    0.00   | 6.13e-13  5.76e-14  2.79e-14 |
 G11  |   287     0     6     0    0.00   | 6.97e-13  7.15e-14  3.00e-14 |
 G08  |   288     0     0     0    0.00   |        -         -         - |
 G05  |   275     0     0     0    0.00   | 1.40e-12  4.31e-13  2.09e-13 |
 G02  |   287     0     6     0    0.00   | 5.57e-13  5.85e-14  1.95e-14 |
 G01  |   287     0     0     0    0.00   | 1.83e-12  6.59e-13  3.34e-13 |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 5.42e-13  2.63e-13  7.75e-14 |
 VILL |   287     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     4     0    0.00   | 3.22e-13  5.40e-14  9.72e-15 |
 TOW2 |   287     0     0     0    0.00   | 4.49e-13  4.51e-13  2.76e-13 |
 THU3 |   287     0     0     0    0.00   |        -         -         - |
 THTI |   287     0     0     0    0.00   | 3.99e-13  3.13e-13  4.20e-13 |
 SUTH |   287     0     0     0    0.00   |        -         -         - |
 SHAO |   287     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     1     0    0.00   | 6.09e-13  9.08e-13  1.67e-12 |
 SANT |   287     0     0     0    0.00   |        -         -         - |
 RIOG |   287     0     0     0    0.00   |        -         -         - |
 RABT |   287     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     1     0     0    0.00   | 3.34e-13  2.07e-13  6.74e-13 |
 POL2 |   287     0     0     0    0.00   |        -         -         - |
 PERT |   287     0     0     0    0.00   | 1.99e-12  5.09e-13  1.99e-13 |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   287     0     0     0    0.00   |        -         -         - |
 MKEA |   287     0     0     0    0.00   |        -         -         - |
 MIZU |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   287     0     1     0    0.00   | 9.01e-13  1.24e-12  1.63e-12 |
 MCM4 |   284     0     1     0    0.00   | 7.07e-13  3.73e-13  9.37e-13 |
 MBAR |   287     0     0     0    0.00   |        -         -         - |
 MAW1 |   287     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KOUR |   287     2     0     0    0.00   |        -         -         - |
 KIRU |   287     0     0     0    0.00   |        -         -         - |
 JPLM |   287     1     0     0    0.00   | 6.38e-13  2.18e-13  4.73e-13 |
 HLFX |   286     0     1     0    0.00   | 2.07e-13  4.09e-13  2.23e-12 |
 GUAT |   239     0     0     0    0.00   |        -         -         - |
 GUAM |   280     0     0     0    0.00   |        -         -         - |
 GRAZ |   284     0     0     0    0.00   |        -         -         - |
 GRAS |   287     0     0     0    0.00   |        -         -         - |
 GOLD |   287     0     0     0    0.00   |        -         -         - |
 GLPS |   287     0     0     0    0.00   |        -         -         - |
 DGAR |   287     0     0     0    0.00   |        -         -         - |
 DAEJ |   288     0     0     0    0.00   |        -         -         - |
 CORD |   288     0     0     0    0.00   |        -         -         - |
 COCO |   287     0     0     0    0.00   | 2.21e-13  7.03e-13  1.19e-12 |
 CEDU |   287     0     0     0    0.00   |        -         -         - |
 CAS1 |   287     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   287     0     0     0    0.00   |        -         -         - |
 AREQ |   287     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.42e-17  2.90e-16  1.74e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     STJO      YELL      YELL |
------------------------------------------+------------------------------+
