
 GPS week: 1306   Day: 3   MJD: 53389                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2688      0     0.06    -0.17     3.16     0.00      0
 cod |   288     0  27213    340     0.04    -0.47     0.04    23.06      0
 emr |   288     0  23134      3  3059.64    51.17     0.04    23.08      0
 esa |   288     0  17099   1488  3059.39    51.58     0.11     5.49      0
 gfz |   288     0  20483    363    -0.01    -0.06     0.05    16.43      0
 iga |    96     0   2688     10     0.07    -0.18     0.08     0.00      0
 igu |    96     0   2688      0     0.07    -0.17     3.82     0.00      0
 jpl |   288     0  16182     44     0.34    -0.52     0.05    16.08      0
 ngs |    96     0   2688      0     0.06    -0.17     2.58     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  33544   2642  3059.71    51.16     0.05    15.85      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 | -2104    15  -140    17    84   112   209    75 -2603     -    12 |
    2 | -6309   -12    -8    28   -92   -16 -4131   136 -4778     -   -22 |
    3 | -1825   -30  -145   -23   203    22  -329    15 -1926     -    37 |
    5 |   496    88   -34   -33    87    47 -7540   -84   -60     -   -73 |
    6 | -2794    90   -77    44   165  -150 -7494  -112 -2877     -   -92 |
    7 |  -588   -74   -59   -40    66    55   667   150  -514     -   -14 |
    8 | -3519    98   -47    66   -94  -123   128    42 -3466     -   -44 |
    9 |  -463    14   -28    54   163  -241 14777   -65 -2338     -  -113 |
   10 | -2354   -12    92    21   -89    85   446    35 -2544     -   -68 |
   11 |  5915    -8   -31    -8  -131    44  -650   182  5373     -    11 |
   13 |  6241   156   -28  -235  -181  -252  1941   168  5521     -   -92 |
   14 |  2675   -26   -35     -   132   -17   514     0  2742     -   -48 |
   15 |   133   -97   -67   150   156   206 -3411   -18 -1368     -    43 |
   16 |  3658   -77    -5    86   102   -49   996    34  3541     -   -50 |
   17 | -4050   125  -178    87    17   102 13027    69 -2937     -   -40 |
   18 |  2256   -87   -77   110   241    26  1353   -54  2623     -     7 |
   19 |  4633   -26  -229   -23   367  1197  2197    33  4365     -   -35 |
   20 |  4142    42  -166   -89     9   -37  1329   194  4324     -     5 |
   21 |   -82   -68    43   -24    43     8  1197    19   670     -   -18 |
   22 |  -515  -144   120     1   111   -32  2022    24  -255     -  -106 |
   23 |   254    52  -129  -292   -32  -197 -1098   136  -202     -   111 |
   24 | -1638    56    -5   125  -186   -22 -7378   121 -1332     -   -47 |
   25 | -6421    35  -161    39   167  -109 -9580    56 -3967     -   -67 |
   26 | -2370    21    10     X   -27   -54  2976    86 -2201     -  -105 |
   27 |  4696    89  -105    23   -36  -229  1695   147  3926     -   -98 |
   28 |  5740   -29   -12   -15  -110   -39 -3319   106  6095     -    70 |
   29 | -3315     5    55   101   -15   -74   708     - -3130     -  -107 |
   30 | -2493   119   -60   -36    50  -138 -1251   -28 -2681     -   -97 |
 -----+-------------------------------------------------------------------+
 ALBH |     -    97   -41     -     -     -     -     6     -     -   -88 |
 ALGO |     -     -   -28    60     -     -     -   153     -     -  -135 |
 ALRT |     -   -47     -     -    65     -     -     -     -     -     - |
 AMC2 |     -   -64   191     -     -     -     -  -269     -     -    87 |
 AREQ |     -    70   208     -   -55     -     -  -404     -     -    61 |
 ARTU |     -    92     -   108   -74     -     -   -93     -     -     X |
 ASPA |     -     -     -     -    91     -     -  -106     -     -     5 |
 AUCK |     -    46     -     X     -     -     -     -     -     -   -66 |
 BAHR |     -     -   109     -    67     -     -  -166     -     -   -60 |
 BAN2 |     -     -   -34     -     -     -     -     -     -     -    50 |
 BILI |     -    31     -     -   -43     -     -     -     -     -     X |
 BOGT |     -     -     -   175     -     -     -     -     -     -   -61 |
 BOR1 |     -    -3   -29     -     -     -     -     -     -     -    46 |
 BRUS |     -   -92    42     -     -     -     -     -     -     -    73 |
 CAGL |     -    45     -     -     -     -     -   -64     -     -     - |
 CAGZ |     -    71     -     -     -     -     -     -     -     -  -104 |
 CAS1 |     -    25     -   -60   -55     -     -     -     -     -    42 |
 CEDU |     -     -     -  -474     -     -     -     -     -     -   164 |
 CHAT |     -    32     -     -   -77     -     -     -     -     -    33 |
 COCO |     -  -138     -   267   -21     -     -     -     -     -   144 |
 CRO1 |     -     -    49   -91   -39     -     -    21     -     -   -20 |
 DAEJ |     -    17   -10     -     -     -     -     -     -     -   -10 |
 DGAR |     -   -34     -     -     -     -     -    48     -     -     X |
 DRAO |     -     -    46     -     -     -     -    10     -     -   -77 |
 DWH1 |     -   104   -13     -     -     -     -     -     -     -  -132 |
 FAIR |     -     -    21   -67    -8     -     -     -     -     -     - |
 FORT |     -    57   -16  -285    21     -     -     -     -     -     X |
 GLPS |     -    56     -     -   -35     -     -     -     -     -   -42 |
 GODE |     -   -28   113   -61     -     -     -     -     -     -  -103 |
 GOLD |     -    92     -  -121     -     -     -   -90     -     -     X |
 GRAZ |     -     -   -24     -     -     -     -     -     -     -    35 |
 GUAM |     -    55     -  -299    67     -     -  -200     -     -   157 |
 GUAT |     -   -14     -     -   -59     -     -     -     -     -    82 |
 HOB2 |     -    38    65     -     -     -     -     -     -     -  -149 |
 HOFN |     -     -     -     -  -204     -     -     -     -     -   212 |
 HRAO |     -   -72     -     -   -83     -     -    81     -     -   110 |
 IENG |     -   -15    15     -     -     -     -     -     -     -     - |
 IISC |     -   -51     -    29    62     -     -     -     -     -     - |
 JPLM |     -     -   -13     -  -214     -     -    81     -     -   159 |
 KERG |     -     -     -     X   102     -     -     -     -     -  -106 |
 KGN0 |     -    10     1     -     -     -     -     -     -     -   -16 |
 KIRU |     -   -30     -     -     -     -     -   132     -     -   -78 |
 KIT3 |     -     -     -   -24   115     -     -  -122     -     -    14 |
 KOKB |     -   -24    82     -   -48     -     -   -52     -     -    18 |
 KOSG |     -   -71     -     -     -     -     -     -     -     -   103 |
 KOUR |     -    65     -  -234   -42     -     -     -     -     -    30 |
 LAE1 |     -     -     -     -    46     -     -     -     -     -   -48 |
 LHAS |     -     -     -     -   -93     -     -     -     -     -    97 |
 LPGS |     -    33    58  -316     -     -     -     -     -     -   -23 |
 MAC1 |     -  -108     -    56    26     -     -     -     -     -   111 |
 MADR |     -     -     -     -     -     -     -    14     -     -   -14 |
 MAS1 |     -   -37     2   -27   -38     -     -    22     -     -    78 |
 MAW1 |     -    64     -     -   -25     -     -     -     -     -   -67 |
 MBAR |     -   -45     -     -   -67     -     -    -5     -     -   141 |
 MCM4 |     -   -53    53     -     X     -     -     -     -     -     - |
 MDO1 |     -     -  -172     -     -     -     -     -     -     -   250 |
 METS |     -   -99    41     -     -     -     -     -     -     -    84 |
 MIZU |     -     -   -33   414     -     -     -     -     -     -   -85 |
 NANO |     -   191     -     -     -     -     -  -273     -     -     - |
 NISU |     -    10     -     -   -14     -     -     -     -     -     - |
 NLIB |     -     -    74     -     -     -     -   -69     -     -   -38 |
 NNOR |     -     -    12  -110     -     -     -     -     -     -    21 |
 NPLD |     -  -103    47     -     -     -     -     -     -     -    81 |
 NRC1 |     -     -    30     -  -103     -     -     -     -     -    62 |
 NSSP |     -    -4     -     -     -     -     -     -     -     -     6 |
 NTUS |     -   -98     -   169     -     -     -     -     -     -    84 |
 NYA1 |     -   -33     -     -   -56     -     -     -     -     -   107 |
 ONSA |     -   -30    44   321  -127     -     -     -     -     -     X |
 PDEL |     -    12     -     -   -17     -     -     -     -     -     - |
 PERT |     -     -    -9     X    83     -     -    -7     -     -   -66 |
 PETP |     -    21     -     -   -29     -     -     -     -     -     X |
 PIE1 |     -  -104   -82   293     -     -     -     -     -     -   171 |
 POL2 |     -    85     -     -     -     -     -  -105     -     -   -18 |
 POTS |     -    15     -     -   -21     -     -     -     -     -     X |
 PRDS |     -     -   -33     -     -     -     -     -     -     -    48 |
 PTBB |     -   -46    15     -     -     -     -     -     -     -    45 |
 QAQ1 |     -     -   -45     -     -     -     -     -     -     -    65 |
 RIOG |     -   -20   154     -  -129     -     -     -     -     -   -61 |
 SCH2 |     -     -    48     -     -     -     -  -138     -     -    72 |
 SFER |     -   -48    48     -     -     -     -     -     -     -     - |
 SPT0 |     -  -159    92     -     -     -     -     -     -     -    97 |
 STJO |     -     -     5     -   -65     -     -    60     -     -     X |
 STR1 |     -     -    -1     -     -     -     -     -     -     -     1 |
 THTI |     -     -   169    -1  -190     -     -     -     -     -   -48 |
 THU3 |     -    -2    89     -     -     -     -     -     -     -  -128 |
 TIDB |     -    79    -7    94     -     -     -     -     -     -  -137 |
 TRO1 |     -    70     -     -     7     -     -     -     -     -  -110 |
 TSKB |     -  -102    27    70    55     -     -     -     -     -    29 |
 TWTF |     -   -74    14     -     -     -     -     -     -     -    87 |
 UNSA |     -     -     -   -35     -     -     -     -     -     -    12 |
 URUM |     -    39     -     -     -     -     -     -     -     -   -57 |
 USN3 |     -    77     -     -     -     -     -   -87     -     -   -24 |
 USNO |     -    27     1     -     -     -     -     -     -     -   -41 |
 USUD |     -     -   -66  -308     -     -     -   175     -     -    26 |
 VILL |     -     -     -   -81     -     -     -     -     -     -    28 |
 WHIT |     -     X     -     -     -     -     -   -42     -     -    42 |
 WILL |     -   -24   107     -     -     -     -     -     -     -  -121 |
 WTZR |     -  -100   126    79     -     -     -     -     -     -   -65 |
 YAR2 |     -     -    54     -     -     -     -     -     -     -   -78 |
 YELL |     -     -  -128     X     X     -     -     -     -     -   187 |
 ZAMB |     -   -29     -     -    40     -     -     -     -     -     - |
 ZIMM |     -   -48     -     -     -     -     -     -     -     -    70 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  3953    57    25   101    19    69  2764    57  4362     -    56 |  288   4.01
    2 |  3985    61    57    85    51    59  1834    28  3117     -   101 |  288   0.35
    3 |  3731    58    21    57    39    48  2665    30  3087     -    40 |  288   2.64
    5 |  6132    37    36    56    27    58  6697    53  3653     -    64 |  288   3.50
    6 |   999    44    23   146    50    55  4153   106  1135     -    84 |  288   0.66
    7 |   751    40    41   124    21    45   367    50   686     -    48 |  288   0.48
    8 |  2982    57    44   125    62   127  3607    75  3063     -    48 |  288   2.79
    9 |  4875   148    74    80    93   157 10030    42  4196     -   129 |  288   2.89
   10 |  3424    40    41   108    31    84  2438    48  3272     -    59 |  288   2.53
   11 |  1197    56    42   145    61    74   531    46   906     -    82 |  288   0.46
   13 |   494    32    42   153    26    77  1316    32   693     -    62 |  288   0.22
   14 |   776    39    87     -    31    59   887    36   811     -    96 |  288   0.27
   15 |  6606    54    54    91    57    37  2771    89  4737     -    46 |  288   2.64
   16 |   738    50    32    54    21    51  1056    54   624     -    60 |  288   0.30
   17 |  4586    46    29    98    46    98  8711    36  3704     -    74 |  288   1.82
   18 |  1212    47    70   151    31    90  1062    57  1205     -    53 |  288   0.41
   19 |   375    28    27    68    16   166   785    26   511     -    40 |  288   0.25
   20 |   606    39    31    59    50    62   931    31   782     -    75 |  288   0.29
   21 |  2171    53    59   134    76    61   926    60  1963     -    83 |  288   0.33
   22 |  3188    64    69   194    54    59  3380    89  3203     -    68 |  288   1.91
   23 |   486    41    32   139    31    55   436    82   683     -    88 |  288   0.32
   24 |  3232    57    54    71    40    81  4798    41  3063     -    50 |  288   2.92
   25 |  6975    76    31    76    36    85  8516    35  4521     -    49 |  288   2.75
   26 |  1621    39    50     X    18    37  1524    63  1040     -    79 |  288   0.95
   27 |  1512    89    72   168   100    86   562   110  1998     -    97 |  288   0.91
   28 |  1682    45    39   111   101    85  3511    47  2367     -    91 |  288   1.48
   29 |   984    35    52   146    48    75   684     -   810     -   101 |  288   0.73
   30 |  1223    26    61   138    18    69   399    58  1070     -    34 |  288   0.69
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    42    23     -     -     -     -    25     -     -    43 |  288   0.04
 ALGO |     -     -    20   119     -     -     -    10     -     -    23 |  288   0.01
 ALRT |     -    12     -     -    17     -     -     -     -     -     - |  276   6.32
 AMC2 |     -    19    45     -     -     -     -    30     -     -    43 |  288   0.04
 AREQ |     -    46    25     -    32     -     -    47     -     -    64 |  288  16.86
 ARTU |     -    29     -    62    27     -     -    46     -     -     X |  284   9.38
 ASPA |     -     -     -     -   107     -     -    59     -     -    63 |  239    >>>
 AUCK |     -    37     -     X     -     -     -     -     -     -    54 |  264  12.94
 BAHR |     -     -    25     -    28     -     -    28     -     -    37 |  288   0.54
 BAN2 |     -     -    22     -     -     -     -     -     -     -    33 |  199  14.58
 BILI |     -    21     -     -    29     -     -     -     -     -     X |  287   7.01
 BOGT |     -     -     -   110     -     -     -     -     -     -    38 |  288  23.09
 BOR1 |     -    32    36     -     -     -     -     -     -     -    15 |  288   6.01
 BRUS |     -    22    26     -     -     -     -     -     -     -    34 |  288   0.03
 CAGL |     -    21     -     -     -     -     -    30     -     -     - |  224    >>>
 CAGZ |     -    45     -     -     -     -     -     -     -     -    66 |  276   0.44
 CAS1 |     -    16     -   152    20     -     -     -     -     -    40 |  288   7.22
 CEDU |     -     -     -    60     -     -     -     -     -     -    21 |   98  10.78
 CHAT |     -    22     -     -    19     -     -     -     -     -    27 |  287  13.34
 COCO |     -    42     -   132    37     -     -     -     -     -    53 |  288   6.83
 CRO1 |     -     -    35   129    66     -     -    28     -     -    44 |  287  21.32
 DAEJ |     -    28    33     -     -     -     -     -     -     -    40 |  287    >>>
 DGAR |     -    22     -     -     -     -     -    32     -     -     X |  287  19.92
 DRAO |     -     -    21     -     -     -     -    13     -     -    26 |  288   0.11
 DWH1 |     -    28    37     -     -     -     -     -     -     -    31 |  288   0.34
 FAIR |     -     -    60    69    73     -     -     -     -     -     - |  262   0.34
 FORT |     -    42    40   100    43     -     -     -     -     -     X |  287   0.07
 GLPS |     -    24     -     -    28     -     -     -     -     -    22 |  288  29.15
 GODE |     -    52    57   128     -     -     -     -     -     -    35 |  288   0.06
 GOLD |     -    31     -   130     -     -     -    16     -     -     X |  288  10.63
 GRAZ |     -     -    13     -     -     -     -     -     -     -    20 |  288    >>>
 GUAM |     -    39     -    85    28     -     -    50     -     -    46 |  288  15.34
 GUAT |     -    27     -     -    26     -     -     -     -     -    25 |  288    >>>
 HOB2 |     -    24    17     -     -     -     -     -     -     -    23 |  288   0.06
 HOFN |     -     -     -     -    25     -     -     -     -     -    26 |  246    >>>
 HRAO |     -    62     -     -    52     -     -    47     -     -    67 |  280   0.17
 IENG |     -    21    21     -     -     -     -     -     -     -     - |  288   0.46
 IISC |     -    15     -    39    21     -     -     -     -     -     - |  288  26.93
 JPLM |     -     -    70     -    40     -     -    37     -     -    32 |  288   8.99
 KERG |     -     -     -     X    24     -     -     -     -     -    25 |  288   1.69
 KGN0 |     -    15    22     -     -     -     -     -     -     -    39 |  287   0.28
 KIRU |     -    14     -     -     -     -     -    53     -     -    52 |  288   8.84
 KIT3 |     -     -     -    53   113     -     -    74     -     -    68 |  268  14.50
 KOKB |     -    73    34     -   170     -     -    37     -     -    40 |  288   0.64
 KOSG |     -    30     -     -     -     -     -     -     -     -    44 |  288  99.82
 KOUR |     -    29     -   100    41     -     -     -     -     -    28 |  288   1.64
 LAE1 |     -     -     -     -    33     -     -     -     -     -    35 |  287  13.23
 LHAS |     -     -     -     -    51     -     -     -     -     -    53 |  237  20.87
 LPGS |     -    34    32    90     -     -     -     -     -     -    55 |  288  16.82
 MAC1 |     -    57     -   101    51     -     -     -     -     -    80 |  283  18.42
 MADR |     -     -     -     -     -     -     -    34     -     -    35 |  288   9.12
 MAS1 |     -    19    20   109    26     -     -    19     -     -    30 |  288   1.80
 MAW1 |     -    50     -     -    32     -     -     -     -     -    55 |  268   8.09
 MBAR |     -    42     -     -    64     -     -   103     -     -    61 |  288  14.37
 MCM4 |     -    17    17     -     X     -     -     -     -     -     - |  139  11.32
 MDO1 |     -     -    16     -     -     -     -     -     -     -    24 |  288  18.90
 METS |     -    18    21     -     -     -     -     -     -     -    24 |  287   6.88
 MIZU |     -     -    22    81     -     -     -     -     -     -    35 |  288   0.39
 NANO |     -    58     -     -     -     -     -    83     -     -     - |  287  46.39
 NISU |     -    24     -     -    33     -     -     -     -     -     - |  287   0.04
 NLIB |     -     -    34     -     -     -     -    25     -     -    31 |  288   0.02
 NNOR |     -     -    24   141     -     -     -     -     -     -    41 |  288  11.84
 NPLD |     -    26    23     -     -     -     -     -     -     -    33 |  287   0.04
 NRC1 |     -     -    20     -    34     -     -     -     -     -    59 |  288   0.03
 NSSP |     -    16     -     -     -     -     -     -     -     -    23 |  288  10.52
 NTUS |     -    32     -    43     -     -     -     -     -     -    47 |  287   9.81
 NYA1 |     -    24     -     -    32     -     -     -     -     -    61 |  288   0.59
 ONSA |     -    21    25    44    20     -     -     -     -     -     X |  288   0.07
 PDEL |     -    15     -     -    21     -     -     -     -     -     - |  288  55.64
 PERT |     -     -    30     X    25     -     -    68     -     -    46 |  288   3.93
 PETP |     -    16     -     -    22     -     -     -     -     -     X |  287   7.13
 PIE1 |     -    42    44   110     -     -     -     -     -     -    69 |  282   2.02
 POL2 |     -    19     -     -     -     -     -    22     -     -    23 |  288  10.15
 POTS |     -    12     -     -    17     -     -     -     -     -     X |  288  15.81
 PRDS |     -     -    19     -     -     -     -     -     -     -    27 |  288   2.87
 PTBB |     -    26    39     -     -     -     -     -     -     -    43 |  288   0.27
 QAQ1 |     -     -    43     -     -     -     -     -     -     -    63 |  258   5.39
 RIOG |     -    23    26     -    34     -     -     -     -     -    44 |  288  11.56
 SCH2 |     -     -    37     -     -     -     -    66     -     -    39 |  283  13.88
 SFER |     -    20    20     -     -     -     -     -     -     -     - |  287   0.28
 SPT0 |     -    20    20     -     -     -     -     -     -     -    34 |  288   0.06
 STJO |     -     -    13     -    14     -     -    11     -     -     X |  288   0.07
 STR1 |     -     -    30     -     -     -     -     -     -     -    44 |  288   0.89
 THTI |     -     -    32    82    53     -     -     -     -     -    59 |  288  15.05
 THU3 |     -    29    40     -     -     -     -     -     -     -    48 |  281   6.62
 TIDB |     -    28    23    79     -     -     -     -     -     -    35 |  288   0.12
 TRO1 |     -    32     -     -    58     -     -     -     -     -    46 |  288   8.45
 TSKB |     -    59    51   143   166     -     -     -     -     -    51 |  288   1.39
 TWTF |     -    16    32     -     -     -     -     -     -     -    54 |  288   0.08
 UNSA |     -     -     -    83     -     -     -     -     -     -    29 |  288  22.23
 URUM |     -    23     -     -     -     -     -     -     -     -    34 |  287  46.98
 USN3 |     -    27     -     -     -     -     -    15     -     -    31 |  288   0.02
 USNO |     -    20    20     -     -     -     -     -     -     -    20 |  288   0.02
 USUD |     -     -    30    85     -     -     -    32     -     -    18 |  288  10.55
 VILL |     -     -     -    59     -     -     -     -     -     -    20 |  282   9.59
 WHIT |     -     X     -     -     -     -     -    38     -     -    38 |  286  17.81
 WILL |     -    20    24     -     -     -     -     -     -     -    19 |  288  43.63
 WTZR |     -    20    19    48     -     -     -     -     -     -    25 |  288   0.06
 YAR2 |     -     -    18     -     -     -     -     -     -     -    27 |  288   2.82
 YELL |     -     -   105     X     X     -     -     -     -     -   152 |  214   0.82
 ZAMB |     -    40     -     -    56     -     -     -     -     -     - |  237  94.96
 ZIMM |     -    33     -     -     -     -     -     -     -     -    47 |  288    >>>
 -----+-------------------------------------------------------------------+--------------
 TOT  |  3162    41    40   107    54    80  3823    52  2583     -    53 |


 BEST CLOCK FIT: ALGO   288   0.01 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 ALGO |   288     1     0   287   10.33   | 3.18e-14  6.81e-15  1.50e-15 |
 AMC2 |   288     0     0   288   10.12   | 4.08e-14  7.47e-15  3.15e-15 |
 NPLD |   287     0     0   286    9.87   | 3.40e-14  1.22e-14  2.45e-15 |
 ALBH |   288     0     0   288    7.77   | 5.40e-14  1.42e-14  2.23e-15 |
 USNO |   288     0     0   288    6.88   | 3.43e-14  6.83e-15  3.00e-15 |
 BRUS |   288     0     0   288    6.69   | 3.68e-14  6.58e-15  2.08e-15 |
 ONSA |   288     0     0   288    6.43   | 3.68e-14  7.43e-15  5.51e-15 |
 NRC1 |   288     0     0   288    5.16   | 3.12e-14  6.30e-15  1.36e-15 |
 USN3 |   288     0     0   288    5.12   | 7.41e-14  1.14e-14  1.98e-15 |
 NLIB |   288     0     0   288    5.11   | 3.57e-14  7.57e-15  1.80e-15 |
 SPT0 |   288     0     0   288    5.00   | 3.70e-14  9.34e-15  6.72e-15 |
 STJO |   288     0     0   288    3.83   | 6.38e-14  8.77e-15  4.70e-15 |
 NISU |   287     0     0   138    3.43   | 5.86e-14  7.42e-15  3.73e-15 |
 WTZR |   288     0     0   288    2.71   | 4.55e-14  1.82e-14  4.07e-15 |
 TWTF |   288     0     0   288    2.54   | 3.97e-14  7.74e-15  5.16e-15 |
 HOB2 |   288     0     0   288    1.61   | 5.00e-14  1.24e-14  6.10e-15 |
 FORT |   287     0     0   286    1.49   | 7.81e-14  1.60e-14  5.99e-15 |
 DRAO |   288     1     0   287    1.34   | 7.27e-14  1.77e-14  9.18e-15 |
 PIE1 |   282     2     0   278    1.08   | 1.10e-13  2.09e-14  3.64e-15 |
 GODE |   288     0     0   288    0.69   | 3.35e-14  7.56e-15  7.23e-15 |
 PTBB |   288     0     0   288    0.33   | 2.48e-13  5.29e-14  1.76e-14 |
 FAIR |   262     0     0   259    0.31   | 1.95e-13  5.69e-14  2.70e-14 |
 HRAO |   280     0     0   276    0.22   | 9.94e-14  2.02e-14  1.34e-14 |
 G16  |   288     0     0   261    0.21   | 4.41e-13  6.34e-14  2.92e-14 |
 YELL |   214     1     0   206    0.20   | 5.87e-14  1.75e-14         - |
 G07  |   288     0     0   288    0.17   | 2.92e-13  7.23e-14  4.81e-14 |
 G23  |   288     0     0   288    0.11   | 4.88e-13  1.18e-13  1.80e-14 |
 MIZU |   288     0     0   288    0.10   | 3.66e-13  9.07e-14  3.25e-14 |
 SFER |   287     0     0   286    0.10   | 3.51e-13  1.21e-13  2.17e-14 |
 TIDB |   288     1     2    31    0.10   | 2.22e-13  2.98e-14  1.37e-14 |
 G26  |   288     0     0   288    0.10   | 3.76e-13  9.37e-14  6.87e-14 |
 KGN0 |   287     0     0   286    0.09   | 3.66e-13  1.07e-13  2.28e-14 |
 G13  |   288     0     2    93    0.08   | 5.17e-13  5.60e-14  1.19e-14 |
 NYA1 |   288     0     0   288    0.07   | 3.54e-14  2.06e-14  4.21e-14 |
 G11  |   288     0     0   206    0.07   | 6.12e-13  6.87e-14  5.81e-14 |
 G06  |   288     0     0   288    0.07   | 4.05e-13  1.04e-13  5.49e-14 |
 BOR1 |   288     1     0   287    0.06   | 4.55e-13  1.27e-13  7.82e-14 |
 DWH1 |   288     0     0   288    0.06   | 4.91e-13  1.40e-13  2.67e-14 |
 G17  |   288     0     0   288    0.05   | 5.12e-13  1.55e-13  1.11e-13 |
 G30  |   288     0     0   288    0.05   | 3.27e-13  9.88e-14  8.75e-14 |
 BAHR |   288     0     0   143    0.05   | 3.55e-13  1.01e-13  5.36e-14 |
 G27  |   288     0     0   288    0.04   | 3.25e-13  1.07e-13  1.10e-13 |
 CAGZ |   276     0     0   143    0.03   | 5.17e-13  1.24e-13  4.29e-14 |
 G29  |   288     0     0   288    0.03   | 3.92e-13  1.40e-13  9.51e-14 |
 STR1 |   288     0     0   288    0.02   | 6.57e-13  1.66e-13  8.68e-14 |
 KOKB |   288     0     0   288    0.02   | 4.90e-14  1.50e-14  3.88e-14 |
 IENG |   288     0     0   143    0.02   | 5.49e-13  1.32e-13  3.46e-14 |
 G22  |   288     0     1   143    0.02   | 6.43e-13  9.86e-14  1.42e-13 |
 TSKB |   288     0     0   288    0.01   | 9.74e-13  3.38e-13  1.06e-13 |
 KERG |   288     0     0   288    0.01   | 1.09e-12  3.53e-13  9.31e-14 |
 KOUR |   288     0     0   288    0.01   | 1.34e-12  4.20e-13  1.76e-13 |
 G25  |   288     0     0   288    0.01   | 1.51e-12  4.23e-13  2.80e-13 |
 PRDS |   288     0     0   288    0.01   | 1.58e-12  3.99e-13  3.02e-13 |
 GPST |   288     0     0     0    0.00   | 1.93e-14  6.02e-15  1.62e-15 |
 CEDU |    98     0     0     0    0.00   |        -         -         - |
 MCM4 |   139     0     2     0    0.00   | 6.68e-13  6.70e-13         - |
 MAC1 |   283     0     0     0    0.00   |        -         -         - |
 HOFN |   246     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 LAE1 |   287     0     0     0    0.00   |        -         -         - |
 DAEJ |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     3     0    0.00   | 5.80e-13  6.29e-14  9.24e-14 |
 G24  |   288     0     0     0    0.00   | 1.41e-12  4.09e-13  3.34e-13 |
 G21  |   288     1     6     0    0.00   | 9.84e-13  1.21e-13  4.64e-14 |
 G20  |   288     0     4     0    0.00   | 6.51e-13  7.44e-14  2.28e-14 |
 G19  |   288     0     6     0    0.00   | 5.90e-13  7.31e-14  1.87e-14 |
 G18  |   288     0     6     0    0.00   | 1.42e-12  1.36e-13  4.12e-14 |
 G15  |   288     0     0     0    0.00   | 1.31e-12  4.40e-13  2.74e-13 |
 G14  |   288     0     6     0    0.00   | 6.72e-13  7.33e-14  2.85e-14 |
 G10  |   288     0     0     0    0.00   | 1.32e-12  5.03e-13  2.84e-13 |
 G09  |   288     0     0     0    0.00   | 1.22e-12  4.73e-13  2.49e-13 |
 G08  |   288     0     0     0    0.00   | 1.37e-12  4.72e-13  2.41e-13 |
 G05  |   288     0     0     0    0.00   | 1.42e-12  5.04e-13  3.33e-13 |
 G03  |   288     0     0     0    0.00   | 1.26e-12  4.54e-13  1.95e-13 |
 G02  |   288     0     3     0    0.00   | 5.01e-13  5.60e-14  2.40e-14 |
 G01  |   288     0     0     0    0.00   | 1.51e-12  7.02e-13  4.85e-13 |
 ZIMM |   288     0     0     0    0.00   |        -         -         - |
 ZAMB |   237     2     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   | 8.13e-13  7.97e-13  2.33e-13 |
 WILL |   288     2     0     0    0.00   |        -         -         - |
 WHIT |   286     0     0     0    0.00   | 6.86e-13  5.10e-13  1.13e-12 |
 VILL |   282     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   287     2     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   281     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     1     0    0.00   | 3.57e-13  2.95e-13  1.05e-12 |
 SCH2 |   283     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   258     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.82e-12  4.31e-13  2.26e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   287     0     0     0    0.00   |        -         -         - |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 NANO |   287     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   268     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 1.81e-12  5.88e-13  1.77e-13 |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 LHAS |   237     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     0     0    0.00   |        -         -         - |
 KIT3 |   268     0     0     0    0.00   |        -         -         - |
 KIRU |   288     2     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 6.10e-13  2.95e-13  8.42e-13 |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   287     0     0     0    0.00   |        -         -         - |
 CRO1 |   287     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.52e-13  6.21e-13  7.20e-13 |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 CAGL |   224     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 BAN2 |   199     0     0     0    0.00   |        -         -         - |
 ASPA |   239     0     0     0    0.00   |        -         -         - |
 ARTU |   284     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   276     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.67e-17  3.20e-16  1.92e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NRC1      NRC1      NRC1 |
------------------------------------------+------------------------------+
