
 GPS week: 1304   Day: 2   MJD: 53374                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2667      5    -0.13     0.20     3.77     0.00      0
 cod |   288     0  27757   1617    -0.61     0.65     0.04    18.67      0
 emr |   288     0  25403      0  2276.28    51.86     0.03    29.96      0
 gfz |   288     0  20584    869     0.25    -0.53     0.04    19.60      0
 iga |    96     0   2667      3    -0.23     0.29     0.09     0.00      0
 igu |    96     0   2667      0    -0.26     0.35     2.97     0.00      0
 jpl |   288     0  16522    278    -0.99     0.55     0.05    14.22      0
 ngs |    96     0   2667     22     0.43    -0.55     3.33     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  35615   3193  2276.23    51.85     0.04    17.54      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -4698    61    -9   -40   -52 -8173   -35  1464     -    23 |
    3 |  5483   -47   -26   120   -25  3555   -28  6111     -   -17 |
    4 | -1089    38  -138    20   -19   347   264 -1285     -   -40 |
    5 |  2157   -29   -62   106    57 -4067    54  1344     -   -25 |
    6 |  1399    34   -62   132  -147 -8392   -39   784     -   -44 |
    7 |  -161    44  -151    86   152   521   163  -155     -   -17 |
    8 |  -211    98  -134    65   102  9624    68 -1572     -    22 |
    9 | -4801     X   -85    60  -177 -3618    94 -4226     -     4 |
   10 | -4153    15   -24    59   154  2945    42 -4269     -   -76 |
   11 |  3186    80   -63   -26     2 -1015    99  3205     -   -29 |
   13 |  4666   105     9   -99   -27   481    66  4600     -   -71 |
   14 |  2583    44    -3   -18   -92  -684    -5  2671     -   -17 |
   15 |  -513     X   112    93    89  4297  -133 -1220     -  -188 |
   16 |  1894   -57   -36    44   -41   158   121  1690     -   -25 |
   17 | -3641   -20  -112   243     2  3998    23 -4021     -   -80 |
   18 |  3693    -3    34    64    -8   315   -62  3427     -   -80 |
   19 |  4455    57  -181   125   863  -241   119  4372     -    12 |
   20 |  5389    84  -186    87    66   602    85  5344     -    62 |
   21 |  2663   -17    59    29    73  -925     0  2878     -  -114 |
   22 | -2828  -100   157   -90  -148  -620    22 -3146     -   -79 |
   23 |  -576    73   -49  -107   -99 -1630     9  -994     -   117 |
   24 | -6559     X   -95    45   -74 -7828   161 -6764     -   -19 |
   25 | -3300     X    41    34  -263  6337   -47 -3489     -   -70 |
   26 | -5804     5   -10    62  -107 -1525    36 -5853     -   -87 |
   27 | -1456    52   -97   128  -110  -576    23 -1622     -   -45 |
   28 |  4240    11   -78    70   103  8277    55  3855     -    -1 |
   29 | -2945    13   -16    17  -155   203   111 -3093     -   -95 |
   30 |  -150   -38    53  -105  -115 -2217    62  -570     -    16 |
 -----+-------------------------------------------------------------+
 ALBH |     -     -   -22     -     -     -    56     -     -    -8 |
 ALGO |     -   -64    -4     -     -     -    66     -     -    21 |
 AMC2 |     -   -69   124     -     -     -  -285     -     -    92 |
 AREQ |     -    16     5   -39     -     -   -77     -     -    81 |
 ARTU |     -   225     -   -81     -     -  -183     -     -     X |
 ASPA |     -     -     -  -103     -     -     -     -     -   116 |
 AUCK |     -    -1     -     -     -     -     -     -     -     1 |
 BAHR |     -  -178   127    91     -     -     -     -     -  -130 |
 BAN2 |     -     -   -47     -     -     -     -     -     -    80 |
 BILI |     -   -16     -    15     -     -     -     -     -     X |
 BOGT |     -    71     -   -70     -     -     -     -     -     2 |
 BOR1 |     -    23     7     -     -     -     -     -     -   -37 |
 BREW |     -     -    51     -     -     -     -     -     -   -87 |
 BRUS |     -   -92    26     -     -     -     -     -     -    54 |
 CAGZ |     -   129     -     -     -     -     -     -     -  -137 |
 CAS1 |     -    -5     -    -7     -     -     -     -     -    13 |
 CEDU |     -     -     -     -     -     -   122     -     -   -99 |
 CHAT |     -   -32     -    11     -     -     -     -     -    22 |
 COCO |     -    -5     -  -133     -     -     -     -     -   154 |
 CRO1 |     -     -    26    15     -     -     6     -     -   -66 |
 DAEJ |     -     -   -48     -     -     -     -     -     -    83 |
 DAKA |     -    11     -    77     -     -  -120     -     -     - |
 DGAR |     -   -22     -     -     -     -    29     -     -     X |
 DRAO |     -   111   -26     -     -     -   -39     -     -   -43 |
 DWH1 |     -   179   -61     -     -     -     -     -     -   -87 |
 GLPS |     -    22     -     X     -     -     -     -     -   -24 |
 GMAS |     -     -   102     -     -     -     -     -     -  -174 |
 GODE |     -    58    38     -     -     -     -     -     -  -127 |
 GOL2 |     -     -    25     -     -     -     X     -     -   -43 |
 GOLD |     -     -     -     -     -     -   -35     -     -    29 |
 HLFX |     -     -   156     -     -     -  -328     -     -     X |
 HOB2 |     -   -55   117     -     -     -     -     -     -  -141 |
 HOFN |     -     -     -   -97     -     -     -     -     -   108 |
 HRAO |     -   -63     -   -74     -     -    86     -     -    80 |
 IENG |     -  -103    64     -     -     -     -     -     -     - |
 IISC |     -    15     -   -14     -     -     -     -     -     - |
 INVK |     -    26     -     -     -     -   -34     -     -     X |
 ISPA |     -   -88     -   -21     -     -   -29     -     -   136 |
 JPLM |     -     -   -47     -     -     -    40     -     -    48 |
 KERG |     -     -   -50   -44     -     -     -     -     -   135 |
 KGN0 |     -    51   -69     -     -     -     -     -     -    64 |
 KIRU |     -     6     -     -     -     -     -     -     -    -7 |
 KIT3 |     -     -     -    10     -     -  -102     -     -    72 |
 KOKB |     -   -38   101  -104     -     -   -80     -     -    48 |
 KOUR |     -    75     -   -51     -     -     -     -     -   -22 |
 LPGS |     -     -    14     -     -     -     -     -     -   -24 |
 MAC1 |     -   -84     -    80     -     -     -     -     -     X |
 MAD2 |     -     -   -19     -     -     -     -     -     -    33 |
 MADR |     -     -     -     -     -     -     8     -     -    -6 |
 MAS1 |     -   -11    -6   -49     -     -     -     -     -    76 |
 MATE |     -    51     -     -     -     -     -     -     -   -55 |
 MAW1 |     -     -     -   -68     -     -     -     -     -    76 |
 MBAR |     -   -90     -   -57     -     -    34     -     -   121 |
 MCM4 |     -   174  -109     X     -     -     -     -     -     - |
 MDO1 |     -     -   -74     -     -     -     -     -     -   126 |
 MEDI |     -     -     9     -     -     -     -     -     -   -15 |
 METS |     -   -52    26     -     -     -     -     -     -    10 |
 MIZU |     -     -   -50     -     -     -     -     -     -    85 |
 MONP |     -    20     -     -     -     -   -27     -     -     - |
 NISU |     -    16    -2   -12     -     -     -     -     -     - |
 NLIB |     -     -    13     -     -     -     5     -     -   -26 |
 NNOR |     -     -     3     -     -     -     -     -     -    -4 |
 NPLD |     -  -108    24     -     -     -     -     -     -    74 |
 NRC1 |     -     -    45   -92     -     -     -     -     -    25 |
 NSSP |     -   -77     -     -     -     -     -     -     -    82 |
 NTUS |     -  -108     -     -     -     -     -     -     -   115 |
 NYA1 |     -   145     -  -111     -     -     -     -     -   -30 |
 ONSA |     -   -98    61     -     -     -     -     -     -     X |
 PDEL |     -   -15     -    15     -     -     -     -     -     - |
 PERT |     -     -   -40    41     -     -     -     -     -    23 |
 PETP |     -    75     -   -71     -     -     -     -     -     X |
 PIE1 |     -  -128    61     -     -     -     -     -     -    32 |
 POL2 |     -   100     -     -     -     -  -131     -     -     X |
 PRDS |     -     -   -31     -     -     -     -     -     -    53 |
 PTBB |     -   -63    31     -     -     -     -     -     -    13 |
 QAQ1 |     -     -   -31     -     -     -     -     -     -    53 |
 RIOG |     -   -53    77   -63     -     -     -     -     -    -5 |
 SANT |     -    26     -   -25     -     -     -     -     -     - |
 SCH2 |     -     -    22     -     -     -   -97     -     -    42 |
 SPT0 |     -   -92    -8     -     -     -     -     -     -   112 |
 STJO |     -   113   -25   -86     -     -   -14     -     -    30 |
 STR1 |     -     -    19     -     -     -     -     -     -   -33 |
 SUTH |     -   -65     -     -     -     -     -     -     -    69 |
 THTI |     -     -   206  -163     -     -     -     -     -  -169 |
 THU3 |     -   -17    55    66     -     -     -     -     -  -150 |
 TID1 |     -     -     -     -     -     -    -9     -     -     7 |
 TIDB |     -   -45    65     -     -     -     -     -     -   -63 |
 TLSE |     -     -    -5     -     -     -     -     -     -     9 |
 TOW2 |     -    13     -   -12     -     -     -     -     -     X |
 TRO1 |     -    96     -   -70     -     -     -     -     -   -16 |
 TSKB |     -    -9    23   -17     -     -     -     -     -   -10 |
 TWTF |     -  -113    21     -     -     -     -     -     -    84 |
 UNSA |     -     -     -    77     -     -     -     -     -   -86 |
 URUM |     -    16     -     -     -     -     -     -     -   -17 |
 USN3 |     -    15     -     -     -     -   -65     -     -    37 |
 USNO |     -   -99    42     -     -     -     -     -     -    33 |
 USUD |     -     -   -54     -     -     -   114     -     -     X |
 VILL |     -   -73     -     -     -     -     -     -     -    77 |
 WHIT |     -    61     -    11     -     -  -226     -     -   107 |
 WILL |     -   -40    63     -     -     -     -     -     -   -65 |
 WTZR |     -  -106   143     -     -     -     -     -     -  -131 |
 WUHN |     -     -    -7    94     -     -     -     -     -   -94 |
 YAR2 |     -   -71    69     -     -     -     -     -     -   -41 |
 YEBE |     -     -    -5     -     -     -     -     -     -     9 |
 YELL |     -     X   -66     X     -     -     -     -     -   113 |
 ZWE2 |     -    38     -   -36     -     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 | 11327    58    31    32    56  4614    74  7647     -    45 |  288   6.36
    3 |  3540    16    32    28    74  1342    37  3361     -    73 |  288   1.30
    4 |  1019    86    32   152    78   655    62   727     -    69 |  288   0.70
    5 |  3742    39    20    19    53  4637    33  4193     -    51 |  288   2.00
    6 |  1886    31    13    25    39  5563    21  1920     -    41 |  288   0.97
    7 |  1264    27    16    16    39   272    46  1547     -    34 |  288   0.40
    8 |  6540   105    33    28   128  5719    37  6169     -    45 |  283   1.83
    9 |  6817     X    26    29   134  3632    32  7047     -    24 |  276   3.51
   10 |  7792    51    27    32    36  2008    37  7458     -    30 |  288   2.71
   11 |  1126    41    27    25    89  1200    74   859     -    72 |  288   0.49
   13 |   476    48    25    27    55   253    22   462     -    77 |  288   0.26
   14 |   859    50    31    42    55   723    22   893     -    73 |  288   0.22
   15 |  6190     X    40    39   189  4907    65  5933     -    48 |  276   1.85
   16 |   600    38    22    50    26   272    44   514     -    44 |  288   0.25
   17 |  1986   129    67    41   124  3133    57  1792     -    31 |  282   1.40
   18 |  1697    52    48    26   108   530    31  1306     -   101 |  288   0.36
   19 |   701    41    21    25   126   784    45   502     -    62 |  288   0.28
   20 |   540    56    26    29    53   244    37   732     -    60 |  288   0.17
   21 |  1347    53    40    40    76   560    32  1592     -    54 |  288   0.49
   22 |  2114    55    31    34    41   392    56  1725     -    66 |  288   0.22
   23 |  1430    65    33    25    70  1063    36  1121     -    52 |  288   0.30
   24 |  5294     X    21    17    84  6709    41  4887     -    44 |  276   2.06
   25 |  2248     X    30    24   164  3473    37  2175     -    57 |  276   2.04
   26 |  1037    36    23    37    76  1307    40   983     -    56 |  288   0.72
   27 |   898   110    21    33   116   324    39   961     -    41 |  278   0.80
   28 |  2378    50    34    21   104  5178    57  2543     -    53 |  288   1.07
   29 |  1080    49    25    35    39  1231    39  1052     -    55 |  288   1.04
   30 |  1341    34    23    18    90   687    27  1399     -    48 |  288   0.50
 -----+-------------------------------------------------------------+--------------
 ALBH |     -     -    13     -     -     -    17     -     -    16 |  288   0.05
 ALGO |     -    22    10     -     -     -    20     -     -    10 |  288   0.02
 AMC2 |     -    21    16     -     -     -    35     -     -    26 |  288   0.03
 AREQ |     -    30    24    41     -     -   129     -     -    15 |  287  13.15
 ARTU |     -    16     -    13     -     -    24     -     -     X |  288  12.79
 ASPA |     -     -     -    57     -     -     -     -     -    63 |  287    >>>
 AUCK |     -    16     -     -     -     -     -     -     -    17 |  264   9.91
 BAHR |     -    24    26    26     -     -     -     -     -    34 |  288   1.58
 BAN2 |     -     -    35     -     -     -     -     -     -    60 |  288  18.42
 BILI |     -    30     -    29     -     -     -     -     -     X |  286   7.78
 BOGT |     -    29     -    51     -     -     -     -     -    81 |  288  21.91
 BOR1 |     -    40    41     -     -     -     -     -     -    34 |  288   0.82
 BREW |     -     -    24     -     -     -     -     -     -    41 |  191   0.99
 BRUS |     -    30    20     -     -     -     -     -     -    18 |  288   0.05
 CAGZ |     -    78     -     -     -     -     -     -     -    83 |  264   0.42
 CAS1 |     -    25     -    18     -     -     -     -     -    27 |  288   7.17
 CEDU |     -     -     -     -     -     -    52     -     -    42 |  269  12.01
 CHAT |     -    31     -    29     -     -     -     -     -    39 |  287  10.95
 COCO |     -    25     -    26     -     -     -     -     -    30 |  288  16.05
 CRO1 |     -     -    22    27     -     -    23     -     -    23 |  288  14.89
 DAEJ |     -     -    36     -     -     -     -     -     -    61 |  287    >>>
 DAKA |     -    17     -    18     -     -    37     -     -     - |  288  17.71
 DGAR |     -    27     -     -     -     -    36     -     -     X |  288  17.06
 DRAO |     -    18    13     -     -     -    23     -     -    28 |  288   0.08
 DWH1 |     -    27    14     -     -     -     -     -     -    22 |  288   0.61
 GLPS |     -    18     -     X     -     -     -     -     -    19 |  287  22.76
 GMAS |     -     -    19     -     -     -     -     -     -    32 |  288   1.88
 GODE |     -    20    12     -     -     -     -     -     -    12 |  288   0.07
 GOL2 |     -     -    25     -     -     -     X     -     -    43 |  268 118.76
 GOLD |     -     -     -     -     -     -    20     -     -    16 |  226  12.16
 HLFX |     -     -    13     -     -     -    27     -     -     X |  288  16.98
 HOB2 |     -    30    26     -     -     -     -     -     -    28 |  288   0.06
 HOFN |     -     -     -    36     -     -     -     -     -    40 |  287    >>>
 HRAO |     -    35     -    39     -     -    38     -     -    46 |  288   0.38
 IENG |     -    28    18     -     -     -     -     -     -     - |  280   0.91
 IISC |     -    36     -    34     -     -     -     -     -     - |  288  24.11
 INVK |     -    34     -     -     -     -    44     -     -     X |  287   8.64
 ISPA |     -    36     -    40     -     -    55     -     -    38 |  288  14.28
 JPLM |     -     -    68     -     -     -   148     -     -    18 |  288  17.53
 KERG |     -     -    30    46     -     -     -     -     -    94 |  288   2.11
 KGN0 |     -    37    16     -     -     -     -     -     -    35 |  287   0.44
 KIRU |     -    11     -     -     -     -     -     -     -    11 |  288   5.40
 KIT3 |     -     -     -    20     -     -    40     -     -    42 |  288  14.79
 KOKB |     -    29    31    22     -     -    51     -     -    23 |  288  17.22
 KOUR |     -    47     -    52     -     -     -     -     -    65 |  285   1.42
 LPGS |     -     -    19     -     -     -     -     -     -    33 |  276  30.77
 MAC1 |     -    31     -    29     -     -     -     -     -     X |  288  23.40
 MAD2 |     -     -    12     -     -     -     -     -     -    21 |  288   0.07
 MADR |     -     -     -     -     -     -    21     -     -    17 |  288  12.68
 MAS1 |     -    30    22    24     -     -     -     -     -    33 |  288   3.04
 MATE |     -    37     -     -     -     -     -     -     -    40 |  288   0.22
 MAW1 |     -     -     -    69     -     -     -     -     -    77 |  283   6.70
 MBAR |     -    67     -    62     -     -   129     -     -    88 |  288  15.20
 MCM4 |     -    52    33     X     -     -     -     -     -     - |  287  22.41
 MDO1 |     -     -    11     -     -     -     -     -     -    20 |  288  21.84
 MEDI |     -     -    12     -     -     -     -     -     -    21 |  288   0.12
 METS |     -    16     9     -     -     -     -     -     -    17 |  287   7.91
 MIZU |     -     -    14     -     -     -     -     -     -    23 |  288   0.64
 MONP |     -    16     -     -     -     -    21     -     -     - |  287  12.11
 NISU |     -    21    19    20     -     -     -     -     -     - |  287   0.05
 NLIB |     -     -    10     -     -     -    24     -     -     9 |  288   0.04
 NNOR |     -     -    30     -     -     -     -     -     -    51 |  284  14.04
 NPLD |     -    26    21     -     -     -     -     -     -    28 |  287   0.03
 NRC1 |     -     -     6    14     -     -     -     -     -    11 |  288   0.03
 NSSP |     -    15     -     -     -     -     -     -     -    16 |  288   8.24
 NTUS |     -    25     -     -     -     -     -     -     -    27 |  288   9.37
 NYA1 |     -    15     -    14     -     -     -     -     -    16 |  288   0.17
 ONSA |     -    24    15     -     -     -     -     -     -     X |  288   0.05
 PDEL |     -    16     -    15     -     -     -     -     -     - |  288  60.84
 PERT |     -     -    18    22     -     -     -     -     -    33 |  288   3.39
 PETP |     -    32     -    31     -     -     -     -     -     X |  287   8.54
 PIE1 |     -    27    14     -     -     -     -     -     -    20 |  288   0.07
 POL2 |     -    15     -     -     -     -    20     -     -     X |  288  11.90
 PRDS |     -     -     8     -     -     -     -     -     -    14 |  288   2.38
 PTBB |     -    23    15     -     -     -     -     -     -    23 |  288   0.41
 QAQ1 |     -     -    14     -     -     -     -     -     -    23 |  288   5.86
 RIOG |     -    22    29    37     -     -     -     -     -    41 |  288  10.67
 SANT |     -    21     -    20     -     -     -     -     -     - |  288   5.27
 SCH2 |     -     -     9     -     -     -    13     -     -    11 |  288  21.50
 SPT0 |     -    18    11     -     -     -     -     -     -    18 |  288   0.05
 STJO |     -    32    14    26     -     -    13     -     -    14 |  288   0.03
 STR1 |     -     -    18     -     -     -     -     -     -    30 |  288   0.75
 SUTH |     -    25     -     -     -     -     -     -     -    26 |  288  13.05
 THTI |     -     -    21    23     -     -     -     -     -    35 |  288   7.83
 THU3 |     -    21    11    14     -     -     -     -     -    11 |  288   6.81
 TID1 |     -     -     -     -     -     -    37     -     -    30 |  288   0.07
 TIDB |     -    49    27     -     -     -     -     -     -    30 |  288   0.11
 TLSE |     -     -    10     -     -     -     -     -     -    18 |  287   0.44
 TOW2 |     -    36     -    34     -     -     -     -     -     X |  286  11.68
 TRO1 |     -    12     -    25     -     -     -     -     -    25 |  287  15.50
 TSKB |     -    26    16    21     -     -     -     -     -    43 |  288   1.74
 TWTF |     -    27    21     -     -     -     -     -     -    39 |  288   0.05
 UNSA |     -     -     -    70     -     -     -     -     -    78 |  275  18.31
 URUM |     -    32     -     -     -     -     -     -     -    34 |  288  25.08
 USN3 |     -    13     -     -     -     -    24     -     -    18 |  288   0.05
 USNO |     -    31    18     -     -     -     -     -     -    25 |  288   0.04
 USUD |     -     -    24     -     -     -    50     -     -     X |  288  10.55
 VILL |     -    19     -     -     -     -     -     -     -    20 |  288   3.83
 WHIT |     -    27     -    13     -     -    19     -     -    17 |  288   5.62
 WILL |     -    26    18     -     -     -     -     -     -    14 |  288  47.95
 WTZR |     -    28    22     -     -     -     -     -     -    29 |  288   0.05
 WUHN |     -     -    34    30     -     -     -     -     -    44 |  287  11.30
 YAR2 |     -    28    33     -     -     -     -     -     -    50 |  288   3.82
 YEBE |     -     -    10     -     -     -     -     -     -    18 |  288   0.05
 YELL |     -     X    13     X     -     -     -     -     -    23 |  287   0.94
 ZWE2 |     -    23     -    22     -     -     -     -     -     - |  288  11.68
 -----+-------------------------------------------------------------+--------------
 TOT  |  3774    39    25    37    91  2970    49  3327     -    42 |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 AMC2 |   288     0     0   288    9.93   | 3.68e-14  6.07e-15  2.37e-15 |
 BRUS |   288     0     0   288    8.15   | 3.66e-14  6.95e-15  2.66e-15 |
 ALGO |   288     0     0   288    7.66   | 2.92e-14  6.24e-15  4.55e-15 |
 NPLD |   287     0     0   286    6.86   | 3.74e-14  8.13e-15  1.57e-15 |
 NRC1 |   288     0     0   288    6.28   | 4.01e-14  5.86e-15  1.40e-15 |
 ALBH |   288     0     0   288    5.67   | 3.84e-14  1.05e-14  3.54e-15 |
 MAD2 |   288     1     0   287    5.63   | 4.00e-14  8.04e-15  5.80e-15 |
 ONSA |   288     0     0   288    4.90   | 3.80e-14  1.03e-14  2.44e-15 |
 USNO |   288     0     0   288    4.76   | 3.61e-14  8.05e-15  2.52e-15 |
 NISU |   287     0     0   286    4.00   | 5.79e-14  7.24e-15  2.93e-15 |
 TWTF |   288     0     0   288    3.87   | 3.70e-14  1.02e-14  2.19e-15 |
 YELL |   287     1     0   285    3.15   | 4.41e-14  1.09e-14  4.71e-15 |
 SPT0 |   288     0     0   288    3.10   | 4.39e-14  1.31e-14  3.83e-15 |
 WTZR |   288     0     0   288    3.08   | 4.39e-14  1.29e-14  3.22e-15 |
 USN3 |   288     0     0   288    2.99   | 8.61e-14  1.09e-14  2.37e-15 |
 STJO |   288     0     0   288    2.97   | 7.20e-14  8.77e-15  2.21e-15 |
 NLIB |   288     0     0   288    2.64   | 3.72e-14  5.78e-15  2.00e-15 |
 HOB2 |   288     0     0   288    2.08   | 4.99e-14  1.39e-14  3.78e-15 |
 MATE |   288     0     0   288    1.96   | 8.49e-14  1.46e-14  2.22e-14 |
 BREW |   191     1     0    75    1.74   | 3.23e-14  7.41e-15         - |
 NYA1 |   288     0     0   288    1.63   | 2.48e-14  5.77e-15  1.15e-14 |
 MEDI |   288     0     0   288    1.50   | 4.03e-14  8.02e-15  6.89e-15 |
 PIE1 |   288     0     0   288    1.33   | 5.64e-14  1.28e-14  4.33e-15 |
 DRAO |   288     0     0   288    1.11   | 6.24e-14  1.73e-14  5.82e-15 |
 TID1 |   288     0     0   288    0.75   | 9.01e-14  2.29e-14  5.09e-15 |
 GODE |   288     0     0   288    0.71   | 4.07e-14  9.25e-15  5.44e-15 |
 TIDB |   288     0     2    96    0.31   | 2.17e-13  3.04e-14  6.95e-15 |
 PTBB |   288     0     0   288    0.19   | 2.75e-13  6.91e-14  2.77e-14 |
 GOL2 |   268     2     0   264    0.18   | 5.21e-14  8.66e-15  3.73e-15 |
 G07  |   288     0     0   288    0.13   | 2.92e-13  8.87e-14  5.12e-14 |
 G06  |   288     0     0   288    0.09   | 4.15e-13  1.28e-13  7.67e-14 |
 TLSE |   287     0     0   286    0.08   | 4.00e-13  1.08e-13  4.76e-14 |
 KGN0 |   287     0     0   286    0.08   | 3.79e-13  1.09e-13  3.71e-14 |
 G30  |   288     0     0   288    0.07   | 2.99e-13  1.01e-13  5.52e-14 |
 G26  |   288     0     0   288    0.05   | 3.64e-13  1.07e-13  7.94e-14 |
 DWH1 |   288     0     0   288    0.04   | 5.05e-13  1.53e-13  5.55e-14 |
 BOR1 |   288     0     0   288    0.04   | 4.55e-13  1.37e-13  7.14e-14 |
 CAGZ |   264     0     0   131    0.03   | 5.59e-13  1.22e-13  4.48e-14 |
 G27  |   278     0     0   276    0.03   | 3.42e-13  1.02e-13  1.03e-13 |
 G04  |   288     0     0   288    0.03   | 4.90e-13  1.32e-13  8.60e-14 |
 G28  |   288     0     1    97    0.03   | 5.37e-13  7.40e-14  1.07e-13 |
 G29  |   288     0     0   288    0.02   | 4.46e-13  1.20e-13  9.10e-14 |
 MIZU |   288     0     0   143    0.02   | 3.76e-13  1.22e-13  5.95e-14 |
 G17  |   282     0     0   280    0.02   | 3.64e-13  1.27e-13  1.44e-13 |
 IENG |   280     0     0   134    0.02   | 5.33e-13  1.45e-13  1.21e-13 |
 STR1 |   288     0     0   143    0.01   | 6.66e-13  2.32e-13  5.32e-14 |
 TSKB |   288     0     0   288    0.01   | 1.05e-12  2.83e-13  1.95e-13 |
 HRAO |   288     0     2    95    0.01   | 1.11e-13  3.01e-14  2.60e-14 |
 G05  |   288     0     0   288    0.01   | 1.39e-12  4.11e-13  1.70e-13 |
 G03  |   288     0     0   288    0.01   | 1.27e-12  4.84e-13  1.21e-13 |
 BAHR |   288     0     1    88    0.01   | 4.30e-13  3.28e-13  9.16e-14 |
 PRDS |   288     0     0   288    0.01   | 1.38e-12  4.03e-13  1.73e-13 |
 G24  |   276     0     0   274    0.01   | 1.29e-12  3.88e-13  1.43e-13 |
 KERG |   288     0     0   288    0.01   | 1.23e-12  4.36e-13  2.09e-13 |
 G08  |   283     0     0   282    0.00   | 1.38e-12  5.29e-13  1.27e-13 |
 KOUR |   285     0     0   284    0.00   | 1.39e-12  4.16e-13  1.43e-13 |
 PERT |   288     0     0   288    0.00   | 1.86e-12  6.48e-13  3.90e-13 |
 GMAS |   288     0     0   143    0.00   | 1.08e-12  4.27e-13  1.44e-13 |
 HLFX |   288     0     1   143    0.00   | 1.77e-13  1.81e-13  9.28e-13 |
 GPST |   288     0     0     0    0.00   | 2.38e-14  4.74e-15  2.62e-15 |
 GOLD |   226     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 MONP |   287     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 HOFN |   287     0     0     0    0.00   |        -         -         - |
 DAEJ |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BILI |   286     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G25  |   276     0     0     0    0.00   | 1.35e-12  4.56e-13  1.99e-13 |
 G23  |   288     0     6     0    0.00   | 5.68e-13  5.82e-14  3.24e-14 |
 G22  |   288     0     5     0    0.00   | 5.40e-13  6.27e-14  1.97e-14 |
 G21  |   288     0     6     0    0.00   | 8.34e-13  1.14e-13  4.13e-14 |
 G20  |   288     1     6     0    0.00   | 6.85e-13  7.76e-14  1.92e-14 |
 G19  |   288     0     6     0    0.00   | 5.64e-13  6.12e-14  2.58e-14 |
 G18  |   288     6     6     0    0.00   | 1.87e-12  2.45e-13  7.26e-14 |
 G16  |   288     0     5     0    0.00   | 4.78e-13  5.99e-14  2.56e-14 |
 G15  |   276     0     0     0    0.00   | 1.51e-12  5.34e-13  1.68e-13 |
 G14  |   288     0     6     0    0.00   | 5.21e-13  7.03e-14  2.41e-14 |
 G13  |   288     0     5     0    0.00   | 4.97e-13  6.56e-14  2.78e-14 |
 G11  |   288     0     4     0    0.00   | 7.35e-13  7.87e-14  5.47e-14 |
 G10  |   288     0     0     0    0.00   | 1.24e-12  4.13e-13  3.54e-13 |
 G09  |   276     0     0     0    0.00   | 1.38e-12  4.97e-13  2.62e-13 |
 G01  |   288     0     0     0    0.00   | 1.44e-12  7.38e-13  7.06e-13 |
 ZWE2 |   288     0     0     0    0.00   |        -         -         - |
 YEBE |   288     0     6     0    0.00   | 2.02e-13  7.56e-15  6.22e-15 |
 YAR2 |   288     0     0     0    0.00   | 8.99e-13  1.36e-12  2.68e-13 |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 5.26e-13  1.75e-13  3.59e-13 |
 VILL |   288     0     0     0    0.00   | 1.01e-12  6.19e-13  2.79e-13 |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   275     0     0     0    0.00   |        -         -         - |
 TRO1 |   287     1     0     0    0.00   |        -         -         - |
 TOW2 |   286     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 3.77e-13  1.80e-13  5.87e-13 |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   288     0     2     0    0.00   | 1.92e-12  9.70e-13  5.51e-13 |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   284     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   287     0     1     0    0.00   | 6.62e-13  6.16e-13  1.44e-12 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   283     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 1.96e-12  5.37e-13  2.68e-13 |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   276     2     0     0    0.00   |        -         -         - |
 KOKB |   288     0     0     0    0.00   |        -         -         - |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     1     0    0.00   | 6.65e-13  3.93e-13  1.47e-12 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 INVK |   287     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   287     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAKA |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     1     0    0.00   | 2.84e-13  1.41e-12  1.65e-12 |
 CEDU |   269     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 BAN2 |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   287     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   287     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.53e-17  3.04e-16  1.83e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      NYA1      NRC1 |
------------------------------------------+------------------------------+
