
 GPS week: 1289   Day: 6   MJD: 53273                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2784      0     0.00     0.01     3.85     0.00      0
 cod |   288     0  28692    311    -0.29     0.74     0.04    16.32      0
 emr |   288     0  25804     21   947.16    30.62     0.03    18.07      0
 esa |   288     0  18842    123   946.90    30.67     0.05    10.99      0
 gfz |   288     0  21199    278     0.18    -0.65     0.03    17.90      0
 iga |    96     0   2784      1    -0.03     0.04     0.07     0.00      0
 igu |    96     0   2784      0    -0.03     0.02     3.29     0.00      0
 jpl |   288     0  20996    289    -3.85    -0.72     0.03    21.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  36904   1515   947.07    30.67     0.04    15.73      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  2888    39   -62  -110   -42   114  5588    42     -   100 |
    3 |  3179   -26   -64   -47    71    21  3622    75     -   -48 |
    4 | -2807    64     2   -76   -11  -104  3705    55     -   -76 |
    5 |-10255  -105  -113   489    58   -50  2225   -38     -  -104 |
    6 |  3135   -28   -83   133   161  -248-10821    -4     -  -181 |
    7 | -2397    72    40  -335   -10    42  -557    95     -    -2 |
    8 | -5076    27    32   -99    13    71-11129    48     -   -75 |
    9 | -6015   -69     3   182    73  -190   733   -28     -  -105 |
   10 |   333   114   -67  -110    37    12  4037    18     -   -32 |
   11 |  3334    83  -194  -134   -47   -80   716   204     -    12 |
   13 | -5394   150  -187   -27   -18    45  3639    84     -   -16 |
   14 |  3837   -54  -117   235    25   -57 -1045    36     -   -51 |
   15 |  3707   -69   146   -65   -24   101  5722    10     -   -38 |
   16 |  4169    20  -156   139     9     7  -961   106     -   -96 |
   17 | -1975   -29    -7   401    44    25   813  -124     -  -126 |
   18 |  4336    27  -117  -183   143    30  -866   106     -   -63 |
   19 |  4896    69  -255   237    28  1143 -1356   226     -  -278 |
   20 |  3996    29  -124    20   -22   -36 -1277   133     -   -55 |
   21 |  7643     6   -23  -100   -63    53  4195   119     -     2 |
   22 | -4137   -20   -57  -128    63   -14  -753    90     -   -14 |
   23 | -3258    84  -109   226   -32  -149 -3298    28     -  -121 |
   24 |  1213     3   -62   102    65  -135  6305     X     -   -78 |
   25 |  5925    -8   -62    18    55  -146  6939     3     -     1 |
   26 |  -306   -29    98    33    49  -189 -1847   -52     -   -92 |
   27 | -1217    17   -27     5   134   -13 -4361   -35     -  -102 |
   28 |  6871   132   -26  -498   -31    55 -4475   167     -    36 |
   29 | -2945    46    48  -132    18  -194 -1263    23     -   -61 |
   30 | -8678   -59   -86   315    48  -119 -4513    -4     -  -108 |
   31 | -5001    45  -135  -108   126    18   281    87     -   -77 |
 -----+-------------------------------------------------------------+
 ALBH |     -     -    11     -     -     -     -   -24     -    19 |
 ALGO |     -   -85   -49   212     -     -     -     4     -    -9 |
 ALRT |     -   -37     -     -    34     -     -     -     -     - |
 AMC2 |     -   -59   187     -     -     -     -  -211     -   127 |
 AREQ |     -    -5    32     -   -20     -     -   -65     -    77 |
 ARTU |     -    43     -    90   -42     -     -   -45     -     X |
 ASPA |     -     -     -     -   -40     -     -     -     -    45 |
 AUCK |     -     -     -    41     -     -     -     -     -   -29 |
 BAHR |     -    24   -17     -    -6     -     -    45     -   -59 |
 BAN2 |     -     -  -112     -     -     -     -     -     -   129 |
 BOGT |     -   -59     -   153     -     -     -     -     -   -45 |
 BOR1 |     -   -12    77     -     -     -     -     -     -   -77 |
 BREW |     -     -    -4     -     -     -     -     -     -     4 |
 BRMU |     -     -     -     -    23     -     -     -     -   -27 |
 BRUS |     -   -30    65     -     -     -     -   -44     -    16 |
 CEDU |     -   -34     -   -59     -     -     -    95     -   -50 |
 CHAT |     -   -21     -     -    -6     -     -     -     -    28 |
 CHUR |     -    81    -3     -     -     -     -     -     -   -81 |
 COCO |     -    31     -    68   -68     -     -     -     -    -3 |
 CRO1 |     -     -    64   -12  -108     -     -    20     -    30 |
 DAV1 |     -    56     -     -  -145     -     -   176     -  -127 |
 DGAR |     -   -50     -     -     -     -     -   -20     -    78 |
 DRAO |     -    -4   -84     -     -     -     -    98     -   -30 |
 DWH1 |     -   137   220     -     -     -     -  -338     -    57 |
 FAIR |     -   -50   -25   177  -103     -     -    55     -     - |
 FLIN |     -    84     -     -     -     -     -   -65     -     - |
 FORT |     -     -    31   -65     7     -     -     -     -     - |
 GLPS |     -    64     -     -   -58     -     -     -     -     - |
 GODE |     -    14   -40    96     -     -     -     -     -   -36 |
 GOL2 |     -     -    22     -     -     -     -     -     -   -25 |
 GOLD |     -    25     -    13     -     -     -   -20     -    -7 |
 GUAM |     -   -67     -  -140   147     -     -  -157     -   209 |
 GUAT |     -    49     -     -   -93     -     -     -     -    55 |
 HERS |     -     -  -248     -     -     -     -     -     -   285 |
 HOB2 |     -   -74   110     -     -     -     -     -     -   -49 |
 HOFN |     -     -     -     -   -62     -     -    53     -     - |
 HRAO |     -     -     -     -  -115     -     -    58     -    54 |
 IENG |     -   -60    54     -     -     -     -     -     -     - |
 IISC |     -     -     -  -126    78     -     -     -     -     - |
 ISPA |     -    76     -     -   -51     -     -   -17     -     2 |
 JAB1 |     -   110     -  -163     -     -     -     -     -     - |
 JPLM |     -     -     1     -     -     -     -     -     -    -1 |
 KERG |     -     -    73  -189    51     -     -     -     -   -10 |
 KGN0 |     -   -12   -21     -     -     -     -     -     -    37 |
 KIRU |     -   -47     -     -     -     -     -    -4     -    54 |
 KIT3 |     -     -     -   -73   -32     -     -     -     -    87 |
 KOKB |     -   -53    44     -     -     -     -     -     -     3 |
 KOSG |     -   -63     -     -     -     -     -     -     -    66 |
 KOUR |     -     -     -    82   -50     -     -     -     -     - |
 KUNM |     -     -     -     -     -     -     -   -97     -   129 |
 LHAS |     -     -     -     -     -     -     -   -99     -   132 |
 LPGS |     -     -   104  -199     -     -     -     -     -    19 |
 MAC1 |     -    86     -    86  -185     -     -     -     -    61 |
 MADR |     -     -     -     -     -     -     -   -27     -    35 |
 MAG0 |     -   -16     -     -     -     -     -    12     -     - |
 MAS1 |     -     -   142  -474     7     -     -   122     -    -3 |
 MATE |     -     -     -  -359     -     -     -     -     -   251 |
 MAW1 |     -   122     -     -  -135     -     -     -     -    27 |
 MBAR |     -    -5     -     -    15     -     -    -9     -     X |
 MCM4 |     -   116  -104     -     X     -     -     -     -     - |
 MDO1 |     -    12   -34     -   -70     -     -     -     -   106 |
 MEDI |     -     -    30     -     -     -     -     -     -   -35 |
 MIZU |     -     -  -103   418     -     -     -  -149     -    46 |
 MKEA |     -     -     -    55     -     -     -    -1     -   -36 |
 NKLG |     -     -     -  -136    68     -     -     -     -    18 |
 NLIB |     -     -   -29     -     -     -     -    23     -     3 |
 NNOR |     -     -    78   190     -     -     -  -178     -    14 |
 NOT1 |     -  -100     -     -     -     -     -     -     -   104 |
 NPLD |     -   -78    76     -     -     -     -     -     -    -7 |
 NRC1 |     -     -    21     -   -46     -     -     -     -    29 |
 NRIL |     -    16     -     -    29     -     -   -37     -     X |
 NSSP |     -    -8     -     -     -     -     -    -7     -    17 |
 NYA1 |     -    87     -     -   -89     -     -     -     -    13 |
 NYAL |     -     -    -1     -     -     -     -     -     -     1 |
 ONSA |     -   -90   -11   251   -62     -     -     -     -     - |
 PDEL |     -     5     -     -    -5     -     -     -     -     - |
 PERT |     -     -    50  -400   228     -     -     -     -   -38 |
 PIE1 |     -     -     -   -71     -     -     -     -     -    49 |
 POL2 |     -   -33     -     -     -     -     -     -     -    34 |
 POTS |     -    42     -     -   -51     -     -     -     -    14 |
 PRDS |     -     -   -23     -     -     -     -     -     -    27 |
 PTBB |     -    15    66     -     -     -     -     -     -   -92 |
 QAQ1 |     -   -94   147     -     -     -     -     -     -   -72 |
 REYK |     -   -29     -     -     -     -     -     -     -    30 |
 RIOG |     -   -63   114     -   -11     -     -     -     -   -54 |
 SANT |     -     X     -   152   -94     -     -     -     -     - |
 SCH2 |     -   -10   -25     -     -     -     -    19     -    15 |
 SCUB |     -   125     -     -     -     -     -   -97     -     - |
 SELE |     -     -     -     -     -     -     -    -7     -     9 |
 SFER |     -   -15    13     -     -     -     -     -     -     - |
 SPT0 |     -  -128    98     -     -     -     -     -     -    21 |
 STJO |     -     -    -4     -     -     -     -   -18     -    29 |
 STR1 |     -     -     6     -     -     -     -     -     -    -7 |
 SUTH |     -  -111     -     -     -     -     -     -     -   116 |
 SUTM |     -     -   115     -    17     -     -  -114     -     X |
 THTI |     -     -    99   -65   -28     -     -     -     -   -38 |
 THU3 |     -    -2   110     -     -     -     -     -     -  -125 |
 TID1 |     -     -     -     -     -     -     -   -41     -    54 |
 TIDB |     -   -62    30    42     -     -     -     -     -     0 |
 TIXI |     -     5     -    25   -26     -     -     6     -     X |
 TLSE |     -     -     8     -     -     -     -     -     -    -9 |
 TRO1 |     -    71     -     -   -74     -     -     -     -    10 |
 TSKB |     -   -72   -25   -85   135     -     -     -     -    10 |
 TWTF |     -   -35    70     -     -     -     -  -205     -   229 |
 UNSA |     -     -     -   -46     -     -     -   -94     -   157 |
 URUM |     -   -36     -     -     -     -     -     -     -    38 |
 USN3 |     -     -     -     -     -     -     -    -3     -     4 |
 USNO |     -   -21    24     -     -     -     -     -     -    -6 |
 USUD |     -     -   -72   103     -     -     -     -     -    11 |
 WHIT |     -    -3     -     -     -     -     -     -     -     3 |
 WILL |     -   -39   100     -     -     -     -     -     -   -75 |
 WTZR |     -   -71   211  -152     -     -     -     -     -   -63 |
 WUHN |     -     -   -31     -   218     -     -     -     -  -213 |
 YAKT |     -    36     -     -     -     -     -   -69     -    54 |
 YAR2 |     -   -99    78     -     -     -     -     -     -    13 |
 YEBE |     -     -    10     -     -     -     -     -     -   -11 |
 YELL |     -   -10   -25   214   -98     -     -     -     -     1 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  7751    51    20    39    18    57  4005    30     -    65 |  288   5.03
    3 |  5853    36    38    31    24    50  5458    25     -    58 |  288   2.52
    4 |  1338    39    43    57    22    51  1018    51     -    30 |  288   1.15
    5 |  6009    53    30    49    26    59  4145    47     -    28 |  288   1.55
    6 |  3344    73    35    33    35    21  7461    36     -   126 |  288   2.29
    7 |   953    41    31    48    27    88   388    21     -    68 |  288   0.89
    8 |  9955    38    35    19    28    48  7783    21     -    60 |  288   1.55
    9 |  7173    29    42    90    33    31  3394    24     -    70 |  288   2.04
   10 |  4007    81    32    32    24    63  3899    53     -    68 |  288   2.01
   11 |   907    35    21    61    34    65   450    22     -    39 |  288   0.37
   13 |  2233    42    63    50    62    66  2373    26     -    44 |  288   0.53
   14 |   876    49    22    37    26    36   533    22     -    58 |  288   0.36
   15 |  6668    30    32    47    33    38  5265    25     -    61 |  288   4.60
   16 |  2306    72    31    75    27    48  1077    26     -    53 |  288   0.42
   17 |  2959    37    33    29    26    31  1566    41     -    71 |  288   1.33
   18 |   766    66    38    40    27    71   729    26     -    39 |  288   0.40
   19 |  2485    29    47    38    39   116  1406    26     -    57 |  288   0.23
   20 |  1043    73    37    40    29    43   974    23     -    42 |  288   0.26
   21 |  1975    40    56    59    67    54  1963    30     -    53 |  288   0.28
   22 |  1461    69    37    43    48    83   863    28     -    44 |  288   0.29
   23 |   988    39    35    81    18    75  1866    19     -    51 |  288   0.26
   24 |  3314    28    27    49    30    59  4192     X     -    25 |  288   3.03
   25 |  2612    37    15    52    37    61  4190    19     -    61 |  288   2.54
   26 |  1277    32    33    28    17    39   795    24     -    62 |  288   0.76
   27 |  1845    22    40    32    31    47  2574    24     -    68 |  288   0.50
   28 |  3052    68    26    47    41    36  2877    25     -    44 |  288   0.28
   29 |  1393    34    28    41    21   165  1993    30     -    46 |  288   0.99
   30 |  2303    42    23    37    27    94  2300    37     -    39 |  288   0.44
   31 |  2088    28    28    44    51    42  1168    23     -    86 |  288   1.24
 -----+-------------------------------------------------------------+--------------
 ALBH |     -     -    19     -     -     -     -    20     -    11 |  288   0.05
 ALGO |     -    54    23    43     -     -     -    22     -    12 |  288   0.02
 ALRT |     -    12     -     -    11     -     -     -     -     - |  288   7.70
 AMC2 |     -    13    18     -     -     -     -    14     -    11 |  288   0.03
 AREQ |     -    50    23     -    60     -     -    52     -    32 |  288  16.14
 ARTU |     -    34     -    23    18     -     -    20     -     X |  280   9.66
 ASPA |     -     -     -     -    28     -     -     -     -    32 |  288    >>>
 AUCK |     -     -     -   139     -     -     -     -     -    97 |  209  12.09
 BAHR |     -    58    31     -    28     -     -    30     -    13 |  288   1.09
 BAN2 |     -     -    20     -     -     -     -     -     -    23 |  280  17.19
 BOGT |     -    31     -    38     -     -     -     -     -    20 |  288  26.41
 BOR1 |     -    25    28     -     -     -     -     -     -    15 |  288   0.32
 BREW |     -     -    12     -     -     -     -     -     -    13 |  288   0.05
 BRMU |     -     -     -     -    24     -     -     -     -    27 |  288    >>>
 BRUS |     -    19    37     -     -     -     -    36     -    23 |  288   0.05
 CEDU |     -    19     -    38     -     -     -    36     -    26 |  288  15.86
 CHAT |     -    28     -     -    22     -     -     -     -    24 |  287  11.38
 CHUR |     -    18    23     -     -     -     -     -     -    39 |  284   5.40
 COCO |     -    23     -    27    20     -     -     -     -    32 |  288   7.50
 CRO1 |     -     -    27    33    14     -     -    23     -    26 |  288  28.92
 DAV1 |     -    23     -     -    18     -     -    17     -    38 |  288  14.13
 DGAR |     -    19     -     -     -     -     -    26     -    31 |  288  17.81
 DRAO |     -    20    12     -     -     -     -    21     -    26 |  288   1.53
 DWH1 |     -    20    21     -     -     -     -    22     -    21 |  288   0.52
 FAIR |     -    24    24    26    13     -     -    17     -     - |  288   0.21
 FLIN |     -    14     -     -     -     -     -    11     -     - |  288   9.38
 FORT |     -     -    73    37    68     -     -     -     -     - |  288   0.14
 GLPS |     -    40     -     -    37     -     -     -     -     - |  281  19.49
 GODE |     -    23    23    34     -     -     -     -     -    18 |  288   0.08
 GOL2 |     -     -    20     -     -     -     -     -     -    23 |  286 137.60
 GOLD |     -    42     -    54     -     -     -    70     -    55 |  288  13.09
 GUAM |     -    30     -    32    43     -     -    23     -    76 |  288  15.66
 GUAT |     -    19     -     -    19     -     -     -     -    15 |  288    >>>
 HERS |     -     -    17     -     -     -     -     -     -    19 |  241   9.59
 HOB2 |     -    24    27     -     -     -     -     -     -    33 |  288   0.05
 HOFN |     -     -     -     -    19     -     -    16     -     - |  288    >>>
 HRAO |     -     -     -     -    36     -     -    26     -    28 |  288   1.33
 IENG |     -    26    24     -     -     -     -     -     -     - |  288   0.75
 IISC |     -     -     -    32    20     -     -     -     -     - |  288  18.34
 ISPA |     -    33     -     -    49     -     -    51     -    39 |  288  14.70
 JAB1 |     -    26     -    39     -     -     -     -     -     - |  287  12.01
 JPLM |     -     -    12     -     -     -     -     -     -    14 |  288   2.01
 KERG |     -     -    48    36    22     -     -     -     -    51 |  288   1.51
 KGN0 |     -    30    18     -     -     -     -     -     -    16 |  287   0.27
 KIRU |     -    16     -     -     -     -     -    12     -    13 |  288   6.91
 KIT3 |     -     -     -    14    13     -     -     -     -    16 |  288  19.18
 KOKB |     -    33    36     -     -     -     -     -     -    20 |  288   0.10
 KOSG |     -    12     -     -     -     -     -     -     -    13 |  288   8.47
 KOUR |     -     -     -    16    10     -     -     -     -     - |  288   1.08
 KUNM |     -     -     -     -     -     -     -    20     -    27 |  288  25.15
 LHAS |     -     -     -     -     -     -     -    23     -    30 |  288  10.06
 LPGS |     -     -    35    45     -     -     -     -     -    31 |  288 127.11
 MAC1 |     -    35     -    37    39     -     -     -     -    31 |  288  16.83
 MADR |     -     -     -     -     -     -     -    19     -    26 |  288  15.35
 MAG0 |     -    34     -     -     -     -     -    26     -     - |  282   8.43
 MAS1 |     -     -    44    35    23     -     -    27     -    21 |  288   1.96
 MATE |     -     -     -    25     -     -     -     -     -    18 |  288   0.06
 MAW1 |     -    24     -     -    14     -     -     -     -    28 |  288  30.65
 MBAR |     -    51     -     -    33     -     -    57     -     X |  288  16.58
 MCM4 |     -    23    21     -     X     -     -     -     -     - |  278  11.69
 MDO1 |     -    31    19     -    24     -     -     -     -    24 |  288  15.70
 MEDI |     -     -    23     -     -     -     -     -     -    27 |  288   0.10
 MIZU |     -     -    28    57     -     -     -    22     -    19 |  288   0.33
 MKEA |     -     -     -    25     -     -     -    23     -    25 |  288  21.64
 NKLG |     -     -     -    33    22     -     -     -     -    27 |  287    >>>
 NLIB |     -     -    13     -     -     -     -    20     -    28 |  288   0.03
 NNOR |     -     -    30    42     -     -     -    28     -    36 |  288  10.49
 NOT1 |     -    19     -     -     -     -     -     -     -    20 |  288   0.07
 NPLD |     -    31    33     -     -     -     -     -     -    21 |  287   0.05
 NRC1 |     -     -    20     -    29     -     -     -     -    19 |  288   0.04
 NRIL |     -    34     -     -    14     -     -    21     -     X |  288   8.40
 NSSP |     -    23     -     -     -     -     -    22     -    18 |  288  10.08
 NYA1 |     -    25     -     -    14     -     -     -     -    20 |  288   0.06
 NYAL |     -     -     8     -     -     -     -     -     -     9 |  288   0.05
 ONSA |     -    46   116    65    52     -     -     -     -     - |  288   0.05
 PDEL |     -    12     -     -    11     -     -     -     -     - |  288  53.24
 PERT |     -     -    29    25    27     -     -     -     -    35 |  288   2.93
 PIE1 |     -     -     -    52     -     -     -     -     -    37 |  215   1.43
 POL2 |     -    18     -     -     -     -     -     -     -    19 |  288  10.01
 POTS |     -    18     -     -    22     -     -     -     -    14 |  288  13.30
 PRDS |     -     -     9     -     -     -     -     -     -    10 |  288   1.87
 PTBB |     -    25    28     -     -     -     -     -     -    20 |  288   0.24
 QAQ1 |     -    19    22     -     -     -     -     -     -    14 |  288   9.39
 REYK |     -    12     -     -     -     -     -     -     -    13 |  287   7.18
 RIOG |     -    69    38     -    92     -     -     -     -    64 |  285  13.97
 SANT |     -     X     -    98    60     -     -     -     -     - |  288   6.29
 SCH2 |     -    32    28     -     -     -     -    28     -    12 |  288   9.92
 SCUB |     -    31     -     -     -     -     -    24     -     - |  288  18.29
 SELE |     -     -     -     -     -     -     -    12     -    16 |  288  46.14
 SFER |     -    77    70     -     -     -     -     -     -     - |  273 728.95
 SPT0 |     -    17    34     -     -     -     -     -     -    27 |  288   0.05
 STJO |     -     -    17     -     -     -     -    20     -    14 |  288   0.05
 STR1 |     -     -    14     -     -     -     -     -     -    16 |  288   0.99
 SUTH |     -    14     -     -     -     -     -     -     -    15 |  288  13.05
 SUTM |     -     -    47     -    26     -     -    34     -     X |  288   9.63
 THTI |     -     -    26    35    32     -     -     -     -    30 |  288   2.02
 THU3 |     -    20    21     -     -     -     -     -     -    21 |  288   7.05
 TID1 |     -     -     -     -     -     -     -    21     -    28 |  288   0.04
 TIDB |     -    44    17    31     -     -     -     -     -    25 |  288   0.05
 TIXI |     -    30     -    99    22     -     -    25     -     X |  286   7.24
 TLSE |     -     -    19     -     -     -     -     -     -    22 |  287   0.65
 TRO1 |     -    21     -     -    12     -     -     -     -    20 |  288   8.22
 TSKB |     -    31    40    54    37     -     -     -     -    24 |  288   1.50
 TWTF |     -    35    16     -     -     -     -    42     -    24 |  288   0.43
 UNSA |     -     -     -    59     -     -     -    35     -    25 |  288  22.25
 URUM |     -    13     -     -     -     -     -     -     -    14 |  288  20.51
 USN3 |     -     -     -     -     -     -     -    15     -    20 |  288   0.03
 USNO |     -    18    13     -     -     -     -     -     -    13 |  288   0.03
 USUD |     -     -    24    46     -     -     -     -     -    15 |  288  10.63
 WHIT |     -    13     -     -     -     -     -     -     -    13 |  288   1.55
 WILL |     -    19    30     -     -     -     -     -     -    21 |  287 145.23
 WTZR |     -    22    35    31     -     -     -     -     -    15 |  288   0.06
 WUHN |     -     -    24     -    21     -     -     -     -    21 |  287  12.49
 YAKT |     -    16     -     -     -     -     -    24     -    28 |  288   0.53
 YAR2 |     -    22    23     -     -     -     -     -     -    31 |  288   7.00
 YEBE |     -     -    22     -     -     -     -     -     -    25 |  288   0.15
 YELL |     -    31    16    30    23     -     -     -     -    22 |  288   0.03
 -----+-------------------------------------------------------------+--------------
 TOT  |  3851    36    33    48    33    66  3291    29     -    37 |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BREW |   288     0     0   288    9.96   | 3.97e-14  7.19e-15  2.69e-15 |
 AMC2 |   288     0     0   288    9.91   | 3.37e-14  5.79e-15  2.63e-15 |
 SPT0 |   288     1     0   287    8.72   | 4.09e-14  9.68e-15  3.92e-15 |
 NPLD |   287     0     0   286    7.84   | 4.19e-14  1.04e-14  2.90e-15 |
 BRUS |   288     0     0   288    6.82   | 4.28e-14  8.48e-15  2.84e-15 |
 ALBH |   288     0     0   288    6.48   | 3.58e-14  9.36e-15  4.28e-15 |
 NLIB |   288     0     0   288    5.82   | 3.73e-14  6.64e-15  1.94e-15 |
 USNO |   288     0     0   288    4.80   | 3.44e-14  6.18e-15  2.52e-15 |
 USN3 |   288     0     3   178    4.30   | 8.20e-14  8.81e-15  1.83e-15 |
 ONSA |   288     0     0   288    4.16   | 4.14e-14  1.05e-14  5.38e-15 |
 ALGO |   288     0     0   288    4.04   | 3.23e-14  1.13e-14  3.71e-15 |
 WTZR |   288     0     0   288    3.19   | 3.97e-14  1.79e-14  4.46e-15 |
 YELL |   288     0     0   288    3.06   | 3.07e-14  8.93e-15  2.12e-15 |
 NRC1 |   288     0     0   143    2.52   | 4.85e-14  1.58e-14  3.25e-15 |
 GODE |   288     0     0   288    2.45   | 4.32e-14  9.96e-15  5.43e-15 |
 GOL2 |   286     1     0   284    1.87   | 3.32e-14  6.81e-15  1.60e-15 |
 MATE |   288     0     0   288    1.63   | 6.60e-14  1.62e-14  7.62e-15 |
 STJO |   288     0     0   288    1.57   | 4.91e-14  9.62e-15  1.93e-15 |
 MEDI |   288     1     0   287    1.47   | 4.30e-14  8.80e-15  6.52e-15 |
 KOKB |   288     0     0   288    1.30   | 7.46e-14  2.43e-14  8.95e-15 |
 NYAL |   288     0     0   288    1.26   | 3.08e-14  5.67e-15  4.96e-15 |
 TID1 |   288     0     0   143    1.10   | 4.48e-14  6.99e-15  2.30e-15 |
 NOT1 |   288     0     0   288    1.04   | 5.66e-14  2.61e-14  4.26e-15 |
 NYA1 |   288     0     0   288    1.04   | 2.65e-14  6.35e-15  5.10e-15 |
 FAIR |   288     1     1   272    0.79   | 1.85e-13  4.95e-14  1.97e-14 |
 FORT |   288     0     0   288    0.54   | 6.98e-14  1.49e-14  8.43e-15 |
 YEBE |   288     0     0   195    0.45   | 1.10e-13  2.45e-14  1.79e-14 |
 PIE1 |   215     0     0   212    0.33   | 8.79e-14  2.63e-14         - |
 PTBB |   288     1     0   287    0.15   | 3.16e-13  8.34e-14  1.54e-14 |
 G27  |   288     1     0   287    0.15   | 3.25e-13  8.10e-14  4.58e-14 |
 MIZU |   288     1     0   287    0.12   | 3.28e-13  1.15e-13  2.82e-14 |
 G30  |   288     1     0   287    0.11   | 3.47e-13  9.61e-14  5.18e-14 |
 HOB2 |   288     0     0   288    0.09   | 4.58e-14  9.63e-15  3.51e-15 |
 G04  |   288     1     0   287    0.08   | 4.64e-13  1.20e-13  7.62e-14 |
 G16  |   288     1     0   287    0.07   | 4.41e-13  6.93e-14  3.97e-14 |
 TWTF |   288     1     0   287    0.07   | 4.00e-13  1.39e-13  3.18e-14 |
 SFER |   273     1     0   269    0.07   | 4.26e-13  1.31e-13  6.11e-14 |
 G14  |   288     1     4   113    0.07   | 5.83e-13  6.72e-14  3.35e-14 |
 TLSE |   287     0     0   286    0.07   | 4.23e-13  1.23e-13  7.04e-14 |
 DWH1 |   288     0     0   288    0.06   | 4.93e-13  1.35e-13  6.26e-14 |
 BOR1 |   288     1     0   287    0.05   | 4.69e-13  1.05e-13  2.03e-14 |
 IENG |   288     1     0   287    0.05   | 5.60e-13  1.41e-13  6.25e-14 |
 KGN0 |   287     0     0   139    0.04   | 3.73e-13  1.12e-13  2.24e-14 |
 YAKT |   288     1     0   287    0.04   | 4.99e-13  1.15e-13  4.46e-14 |
 G07  |   288     1     0   287    0.04   | 3.01e-13  1.16e-13  1.08e-13 |
 G26  |   288     1     0   287    0.03   | 3.54e-13  1.11e-13  6.32e-14 |
 G29  |   288     1     0   287    0.03   | 3.95e-13  1.15e-13  1.30e-13 |
 STR1 |   288     1     0   287    0.02   | 6.29e-13  1.55e-13  1.33e-13 |
 G17  |   288     1     0   287    0.02   | 4.01e-13  1.46e-13  1.47e-13 |
 G31  |   288     1     0   287    0.02   | 2.17e-13  1.43e-13  8.44e-14 |
 HRAO |   288     1     0   287    0.02   | 1.24e-13  4.32e-14  1.30e-13 |
 DRAO |   288     1     1   144    0.02   | 1.74e-13  9.57e-14  9.82e-14 |
 G06  |   288     1     0   287    0.02   | 5.30e-13  1.89e-13  1.86e-13 |
 TSKB |   288     1     0   287    0.01   | 1.04e-12  3.32e-13  1.61e-13 |
 KERG |   288     1     0   287    0.01   | 1.08e-12  3.15e-13  1.08e-13 |
 G05  |   288     1     0   287    0.01   | 1.19e-12  3.15e-13  1.69e-13 |
 G09  |   288     1     0   287    0.01   | 1.30e-12  5.12e-13  1.64e-13 |
 G08  |   288     1     0   287    0.01   | 1.45e-12  4.71e-13  1.44e-13 |
 KOUR |   288     1     0   287    0.01   | 1.48e-12  4.34e-13  1.06e-13 |
 G25  |   288     1     0   287    0.00   | 1.38e-12  4.70e-13  1.94e-13 |
 PRDS |   288     1     0   287    0.00   | 1.40e-12  3.55e-13  1.82e-13 |
 WHIT |   288     1     1   144    0.00   | 4.82e-13  1.83e-13  1.30e-13 |
 THTI |   288     1     0   287    0.00   | 4.05e-13  1.97e-13  1.35e-13 |
 CHUR |   284     0     0   283    0.00   | 4.58e-14  1.25e-14  4.46e-15 |
 JPLM |   288     1     0   144    0.00   | 5.97e-13  2.03e-13  1.47e-13 |
 GPST |   288     0     0     0    0.00   | 2.63e-14  7.43e-15  2.27e-15 |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   286     0     0     0    0.00   |        -         -         - |
 NKLG |   287     1     0     0    0.00   |        -         -         - |
 MAG0 |   282     0     0     0    0.00   |        -         -         - |
 HERS |   241     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   209     0     0     0    0.00   |        -         -         - |
 G28  |   288     1     6     0    0.00   | 7.14e-13  7.71e-14  2.79e-14 |
 G24  |   288     1     0     0    0.00   | 1.32e-12  3.93e-13  4.08e-13 |
 G23  |   288     1     5     0    0.00   | 5.24e-13  6.31e-14  2.30e-14 |
 G22  |   288     1     6     0    0.00   | 8.40e-13  8.83e-14  1.79e-14 |
 G21  |   288     1     6     0    0.00   | 8.38e-13  1.04e-13  2.39e-14 |
 G20  |   288     1     6     0    0.00   | 6.70e-13  9.16e-14  1.53e-14 |
 G19  |   288     1     6     0    0.00   | 6.67e-13  6.51e-14  1.92e-14 |
 G18  |   288     3     6     0    0.00   | 1.28e-12  1.71e-13  7.74e-14 |
 G15  |   288     1     0     0    0.00   | 1.51e-12  5.33e-13  4.64e-13 |
 G13  |   288     1     6     0    0.00   | 6.31e-13  1.26e-13  3.94e-14 |
 G11  |   288     1     6     0    0.00   | 8.52e-13  8.06e-14  3.89e-14 |
 G10  |   288     1     0     0    0.00   | 1.17e-12  4.45e-13  2.18e-13 |
 G03  |   288     1     0     0    0.00   | 1.17e-12  5.62e-13  2.51e-13 |
 G01  |   288     1     0     0    0.00   | 1.53e-12  7.53e-13  5.51e-13 |
 YAR2 |   288     0     2     0    0.00   | 9.28e-13  1.32e-12  7.57e-13 |
 WILL |   287     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TIDB |   288     0     3     0    0.00   | 1.78e-13  1.67e-14  3.71e-15 |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 SUTM |   288     0     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SELE |   288     0     0     0    0.00   |        -         -         - |
 SCUB |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     1     0     0    0.00   | 5.65e-13  3.54e-13  8.62e-13 |
 SANT |   288     0     0     0    0.00   |        -         -         - |
 RIOG |   285     0     0     0    0.00   |        -         -         - |
 REYK |   287     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     2     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     1     0     0    0.00   | 1.73e-12  5.12e-13  3.72e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     1     1     0    0.00   | 5.56e-13  9.26e-13  9.60e-13 |
 MCM4 |   278     2     0     0    0.00   | 6.36e-13  2.69e-13  7.62e-13 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     1     0     0    0.00   | 1.87e-12  4.78e-13  1.85e-13 |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     2     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 KUNM |   288     1     0     0    0.00   |        -         -         - |
 KOSG |   288     0     1     0    0.00   | 7.25e-13  5.99e-13  5.56e-13 |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 JAB1 |   287     0     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HOFN |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   281     0     0     0    0.00   |        -         -         - |
 FLIN |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   288     1     0     0    0.00   |        -         -         - |
 COCO |   288     1     1     0    0.00   | 2.86e-13  1.35e-12  5.74e-13 |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 BAN2 |   280     0     0     0    0.00   |        -         -         - |
 BAHR |   288     1     5     0    0.00   | 6.73e-13  1.72e-13  9.56e-14 |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   280     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.12e-17  2.54e-16  1.52e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      NYAL      GOL2 |
------------------------------------------+------------------------------+
