
 GPS week: 1288   Day: 1   MJD: 53261                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2758     41     0.06    -0.02     2.84     0.00      0
 cod |   288     0  25127    116    -0.16     0.10     0.04    23.42      0
 emr |   288     0  12953    108   553.16    29.23     0.05    23.06      0
 esa |   288     0  17947    478   552.70    28.98     0.09     9.93      0
 gfz |   288     0  20102    261     0.36    -0.60     0.05    18.18      0
 iga |    96     0   2758     12   409.59 -7119.38     0.09     0.00      0
 igu |    96     0   2758     49 -2687.64  9150.97     3.18     0.00      0
 jpl |   288     0  18176    523    -9.18    -1.69     0.06    14.45      0
 ngs |    96     0   2758     10   409.69 -7119.23     2.93     0.00      0
 usn |   288     0  28117   4937   -10.19    -1.16     0.08    10.95      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------------+
    1 | -7968   -23   146  -164  -116    83-17111    57 -6505     9 |
    3 |  5045    34   -77   -78    85   -18  9113   122  3676  -181 |
    4 | -1312   -10     -   -82    -8    48 -2063    50 -1826    52 |
    5 |  2800  -109   -31   624  -136    63  4736    52  2120  -159 |
    6 |   372    40   -61    14    14   -17 -7513    55    10   -78 |
    7 | -4935    86  -153   -77   149   -13 -3539   -11 -4339   -35 |
    8 | -2968     2    28   -41   118    24   672  -111 -2917   -92 |
    9 | -3561   -83   132   214     3   155  3975  -134 -1834  -154 |
   10 | -3583   -14  -121   605   -49   199 -8228   -56 -3134  -117 |
   11 |  3460     3   -28  -197   -11    -8   791   168  3800    34 |
   13 |  3780    95   -97  -145   116    32  -659    30  3733   -63 |
   14 |  2711   -86    77   -38     6   -92   411    97  2819  -105 |
   15 |  -906   -92   155   -80   -55    71   952    51  -914   -41 |
   16 |  4589    26   -41   129    -7   -53   501    33  4046  -145 |
   17 |  -845   -24    33   233   -69    60  4313   -15  -496  -120 |
   18 |  1680    50  -108   -48    -2    24  1521   169  2320   -72 |
   19 |  6136   168  -251    28   176  -276    29   138  5640  -413 |
   20 |  3727    78  -119  -259   118   -99  -172   115  3906   -26 |
   21 |  5384    26   -73   -63   -16   141   344   128  4743    16 |
   22 |  2810    25   -71    -8  -110    65  1232   153  1476    92 |
   23 |   237    49   106  -135    -1  -220  -778   -54   -49  -160 |
   24 |-10369   -59    30   128   -27    38 -2410     - -8064   -10 |
   25 |  3272    11    90  -336    27   -45  1088    62  2245   -43 |
   26 | -5566  -109    41   255   134   -54  1910  -122 -4487  -178 |
   27 | -2791    10    10  -125   114    68   697   -25 -2326  -104 |
   28 |  4336    29    52  -232   -33     4 12517   113  4416   -70 |
   29 | -3206   -62    21   118    52   -16   364   -34 -2991   -72 |
   30 | -3837   -57   -46   288    -7   -36 -2126    73 -4221  -158 |
   31 |  4954     4   -64   -83   168   -68 -2360     X -1322   -86 |
 -----+-------------------------------------------------------------+
 ALBH |     -     -     -     -     -     -     -    16     -   -21 |
 ALGO |     -  -185   -23   606     -     -     -   -79     -     - |
 ALRT |     -   -35     -     -    45     -     -     -     -     - |
 AMC2 |     -    28     -     -     -     -     -  -159     -   149 |
 AREQ |     -    16     -     -    12     -     -  -112     -   116 |
 ARTU |     -    23     -   -30   -25     -     -    15     -     X |
 ASPA |     -     -     -     -    21     -     -     -     -   -35 |
 AUCK |     -    75     -  -145     -     -     -     -     -   -62 |
 BAHR |     -     -    71     -   -91     -     -    38     -   -59 |
 BOGT |     -  -226     -   362     -     -     -     -     -   101 |
 BOR1 |     -    14     -     -     -     -     -     -     -   -31 |
 BRMU |     -     -     -     -    54     -     -     -     -   -89 |
 BRUS |     -     3     -     -     -     -     -     5     -   -18 |
 CAGZ |     -    68     -     -     -     -     -     -     -  -144 |
 CHAT |     -    47     -   -58   -14     -     -     -     -   -31 |
 CHUR |     -    -6     -     -     -     -     -    41     -   -59 |
 CRO1 |     -     -    88    10   -77     -     -   -40     -   -18 |
 DGAR |     -   -38     -     -   -12     -     -    14     -   118 |
 DRAO |     -     -   -42     -     -     -     -    29     -    60 |
 DWH1 |     -   254     -     -     -     -     -  -411     -    -2 |
 FAIR |     -   -22     -   117   -35     -     -     X     -     - |
 FORT |     -   257   -69  -325   -14     -     -     -     -     - |
 GLPS |     -    40     -     -   -51     -     -     -     -     - |
 GODE |     -  -121     -   171     -     -     -     -     -   138 |
 GOLD |     -     -     -  -116     -     -     -    86     -    -1 |
 GUAT |     -     3     -     -   -23     -     -     -     -    40 |
 HARB |     -   -61     -   145     -     -     -     -     -     - |
 HOFN |     -     -     -     -    15     -     -   -19     -     - |
 HRAO |     -   -27     -     -   -80     -     -    94     -    92 |
 IISC |     -     -     -  -139    76     -     -     -     -     - |
 ISPA |     -    62     -     -   -28     -     -   -39     -   -21 |
 JPLM |     -     -     -     -     -     -     -   149     -  -197 |
 KERG |     -  -104    34   -47   127     -     -     -     -   -45 |
 KIRU |     -     4     -    64     -     -     -     -     -   -96 |
 KOKB |     -    52   -72     -     -     -     -    51     -   -84 |
 KOSG |     -     3     -     -     -     -     -     -     -    -7 |
 KOUR |     -     -     -   -45    25     -     -     -     -     - |
 KSTU |     -     -     -   -87     -     -     -    27     -    50 |
 KUNM |     -     -     -     -     -     -     -   -93     -   122 |
 LAE1 |     -     8     -   -88    26     -     -     -     -    23 |
 LHAS |     -     -     -     -     -     -     -   -80     -   105 |
 LPGS |     -    87     -  -438     -     -     -     -     -   260 |
 MADR |     -     -     -     -     -     -     -   -52     -    68 |
 MAS1 |     -     -     -   299   -57     -     -     -     -  -223 |
 MATE |     -   -16     -     X   -13     -     -     -     -    68 |
 MBAR |     -     -     -     -   -80     -     -    73     -    49 |
 MCM4 |     -   168  -171     -     X     -     -     -     -     - |
 MDO1 |     -     -    53     -  -102     -     -     -     -    70 |
 METS |     -   -72     -     -     -     -     -     -     -   154 |
 MIZU |     -     -     -   -41     -     -     -     -     -    37 |
 NKLG |     -    13     -   -78     -     -     -     -     -    54 |
 NLIB |     -     -     -     -     -     -     -    65     -   -86 |
 NNOR |     -     -     -   -22     -     -     -     -     -    20 |
 NOT1 |     -    41     -     -     -     -     -     -     -   -88 |
 NPLD |     -   -19     -     -     -     -     -     -     -    41 |
 NRC1 |     -     -    70     -  -142     -     -     -     -   107 |
 NRIL |     -  -102     -     -    38     -     -    99     -     X |
 NSSP |     -     0     -     -     -     -     -     3     -    -4 |
 NYA1 |     -   125     -     -  -117     -     -     -     -   -94 |
 NYAL |     -     -    31     -     -     -     -     -     -   -65 |
 ONSA |     -     -     -   122   -66     -     -     -     -     - |
 PERT |     -   -29    78  -647   250     -     -     -     -   -68 |
 PETP |     -   -19     -     -     7     -     -    22     -     X |
 PIE1 |     -     -     -  -365     -     -     -     -     -   331 |
 PIMO |     -     -     -    -3     2     -     -     -     -     X |
 POL2 |     -    25     -     -     -     -     -   -41     -     - |
 POTS |     -   -58     -     -    10     -     -     -     -   129 |
 PTBB |     -    18     -     -     -     -     -     -     -   -39 |
 QAQ1 |     -    71     -     -     -     -     -     -     -  -153 |
 RESO |     -    15     -     -     -     -     -   -24     -     - |
 REYK |     -   -12     -     -     -     -     -     -     -    25 |
 RIOG |     -   -28    24     -    22     -     -     -     -   -28 |
 SANT |     -    33     -  -167    36     -     -     -     -     - |
 SCH2 |     -     -     -     -     -     -     -   -71     -    93 |
 SCUB |     -   139     -     -     -     -     -  -225     -     - |
 SEY1 |     -    21     -     -   -27     -     -     -     -     X |
 SOFI |     -     -     -     -     -     -     -    23     -   -31 |
 SPT0 |     -  -229     -     -     -     -     -     -     -   489 |
 STJO |     -    28    17     -     -     -     -   -94     -    34 |
 SUTH |     -   127     -  -186     -     -     -     -     -   -51 |
 THTI |     -     -     -   124    27     -     -     -     -  -200 |
 TIDB |     -    28     -   152   -90     -     -     -     -   -68 |
 TIXI |     -   -40     -     -    17     -     -    44     -     X |
 TRO1 |     -   160     -     -   -76     -     -     -     -  -310 |
 TSKB |     -  -122    34    78   126     -     -     -     -  -113 |
 TWTF |     -   -29   153     -     -     -     -  -167     -   -56 |
 UNSA |     -     -     -  -250     -     -     -     -     -   227 |
 URUM |     -   -39     -     -     -     -     -     -     -    83 |
 USN3 |     -     -     -     -     -     -     -   -17     -    23 |
 USNO |     -  -108    98     -     -     -     -     -     -    29 |
 USUD |     -     -     -   102     -     -     -    -8     -   -99 |
 WHIT |     -     7     -     -     -     -     -     -     -   -14 |
 WILL |     -    51     -     -     -     -     -     -     -  -109 |
 WTZR |     -   -39     -    66     -     -     -     -     -    27 |
 WUHN |     -     -     -     -    60     -     -     -     -   -99 |
 YAKT |     -    24     -     -     -     -     -   -26     -   -21 |
 YELL |     -   -69    50   202  -121     -     -     -     -    73 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  3988    43    28   101    25    29  9253    57  5317    80 |  288   4.42
    3 |  3401    39    31    45    37    42  5139    38  3425   117 |  288   1.81
    4 |  3070    30     -    60    28    44  1992    55  2655    71 |  288   0.60
    5 |  3303   113    70    73    73    84  2712    47  3676   103 |  288   2.94
    6 |  1464    25    34    83    52    46  4711    44  1534    93 |  288   1.45
    7 |  1780    35    58    61    66    44  2198    55  1033   111 |  288   1.06
    8 |  2054    45    40    47    45    44  3072    71  2208    96 |  288   1.85
    9 |  4142    26    34    84    22    47  2812    28  2690    87 |  288   1.42
   10 |  4810    69    43   110    33   102  5393    48  4769    69 |  288   2.97
   11 |  1247    37    43    89    30    77   935    55   944    84 |  288   0.53
   13 |   689    77    56    50    44   139   680   144   521    93 |  288   0.29
   14 |  1093    38    27   164    25   122   398   129   834   116 |  288   0.33
   15 |  4440    39    31    58    56    79  4168    97  4687   111 |  288   2.75
   16 |  1523    30    79   124    59    66   413   161  1251   133 |  288   0.47
   17 |  1875    35    33    71    23    60  2638   103  1640    97 |  288   0.92
   18 |   915    68    47   141    58    94   405    44  1038    57 |  288   0.34
   19 |  1197    34    37   116    58    89   819    47   760   108 |  288   0.22
   20 |   634    71    48   132    48    93   556    49   404   108 |  288   0.29
   21 |  1670    43    35    97    82   198   497   136  1025    72 |  288   0.40
   22 |  4138    72    50    86    60    97   666    59  3259   136 |  288   0.51
   23 |   688    45    41   142    26    39   790   110   553    69 |  288   0.34
   24 |  4637    31    25    53    24    44  1428     -  5028    50 |  288   1.82
   25 |  3596    31    22   105    24    90  1738    30  3688   132 |  288   1.61
   26 |  2278    38    43    59    27    69  1097    42  2796    68 |  288   0.74
   27 |  1586    49    60    43    36    42   776    95  1698    98 |  288   0.84
   28 |  2327    55   100    92    63    60  7010    89  2536    86 |  288   0.35
   29 |  1000    36    40    98    16    88   942    33  1514    85 |  288   0.89
   30 |  1897   149   114   128    63   105  1549    94  1683    75 |  288   0.40
   31 |  9941    49   144    65   207   132  4401     X  8640   119 |  211    >>>
 -----+-------------------------------------------------------------+--------------
 ALBH |     -     -     -     -     -     -     -    27     -    35 |  202   0.11
 ALGO |     -    14    20    66     -     -     -    24     -     - |  288   0.05
 ALRT |     -    20     -     -    26     -     -     -     -     - |  288   7.77
 AMC2 |     -    22     -     -     -     -     -    36     -    85 |  288   0.03
 AREQ |     -    26     -     -    25     -     -    32     -    60 |  288  15.73
 ARTU |     -    17     -    43    58     -     -    50     -     X |  288  11.65
 ASPA |     -     -     -     -    47     -     -     -     -    78 |  225    >>>
 AUCK |     -    62     -   160     -     -     -     -     -    83 |  243  16.16
 BAHR |     -     -    22     -    20     -     -    17     -    68 |  288   1.38
 BOGT |     -    51     -    38     -     -     -     -     -    85 |  251  24.39
 BOR1 |     -    12     -     -     -     -     -     -     -    26 |  202   0.51
 BRMU |     -     -     -     -    34     -     -     -     -    57 |  202    >>>
 BRUS |     -    19     -     -     -     -     -    29     -    63 |  288   0.08
 CAGZ |     -    26     -     -     -     -     -     -     -    56 |  202    >>>
 CHAT |     -    29     -    90    37     -     -     -     -    92 |  287  13.63
 CHUR |     -    20     -     -     -     -     -    34     -    46 |  288   5.12
 CRO1 |     -     -    17    42    57     -     -    83     -    84 |  287  23.22
 DGAR |     -    22     -     -    31     -     -    34     -    52 |  288  18.64
 DRAO |     -     -    19     -     -     -     -    18     -    61 |  288   0.58
 DWH1 |     -    35     -     -     -     -     -    27     -   111 |  288   0.46
 FAIR |     -    14     -    33    21     -     -     X     -     - |  288  10.38
 FORT |     -    74    27    60    57     -     -     -     -     - |  288   0.09
 GLPS |     -    15     -     -    19     -     -     -     -     - |  282  20.99
 GODE |     -    41     -    50     -     -     -     -     -    90 |  216   0.06
 GOLD |     -     -     -    85     -     -     -    68     -   126 |  237  13.31
 GUAT |     -    28     -     -    33     -     -     -     -    93 |  288    >>>
 HARB |     -    29     -    68     -     -     -     -     -     - |  263  51.72
 HOFN |     -     -     -     -    18     -     -    23     -     - |  288    >>>
 HRAO |     -    54     -     -    51     -     -    39     -   118 |  288   1.08
 IISC |     -     -     -    33    18     -     -     -     -     - |  288  19.42
 ISPA |     -    82     -     -    82     -     -    85     -    76 |  224  14.60
 JPLM |     -     -     -     -     -     -     -    33     -    43 |  147   2.05
 KERG |     -    32    32    78    40     -     -     -     -    67 |  288   1.36
 KIRU |     -    34     -    52     -     -     -     -     -    58 |  280   9.12
 KOKB |     -    37    49     -     -     -     -    31     -    87 |  288   0.09
 KOSG |     -    29     -     -     -     -     -     -     -    61 |  230  65.89
 KOUR |     -     -     -    36    20     -     -     -     -     - |  288   1.47
 KSTU |     -     -     -    75     -     -     -    41     -    75 |  284  11.91
 KUNM |     -     -     -     -     -     -     -    40     -    53 |  230  37.64
 LAE1 |     -    50     -    56    34     -     -     -     -   146 |  287  17.38
 LHAS |     -     -     -     -     -     -     -    36     -    48 |  230   9.36
 LPGS |     -    35     -    57     -     -     -     -     -    92 |  287  51.04
 MADR |     -     -     -     -     -     -     -    41     -    54 |  202  17.15
 MAS1 |     -     -     -   136   151     -     -     -     -   150 |  288   1.88
 MATE |     -    27     -     X    23     -     -     -     -    75 |  288   0.09
 MBAR |     -     -     -     -    85     -     -   132     -   174 |  288  21.66
 MCM4 |     -    24    24     -     X     -     -     -     -     - |  200   7.06
 MDO1 |     -     -    44     -    29     -     -     -     -   123 |  288 404.53
 METS |     -    12     -     -     -     -     -     -     -    26 |  201  12.21
 MIZU |     -     -     -    56     -     -     -     -     -    51 |  202   0.32
 NKLG |     -    21     -    52     -     -     -     -     -    61 |  282    >>>
 NLIB |     -     -     -     -     -     -     -   101     -   134 |  159   0.07
 NNOR |     -     -     -    71     -     -     -     -     -    64 |  230  11.25
 NOT1 |     -    21     -     -     -     -     -     -     -    46 |  202   0.20
 NPLD |     -    14     -     -     -     -     -     -     -    30 |  201   0.05
 NRC1 |     -     -    23     -    20     -     -     -     -    58 |  288   0.03
 NRIL |     -    16     -     -    86     -     -   110     -     X |  288   9.87
 NSSP |     -    20     -     -     -     -     -    25     -    70 |  272  12.81
 NYA1 |     -    22     -     -    31     -     -     -     -    47 |  288   0.04
 NYAL |     -     -    33     -     -     -     -     -     -    69 |  240   0.05
 ONSA |     -     -     -    47    26     -     -     -     -     - |  288   0.06
 PERT |     -    84    35    87    31     -     -     -     -    93 |  288   2.78
 PETP |     -    29     -     -    31     -     -    14     -     X |  287  10.80
 PIE1 |     -     -     -    39     -     -     -     -     -    36 |  159   0.07
 PIMO |     -     -     -   159    87     -     -     -     -     X |  228  14.46
 POL2 |     -    20     -     -     -     -     -    33     -     - |  288  12.20
 POTS |     -    24     -     -    32     -     -     -     -    71 |  288  36.32
 PTBB |     -     9     -     -     -     -     -     -     -    20 |  202   0.42
 QAQ1 |     -    37     -     -     -     -     -     -     -    80 |  230  14.66
 RESO |     -    11     -     -     -     -     -    18     -     - |  288  10.79
 REYK |     -    14     -     -     -     -     -     -     -    29 |  201   7.86
 RIOG |     -    29    28     -    34     -     -     -     -   106 |  287    >>>
 SANT |     -    78     -   181    63     -     -     -     -     - |  287   8.89
 SCH2 |     -     -     -     -     -     -     -    37     -    49 |  202  65.00
 SCUB |     -    17     -     -     -     -     -    28     -     - |  288  18.02
 SEY1 |     -    45     -     -    58     -     -     -     -     X |  285  19.02
 SOFI |     -     -     -     -     -     -     -    35     -    46 |  202  46.08
 SPT0 |     -    17     -     -     -     -     -     -     -    37 |  202   0.06
 STJO |     -    29    35     -     -     -     -    28     -   119 |  288   0.09
 SUTH |     -    60     -   130     -     -     -     -     -   129 |  276  12.41
 THTI |     -     -     -    87    30     -     -     -     -    92 |  288   3.57
 TIDB |     -    17     -    59    33     -     -     -     -    68 |  288   0.10
 TIXI |     -    20     -     -    26     -     -    15     -     X |  286   7.46
 TRO1 |     -    17     -     -    26     -     -     -     -    27 |  288   8.86
 TSKB |     -    34    22    82    45     -     -     -     -    68 |  288   1.54
 TWTF |     -    24    20     -     -     -     -    35     -    71 |  288   0.52
 UNSA |     -     -     -    53     -     -     -     -     -    48 |  230  22.03
 URUM |     -    24     -     -     -     -     -     -     -    52 |  230  15.59
 USN3 |     -     -     -     -     -     -     -    22     -    29 |  198   0.04
 USNO |     -    25    22     -     -     -     -     -     -    55 |  283   0.05
 USUD |     -     -     -    49     -     -     -    37     -    37 |  284  10.76
 WHIT |     -    26     -     -     -     -     -     -     -    56 |  239   1.12
 WILL |     -    17     -     -     -     -     -     -     -    36 |  202 167.11
 WTZR |     -    24     -    53     -     -     -     -     -    76 |  288   0.05
 WUHN |     -     -     -     -    36     -     -     -     -    61 |  238  11.56
 YAKT |     -    33     -     -     -     -     -    34     -    63 |  288   0.55
 YELL |     -    22    21    53    30     -     -     -     -    63 |  288   0.02
 -----+-------------------------------------------------------------+--------------
 TOT  |  2840    43    47    87    51    85  3181    65  2929    83 |


 BEST CLOCK FIT: YELL   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 YELL |   288     0     0   288   11.33   | 2.98e-14  5.95e-15  1.08e-15 |
 USNO |   283     0     0   282   10.98   | 4.61e-14  9.28e-15  1.50e-15 |
 NRC1 |   288     0     0   288   10.43   | 3.27e-14  8.94e-15  3.70e-15 |
 BRUS |   288     0     0   288    9.63   | 6.40e-14  1.82e-14  5.22e-15 |
 AMC2 |   288     0     0   288    8.85   | 5.43e-14  9.26e-15  2.23e-15 |
 ONSA |   288     0     0   288    8.43   | 5.46e-14  2.36e-14  4.20e-15 |
 WTZR |   288     0     0   288    6.54   | 5.18e-14  1.29e-14  4.90e-15 |
 ALGO |   288     0     0   288    4.60   | 2.82e-14  5.91e-15  4.16e-15 |
 NYA1 |   288     0     0   288    3.53   | 3.39e-14  1.19e-14  3.82e-15 |
 NYAL |   240     0     0   108    3.28   | 4.05e-14  1.07e-14         - |
 MATE |   288     0     0   288    3.23   | 4.19e-14  1.26e-14  9.30e-15 |
 KOKB |   288     0     0   288    3.17   | 9.39e-14  2.91e-14  6.55e-15 |
 ALBH |   202     0     0    98    2.68   | 3.81e-14  1.01e-14         - |
 TIDB |   288     0     0   288    2.23   | 1.90e-13  1.92e-14  6.79e-15 |
 STJO |   288     0     0   143    1.85   | 6.15e-14  1.61e-14  6.93e-15 |
 NLIB |   159     0     0    46    1.80   | 5.58e-14  1.26e-14         - |
 USN3 |   198     0     0    98    1.69   | 8.12e-14  1.07e-14         - |
 GODE |   216     0     0   106    1.42   | 5.44e-14  9.19e-15         - |
 NPLD |   201     0     0    96    1.13   | 5.33e-14  2.04e-14         - |
 FORT |   288     0     0   288    0.51   | 7.81e-14  1.77e-14  6.13e-15 |
 NOT1 |   202     0     0    98    0.33   | 3.82e-14  2.15e-14         - |
 PIE1 |   159     0     0   156    0.23   | 8.13e-14  3.31e-14         - |
 SPT0 |   202     0     0    98    0.19   | 4.34e-14  1.12e-14         - |
 PTBB |   202     0     0   198    0.19   | 3.99e-13  7.02e-14         - |
 G30  |   288     0     0   287    0.18   | 3.86e-13  1.19e-13  3.37e-14 |
 G27  |   288     0     0   288    0.18   | 3.43e-13  8.46e-14  7.91e-14 |
 G16  |   288     0     0   288    0.16   | 5.10e-13  8.94e-14  4.65e-14 |
 TWTF |   288     0     0   288    0.14   | 3.54e-13  1.39e-13  4.28e-14 |
 MIZU |   202     0     0   197    0.13   | 3.86e-13  1.12e-13         - |
 G20  |   288     0     3    88    0.12   | 6.51e-13  8.60e-14  2.69e-14 |
 G17  |   288     0     0   288    0.09   | 3.63e-13  1.03e-13  1.08e-13 |
 DRAO |   288     0     0   288    0.09   | 1.21e-13  7.13e-14  3.27e-14 |
 G04  |   288     0     0   288    0.08   | 4.32e-13  1.17e-13  6.17e-14 |
 G26  |   288     0     0   288    0.08   | 3.62e-13  9.90e-14  9.84e-14 |
 G29  |   288     0     0   288    0.07   | 3.99e-13  1.27e-13  1.09e-13 |
 G06  |   288     0     0   288    0.06   | 5.46e-13  1.67e-13  1.12e-13 |
 BOR1 |   202     0     0   198    0.05   | 4.32e-13  1.15e-13         - |
 G07  |   288     0     0   288    0.05   | 3.11e-13  1.04e-13  1.45e-13 |
 DWH1 |   288     0     0   143    0.04   | 4.60e-13  1.36e-13  3.77e-14 |
 BAHR |   288     0     0   288    0.04   | 5.73e-13  2.00e-13  1.17e-13 |
 YAKT |   288     0     0   143    0.03   | 4.11e-13  1.16e-13  3.53e-14 |
 TSKB |   288     0     0   288    0.02   | 9.40e-13  3.11e-13  1.61e-13 |
 G14  |   288     0     3    18    0.02   | 5.75e-13  5.94e-14  3.35e-14 |
 KERG |   288     0     0   288    0.02   | 1.11e-12  2.91e-13  1.21e-13 |
 G03  |   288     0     0   288    0.01   | 1.27e-12  4.21e-13  1.11e-13 |
 HRAO |   288     0     0   143    0.01   | 1.17e-13  9.10e-14  1.27e-13 |
 G31  |   211     0     0   208    0.01   | 2.13e-13  2.22e-13         - |
 G24  |   288     0     0   288    0.01   | 1.45e-12  4.31e-13  2.04e-13 |
 G08  |   288     0     0   275    0.01   | 1.45e-12  4.37e-13  1.42e-13 |
 G09  |   288     0     0   288    0.01   | 1.32e-12  4.69e-13  1.39e-13 |
 KOUR |   288     0     0   288    0.01   | 1.43e-12  4.51e-13  1.56e-13 |
 MAS1 |   288     0     0   288    0.01   | 1.84e-12  4.74e-13  1.76e-13 |
 THTI |   288     0     0   288    0.00   | 4.09e-13  1.68e-13  2.53e-13 |
 WHIT |   239     0     0   107    0.00   | 4.78e-13  1.39e-13         - |
 JPLM |   147     0     0   142    0.00   | 5.32e-13  1.94e-13         - |
 GPST |   288     0     0     0    0.00   | 2.22e-14  5.56e-15  1.16e-15 |
 WUHN |   238     0     0     0    0.00   |        -         -         - |
 TIXI |   286     0     0     0    0.00   |        -         -         - |
 SANT |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     2     0     0    0.00   |        -         -         - |
 NKLG |   282     0     0     0    0.00   |        -         -         - |
 METS |   201     0     0     0    0.00   |        -         -         - |
 LAE1 |   287     0     0     0    0.00   |        -         -         - |
 HARB |   263     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   243     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     4     0    0.00   | 7.02e-13  7.38e-14  3.14e-14 |
 G25  |   288     0     0     0    0.00   | 1.35e-12  3.84e-13  1.51e-13 |
 G23  |   288     0     3     0    0.00   | 5.09e-13  5.22e-14  2.03e-14 |
 G22  |   288     0     6     0    0.00   | 1.02e-12  9.71e-14  2.84e-14 |
 G21  |   288     0     6     0    0.00   | 8.03e-13  1.04e-13  3.98e-14 |
 G19  |   288     0     6     0    0.00   | 6.45e-13  6.08e-14  1.74e-14 |
 G18  |   288     0     6     0    0.00   | 1.24e-12  1.09e-13  3.47e-14 |
 G15  |   288     0     0     0    0.00   | 1.49e-12  5.80e-13  3.21e-13 |
 G13  |   288     1     5     0    0.00   | 6.39e-13  1.06e-13  2.75e-14 |
 G11  |   288     0     5     0    0.00   | 7.63e-13  8.33e-14  6.94e-14 |
 G10  |   288     0     0     0    0.00   | 1.14e-12  3.97e-13  4.07e-13 |
 G05  |   288     0     0     0    0.00   | 1.33e-12  4.10e-13  3.94e-13 |
 G01  |   288     0     0     0    0.00   | 1.64e-12  6.55e-13  5.51e-13 |
 WILL |   202     0     0     0    0.00   |        -         -         - |
 USUD |   284     0     0     0    0.00   |        -         -         - |
 URUM |   230     0     0     0    0.00   |        -         -         - |
 UNSA |   230     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 SUTH |   276     0     0     0    0.00   |        -         -         - |
 SOFI |   202     0     0     0    0.00   |        -         -         - |
 SEY1 |   285     0     0     0    0.00   |        -         -         - |
 SCUB |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   202     0     0     0    0.00   |        -         -         - |
 RIOG |   287     2     0     0    0.00   |        -         -         - |
 REYK |   201     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   230     2     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   228     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.78e-12  5.61e-13  1.90e-13 |
 NSSP |   272     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   230     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     1     1     0    0.00   | 8.06e-13  6.29e-13  1.21e-12 |
 MCM4 |   200     0     0     0    0.00   | 6.17e-13  3.25e-13         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MADR |   202     0     0     0    0.00   |        -         -         - |
 LPGS |   287     2     0     0    0.00   |        -         -         - |
 LHAS |   230     0     0     0    0.00   |        -         -         - |
 KUNM |   230     0     0     0    0.00   |        -         -         - |
 KSTU |   284     0     0     0    0.00   |        -         -         - |
 KOSG |   230     0     0     0    0.00   |        -         -         - |
 KIRU |   280     0     0     0    0.00   |        -         -         - |
 ISPA |   224     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HOFN |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   237     0     0     0    0.00   |        -         -         - |
 GLPS |   282     0     0     0    0.00   |        -         -         - |
 FAIR |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   287     1     0     0    0.00   |        -         -         - |
 CHUR |   288     0     1     0    0.00   | 1.01e-12  3.11e-13  3.39e-13 |
 CAGZ |   202     0     0     0    0.00   |        -         -         - |
 BRMU |   202     0     0     0    0.00   |        -         -         - |
 BOGT |   251     0     0     0    0.00   |        -         -         - |
 ASPA |   225     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 1.39e-17  1.67e-16  1.00e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     ALGO      ALGO      YELL |
------------------------------------------+------------------------------+
