
 GPS week: 1277   Day: 2   MJD: 53185                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2584      0     0.10    -0.13     2.96     0.00
 cod |   288     0  25721    843    -0.19     0.04     0.04    17.38
 emr |   288     0  20481     35   399.53    30.49     0.05    14.68
 esa |   288     0  16578   3428   849.56    12.78     0.09     6.44
 gfz |   286     0  20162    333    -0.30    -0.16     0.04    21.65
 iga |    96     0   2396      9     0.07    -0.11     0.22     0.00
 igu |    96     0   2584      0     0.06    -0.05     2.95     0.00
 jpl |   288     0  15355    146     0.17    -2.99     0.04    21.44
 ngs |    96     0   2396      0     0.08    -0.10     2.68     0.00
 usn |   288     0  33249    361   399.47    30.46     0.04    18.41

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------------+
    3 |  -668    -5    29     5    41   -48  8008     X -1654   -68 |
    4 | -3280     X  -167     X   107  -185  1045   -86 -2801    58 |
    5 | -3404   -92   -57   176   113   150-13363    15 -2490   -71 |
    6 | -1025    44   -80   -47   115  -310-12072    55  -955  -128 |
    7 | -3851  -105   -44     -   124   137 -2048   -38 -3433    11 |
    8 |  -379    67  -152    70   -25   -63  2091   -14 -1462    71 |
    9 |  -680    15   -80   -40    33   -11   482    10   -22    16 |
   10 | -4072    -8   -39     2    81   287  5287   -51 -3457   -27 |
   11 |  3471   -17   -76   172   -14  -153   530   100  3712   -30 |
   13 |  4369   129  -134    11    41  -321 -2761   -29  4426   -51 |
   14 |  2904   132   -36    21   -56    10 -1676   104  2890   -96 |
   15 |  5954   -21    22   137   -46     -  9485   129     -   -72 |
   16 |   379   113    17   -53   -61    93   594   169   823  -121 |
   17 | -3454     X   -77     X    76     -  3973   -40     -    -4 |
   18 |   371    55   -75   -48    69   -41 -1634    55  1059   -87 |
   19 |  1611    77    23   290  -128  1412  -160   209  2106  -164 |
   20 |  1327    85   -24   175    -9  -347 -1081   165  2163  -185 |
   21 |  -375    22    55  -425     7    42 -1496   132   339   -37 |
   22 |  1792    55     6    -4    55   -42  -747    74  1084  -159 |
   24 |  3638   -40  -138    63    99    -1  6320  -183  1788   114 |
   25 | -1382   118   -85  -106    -2  -238  2145   142   -56   -81 |
   26 | -2719    46  -179   -74   117  -124 -4447   -19 -2132    -4 |
   27 | -4844    19  -146    41   100  -221  2087    -3 -3768   -31 |
   28 |  1475  -106   -44  -265   127    78  1797   -68  2213   119 |
   29 | -2729    -2  -120     X    83   -50 -2398   -45 -2912    27 |
   30 | -2059  -111    51  -114   128  -137 -1511    29 -1667   -64 |
   31 |  7345   -32     1  -168     6    35  1768   124  4092     9 |
 -----+-------------------------------------------------------------+
 ALBH |     -     -   -31     -     -     -     -    63     -   -49 |
 ALGO |     -     -   -53  -578     -     -     -   189     -    -6 |
 ALRT |     -   -31     -     -    25     -     -     -     -     - |
 AMC2 |     -   -87    79     -     -     -     -  -112     -   149 |
 ARTU |     -    40     -   148    48     -     -   -72     -   -61 |
 ASC1 |     -   128     -     -   -92     -     -     -     -   -14 |
 ASPA |     -     -     -     -   224     -     -     -     -  -264 |
 BILI |     -    14     -     -  -103     -     -    21     -    83 |
 BOGT |     -     -     -   392     -     -     -     -     -  -137 |
 BOR1 |     -     X    36     -     -     -     -     -     -   -29 |
 BREW |     -     -   -45     -     -     -     -     -     -    36 |
 BRMU |     -     -     -     -    -1     -     -     -     -     1 |
 BRUS |     -    96    33     -     -     -     -   -59     -   -48 |
 CAGZ |     -    45     -     -     -     -     -     -     -   -42 |
 CHAT |     -   -33     -   -17   -15     -     -     -     -    55 |
 CRO1 |     -     -     9     X    19     -     -    -2     -   -27 |
 DGAR |     -   -76     -     -   -35     -     -    23     -    86 |
 DRAO |     -     -  -149     -     -     -     -   137     -   -45 |
 DWH1 |     -   338    42     -     -     -     -  -293     -    -7 |
 FAIR |     -     -   -30  -156  -103     -     -   102     -    80 |
 FLIN |     -    27     -     -     -     -     -   -22     -     - |
 GODE |     -   -74   154     X     -     -     -     -     -   -53 |
 GOL2 |     -     -   -33     -     -     -     -     -     -    26 |
 GOLD |     -   -22     -  -499     -     -     -   -15     -   205 |
 GUAT |     -   165     -     -    -4     -     -     -     -  -150 |
 HARB |     -    69     -  -187     -     -     -     -     -     X |
 HERS |     -     -    70     -     -     -     -     -     -   -56 |
 HLFX |     -     -   169     -     -     -     -     -     -  -135 |
 HOFN |     -     -     -     -   -82     -     -    83     -     - |
 HRAO |     -   -52     -     -     -     -     -    16     -    31 |
 IENG |     -   -54    64     -     -     -     -     -     -     - |
 INVK |     -  -141     -     -     -     -     -     -     -   133 |
 IRKT |     -     -  -168   383     -     -     -     -     -     - |
 ISPA |     -    63     -     -     2     -     -   -26     -   -31 |
 JPLM |     -     -   127     -  -147     -     -     -     -    62 |
 KERG |     -   -66  -137   445   161     -     -     -     -  -173 |
 KGN0 |     -    29   109     -     -     -     -     -     -  -115 |
 KIT3 |     -     -     -   -47  -132     -     -    86     -    71 |
 KOKB |     -   -40   224     -  -164     -     -    14     -    33 |
 KOSG |     -   -55     -     -     -     -     -     -     -    52 |
 KOUR |     -    59     -  -251     1     -     -    70     -   -72 |
 KUNM |     -     -     -     -     -     -     -   -27     -    32 |
 LAE1 |     -   -82     -   -42   -61     -     -     -     -   163 |
 LHAS |     -     -     -     -    17     -     -   -71     -    64 |
 LPGS |     -   -79    53     X     X     -     -   -52     -    85 |
 MADR |     -     -     -     -     -     -     -  -117     -   136 |
 MAG0 |     -   -11     -     -     -     -     -     9     -     - |
 MAS1 |     -     -    27  -271    18     -     -    71     -   -31 |
 MATE |     -     -     -  -357     -     -     -     -     -   125 |
 MBAR |     -   -45     -     -   -44     -     -   -15     -   112 |
 MCM4 |     -     -     -     -  -190     -     -     -     -   223 |
 MDO1 |     -    20    22     -   -68     -     -     -     -    38 |
 MEDI |     -     -    41     -     -     -     -     -     -   -33 |
 METS |     -   -25   -16     -     -     -     -     -     -    37 |
 MIZU |     -     -   -66     X     -     -     -     -     -    52 |
 MKEA |     -    75     -   110  -135     -     -     -     -    48 |
 MONP |     -   -65     -     -     -     -     -     -     -    61 |
 NLIB |     -   -65    68     -     -     -     -    75     -   -80 |
 NNOR |     -     -   335   123     -     -     -  -190     -   -89 |
 NPLD |     -   -20    97     -     -     -     -     -     -   -59 |
 NRC1 |     -     -   -23     -  -166     -     -    26     -   170 |
 NRIL |     -   -41     -     -   -36     -     -   -99     -   196 |
 NSSP |     -    24     -     -     -     -     -   -49     -    35 |
 NYA1 |     -    95     -     -   -75     -     -     -     -    -2 |
 NYAL |     -     -    31     -     -     -     -     -     -   -25 |
 OHI2 |     -    96     -     X   -64     -     -     9     -   -25 |
 ONSA |     -    16   -15   -38     -     -     -     -     -    14 |
 OPMT |     -   -26    30     -     -     -     -     -     -     - |
 PDEL |     -   -27     -     -     8     -     -   -11     -    29 |
 PERT |     -    -7    14  -327   126     -     -     -     -   -37 |
 PETP |     -    19     -     -   -15     -     -     -     -     - |
 PIE1 |     -     -    96     X     -     -     -     -     -   -76 |
 POTS |     -   -76     -     -     4     -     -     -     -    67 |
 PRDS |     -     -   -12     -     -     -     -     -     -    10 |
 PTBB |     -   -19    38     -     -     -     -     -     -   -13 |
 QAQ1 |     -     -   129     -     -     -     -     -     -  -103 |
 RESO |     -    15     -     -     -     -     -   -12     -     - |
 REUN |     -     -     -   195     -     -     -     -     -   -68 |
 RIOG |     -    24    66     -   -38     -     -     -     -   -29 |
 SANT |     -    -8     -     X   -24     -     -     -     -    36 |
 SCH2 |     -   -52     -     -     -     -     -     8     -    39 |
 SFER |     -   -32     -     -     -     -     -     -     -    30 |
 SPT0 |     -   -48     -     -     -     -     -     -     -    45 |
 STJO |     -     -   -81     -     -     -     -   -27     -    96 |
 SUTM |     -     -     -     -  -187     -     -     4     -   214 |
 THTI |     -     -   142   183   -20     -     -   -44     -  -103 |
 THU3 |     -    92     -     -     -     -     -     -     -   -87 |
 TIDB |     -    68   -41   254   -80     -     -     -     -   -27 |
 TRO1 |     -  -190     -     -    30     -     -     -     -   145 |
 TSKB |     -   -33    -5     X    71     -     -     -     -   -47 |
 TWTF |     -    90     -     -     -     -     -  -107     -    66 |
 URUM |     -   -99     -     -     -     -     -     -     -    94 |
 USNO |     -   -50   103     -     -     -     -     -     -   -35 |
 USUD |     -     -     -   460     -     -     -   -46     -  -102 |
 VILL |     -   -16     -    37     -     -     -     -     -     2 |
 WHIT |     -   -45     -     -     -     -     -     -     -    43 |
 WTZA |     -   -81     -     -     -     -     -     -     -    76 |
 WTZR |     -   -56     -   -55     -     -     -     -     -    72 |
 WUHN |     -     -     -     -   185     -     -     -     -  -217 |
 YELL |     -   -38    48   311   -91     -     -     -     -    -4 |
 ZWEN |     -     -     -  -246    54     -     -     -     -    22 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    3 |  3602    40    40    71    17    55  2824     X  2671    38 |  288   2.49
    4 |  1234     X    74     X    55   242   717    71  1361    62 |  276   0.85
    5 |  3267    23    41    91    24    91  7392    30  2562    34 |  288   1.87
    6 |  2156    35    31    49    22   118  7128    55  1805    72 |  288   1.38
    7 |  1136    45    48     -    20    89   874    19  1041    76 |  288   0.76
    8 |  4419    47    29    62    24    77  2147    45  4769    21 |  288   2.56
    9 |  4248    58    68   103    33   134  3785    52  3032    48 |  288   2.19
   10 |  1822    44    47    98    27   133  3317    36  1842    46 |  288   1.81
   11 |  1589    63    60    95    61   208   197    44  1492    54 |  288   0.33
   13 |  1325    51    46   163    26   675  1230    56  1268    42 |  288   0.24
   14 |  1106    56    54    93    29   234   760    33   933    61 |  288   0.17
   15 |  3616   131   179    84    90     -  4661    84     -    73 |  288   2.43
   16 |   291    33    44   167    36   208   552    63   376    42 |  288   0.27
   17 |  1077     X    67     X    66     -  2764    64     -   102 |  276   0.93
   18 |   950    76    48    72    29    57   636    47  1138    37 |  288   0.47
   19 |  1028    44   100   122    59   202  1209    44   827    76 |  288   0.20
   20 |   657    62    99    78    31   463   638    74   558    95 |  288   0.24
   21 |   834    72    77    99    36   109   670    43  1324    87 |  288   0.39
   22 |  4836    78    80    60    62   127  2990    52  3836    88 |  288   2.24
   24 |  4743   107    80   113    30   267  4580   101  4583    52 |  288   2.63
   25 |  4328    58    91    55    39   382  2986    34  4057    82 |  288   2.04
   26 |   662    51    33   189    31    53  2269    45   657    39 |  288   0.35
   27 |  2560    47    67   112    40   135  2041    51  2313    55 |  288   0.77
   28 |  1323    30    37    47    23    70  1361    34  1542    57 |  288   0.42
   29 |   875    56    24     X    34    64  1311    24   823    41 |  288   0.46
   30 |   895    35    38   100    34    62   903    24  1056    33 |  288   0.74
   31 |  8240    34    31   108    29   150  2286    45  7436    50 |  288   1.65
 -----+-------------------------------------------------------------+--------------
 ALBH |     -     -    41     -     -     -     -    24     -    26 |  288   0.16
 ALGO |     -     -    16    40     -     -     -    16     -    12 |  288   0.02
 ALRT |     -    13     -     -    11     -     -     -     -     - |  286   7.75
 AMC2 |     -    49    26     -     -     -     -    31     -    22 |  288   0.04
 ARTU |     -    31     -    82    26     -     -    60     -    31 |  288  10.56
 ASC1 |     -    38     -     -    23     -     -     -     -    26 |  286    >>>
 ASPA |     -     -     -     -    33     -     -     -     -    38 |  284    >>>
 BILI |     -    36     -     -    36     -     -    25     -    20 |  286  10.91
 BOGT |     -     -     -    33     -     -     -     -     -    11 |  101  10.77
 BOR1 |     -     X    12     -     -     -     -     -     -    10 |  288   0.74
 BREW |     -     -    27     -     -     -     -     -     -    22 |  288   0.04
 BRMU |     -     -     -     -   104     -     -     -     -   122 |  273    >>>
 BRUS |     -    36    25     -     -     -     -    28     -    19 |  288   0.03
 CAGZ |     -    67     -     -     -     -     -     -     -    64 |  110   0.45
 CHAT |     -    70     -    74    40     -     -     -     -    52 |  275  12.69
 CRO1 |     -     -    22     X    27     -     -    24     -    21 |  276  17.66
 DGAR |     -    33     -     -    34     -     -    37     -    21 |  288  16.68
 DRAO |     -     -    54     -     -     -     -    28     -    35 |  288   0.10
 DWH1 |     -    38    42     -     -     -     -    30     -    21 |  288   0.50
 FAIR |     -     -    38    47    28     -     -    22     -    23 |  288   0.06
 FLIN |     -    38     -     -     -     -     -    30     -     - |  288   8.50
 GODE |     -    27    20     X     -     -     -     -     -    29 |  288   0.05
 GOL2 |     -     -    29     -     -     -     -     -     -    23 |  286 295.49
 GOLD |     -    27     -    53     -     -     -    29     -    20 |  288  16.39
 GUAT |     -    27     -     -    23     -     -     -     -    21 |  287    >>>
 HARB |     -    32     -    86     -     -     -     -     -     X |  277  47.72
 HERS |     -     -    29     -     -     -     -     -     -    23 |  241  27.32
 HLFX |     -     -    38     -     -     -     -     -     -    31 |  286   5.33
 HOFN |     -     -     -     -    15     -     -    15     -     - |  279    >>>
 HRAO |     -    34     -     -     -     -     -    43     -    30 |  288   0.21
 IENG |     -    29    34     -     -     -     -     -     -     - |  288   0.65
 INVK |     -    36     -     -     -     -     -     -     -    34 |  288   9.21
 IRKT |     -     -    23    53     -     -     -     -     -     - |  288   0.15
 ISPA |     -    44     -     -    25     -     -    38     -    42 |  288  13.73
 JPLM |     -     -    27     -    18     -     -     -     -    17 |  288   3.82
 KERG |     -    39    80    90    34     -     -     -     -    82 |  276   1.45
 KGN0 |     -    65    51     -     -     -     -     -     -    31 |  287   0.41
 KIT3 |     -     -     -    99    13     -     -    36     -    15 |  288  29.46
 KOKB |     -    30    67     -    38     -     -    51     -    24 |  288   0.07
 KOSG |     -    17     -     -     -     -     -     -     -    16 |  288  24.02
 KOUR |     -    41     -    71    33     -     -    29     -    29 |  288   2.40
 KUNM |     -     -     -     -     -     -     -    19     -    22 |  288  34.10
 LAE1 |     -    33     -    62    29     -     -     -     -    21 |  287  11.15
 LHAS |     -     -     -     -    49     -     -    51     -    19 |  284  16.63
 LPGS |     -    53    38     X     X     -     -    52     -    21 |  288  62.21
 MADR |     -     -     -     -     -     -     -    29     -    34 |  288  11.77
 MAG0 |     -    21     -     -     -     -     -    17     -     - |  286   9.33
 MAS1 |     -     -    24    63    16     -     -    23     -    21 |  288   1.73
 MATE |     -     -     -    41     -     -     -     -     -    14 |   99    >>>
 MBAR |     -    30     -     -    21     -     -    30     -    18 |  288  21.46
 MCM4 |     -     -     -     -    29     -     -     -     -    34 |  285   6.73
 MDO1 |     -    22    18     -    14     -     -     -     -    19 |  287  31.40
 MEDI |     -     -    14     -     -     -     -     -     -    11 |  288    >>>
 METS |     -    17    25     -     -     -     -     -     -    14 |  287  11.06
 MIZU |     -     -    19     X     -     -     -     -     -    16 |  288   0.58
 MKEA |     -    19     -    56    27     -     -     -     -    30 |  288  21.51
 MONP |     -    26     -     -     -     -     -     -     -    25 |  287  15.55
 NLIB |     -    34    29     -     -     -     -    30     -    17 |  288   0.03
 NNOR |     -     -    39    73     -     -     -    26     -    39 |  288  15.78
 NPLD |     -    37    59     -     -     -     -     -     -    70 |  287   0.04
 NRC1 |     -     -    18     -    25     -     -    21     -    10 |  288   0.03
 NRIL |     -    23     -     -    23     -     -    30     -    31 |  288   9.08
 NSSP |     -    38     -     -     -     -     -    24     -    18 |  288  21.62
 NYA1 |     -    24     -     -    16     -     -     -     -    15 |  288   0.06
 NYAL |     -     -    12     -     -     -     -     -     -     9 |  288   0.07
 OHI2 |     -    42     -     X    15     -     -    37     -    31 |  288   7.01
 ONSA |     -    24    37    43     -     -     -     -     -    22 |  288   0.09
 OPMT |     -    29    34     -     -     -     -     -     -     - |  287   0.04
 PDEL |     -    40     -     -    17     -     -    16     -    36 |  288  52.44
 PERT |     -    45    61    84    43     -     -     -     -    44 |  288   2.33
 PETP |     -    31     -     -    25     -     -     -     -     - |  285  11.03
 PIE1 |     -     -    28     X     -     -     -     -     -    23 |  216   3.30
 POTS |     -    24     -     -    22     -     -     -     -    19 |  287  20.85
 PRDS |     -     -    16     -     -     -     -     -     -    13 |  288   1.69
 PTBB |     -    32    44     -     -     -     -     -     -    36 |  288   0.39
 QAQ1 |     -     -    22     -     -     -     -     -     -    17 |  272  14.91
 RESO |     -    15     -     -     -     -     -    12     -     - |  288   9.17
 REUN |     -     -     -    73     -     -     -     -     -    26 |  286  16.86
 RIOG |     -    43    75     -    32     -     -     -     -    42 |  288  11.23
 SANT |     -    75     -     X    63     -     -     -     -   141 |  288   5.90
 SCH2 |     -    43     -     -     -     -     -    40     -    40 |  288  28.93
 SFER |     -    21     -     -     -     -     -     -     -    20 |  284   0.52
 SPT0 |     -    22     -     -     -     -     -     -     -    21 |  205   0.03
 STJO |     -     -    25     -     -     -     -    20     -    30 |  288   0.11
 SUTM |     -     -     -     -    14     -     -    27     -    24 |  288  49.92
 THTI |     -     -    55   122    24     -     -    22     -    32 |  288  18.32
 THU3 |     -    14     -     -     -     -     -     -     -    14 |  288   8.22
 TIDB |     -    37    47    45    28     -     -     -     -    21 |  288   0.06
 TRO1 |     -    47     -     -    67     -     -     -     -    40 |  288   8.11
 TSKB |     -    61    59     X    31     -     -     -     -    39 |  288 148.01
 TWTF |     -    75     -     -     -     -     -    37     -    29 |  288   0.54
 URUM |     -    49     -     -     -     -     -     -     -    46 |  288  15.07
 USNO |     -    28    18     -     -     -     -     -     -    24 |  288   0.05
 USUD |     -     -     -    62     -     -     -    31     -    26 |  288  11.21
 VILL |     -    29     -    78     -     -     -     -     -    26 |  288   6.95
 WHIT |     -    22     -     -     -     -     -     -     -    21 |  288   2.48
 WTZA |     -    15     -     -     -     -     -     -     -    14 |  286   0.36
 WTZR |     -    16     -    61     -     -     -     -     -    23 |  288   0.07
 WUHN |     -     -     -     -    52     -     -     -     -    61 |  285  14.62
 YELL |     -    32    52    34    19     -     -     -     -    21 |  288   0.06
 ZWEN |     -     -     -   109    34     -     -     -     -    24 |  288  14.56
 -----+-------------------------------------------------------------+--------------
 TOT  |  2956    45    51    87    37   225  2949    37  2682    43 |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 ALGO |   288     0     0   288    9.95   | 4.85e-14  1.06e-14  1.74e-15 |
 USNO |   288     0     0   288    9.32   | 4.73e-14  1.07e-14  3.57e-15 |
 BREW |   288     0     0   288    7.59   | 5.18e-14  1.06e-14  4.46e-15 |
 BRUS |   288     0     0   288    6.81   | 4.60e-14  7.60e-15  2.54e-15 |
 ONSA |   288     0     0   288    6.79   | 4.13e-14  8.38e-15  8.64e-15 |
 AMC2 |   288     0     0   288    6.01   | 4.29e-14  7.51e-15  2.37e-15 |
 GODE |   288     0     0   288    5.48   | 5.07e-14  1.13e-14  2.21e-15 |
 KOKB |   288     0     0   288    5.38   | 4.95e-14  9.70e-15  4.43e-15 |
 YELL |   288     0     0   288    5.23   | 3.29e-14  7.80e-15  3.08e-15 |
 NPLD |   287     0     0   286    4.41   | 4.64e-14  9.12e-15  3.14e-15 |
 NRC1 |   288     0     0   288    4.31   | 4.63e-14  1.51e-14  2.63e-15 |
 OPMT |   287     0     0   136    4.26   | 4.71e-14  8.81e-15  3.92e-15 |
 GOL2 |   286     2     0   283    3.17   | 5.32e-14  1.16e-14  2.88e-15 |
 WTZR |   288     0     0   288    2.94   | 4.92e-14  2.63e-14  7.57e-15 |
 NYA1 |   288     0     0   288    2.57   | 2.86e-14  8.18e-15  5.21e-15 |
 STJO |   288     0     0   288    2.48   | 5.25e-14  9.24e-15  7.14e-15 |
 NLIB |   288     0     0   288    2.32   | 3.65e-14  8.15e-15  2.73e-15 |
 NYAL |   288     0     0   143    2.01   | 4.20e-14  1.12e-14  7.47e-15 |
 TIDB |   288     0     0   288    1.95   | 1.52e-13  1.61e-14  5.25e-15 |
 ALBH |   288     0     0   288    1.76   | 5.88e-14  1.43e-14  1.94e-14 |
 SPT0 |   205     0     0    61    1.43   | 4.78e-14  6.67e-15         - |
 FAIR |   288     0     0   288    0.92   | 6.17e-14  1.25e-14  7.56e-15 |
 DRAO |   288     0     0   288    0.87   | 9.15e-14  2.26e-14  7.92e-15 |
 IRKT |   288     0     0   143    0.52   | 6.00e-14  1.87e-14  1.04e-14 |
 PIE1 |   216     0     0    70    0.37   | 5.58e-14  7.89e-15         - |
 PTBB |   288     0     0   288    0.17   | 3.12e-13  6.62e-14  2.14e-14 |
 G26  |   288     0     0   288    0.13   | 3.36e-13  1.05e-13  3.27e-14 |
 KGN0 |   287     0     0   286    0.10   | 3.90e-13  1.12e-13  3.23e-14 |
 G07  |   288     0     0   288    0.08   | 2.67e-13  8.87e-14  7.33e-14 |
 TWTF |   288     0     0   288    0.07   | 4.38e-13  9.85e-14  6.11e-14 |
 G30  |   288     0     0   288    0.06   | 3.49e-13  9.44e-14  7.95e-14 |
 WTZA |   286     0     0   285    0.06   | 4.29e-13  1.02e-13  2.86e-14 |
 G29  |   288     0     0   288    0.05   | 4.18e-13  1.39e-13  4.29e-14 |
 G27  |   288     0     0   288    0.05   | 3.48e-13  1.03e-13  1.01e-13 |
 BOR1 |   288     0     0   288    0.04   | 4.51e-13  1.42e-13  9.37e-14 |
 IENG |   288     0     0   288    0.04   | 6.75e-13  1.66e-13  6.00e-14 |
 G06  |   288     0     0   288    0.04   | 3.92e-13  1.23e-13  9.41e-14 |
 MIZU |   288     0     0   143    0.04   | 3.69e-13  1.14e-13  4.13e-14 |
 SFER |   284     0     0   136    0.03   | 3.91e-13  1.20e-13  3.91e-14 |
 DWH1 |   288     0     0   288    0.03   | 4.59e-13  1.36e-13  5.83e-14 |
 G17  |   276     0     0   274    0.02   | 4.84e-13  1.66e-13  7.46e-14 |
 G04  |   276     0     0   274    0.02   | 4.84e-13  1.43e-13  9.96e-14 |
 G22  |   288     0     0   215    0.02   | 5.90e-13  1.33e-13  1.61e-13 |
 TSKB |   288     1     0   287    0.02   | 1.00e-12  2.58e-13  1.16e-13 |
 G25  |   288     0     0   288    0.01   | 1.28e-12  3.31e-13  1.79e-13 |
 G05  |   288     0     0   288    0.01   | 1.29e-12  3.66e-13  2.19e-13 |
 G31  |   288     0     0   288    0.01   | 2.74e-13  2.14e-13  8.96e-14 |
 KERG |   276     0     0   276    0.01   | 1.16e-12  4.30e-13  1.41e-13 |
 G10  |   288     0     0   288    0.01   | 1.31e-12  3.69e-13  1.80e-13 |
 KOUR |   288     0     0   288    0.01   | 1.49e-12  4.63e-13  2.11e-13 |
 G08  |   288     0     0   288    0.00   | 1.36e-12  3.85e-13  3.01e-13 |
 G03  |   288     0     0   288    0.00   | 1.31e-12  4.53e-13  2.18e-13 |
 G09  |   288     0     0   288    0.00   | 1.29e-12  4.50e-13  2.06e-13 |
 MAS1 |   288     0     0   288    0.00   | 1.87e-12  4.72e-13  1.44e-13 |
 PRDS |   288     0     0   143    0.00   | 1.57e-12  4.34e-13  1.18e-13 |
 GPST |   288     0     0     0    0.00   | 3.68e-14  6.37e-15  1.57e-15 |
 BOGT |   101     0     0     0    0.00   |        -         -         - |
 CAGZ |   110     0     3     0    0.00   | 1.12e-12  1.01e-13         - |
 QAQ1 |   272     2     0     0    0.00   |        -         -         - |
 HOFN |   279     0     0     0    0.00   |        -         -         - |
 WUHN |   285     0     0     0    0.00   |        -         -         - |
 PETP |   285     0     0     0    0.00   |        -         -         - |
 MONP |   287     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 MDO1 |   287     0     0     0    0.00   |        -         -         - |
 MCM4 |   285     0     0     0    0.00   | 6.53e-13  2.61e-13  4.44e-13 |
 MATE |    99     0     0     0    0.00   |        -         -         - |
 MAG0 |   286     0     0     0    0.00   |        -         -         - |
 LAE1 |   287     0     0     0    0.00   |        -         -         - |
 HERS |   241     0     0     0    0.00   |        -         -         - |
 HARB |   277     0     0     0    0.00   |        -         -         - |
 CHAT |   275     0     0     0    0.00   |        -         -         - |
 BILI |   286     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 6.71e-13  7.45e-14  2.46e-14 |
 G24  |   288     0     0     0    0.00   | 1.38e-12  4.03e-13  2.86e-13 |
 G21  |   288     0     6     0    0.00   | 1.17e-12  1.40e-13  2.76e-14 |
 G20  |   288     0     4     0    0.00   | 5.79e-13  6.88e-14  2.45e-14 |
 G19  |   288     0     4     0    0.00   | 6.84e-13  6.49e-14  1.78e-14 |
 G18  |   288     0     6     0    0.00   | 1.39e-12  1.19e-13  5.81e-14 |
 G16  |   288     0     3     0    0.00   | 4.45e-13  4.97e-14  3.35e-14 |
 G15  |   288     0     0     0    0.00   | 1.59e-12  5.57e-13  2.65e-13 |
 G14  |   288     0     6     0    0.00   | 5.83e-13  6.35e-14  1.71e-14 |
 G13  |   288     0     6     0    0.00   | 5.24e-13  5.98e-14  2.30e-14 |
 G11  |   288     0     6     0    0.00   | 6.38e-13  6.35e-14  3.50e-14 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 5.10e-13  3.24e-13  2.88e-13 |
 VILL |   288     0     0     0    0.00   | 1.14e-12  1.24e-12  4.75e-13 |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 3.61e-13  2.20e-13  1.12e-12 |
 SUTM |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   288     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 REUN |   286     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 POTS |   287     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.92e-12  5.01e-13  2.07e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     2     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     2     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MEDI |   288     0     0     0    0.00   |        -         -         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     1     0     0    0.00   |        -         -         - |
 LHAS |   284     0     0     0    0.00   |        -         -         - |
 KUNM |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     0     0    0.00   |        -         -         - |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 5.47e-13  2.06e-13  4.08e-13 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 INVK |   288     1     0     0    0.00   |        -         -         - |
 HRAO |   288     0     0     0    0.00   | 1.17e-13  2.61e-14  2.14e-14 |
 HLFX |   286     0     0     0    0.00   | 1.85e-13  2.62e-13  6.21e-13 |
 GUAT |   287     0     0     0    0.00   |        -         -         - |
 GOLD |   288     1     0     0    0.00   |        -         -         - |
 FLIN |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   276     0     0     0    0.00   |        -         -         - |
 BRMU |   273     0     0     0    0.00   |        -         -         - |
 ASPA |   284     0     0     0    0.00   |        -         -         - |
 ASC1 |   286     1     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   286     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 1.46e-17  1.76e-16  1.05e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      SPT0      ALGO |
------------------------------------------+------------------------------+
