
 GPS week: 1269   Day: 3   MJD: 53130                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2561     82    -0.08     0.02     3.39     0.00
 cod |   288     0  23929    107    -0.23    -0.04     0.05    21.36
 emr |   288     0  24492    549  3550.61    26.05     0.05    23.24
 gfz |   288     0  19453    308    -0.43     0.31     0.06    17.84
 iga |    96     0   2535     11  4136.00 -4881.79     0.11     0.00
 igu |    96     0   2561      2  6677.72 -5619.47  2460.93     0.00
 jpl |   288     0  17185    538    -4.48    -0.78     0.06    17.47
 ngs |    96     0   2561     65  2920.40 -3231.10     3.45     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  32944   1781   -57.52    12.58     0.05    20.09

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -5137    50   -68   -39   -92******   128 -3850     -     X |
    3 |  1123    20  -140   135   -62******    90   386     -   -16 |
    4 | -3029    -2  -145   185   -15******    60 -2834     -   -18 |
    5 | -1322   -46   -44   116     8******    86 -1018     -   -47 |
    6 | -4810    32  -100   179  -130******    51 -4355     -   -97 |
    7 | -5129     9   -48   111    32******   156 -4887     -  -119 |
    8 |     X   -35  -117   171    86******    64 -8250     -    55 |
    9 |  3826    59     6    10  -169******   147  3906     -  -142 |
   10 |  -186     4     2   -28   -82******   107 -1095     -   -23 |
   11 |  5459    70   -73   -12   -51******    49  5613     -     0 |
   13 |  3127    68   -63    31  -149******    51  3281     -   -51 |
   14 |  5709   138   -18  -141   -17******   179  5321     -   -83 |
   15 | -3043   -14   -65   116   141******   109 -3438     -   -57 |
   16 |  3556    89   -25   -42     7******     X  3290     -   -29 |
   17 | -4687    49   -36    78   -11******    51 -4417     -  -105 |
   18 |  2760    93   -23     1   -46******    73  2919     -  -104 |
   19 |  4975   -81     X   225  1666******     X  4900     -  -114 |
   20 |  3795  -131   -98    77    74******   218  3729     -    97 |
   21 |   546    27     6   -77   106******    52   749     -    11 |
   22 | -2320   134   -61   -64   -50******    20 -2126     -   -23 |
   24 | -3198   -21    -4    52  -111******    62 -2324     -   -48 |
   25 |  -355    40   -53    65  -181******    38   -62     -   -54 |
   26 | -1097    -9   -33    95  -215******    67 -1338     -   -65 |
   27 |  -644    -2  -130   158  -197******   106  -922     -   -33 |
   28 |  5461   138    -1  -196    13******    75  5267     -    -5 |
   29 | -3462     4    88   -86  -221******    45 -3263     -   -50 |
   30 | -2362    38   -96   232  -134******    27 -2607     -  -145 |
 -----+-------------------------------------------------------------+
 ALBH |     -     -   -33     -     -     -   102     -     -   -50 |
 ALGO |     -   -13   -17     -     -     -    79     -     -   -36 |
 AMC2 |     -   -83    41     -     -     -   -99     -     -   127 |
 ARTU |     -     -     -    50     -     -   -51     -     -     - |
 ASC1 |     -   -56     -   -54     -     -     -     -     -   108 |
 ASPA |     -     -     -   160     -     -     -     -     -  -142 |
 AUCK |     -   -17     -     -     -     -     -     -     -    18 |
 BAHR |     -   -91   191   -60     -     -     0     -     -   -72 |
 BILI |     -     1     -     4     -     -    -5     -     -     - |
 BOGT |     -    18     -    82     -     -     9     -     -   -99 |
 BOR1 |     -   168  -183     -     -     -     -     -     -    34 |
 BREW |     -     -     8     -     -     -     -     -     -    -9 |
 BRMU |     -     -     -   -40     -     -     -     -     -    35 |
 BRUS |     -    65   -66     -     -     -     1     -     -     6 |
 CAS1 |     -    92     -   -96     -     -    40     -     -   -48 |
 CEDU |     -   -72     -     -     -     -    68     -     -    18 |
 CHAT |     -  -106     -    30     -     -     -     -     -    87 |
 CHUR |     -     -   147     -     -     -     -     -     -  -170 |
 COCO |     -     -     -    76     -     -     -     -     -   -68 |
 CRO1 |     -   121    -8  -117     -     -    -5     -     -    -8 |
 DAKA |     -    53     -   -64     -     -     -     -     -     - |
 DARW |     -   -57    76     -     -     -   -31     -     -     - |
 DAV1 |     -    -1     -  -121     -     -   101     -     -    21 |
 DRAO |     -     -   -21     -     -     -   160     -     -  -115 |
 DWH1 |     -     -    93     -     -     -  -232     -     -    94 |
 FAIR |     -     -    11  -113     -     -   100     -     -     X |
 GMAS |     -     -   158     -     -     -  -211     -     -     X |
 GODE |     -   -80    65     -     -     -     -     -     -     9 |
 GOL2 |     -     -    -5     -     -     -     -     -     -     6 |
 GOLD |     -   -29     -     -     -     -    58     -     -   -20 |
 GUAM |     -     -     -   101     -     -  -103     -     -     X |
 GUAT |     -     -     -   -43     -     -     -     -     -    38 |
 HERS |     -     -  -257     -     -     -     -     -     -   297 |
 HOB2 |     -    50    -6     -     -     -     -     -     -   -46 |
 HOFN |     -     -     -   -76     -     -    77     -     -     - |
 HRAO |     -     -     -     -     -     -   -79     -     -    69 |
 IENG |     -   -39    36     -     -     -     -     -     -     - |
 IISC |     -   -77     -   -22     -     -     -     -     -   101 |
 ISPA |     -    38     -    12     -     -   -58     -     -     - |
 JPLM |     -     -    -5     -     -     -     -     -     -     6 |
 KERG |     -    52    32  -100     -     -     -     -     -    -3 |
 KGN0 |     -  -102    76     -     -     -     -     -     -    20 |
 KIRU |     -     -     -     -     -     -   -22     -     -    19 |
 KIT3 |     -    24     -   -28     -     -     -     -     -     X |
 KOKB |     -   -20     -     -     -     -     -     -     -    21 |
 KUNM |     -     -     -     -     -     -    53     -     -   -46 |
 LHAS |     -     -     -     -     -     -   -49     -     -    43 |
 LPGS |     -  -112   226     -     -     -  -170     -     -    -9 |
 MAC1 |     -   -32     -  -137     -     -   136     -     -    38 |
 MAG0 |     -   -63     -     -     -     -    77     -     -     - |
 MAS1 |     -     2     5   -13     -     -     -     -     -     4 |
 MDO1 |     -    68   -99   -55     -     -     -     -     -   101 |
 METS |     -   -99   -65     -     -     -     -     -     -   180 |
 MIZU |     -     -     -     -     -     -   -61     -     -    53 |
 MKEA |     -    -6     -     -     -     -   -51     -     -    51 |
 NLIB |     -     -   -10     -     -     -   130     -     -  -101 |
 NNOR |     -     -   162     -     -     -  -146     -     -   -61 |
 NRC1 |     -   -61   -63    79     -     -   -67     -     -   126 |
 NRIL |     -     -     -   -33     -     -    34     -     -     - |
 NSSP |     -   -71     -     -     -     -   -54     -     -   122 |
 NYA1 |     -    98     -   -77     -     -     -     -     -   -35 |
 NYAL |     -     -     4     -     -     -     -     -     -    -5 |
 PDEL |     -     -     -   -95     -     -    97     -     -     - |
 PERT |     -   -14   -30   106     -     -     -     -     -   -44 |
 PIE1 |     -    96    40     -     -     -    42     -     -  -184 |
 POTS |     -   -26     -     8     -     -     -     -     -    21 |
 PRDS |     -     -    37     -     -     -     -     -     -   -43 |
 PTBB |     -    44   -41     -     -     -     -     -     -     - |
 QAQ1 |     -     -   -34     -     -     -     -     -     -    39 |
 RIOG |     -    -9    77   -85     -     -     -     -     -    -4 |
 SANT |     -   109     -     X     -     -     -     -     -  -115 |
 SCH2 |     -     -     6     -     -     -     -     -     -    -7 |
 SELE |     -     -     -     -     -     -  -102     -     -    89 |
 SFER |     -   -84   -80     -     -     -     -     -     -   181 |
 SPT0 |     -  -162   -35     -     -     -     -     -     -   213 |
 STJO |     -     -     2     -     -     -  -101     -     -    86 |
 STR1 |     -     -   -11     -     -     -     -     -     -    13 |
 SUTH |     -   -10     -     -     -     -     -     -     -    11 |
 SUTM |     -     -     2   138     -     -  -143     -     -     - |
 SUWN |     -     -   -24     -     -     -     -     -     -    28 |
 THTI |     -     -   205  -168     -     -     -     -     -   -89 |
 THU3 |     -     0   -11   -70     -     -     -     -     -    75 |
 TID1 |     -     -     -     -     -     -    -7     -     -     6 |
 TIDB |     -     -   -14     -     -     -     -     -     -    16 |
 TIXI |     -   -17     -     -     -     -    20     -     -     - |
 TOW2 |     -    -7     -   -27     -     -    37     -     -     - |
 TRO1 |     -     -     X  -192     -     -     -     -     -   171 |
 TSKB |     -   -97    31    67     -     -     -     -     -     8 |
 TWTF |     -   -82   120     -     -     -   -56     -     -    -3 |
 UNSA |     -     -     -   121     -     -  -124     -     -     X |
 USN1 |     -    59   201     -     -     -  -443     -     -    90 |
 USNO |     -   -48    65     -     -     -     -     -     -   -25 |
 USUD |     -     -    38     -     -     -     -     -     -   -44 |
 VILL |     -   -56     -     -     -     -     -     -     -    59 |
 WES2 |     -     -   -27     -     -     -     -     -     -    31 |
 WHIT |     -    76     -     -     -     -     -     -     -   -81 |
 WSRT |     -   108   -27     -     -     -     -     -     -   -83 |
 WTZR |     -   -73    31     -     -     -     -     -     -    41 |
 WUHN |     -     -   154  -119     -     -     -     -     -   -73 |
 YAR2 |     -   -79   113     -     -     -     -     -     -   -47 |
 YEBE |     -     -   -64     -     -     -     -     -     -    75 |
 YELL |     -     -    45    12     -     -     -     -     -   -62 |
 ZWEN |     -     -     -  -332     -     -     X     -     -   295 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  7635    62    58    29    51******    27  8325     -     X |  288   5.65
    3 |  5542   187    99    78   236******    60  5208     -    81 |  278   2.39
    4 |   888    22    47    33    53******    55   922     -    42 |  288   0.60
    5 |  3445    36    54    14    93******    31  3065     -    35 |  288   2.25
    6 |  2237   150    66    44   141******    49  2296     -    81 |  277   0.79
    7 |  1229   135    45    35   147******    85  1339     -    63 |  276   0.65
    8 |     X   113   106    91   284921795    69  1578     -   131 |  235    >>>
    9 |  2307    43    35    40    49******    48  2232     -    33 |  288   2.23
   10 |  7203    39   133    34   122******    54  7169     -   138 |  288   2.86
   11 |  1044    51    30    52    81******    29  1003     -    79 |  288   0.31
   13 |   580    52    44    28    68******    59   745     -    98 |  288   0.27
   14 |  2036    65    83    70    62******    85  2300     -   134 |  288   0.32
   15 |  5382    78    40    40    86******    52  5759     -   105 |  288   4.34
   16 |  2229    61    80    31    60******     X  2286     -    40 |  288   0.31
   17 |   901    58    51    54    84******    21   955     -    58 |  287   0.64
   18 |   731    42    34    27    61******    25   842     -    39 |  288   0.34
   19 |  1131    43     X    75   186******     X  1224     -   105 |  282   0.41
   20 |  1608    37    21    32   102******    32  1815     -    41 |  288   0.34
   21 |   728    35    35    43    77******    25   877     -    53 |  288   0.25
   22 |   959    48   112    33    80******    35   888     -   142 |  288   0.42
   24 |  7651    36    27    23    66******    23  7772     -    52 |  288   3.81
   25 |  3878    32    33    23    28******    32  3690     -    41 |  288   1.91
   26 |  1590    50    32    33    82******    50  1682     -    21 |  288   0.47
   27 |  2216    53    38    31    66******    46  2282     -    39 |  288   0.41
   28 |  1951    43    55    28    75******    34  1865     -    73 |  288   0.29
   29 |   743    53    29    45   113******    41   645     -    32 |  288   0.40
   30 |  2415    23    48    53    48******    67  2145     -    54 |  288   1.16
 -----+-------------------------------------------------------------+--------------
 ALBH |     -     -    31     -     -     -    16     -     -    38 |  288   0.07
 ALGO |     -    19    20     -     -     -    38     -     -    24 |  288   0.02
 AMC2 |     -    20    22     -     -     -    43     -     -    21 |  288   0.02
 ARTU |     -     -     -    28     -     -    29     -     -     - |  266  11.93
 ASC1 |     -    26     -    21     -     -     -     -     -    27 |  288    >>>
 ASPA |     -     -     -   170     -     -     -     -     -   151 |  279    >>>
 AUCK |     -    44     -     -     -     -     -     -     -    47 |  264  13.93
 BAHR |     -    26    33    45     -     -    50     -     -    22 |  288   0.61
 BILI |     -    41     -    23     -     -    38     -     -     - |  286  10.23
 BOGT |     -    40     -    28     -     -    26     -     -    46 |  288  13.87
 BOR1 |     -    29    19     -     -     -     -     -     -    26 |  288   0.40
 BREW |     -     -    30     -     -     -     -     -     -    34 |  288   0.03
 BRMU |     -     -     -    63     -     -     -     -     -    56 |  264    >>>
 BRUS |     -    34    27     -     -     -    29     -     -    31 |  288   0.02
 CAS1 |     -    52     -    19     -     -    48     -     -    25 |  288   8.24
 CEDU |     -    33     -     -     -     -    73     -     -    41 |  288  11.09
 CHAT |     -    41     -    46     -     -     -     -     -    15 |  287  13.62
 CHUR |     -     -    42     -     -     -     -     -     -    49 |  272   7.86
 COCO |     -     -     -    17     -     -     -     -     -    15 |  288   8.82
 CRO1 |     -    19    77   174     -     -    77     -     -    23 |  278  20.01
 DAKA |     -    14     -    16     -     -     -     -     -     - |  264  19.06
 DARW |     -    39    27     -     -     -    28     -     -     - |  288   4.06
 DAV1 |     -    25     -    18     -     -    59     -     -    59 |  284  14.70
 DRAO |     -     -    11     -     -     -    32     -     -    29 |  288   0.07
 DWH1 |     -     -    30     -     -     -    47     -     -    48 |  287   0.60
 FAIR |     -     -   122    76     -     -   182     -     -     X |  288   0.19
 GMAS |     -     -    14     -     -     -    18     -     -     X |  288   1.02
 GODE |     -    26    29     -     -     -     -     -     -    24 |  288   0.31
 GOL2 |     -     -   144     -     -     -     -     -     -   166 |  282 126.79
 GOLD |     -    37     -     -     -     -    63     -     -    22 |  288  16.21
 GUAM |     -     -     -   186     -     -   190     -     -     X |  286  11.88
 GUAT |     -     -     -    23     -     -     -     -     -    20 |  288    >>>
 HERS |     -     -    27     -     -     -     -     -     -    32 |  241  15.92
 HOB2 |     -    68    49     -     -     -     -     -     -    35 |  288   0.08
 HOFN |     -     -     -    21     -     -    21     -     -     - |  288    >>>
 HRAO |     -     -     -     -     -     -    31     -     -    27 |  288   0.85
 IENG |     -    34    31     -     -     -     -     -     -     - |  288   0.59
 IISC |     -    34     -    27     -     -     -     -     -    47 |  288  23.31
 ISPA |     -    21     -    23     -     -    21     -     -     - |  288  17.99
 JPLM |     -     -    39     -     -     -     -     -     -    45 |  288   4.94
 KERG |     -    36    45    32     -     -     -     -     -    25 |  288   2.00
 KGN0 |     -    95    53     -     -     -     -     -     -    45 |  287   0.32
 KIRU |     -     -     -     -     -     -    28     -     -    24 |  227    >>>
 KIT3 |     -    22     -    26     -     -     -     -     -     X |  286  19.77
 KOKB |     -    78     -     -     -     -     -     -     -    83 |  287   0.07
 KUNM |     -     -     -     -     -     -    13     -     -    11 |  288  38.07
 LHAS |     -     -     -     -     -     -    21     -     -    18 |  288   9.56
 LPGS |     -    60    70     -     -     -    49     -     -    29 |  288 226.83
 MAC1 |     -    75     -    24     -     -    79     -     -    23 |  288  13.96
 MAG0 |     -    35     -     -     -     -    42     -     -     - |  287  10.47
 MAS1 |     -    21    22    15     -     -     -     -     -    25 |  288   2.04
 MDO1 |     -    61    19    63     -     -     -     -     -    28 |  288  17.82
 METS |     -    22    19     -     -     -     -     -     -    29 |  287  10.32
 MIZU |     -     -     -     -     -     -    72     -     -    62 |  273   0.51
 MKEA |     -    72     -     -     -     -    55     -     -    34 |  288  24.73
 NLIB |     -     -    26     -     -     -    46     -     -    36 |  288   0.03
 NNOR |     -     -    25     -     -     -    60     -     -    37 |  288  12.78
 NRC1 |     -    21    24    19     -     -    33     -     -    20 |  288   0.03
 NRIL |     -     -     -   157     -     -   161     -     -     - |  286  10.95
 NSSP |     -    43     -     -     -     -    42     -     -    14 |  288  14.95
 NYA1 |     -    17     -    21     -     -     -     -     -    22 |  288   0.07
 NYAL |     -     -    23     -     -     -     -     -     -    27 |  288   0.06
 PDEL |     -     -     -    21     -     -    22     -     -     - |  288  52.07
 PERT |     -    53    28    26     -     -     -     -     -    53 |  273   4.56
 PIE1 |     -    43    31     -     -     -    40     -     -    29 |  288   0.03
 POTS |     -    29     -    26     -     -     -     -     -    26 |  288  25.68
 PRDS |     -     -    26     -     -     -     -     -     -    31 |  288   2.02
 PTBB |     -    34    31     -     -     -     -     -     -     - |  288   0.28
 QAQ1 |     -     -    13     -     -     -     -     -     -    14 |  288   8.44
 RIOG |     -    78    66    49     -     -     -     -     -    86 |  287  12.53
 SANT |     -    18     -     X     -     -     -     -     -    19 |  271   7.06
 SCH2 |     -     -    15     -     -     -     -     -     -    17 |  288  95.51
 SELE |     -     -     -     -     -     -    25     -     -    22 |  288  45.32
 SFER |     -    35    39     -     -     -     -     -     -    25 |  284   0.64
 SPT0 |     -    33    24     -     -     -     -     -     -    35 |  288   0.05
 STJO |     -     -    16     -     -     -    39     -     -    32 |  288   0.05
 STR1 |     -     -    41     -     -     -     -     -     -    47 |  288   0.90
 SUTH |     -    21     -     -     -     -     -     -     -    23 |  288  14.71
 SUTM |     -     -    40    22     -     -    45     -     -     - |  288   3.26
 SUWN |     -     -    22     -     -     -     -     -     -    26 |  288   1.02
 THTI |     -     -    30    28     -     -     -     -     -    33 |  288   2.22
 THU3 |     -    13    18    14     -     -     -     -     -    22 |  288   8.57
 TID1 |     -     -     -     -     -     -    56     -     -    49 |  285   0.06
 TIDB |     -     -    40     -     -     -     -     -     -    46 |  288   0.08
 TIXI |     -    25     -     -     -     -    30     -     -     - |  286  10.18
 TOW2 |     -    51     -    26     -     -    49     -     -     - |  288  10.81
 TRO1 |     -     -     X   152     -     -     -     -     -   135 |  257   8.57
 TSKB |     -    60    31    31     -     -     -     -     -    36 |  288   1.26
 TWTF |     -    78    45     -     -     -    26     -     -    72 |  288   0.29
 UNSA |     -     -     -    87     -     -    89     -     -     X |  276  19.96
 USN1 |     -    27    35     -     -     -    55     -     -    29 |  288   0.03
 USNO |     -    23    20     -     -     -     -     -     -    30 |  288   0.03
 USUD |     -     -    17     -     -     -     -     -     -    20 |  288  11.53
 VILL |     -    25     -     -     -     -     -     -     -    27 |  288   4.20
 WES2 |     -     -    25     -     -     -     -     -     -    29 |  288   0.15
 WHIT |     -    26     -     -     -     -     -     -     -    27 |  288   2.79
 WSRT |     -    28    16     -     -     -     -     -     -    26 |  288   0.01
 WTZR |     -    28    28     -     -     -     -     -     -    37 |  288   0.06
 WUHN |     -     -    30    29     -     -     -     -     -    22 |  287  18.16
 YAR2 |     -    15    27     -     -     -     -     -     -    30 |  288   8.45
 YEBE |     -     -    26     -     -     -     -     -     -    30 |  288   0.12
 YELL |     -     -    18    24     -     -     -     -     -    32 |  288   0.06
 ZWEN |     -     -     -    70     -     -     X     -     -    63 |  242  13.48
 -----+-------------------------------------------------------------+--------------
 TOT  |  3387    52    48    59   106******    60  3450     -    54 |


 BEST CLOCK FIT: WSRT   288   0.01 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 WSRT |   288     0     0   288    9.94   | 2.68e-14  6.12e-15  1.30e-15 |
 BRUS |   288     0     0   288    9.94   | 4.01e-14  7.59e-15  1.88e-15 |
 BREW |   288     0     0   288    9.94   | 3.89e-14  6.79e-15  2.59e-15 |
 AMC2 |   288     0     0   288    8.40   | 3.57e-14  6.19e-15  1.18e-15 |
 ALBH |   288     0     0   288    6.34   | 3.96e-14  8.13e-15  4.35e-15 |
 USNO |   288     0     0   288    6.15   | 4.40e-14  1.22e-14  2.44e-15 |
 PIE1 |   288     0     0   288    5.95   | 3.67e-14  7.51e-15  1.42e-15 |
 USN1 |   288     0     0   288    5.45   | 7.52e-14  1.35e-14  3.01e-15 |
 YELL |   288     0     0   288    4.84   | 3.89e-14  5.68e-15  3.93e-15 |
 NLIB |   288     0     0   288    3.51   | 4.42e-14  1.04e-14  2.48e-15 |
 ALGO |   288     0     0   288    3.37   | 3.28e-14  7.76e-15  2.69e-15 |
 NRC1 |   288     0     0   288    2.82   | 2.91e-14  7.64e-15  2.14e-15 |
 NYA1 |   288     0     0   288    2.72   | 2.78e-14  7.69e-15  8.99e-15 |
 WTZR |   288     0     0   288    2.59   | 3.47e-14  2.18e-14  5.60e-15 |
 SPT0 |   288     0     0   288    2.57   | 5.32e-14  1.50e-14  3.36e-15 |
 KOKB |   287     0     0   286    2.57   | 7.12e-14  1.52e-14  6.28e-15 |
 NYAL |   288     0     0   288    2.44   | 4.06e-14  1.09e-14  8.33e-15 |
 DRAO |   288     0     0   288    1.89   | 7.48e-14  1.76e-14  5.07e-15 |
 WES2 |   288     0     0   288    1.76   | 3.80e-14  1.07e-14  1.45e-14 |
 GOL2 |   282     1     0   278    1.43   | 1.37e-13  3.43e-14  1.54e-14 |
 FAIR |   288     0     0   288    1.04   | 6.87e-14  2.66e-14  2.08e-14 |
 HOB2 |   288     0     0   288    0.90   | 5.58e-14  1.15e-14  7.27e-15 |
 YEBE |   288     0     0   275    0.86   | 1.96e-13  2.57e-14  8.98e-15 |
 GODE |   288     0     0   288    0.61   | 4.06e-14  1.40e-14  2.93e-14 |
 TIDB |   288     0     0   288    0.32   | 1.54e-13  1.34e-14  5.13e-15 |
 TID1 |   285     0     0   284    0.26   | 5.00e-14  8.09e-15  3.86e-15 |
 G22  |   288     0     4   117    0.10   | 5.90e-13  5.99e-14  3.70e-14 |
 G29  |   288     0     0   288    0.09   | 3.75e-13  1.34e-13  2.77e-14 |
 PTBB |   288     1     2   187    0.09   | 4.49e-13  8.65e-14  2.22e-14 |
 TWTF |   288     0     0   288    0.09   | 3.44e-13  8.76e-14  2.23e-14 |
 MIZU |   273     0     0   271    0.08   | 3.13e-13  9.58e-14  3.83e-14 |
 KGN0 |   287     0     0   286    0.08   | 3.22e-13  1.03e-13  2.06e-14 |
 G17  |   287     0     0   286    0.07   | 4.44e-13  1.08e-13  6.92e-14 |
 G04  |   288     0     0   288    0.07   | 4.65e-13  1.41e-13  5.63e-14 |
 G19  |   282     0     0   162    0.07   | 6.09e-13  7.00e-14  2.63e-14 |
 G26  |   288     0     0   288    0.07   | 3.46e-13  9.90e-14  4.46e-14 |
 G27  |   288     0     0   288    0.07   | 3.38e-13  1.12e-13  3.60e-14 |
 G07  |   276     0     0   274    0.06   | 2.93e-13  8.85e-14  7.49e-14 |
 BOR1 |   288     0     0   288    0.06   | 4.41e-13  1.29e-13  4.30e-14 |
 IENG |   288     0     0   288    0.06   | 4.79e-13  1.49e-13  7.60e-14 |
 G30  |   288     0     0   288    0.05   | 3.28e-13  1.03e-13  7.02e-14 |
 SFER |   284     0     0   280    0.04   | 4.06e-13  1.17e-13  6.10e-14 |
 G06  |   277     0     0   275    0.04   | 4.04e-13  1.41e-13  9.40e-14 |
 BAHR |   288     0     0   288    0.03   | 4.08e-13  1.26e-13  4.58e-14 |
 DWH1 |   287     0     0   141    0.03   | 4.62e-13  1.51e-13  5.18e-14 |
 HRAO |   288     0     0   288    0.02   | 1.21e-13  4.26e-14  8.39e-14 |
 STR1 |   288     0     0   288    0.02   | 7.40e-13  1.88e-13  1.08e-13 |
 TSKB |   288     0     0   288    0.01   | 9.09e-13  2.60e-13  1.26e-13 |
 GMAS |   288     0     0   288    0.01   | 8.63e-13  3.98e-13  8.40e-14 |
 G25  |   288     0     0   288    0.01   | 1.32e-12  4.42e-13  1.51e-13 |
 KERG |   288     0     0   288    0.01   | 1.41e-12  3.82e-13  2.36e-13 |
 SUWN |   288     0     0   143    0.01   | 9.96e-13  2.94e-13  9.92e-14 |
 G09  |   288     0     0   288    0.01   | 1.30e-12  4.24e-13  2.73e-13 |
 G05  |   288     0     0   288    0.00   | 1.29e-12  3.28e-13  2.95e-13 |
 MAS1 |   288     0     0   288    0.00   | 1.70e-12  6.80e-13  1.93e-13 |
 PRDS |   288     0     0   288    0.00   | 1.47e-12  3.80e-13  1.51e-13 |
 SUTM |   288     0     0   288    0.00   | 6.80e-13  1.83e-13  1.89e-13 |
 G13  |   288     0     3     1    0.00   | 4.91e-13  5.93e-14  2.81e-14 |
 WHIT |   288     0     1   145    0.00   | 5.30e-13  1.56e-13  1.67e-13 |
 GPST |   288     0     0     0    0.00   | 2.00e-14  3.73e-15  1.06e-15 |
 BRMU |   264     0     0     0    0.00   |        -         -         - |
 PERT |   273     0     0     0    0.00   | 1.91e-12  5.16e-13  4.89e-13 |
 WUHN |   287     1     0     0    0.00   |        -         -         - |
 TIXI |   286     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 MAG0 |   287     0     0     0    0.00   |        -         -         - |
 HERS |   241     0     0     0    0.00   |        -         -         - |
 DAKA |   264     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BILI |   286     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     3     0    0.00   | 6.00e-13  6.86e-14  2.94e-14 |
 G24  |   288     0     0     0    0.00   | 1.17e-12  3.88e-13  4.80e-13 |
 G21  |   288     0     6     0    0.00   | 9.27e-13  1.16e-13  1.98e-14 |
 G20  |   288     0     6     0    0.00   | 6.79e-13  7.18e-14  2.46e-14 |
 G18  |   288     3     6     0    0.00   | 1.19e-12  1.64e-13  3.49e-14 |
 G16  |   288     0     4     0    0.00   | 5.35e-13  5.71e-14  3.87e-14 |
 G15  |   288     0     0     0    0.00   | 1.46e-12  5.02e-13  4.90e-13 |
 G14  |   288     0     4     0    0.00   | 5.78e-13  6.29e-14  3.49e-14 |
 G11  |   288     0     6     0    0.00   | 6.78e-13  6.24e-14  4.16e-14 |
 G10  |   288     0     0     0    0.00   | 1.24e-12  4.41e-13  3.30e-13 |
 G08  |   235     0     0     0    0.00   | 5.38e-13  4.84e-13         - |
 G03  |   278     0     0     0    0.00   | 1.32e-12  5.54e-13  1.69e-13 |
 G01  |   288     0     0     0    0.00   | 1.59e-12  7.29e-13  5.54e-13 |
 ZWEN |   242     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 USUD |   288     1     0     0    0.00   |        -         -         - |
 UNSA |   276     0     0     0    0.00   |        -         -         - |
 TRO1 |   257     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 3.39e-13  2.08e-13  2.03e-13 |
 SUTH |   288     2     0     0    0.00   |        -         -         - |
 STJO |   288     0     0     0    0.00   | 4.34e-14  1.16e-14  4.05e-15 |
 SELE |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   271     0     0     0    0.00   | 1.84e-12  7.24e-13  6.32e-13 |
 RIOG |   287     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   286     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   | 7.47e-13  7.26e-13  1.22e-12 |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     2     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 KUNM |   288     0     0     0    0.00   |        -         -         - |
 KIT3 |   286     0     0     0    0.00   |        -         -         - |
 KIRU |   227     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 6.12e-13  2.43e-13  3.93e-13 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HOFN |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   286     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   284     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   | 2.46e-13  5.61e-13  3.87e-13 |
 CRO1 |   278     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   |        -         -         - |
 CHUR |   272     0     0     0    0.00   |        -         -         - |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   279     0     0     0    0.00   |        -         -         - |
 ASC1 |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   266     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 1.73e-17  2.07e-16  1.24e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     WSRT      YELL      AMC2 |
------------------------------------------+------------------------------+
