
 GPS week: 1196   Day: 0   MJD: 52616                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2586     92    -0.02     0.09     4.36     0.00
 cod |   288     0  22540     51     2.29     2.06     0.06    22.32
 emr |   288     0  20551    314  1630.87    19.49     0.08    15.78
 esa |   288     0  17550   3184     0.01    14.74     0.13     7.44
 gfz |   288     0  15426    756    -0.05    -0.60     0.08    15.08
 igu |    96     0   2395      0     0.56    12.70     3.56     0.00
 jpl |   288     0  13948    552     3.10     9.91     0.07    18.96
 ngs |    96     0   2586     77     1.03    -1.17     4.18     0.00
 usn |   288     0  29729    535   716.08   -47.18     0.06    20.42

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------+
    1 |  3709    13    51     -    81     -    18  3076  -120 |
    2 |  -188   -92    34   -21   310  1082   -12  -532  -141 |
    3 | -4231   -55   -96   -72   282  3571   286 -4108  -185 |
    4 | -7089   118   -47    70  -119 -2325   377 -6939  -211 |
    5 |  1399   172  -194   236    92 17753  -172   845  -110 |
    6 |  1700   222  -231  -195   183 14308   152  3263  -214 |
    7 |  1182   146   -26   303   -45 -2835  -361  1283   -61 |
    8 | -6780    43    72   278    10 -7655  -180 -7340  -122 |
    9 | -4080    52  -190   349    48   849    69 -3555  -104 |
   10 |  3803   234     2   126   230  4212  -530  3491  -218 |
   11 |  1302   -22    92   223   -91   710    70  1762   -89 |
   13 |  8134   -19    83   -78  -146  2449   491  8180  -132 |
   14 |  4431    37   151    91  -224  2100    97  4534   -78 |
   15 | -4958   139  -224     -   262   -93  -160 -5071  -101 |
   17 |  4807     -   -47     X   230 -2341  -112  4401   -78 |
   18 |  4302   100     1     X  -108   876   118  3967   -84 |
   20 |  3779   -60    36   245    -7  1576    98  3744   -94 |
   22 |   900   137   -85   254     X     -  -202  -266   -26 |
   23 |  -196   296  -153    36    37  2276   106   301  -294 |
   24 |  2267   236  -152   -10    48 -2764    74  2374  -206 |
   25 | -2923    16  -176   -98   238 -5131   364 -2997  -196 |
   26 | -1241   140  -188    98    23 -1213   447 -1221  -269 |
   27 |  1331    32    53    74    57-14253   166  1069  -215 |
   28 | -4574    74   188   -90  -165 -2955   -86 -4471   -34 |
   29 | -3596   139  -203     X    -3 -4526   314 -3328  -150 |
   30 | -1597   129  -173    24    -6 -2307   459 -2303  -217 |
   31 |  -636   -53    28   139    91 -3501   116  -277  -132 |
 -----+-------------------------------------------------------+
 ALBH |     -  -125  -120     -     -     -   -48     -   273 |
 ALGO |     -   -66   145     X     -     -  -150     -    98 |
 AMC2 |     -  -121    50     -     -     -  -205     -   286 |
 ARTU |     -   -43     -     -  -130     -   154     -     - |
 ASC1 |     -    -9     -   -63     -     -     -     -    24 |
 AUCK |     -     -     -   159     -     -     -     -   -58 |
 BAHR |     -    33    90   -21   -12     -    34     -  -120 |
 BILI |     -    84     -     -  -125     -     -     -     - |
 BJFS |     -     -   -14     -     X     -     -     -    11 |
 BOGT |     -    73     -     X     -     -     -     -   -80 |
 BOR1 |     -     -     0     -     -     -     -     -     0 |
 BRMU |     -   199     -  -143    74     -     -     -  -254 |
 BRUS |     -     -    -5     -     -     -     -     -     4 |
 CAS1 |     -    31     -     -   -23     -     -     -   -17 |
 CEDU |     -  -271     -  -160     -     -     -     -   353 |
 CHAT |     -   -94     -   124     -     -     -     -    58 |
 CHUR |     -    84    85     -     -     -     -     -  -156 |
 COCO |     -    20     -    71   220     -   -80     -  -136 |
 CRO1 |     -     -     8     -     -     -   -59     -    49 |
 DAEJ |     -     -   -26     -     -     -    21     -     X |
 DARW |     -    21     -     -     -     -   -25     -     - |
 DAVR |     -     -     -     -   -56     -    93     -   -46 |
 DRAO |     -    25    51     -     -     -     -     -   -67 |
 EISL |     -  -291     -     X     X     -   343     -     X |
 FAIR |     -    36    80   -30  -133     -   -91     -    93 |
 FORT |     -   656     -  -838    14     -    10     -  -318 |
 GODE |     -  -102    11   -49     -     -     -     -   122 |
 GOLD |     -  -358     -     -     -     -     6     -   321 |
 GRAZ |     -  -169   128  -205     -     -     -     -   146 |
 GUAT |     -   -61     -     -  -384     -    49     -   307 |
 HERS |     -     -  -391     -     -     -     -     -   302 |
 HOB2 |     -   105   -30   187     -     -  -179     -     8 |
 HOFN |     -     -     -     -   -11     -     9     -     - |
 HRAO |     -  -203     -     -     -     -  -298     -   498 |
 IISC |     -  -152     -   -33     -     -   117     -    55 |
 JPLM |     -     -   -38     -   -51     -     -     -    67 |
 KARR |     -   -88     -     -   130     -     -     -     - |
 KERG |     -   -34    96     -   123     -     -     -  -128 |
 KGN0 |     -     -   -67     -     -     -     -     -    52 |
 KIRU |     -  -312   140     -     -     -     -     -   237 |
 KIT3 |     -     -     -     -     -     -  -152     -   141 |
 KOKB |     -     5   148     -  -161     -     -     -     - |
 KOSG |     -  -219     -     -     -     -     -     -   239 |
 KOUR |     -  -136     -     X     -     -     9     -   135 |
 LAMA |     -  -203     -     -     -     -   239     -     - |
 MAS1 |     -     -    90  -211    53     -     -     -   -31 |
 MATE |     -   106     -  -247     -     -     -     -   -27 |
 MCM4 |     -   230     -     -     -     -     X     -  -251 |
 MDO1 |     -   -65   -66     -     -     -     -     -   122 |
 MEDI |     -     -   -95     -     -     -     -     -    73 |
 METS |     -  -222   137     -     -     -     -     -   137 |
 MIZU |     -     -   -16     -     -     -     -     -    12 |
 MKEA |     -   116     -    86  -297     -   107     -   -34 |
 NKLG |     -     -     -    56   -60     -     -     -    26 |
 NLIB |     -     -   -55  -142     -     -    82     -    16 |
 NRC2 |     -     -  -111   548  -329     -     X     -   130 |
 NRIL |     -     -     -     -   -35     -    28     -     - |
 NTUS |     -   -72     -     -     -     -     -     -    78 |
 NYA1 |     -  -120     -     -     -     -     -     -   132 |
 NYAL |     -     -   144   140     -     -     -     -  -149 |
 OHI2 |     -   155     -     -  -112     -   -93     -     - |
 OS0G |     -     -   278  -280     -     -     -     -  -113 |
 PERT |     -     -    37   194     -     -  -106     -     - |
 PETP |     -   -18     -     -     -     -    22     -     - |
 PIE1 |     -    68   294     X     -     -   -60     -  -233 |
 POTS |     -  -210     -  -152     -     -     -     -   287 |
 RIOG |     -     -     -     -  -110     -     -     -    81 |
 SANT |     -   -25     -     X     -     -   226     -  -182 |
 SCH2 |     -     -   -98     -     -     -     -     -    76 |
 SFER |     -     -  -178     -     -     -     -     -   138 |
 STJO |     -     -   -85     -     -     -     -     -    66 |
 SUTH |     -  -152     -  -281     -     -     -     -   270 |
 THTI |     -     -     -   -35   127     -     -     -   -81 |
 TLSE |     -     -  -145     -     -     -     -     -   112 |
 TRO1 |     -  -239     -     -    14     -     -     -   253 |
 TROM |     -     -     -  -157     -     -     -     -    57 |
 TSKB |     -    79    72   -23     -     -     -     -  -136 |
 TWTF |     -     -  -108     -     -     -     -     -    84 |
 URUM |     -    14     -     -     -     -     -     -   -15 |
 USN1 |     -     -   254     -     -     -  -601     -   433 |
 USNO |     -    31   131     -     -     -   -35     -  -104 |
 USUD |     -     9     X   123     -     -     -     -   -54 |
 VILL |     -     -     -  -634     -     -     -     -   231 |
 WILL |     -  -102   -95     -     -     -     -     -   184 |
 WSRT |     -     -   270     -     -     -     -     -  -209 |
 WTZR |     -     -   297  -312     -     -     -     -  -115 |
 WUHN |     -     -   247   -11   -67     -     -     -  -136 |
 YAKT |     -     -   -79     -     -     -  -145     -   195 |
 YAR2 |     -  -134     -     -     -     -     -     -   146 |
 YELL |     -    38     -     X    -5     -   -21     -   -18 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  5962   132    57     -    49     -    55  5645    66 |  284   3.36
    2 |  5406    38    27   107    85  3391    39  4906    66 |  288   2.69
    3 |  1788    59    94   133    87  3048    86  1794    32 |  288   1.34
    4 |  1902    63    54   153    44  1063    55  1861    28 |  288   0.97
    5 |  4140    47    47    71    33  7455    33  4036    29 |  288   3.04
    6 | 12172    62    75   163   111  7271    58 12399    40 |  288  10.15
    7 |  1660    60    62    70    43  1358    58  1777    27 |  288   0.71
    8 |  5381    45    49    71    38  2739    33  5048    42 |  288   3.50
    9 |  3837    48    61   219   105  2684    46  3640    59 |  288   2.03
   10 |  6032    59    37   141    48  3643    56  4752    82 |  288   2.90
   11 |  1146    82    48   170    65   429    68  1311    82 |  288   0.53
   13 |  1392    55    41    71    74  1701    57  1491    36 |  288   0.19
   14 |   997    66    40    90    75  1438    54  1001    49 |  288   0.35
   15 |  3582    49    75     -    79  2054    49  3259    92 |  288   2.32
   17 |  2549     -   166     X   223  1673   212  2234   154 |  288   1.78
   18 |  1654    50    34     X    54   737    27  1772    37 |  288   0.37
   20 |   771    82    48   104    70  1046    49   829    53 |  288   0.18
   22 |  7805   109    45   233     X     -    63  5968    61 |  288  45.39
   23 |  9486    56    72   198   120  4256    93  8545    81 |  288   5.85
   24 |  3439    59    67    86   114  1573    34  3458    33 |  288   1.65
   25 |  3602    38    75   113    61  3115    63  3578    46 |  288   1.23
   26 |   720   137    47   256   140  2181    50   795    66 |  282   0.63
   27 |  1973    54    44    92   155  9857    59  1753    57 |  288   1.92
   28 |  2054    35    31   123    77   914    55  2147   102 |  288   0.53
   29 |   958   140    83     X    68  1851    58   781    54 |  282   0.69
   30 |  5214    61    35    84    95  1377    50  4770    27 |  288   0.80
   31 |  2433    97   106   200   115  2626    59  2258    38 |  288   1.25
 -----+-------------------------------------------------------+--------------
 ALBH |     -    20    83     -     -     -    34     -    30 |  288   0.15
 ALGO |     -    20    33     X     -     -    17     -    22 |  288   0.06
 AMC2 |     -    29    72     -     -     -    31     -    49 |  288   0.05
 ARTU |     -    27     -     -    23     -    44     -     - |  288  15.98
 ASC1 |     -    33     -    37     -     -     -     -    35 |  286    >>>
 AUCK |     -     -     -    85     -     -     -     -    31 |  288  15.67
 BAHR |     -    41    37   166    49     -    24     -    40 |  288   0.61
 BILI |     -    18     -     -    27     -     -     -     - |  287  11.99
 BJFS |     -     -   206     -     X     -     -     -   159 |  267    >>>
 BOGT |     -    97     -     X     -     -     -     -   106 |  284  35.32
 BOR1 |     -     -    61     -     -     -     -     -    47 |  286   0.60
 BRMU |     -    53     -    70   100     -     -     -    26 |  279  22.25
 BRUS |     -     -    53     -     -     -     -     -    41 |  286   0.04
 CAS1 |     -    54     -     -    34     -     -     -    76 |  276   8.07
 CEDU |     -    53     -   138     -     -     -     -    47 |  288  17.50
 CHAT |     -    45     -    93     -     -     -     -    44 |  287  13.65
 CHUR |     -    35    54     -     -     -     -     -    28 |  288   1.02
 COCO |     -    47     -    83    39     -    20     -    46 |  288  10.50
 CRO1 |     -     -   175     -     -     -    70     -    91 |  287  22.68
 DAEJ |     -     -    83     -     -     -    69     -     X |  283   1.53
 DARW |     -    46     -     -     -     -    54     -     - |  286  23.73
 DAVR |     -     -     -     -    81     -   104     -    63 |  267    >>>
 DRAO |     -    15    21     -     -     -     -     -    13 |  288   0.04
 EISL |     -    25     -     X     X     -    29     -     X |  161  22.73
 FAIR |     -    47    25   129    37     -    29     -    26 |  288   0.07
 FORT |     -   107     -   160   139     -    83     -    52 |  288   0.12
 GODE |     -    37    55   135     -     -     -     -    30 |  288   0.06
 GOLD |     -    29     -     -     -     -    37     -    22 |  288  19.02
 GRAZ |     -    33    66   110     -     -     -     -    37 |  286  26.22
 GUAT |     -    21     -     -    45     -    31     -    21 |  288    >>>
 HERS |     -     -    68     -     -     -     -     -    52 |  239  16.73
 HOB2 |     -    57   103   116     -     -    58     -    41 |  288   0.09
 HOFN |     -     -     -     -    65     -    51     -     - |  287    >>>
 HRAO |     -    37     -     -     -     -    72     -    80 |  288   1.78
 IISC |     -    52     -   151     -     -    73     -    83 |  288  25.57
 JPLM |     -     -    69     -    43     -     -     -    27 |  288  34.38
 KARR |     -    38     -     -    57     -     -     -     - |  285  14.00
 KERG |     -    72    69     -    47     -     -     -    30 |  287   1.21
 KGN0 |     -     -    76     -     -     -     -     -    59 |  281   0.45
 KIRU |     -    40    60     -     -     -     -     -    50 |  288   1.12
 KIT3 |     -     -     -     -     -     -    94     -    87 |  253  14.38
 KOKB |     -    40    58     -    15     -     -     -     - |  288   0.05
 KOSG |     -    20     -     -     -     -     -     -    22 |  286  35.04
 KOUR |     -    47     -     X     -     -    37     -    63 |  287   1.28
 LAMA |     -    30     -     -     -     -    35     -     - |  287  19.53
 MAS1 |     -     -    77   113   102     -     -     -    31 |  288   1.99
 MATE |     -    34     -   129     -     -     -     -    35 |  288   0.04
 MCM4 |     -    59     -     -     -     -     X     -    65 |  264  17.79
 MDO1 |     -    31    35     -     -     -     -     -    27 |  288  24.02
 MEDI |     -     -    44     -     -     -     -     -    34 |  286   0.07
 METS |     -    27    67     -     -     -     -     -    31 |  287   1.30
 MIZU |     -     -   107     -     -     -     -     -    83 |  272   0.58
 MKEA |     -    43     -   172    22     -    31     -    23 |  288  50.69
 NKLG |     -     -     -   156    60     -     -     -    36 |  287    >>>
 NLIB |     -     -   171   210     -     -   143     -    41 |  287 409.24
 NRC2 |     -     -    49   150    34     -     X     -    40 |  288   0.03
 NRIL |     -     -     -     -    25     -    20     -     - |  288  10.91
 NTUS |     -    58     -     -     -     -     -     -    64 |  283  28.78
 NYA1 |     -   155     -     -     -     -     -     -   170 |  282   0.47
 NYAL |     -     -    23    51     -     -     -     -    22 |  285   0.38
 OHI2 |     -    37     -     -    52     -    28     -     - |  288   9.62
 OS0G |     -     -    35    42     -     -     -     -    19 |  168   0.22
 PERT |     -     -   108   130     -     -    66     -     - |  288  16.19
 PETP |     -    50     -     -     -     -    59     -     - |  287  15.95
 PIE1 |     -    96   237     X     -     -   166     -   111 |  288   0.09
 POTS |     -    22     -    77     -     -     -     -    29 |  288  16.37
 RIOG |     -     -     -     -    27     -     -     -    20 |  227  13.62
 SANT |     -    23     -     X     -     -    51     -    52 |  229   6.33
 SCH2 |     -     -    42     -     -     -     -     -    33 |  283  19.58
 SFER |     -     -    60     -     -     -     -     -    46 |  283 210.82
 STJO |     -     -    34     -     -     -     -     -    26 |  286   0.06
 SUTH |     -    49     -    87     -     -     -     -    41 |  288  23.79
 THTI |     -     -     -    76    42     -     -     -    26 |  287   3.87
 TLSE |     -     -    43     -     -     -     -     -    33 |  286   0.63
 TRO1 |     -    27     -     -    25     -     -     -    42 |  288  12.34
 TROM |     -     -     -    62     -     -     -     -    22 |  288  13.32
 TSKB |     -    32    38    83     -     -     -     -    20 |  288   1.20
 TWTF |     -     -    85     -     -     -     -     -    66 |  286   0.35
 URUM |     -    15     -     -     -     -     -     -    17 |  286  30.61
 USN1 |     -     -   148     -     -     -   136     -   251 |  288   0.11
 USNO |     -    21    34     -     -     -    16     -    24 |  288   0.02
 USUD |     -    42     X   143     -     -     -     -    19 |  288  17.12
 VILL |     -     -     -   142     -     -     -     -    52 |  256   5.85
 WILL |     -    38    79     -     -     -     -     -    32 |  288   0.87
 WSRT |     -     -    43     -     -     -     -     -    33 |  288   0.04
 WTZR |     -     -    52    86     -     -     -     -    27 |  288   0.07
 WUHN |     -     -    95    75    80     -     -     -    42 |  225  32.66
 YAKT |     -     -    75     -     -     -    52     -    42 |  286    >>>
 YAR2 |     -    18     -     -     -     -     -     -    20 |  286   4.29
 YELL |     -    73     -     X   122     -    64     -   118 |  288   0.07
 -----+-------------------------------------------------------+--------------
 TOT  |  4356    59    79   130    80  3557    68  4184    61 |


 BEST CLOCK FIT: USNO   288   0.02 (ns) 

