
 GPS week: 1194   Day: 2   MJD: 52604                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2488      1    -0.42     0.17     4.45     0.00
 cod |   288     0  24907     67     0.30    -0.67     0.08    15.79
 emr |   288     0  18241    137  1435.26    11.99     0.09    14.87
 esa |   288     0  14086    644    -0.07    -0.04     0.10    11.93
 gfz |   288     0  15009    261    -0.13    -0.84     0.06    23.44
 igu |    96     0   2488      0    -0.42     0.18     4.70     0.00
 jpl |   288     0  13224    532     2.71    -2.26     0.04    33.96
 ngs |    96     0   2488      7    -0.34    -0.14     4.00     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |    96     0   2477      0     0.31   -17.93    29.54     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -7189   -53   -59  -160   161 -8955   -48 -7656     -   111 |
    2 | -1108   -62   -96    63    94 15036   -18 -1244     -    21 |
    3 |  -107   -70  -189  -209   251 -2311   123    68     - 87504 |
    4 | -3728   130   -98    -1   -63 -1792   318 -3720     -   -74 |
    5 |  8436   145   -19   207   -27 14209  -124  6948     -   131 |
    6 |  2696   134  -287   142     8 19786   163  2036     - 25456 |
    7 |   485    66   -52   -20     9    -5  -128   562     --55676 |
    8 | -1691    69     6   -23   198  1467  -178 -1548     -    17 |
    9 |  4214   -10  -119   -12     9  1494    59  3634     -   -72 |
   10 |  2797   317    80    25    79  5942  -268  2387     -   186 |
   11 |  2732   -47    -3   -16   -69  -574    84  3361     -   -49 |
   13 |  4214  -159  -120  -143  -199  -207   342  4285     -  -203 |
   14 |  3569    94    56  -140   -32    41    33  3503     -    94 |
   15 |-13287   -68  -233     -   221  2373  -222-12158     --18694 |
   17 |  1816   141  -237   119   249 -1441  -182  1971     -    23 |
   18 |  3481    91   -68   -12   -72  -856    45  3651     -    -4 |
   20 |  4271    65   109  -204   -16  -195    54  4303     -    69 |
   22 |  -711  -106    85     6   233  8910  -165  -832     -   148 |
   23 |   424    98  -220    84    43 -3530  -102   424     --18762 |
   24 | -1609   101   -96   -17   -96 -2458    74 -1447     --18671 |
   26 |  -939    65   -89    12   -22 -2633   239  -808     -   -70 |
   27 |   878   -93  -192  -166   138-20940    99   899     -   -56 |
   28 |  2775    42   184   167  -235   163    42  2652     -   -24 |
   29 | -3825     4  -194   251   -24 -4287   141 -3291     -   -38 |
   30 | -2573    30  -192   220   -39 -3716   234 -2314     -    16 |
   31 | -6045    31  -171    57    89-15471   -21 -5553     -106695 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -105   -59     -     -     -    73     -     -     - |
 ALGO |     -   -90    96     X     -     -     -     -     -     - |
 AMC2 |     -   310   161     -     -     -  -175     -     -     - |
 ARTU |     -     -     -     -   -78     -    54     -     -     - |
 BAHR |     -   -82    15   -43    68     -     -     -     -     - |
 BILI |     -    65     -     -   -44     -     -     -     -     - |
 BJFS |     -     -   184     -  -116     -     -     -     -     - |
 BOGT |     -    61     -     -     -     -   -28     -     -     - |
 BRMU |     -   226     -     -  -152     -     -     -     -     - |
 CAS1 |     -   -11     -     -     7     -     -     -     -     - |
 CEDU |     -    53     -  -409     -     -   119     -     -     - |
 CHAT |     -   -65     -    86     -     -     -     -     -     - |
 CHUR |     -   111  -118     -     -     -     -     -     -     - |
 COCO |     -    10     -     -    30     -   -25     -     -     - |
 CRO1 |     -  -144   -99     -     -     -   106     -     -     - |
 DAEJ |     -    53   -56     -     -     -     -     -     -     - |
 DAVR |     -  -140     -     -  -195     -   200     -     -     - |
 DRAO |     -   -42    45     -     -     -     -     -     -     - |
 FAIR |     -   -44    62   189   -88     -   -13     -     -     - |
 FLIN |     -     6     -     -     -     -    -3     -     -     - |
 FORT |     -     -    24     X   -15     -     -     -     -     - |
 GODE |     -  -194   206     -     -     -     -     -     -     - |
 GOLD |     -   -61     -     -     -     -    28     -     -     - |
 GUAM |     -   167     -   180   110     -  -217     -     -     - |
 GUAT |     -     5     -     -    -3     -     -     -     -     - |
 HERS |     -  -154   163     -     -     -     -     -     -     - |
 HOB2 |     -  -104    84   160     -     -   -45     -     -     - |
 HOFN |     -     -     -     -    40     -   -28     -     -     - |
 HRAO |     -   118     -     -     -     -   -55     -     -     - |
 IISC |     -     -     -   109     -     -   -38     -     -     - |
 IRKT |     -     -   175  -218     -     -     -     -     -     - |
 JAB1 |     -    -3     -     -     -     -     1     -     -     - |
 JPLM |     -     -   113     -   -72     -     -     -     -     - |
 KARR |     -  -156     -     -   105     -     -     -     -     - |
 KERG |     -   -49    25     -    17     -     -     -     -     - |
 KOKB |     -   -81   127     -   -27     -     -     -     -     - |
 KOUR |     -    -6     -  -139     -     -    50     -     -     - |
 MAC1 |     -   -87     -    34    -2     -    30     -     -     - |
 MADR |     -   175  -186     -     -     -     -     -     -     - |
 MALI |     -  -299     -   395     X     -     -     -     -     - |
 MAS1 |     -    39   160  -271    11     -     -     -     -     - |
 MCM4 |     -   189     X     -  -127     -     X     -     -     - |
 MDO1 |     -    62   -66     -     -     -     -     -     -     - |
 MEDI |     -   -88    94     -     -     -     -     -     -     - |
 METS |     -     -  -110     -     -     -    48     -     -     - |
 MKEA |     -    74     -     -  -175     -    87     -     -     - |
 NICO |     -  -135     -     -     -     -    63     -     -     - |
 NLIB |     -  -105  -130     -     -     -    99     -     -     - |
 NRC2 |     -   -65   124     -   -79     -    30     -     -     - |
 OS0G |     -     -    43     -   -28     -     -     -     -     - |
 PIE1 |     -   -58   239  -122     -     -   -29     -     -     - |
 POTS |     -    55     -   -72     -     -     -     -     -     - |
 RIOG |     -    10     -   108   -62     -     -     -     -     - |
 SANT |     -   -93     -   123     -     -     -     -     -     - |
 SCH2 |     -  -129   137     -     -     -     -     -     -     - |
 SFER |     -    97    -3     -     -     -   -43     -     -     - |
 STJO |     -  -144   153     -     -     -     -     -     -     - |
 TIDB |     -   -19   127   -18   -54     -     X     -     -     - |
 TIXI |     -     8     -     -     -     -    -4     -     -     - |
 TLSE |     -   -65    69     -     -     -     -     -     -     - |
 TOW2 |     -    22     -     -     -     -   -10     -     -     - |
 TSKB |     -   -35    65   -35     -     -     -     -     -     - |
 USNO |     -   -91    97     -     -     -     -     -     -     - |
 USUD |     -    82  -144    64     -     -     -     -     -     - |
 VILL |     -   290     -  -384     -     -     -     -     -     - |
 WILL |     -    37   -39     -     -     -     -     -     -     - |
 WSRT |     -  -141   150     -     -     -     -     -     -     - |
 WTZR |     -   -68   297  -350     -     -    26     -     -     - |
 WUHN |     -     -     -   231     5     -   -85     -     -     - |
 YAKT |     -    44   -46     -     -     -     -     -     -     - |
 YAR2 |     -    26     -     -     -     -   -12     -     -     - |
 YELL |     -  -148     -   196     -     -     -     -     -     - |
 YSSK |     -    82     -     -     -     -   -38     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 | 10690    98    35    48    60  7992    54  9803     -  3970 |  288   3.72
    2 |  3124    49    35   146    45  8192    73  3111     -  3977 |  288   2.08
    3 |  4777   158    59    96    92  5217    58  4929     - 84127 |  284   2.70
    4 |  1455    69    52   101    47  1008   105  1357     -  3971 |  288   0.80
    5 |  4326    62    32    91    51  7512    54  4039     -  3979 |  288   3.35
    6 | 14729   206   119   265    92  7961    87 12130     - 21617 |  281  10.37
    7 |  1934   218    91   215    62  1953    77  1987     - 59998 |  280   1.06
    8 |  4443    50    82    51    68  2287    18  4421     -  3985 |  288   4.58
    9 |  2847    96    38    50    45  1927    25  2632     -  3973 |  288   1.65
   10 |  2687    63    33    69    80  3299    31  2511     -  3980 |  288   1.94
   11 |  2303    47    34   223    49   537    50  2183     -  3981 |  288   0.41
   13 |   954    43    49   113    38  1330    24  1001     -  3975 |  288   0.40
   14 |   714    78    53    72    31   618    21   819     -  3978 |  288   0.25
   15 |  4139    90    47     -    50  3516    97  3910     - 22734 |  288   2.13
   17 |  2211    59    49    47   106  1712    88  2366     -  3978 |  288   1.86
   18 |  1054    68    38    53    37   555    26  1014     -  3991 |  288   0.30
   20 |  1067    90    41    76    27   601    51  1082     -  3974 |  288   0.25
   22 |  3507    51    73    90    55  3751    57  3297     -  3979 |  288   1.91
   23 |  5817    85   104   132    46  3796    92  6019     - 22730 |  288   6.17
   24 |  2422   100    63   125   123  1866    59  2409     - 22725 |  288   2.25
   26 |  1323    81    74   120    61   926    92  1390     -  3983 |  288   0.76
   27 |  1581    34    22   189    71 12426    26  1551     -  3978 |  288   1.59
   28 |  2102    97    38    68    86  1537    66  1926     -  3994 |  288   1.38
   29 |  1869    69    86    53    58  1900    60  1288     -  3986 |  288   0.72
   30 |  1872    55    33   138    52  4150    78  1892     -  3981 |  288   2.66
   31 |  2159   235    81    92   169  7111    46  2001     -103370 |  281   1.91
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    42   226     -     -     -    82     -     -     - |  277   0.24
 ALGO |     -    21    22     X     -     -     -     -     -     - |  288   0.06
 AMC2 |     -    42    94     -     -     -    38     -     -     - |  276   0.21
 ARTU |     -     -     -     -    33     -    23     -     -     - |  280  15.97
 BAHR |     -    40    67    54    29     -     -     -     -     - |  288   0.41
 BILI |     -    23     -     -    16     -     -     -     -     - |  286  12.89
 BJFS |     -     -    58     -    37     -     -     -     -     - |  274    >>>
 BOGT |     -    49     -     -     -     -    23     -     -     - |  264  32.41
 BRMU |     -    35     -     -    24     -     -     -     -     - |  241  21.07
 CAS1 |     -    27     -     -    18     -     -     -     -     - |  288   8.46
 CEDU |     -    35     -    56     -     -    16     -     -     - |  288  14.85
 CHAT |     -    47     -    62     -     -     -     -     -     - |  287  15.10
 CHUR |     -   125   133     -     -     -     -     -     -     - |  255   0.55
 COCO |     -    18     -     -    35     -    29     -     -     - |  288  23.59
 CRO1 |     -    60   163     -     -     -    54     -     -     - |  254  23.62
 DAEJ |     -    61    65     -     -     -     -     -     -     - |  263   1.36
 DAVR |     -    33     -     -    80     -    57     -     -     - |  288  21.85
 DRAO |     -    91    96     -     -     -     -     -     -     - |  284    >>>
 FAIR |     -    85    30    61    57     -    28     -     -     - |  288   0.04
 FLIN |     -    22     -     -     -     -    10     -     -     - |  288   7.99
 FORT |     -     -    31     X    19     -     -     -     -     - |  275   0.19
 GODE |     -   101   107     -     -     -     -     -     -     - |  275   0.15
 GOLD |     -   109     -     -     -     -    51     -     -     - |  285  18.52
 GUAM |     -    28     -    64    25     -    18     -     -     - |  288  27.51
 GUAT |     -    46     -     -    31     -     -     -     -     - |  282    >>>
 HERS |     -    53    57     -     -     -     -     -     -     - |  240  26.27
 HOB2 |     -    35    23    52     -     -    31     -     -     - |  288   0.05
 HOFN |     -     -     -     -    30     -    21     -     -     - |  264    >>>
 HRAO |     -    50     -     -     -     -    23     -     -     - |  287   3.78
 IISC |     -     -     -    42     -     -    15     -     -     - |  216  22.06
 IRKT |     -     -    82   103     -     -     -     -     -     - |  274   0.26
 JAB1 |     -    56     -     -     -     -    26     -     -     - |  285  20.91
 JPLM |     -     -   109     -    69     -     -     -     -     - |  269  20.72
 KARR |     -    51     -     -    34     -     -     -     -     - |  288  12.35
 KERG |     -    50    64     -    37     -     -     -     -     - |  287   1.65
 KOKB |     -    49    50     -    32     -     -     -     -     - |  288   0.09
 KOUR |     -    51     -   116     -     -    37     -     -     - |  286   1.95
 MAC1 |     -    44     -    57    27     -    31     -     -     - |  288  15.71
 MADR |     -    82    87     -     -     -     -     -     -     - |  235  15.52
 MALI |     -    34     -    45     X     -     -     -     -     - |  261  85.76
 MAS1 |     -    28    31    90    39     -     -     -     -     - |  288   2.97
 MCM4 |     -    66     X     -    45     -     X     -     -     - |  247    >>>
 MDO1 |     -    81    86     -     -     -     -     -     -     - |  250  16.06
 MEDI |     -    46    49     -     -     -     -     -     -     - |  281   0.09
 METS |     -     -    57     -     -     -    25     -     -     - |  266   0.28
 MKEA |     -    70     -     -    62     -    34     -     -     - |  288  39.79
 NICO |     -    60     -     -     -     -    28     -     -     - |  284  11.47
 NLIB |     -   173   143     -     -     -   117     -     -     - |  271   0.33
 NRC2 |     -    39    19     -    41     -    19     -     -     - |  288   0.02
 OS0G |     -     -    23     -    15     -     -     -     -     - |  288   0.14
 PIE1 |     -    70   117    29     -     -    24     -     -     - |  288   0.11
 POTS |     -    30     -    39     -     -     -     -     -     - |  288  17.41
 RIOG |     -    68     -   176   130     -     -     -     -     - |  287  13.51
 SANT |     -   118     -   156     -     -     -     -     -     - |  221   4.03
 SCH2 |     -    42    44     -     -     -     -     -     -     - |  266  37.01
 SFER |     -    42   116     -     -     -    39     -     -     - |  287   0.40
 STJO |     -   340   361     -     -     -     -     -     -     - |  282   3.33
 TIDB |     -    49   146    70    68     -     X     -     -     - |  285   0.14
 TIXI |     -    32     -     -     -     -    15     -     -     - |  286  11.53
 TLSE |     -    52    55     -     -     -     -     -     -     - |  287   0.78
 TOW2 |     -    53     -     -     -     -    25     -     -     - |  288  18.12
 TSKB |     -    32    64    67     -     -     -     -     -     - |  288   1.63
 USNO |     -    23    24     -     -     -     -     -     -     - |  288   0.03
 USUD |     -    42    81    79     -     -     -     -     -     - |  287  26.69
 VILL |     -    76     -   101     -     -     -     -     -     - |  288   8.15
 WILL |     -    46    49     -     -     -     -     -     -     - |  264   6.71
 WSRT |     -    42    44     -     -     -     -     -     -     - |  288   0.06
 WTZR |     -    34   139    72     -     -    34     -     -     - |  288   0.10
 WUHN |     -     -     -    49    25     -    12     -     -     - |  287  22.99
 YAKT |     -    71    75     -     -     -     -     -     -     - |  285   0.47
 YAR2 |     -    31     -     -     -     -    14     -     -     - |  288   4.11
 YELL |     -    48     -    64     -     -     -     -     -     - |  288   0.05
 YSSK |     -    26     -     -     -     -    12     -     -     - |  285  16.28
 -----+-------------------------------------------------------------+--------------
 TOT  |  4454    83    89   105    61  4702    42  3997     - 29535 |


 BEST CLOCK FIT: NRC2   288   0.02 (ns) 

