
 GPS week: 1187   Day: 6   MJD: 52559                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2469     23    -0.28     1.08     4.98     0.00
 cod |   288     0  21222      0    -0.09     1.44     0.08    22.99
 emr |   288     0  10674   1131   814.81    14.74     0.12    13.43
 esa |   288     0  16364    890    -1.82     1.80     0.12    14.14
 gfz |   288     0  14329    161    -0.64     1.10     0.08    24.46
 igu |    96     0   2245      0    -5.31     4.80     5.01     0.00
 jpl |   288     0  12218    288    -7.36     4.39     0.08    24.99
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   sio |
 -----+-------------------------------------------------+
    1 | -9177    77  -123   -32   113  1347  -196     - |
    2 |  -972   -58  -165   259   136     -  -277     - |
    3 | -1790  -135   -33  -163   239   502     0     - |
    4 |   846    59   -89   -36  -159 -1211   341     - |
    5 |   585  -110    32   147    30  5934   -46     - |
    6 | -6910  -101   -88  -102   129  1560   130     - |
    7 |    34   111  -188    84    17  2936  -131     - |
    8 | -6045   107  -309   210   -11 -2048   -80     - |
    9 |  5087    14   -55   -25   -76   615   209     - |
   10 | -8017    55     X    54    22 -1758  -202     - |
   11 |  1612   -96    52   223    27  1937  -186     - |
   13 |  6092   -23  -128    67   -67  1694   239     - |
   14 |  4002  -111   309    -9    -1   783  -115     - |
   15 |-12123     -     X     -   198 -4182  -194     - |
   17 |-29053     -     X     X   -41     -    40     - |
   18 |  6946  -131   256  -105    33  4224    24     - |
   20 |  3434    -1    22   193  -100  2056   -53     - |
   22 | 13972    20  -205    54   198 23129  -262     - |
   23 |  3276    50     X    23  -141  8668   158     - |
   24 | -2179    87     X   -14  -133-18371   115     - |
   25 |   240  -101    -2   -84    65  -236   154     - |
   26 |  1559    81  -115    99  -195 -2308   244     - |
   27 | -2978   104  -493   120    88-22906    32     - |
   28 |   864    55    38    52   -66  -879   -76     - |
   29 |   148    65  -212   128   -89     -   139     - |
   30 |  1129  -198   -97    -9    76  4228   319     - |
   31 | -2269    43  -216   -31   165 -7022  -133     - |
 -----+-------------------------------------------------+
 ALBH |     -   111     -     -     -     -  -102     - |
 ALGO |     -  -152   261     X     -     -     -     - |
 AMC2 |     -    57     -     -     -     -   -53     - |
 ARTU |     -     -     -     -    -2     -     2     - |
 ASC1 |     -   231     -  -376     -     -     -     - |
 AUCK |     -   -11     -    17     -     -     -     - |
 BAHR |     -    30   -43   -76    39     -     -     - |
 BILI |     -    44     -     -   -41     -     -     - |
 BRMU |     -    53     -  -260    90     -     -     - |
 CAS1 |     -  -151     -   289  -121     -    94     - |
 CEDU |     -   -33     -    53     -     -     -     - |
 CHAT |     -   -45     -    74     -     -     -     - |
 COCO |     -    56     -    -1    28     -   -78     - |
 CRO1 |     -   -87     -     -     -     -    80     - |
 DAVR |     -    30     -     -   -28     -     -     - |
 DRAO |     -   -88   151     -     -     -     -     - |
 FAIR |     -     -   177    27   -92     -   -20     - |
 FORT |     -    78  -133     X     X     -     -     - |
 GODE |     -    20     -   -33     -     -     -     - |
 GOLD |     -     2     -     -     -     -    -2     - |
 GUAT |     -   114     -     -  -107     -     -     - |
 HOB2 |     -    -2   269   -11    -1     -  -136     - |
 HOFN |     -     -     -     -   155     -  -152     - |
 HRAO |     -    25     -     -     -     -   -23     - |
 IISC |     -   -57     -   -83     -     -    98     - |
 JAB1 |     -    13     -     -     -     -   -12     - |
 KOUR |     -   -32   129  -176     -     -    60     - |
 KSTU |     -     0     -     -    86     -   -84     - |
 LHAS |     -   108     -  -176     -     -     -     - |
 LPGS |     -   -79     -     -     -     -    73     - |
 MAC1 |     -   -54     -   123  -144     -   122     - |
 MAG0 |     -    61     -     -     -     -   -56     - |
 MALI |     -  -104     -   -78   133     -     -     - |
 MAS1 |     -    23     -     X   -21     -     -     - |
 MATE |     -   -54     -    88     -     -     -     - |
 MAW1 |     -   110     -     -  -132     -    29     - |
 MKEA |     -    75     -    24  -149     -    68     - |
 NLIB |     -     -     -  -144     -     -    82     - |
 NRC2 |     -     -   357  -217   -70     -     -     - |
 NRIL |     -     -     -     -    32     -   -31     - |
 OHI2 |     -     8     -     -   -12     -     5     - |
 PERT |     -  -188   162   246     -     -   -53     - |
 PIE1 |     -     -    -4     4     -     -     X     - |
 POTS |     -     3     -    -5     -     -     -     - |
 RAMO |     -  -191     -     -     -     -   175     - |
 RESO |     -    73     -     -   -68     -     -     - |
 RIOG |     -    77     -    62  -108     -     -     - |
 SANT |     -    96     -  -127   -28     -     -     - |
 STJO |     -  -157   269     -     -     -     -     - |
 SUTH |     -    25     -   -40     -     -     -     - |
 TIXI |     -    52     -     -     -     -   -48     - |
 TOW2 |     -    24     -     -     -     -   -22     - |
 USNO |     -   -89   153     -     -     -     -     - |
 VILL |     -   -55     -    89     -     -     -     - |
 WTZR |     -   -23     -    38     -     -     -     - |
 WUHN |     -   -82     -   -67   187     -   -70     - |
 YELL |     -   230     -  -374     -     -     -     - |
 YSSK |     -    33     -     -     -     -   -30     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   sio | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  4777    58   141    59    62  2451    99     - |  288   3.71
    2 |  7048    68   188   100   116     -    69     - |  281   3.02
    3 |  3346    66   209    51   154  1822    40     - |  288   1.54
    4 |  1591   147   143    42   100   988    75     - |  288   0.81
    5 |  7005   118   109   144    63  3386    67     - |  281   4.85
    6 | 12066    68   246    77    71  5031    37     - |  288   8.59
    7 |  1395    52    42    80    42  1949    50     - |  288   0.94
    8 |  3131    52    61    52    98  1051    61     - |  288   2.43
    9 |  6249    77   115    68    76  1889    49     - |  288   1.70
   10 |  2759    69     X   128    62  1612    81     - |  282   2.03
   11 |  1072    52    84    93    70  1212    84     - |  288   0.52
   13 |  1028    75   155   132    74  1688    47     - |  288   0.17
   14 |  1451    60   122    47    70  1027    55     - |  288   0.24
   15 |  7653     -     X     -   194  2545   190     - |  145   2.11
   17 |  9669     -     X     X   267     -   262     - |  103   1.63
   18 |  3194   129   269   201   133  2710   116     - |  288   0.32
   20 |  1075    67    86   168   129  1509    79     - |  288   0.26
   22 |  7813   175    87   129    58 13494    85     - |  282   2.73
   23 |  7779   131     X   246   115  4507   175     - |  284   5.75
   24 |  2184    67     X    68    38  8249    73     - |  288   1.93
   25 | 10189    45    65    59    68  5006    50     - |  288   1.93
   26 |  1131    51   149   131    42  1488    55     - |  288   0.56
   27 |  1616    65   126   148   132 14524    84     - |  288   1.69
   28 |  1379    68    36   142    87   967    28     - |  288   0.80
   29 |  1839    41   190   154    50     -    41     - |  288   0.58
   30 |  1904   201    93   235    94  2551    56     - |  282   0.83
   31 |  2553   111   178   100    59  2319    83     - |  288   1.45
 -----+-------------------------------------------------+--------------
 ALBH |     -    26     -     -     -     -    24     - |  288   0.38
 ALGO |     -    21    36     X     -     -     -     - |  288   0.06
 AMC2 |     -    21     -     -     -     -    19     - |  288   0.02
 ARTU |     -     -     -     -    21     -    21     - |  288  18.95
 ASC1 |     -    26     -    42     -     -     -     - |  276    >>>
 AUCK |     -   162     -   263     -     -     -     - |  216  18.38
 BAHR |     -    40    63    64    27     -     -     - |  288   0.31
 BILI |     -    34     -     -    32     -     -     - |  287  15.51
 BRMU |     -   114     -   353   101     -     -     - |  284  29.33
 CAS1 |     -    87     -   106    41     -    43     - |  288   9.56
 CEDU |     -    31     -    50     -     -     -     - |  288  14.03
 CHAT |     -    57     -    93     -     -     -     - |  284  15.79
 COCO |     -    42     -    31    30     -    41     - |  288  12.15
 CRO1 |     -    24     -     -     -     -    22     - |  274  37.11
 DAVR |     -    66     -     -    62     -     -     - |  288  18.14
 DRAO |     -    33    56     -     -     -     -     - |  288   0.09
 FAIR |     -     -    54    42    39     -    53     - |  288   0.04
 FORT |     -    32    56     X     X     -     -     - |  161   0.11
 GODE |     -    35     -    57     -     -     -     - |  287   0.05
 GOLD |     -   128     -     -     -     -   118     - |  274  22.65
 GUAT |     -    51     -     -    48     -     -     - |  261    >>>
 HOB2 |     -    62    56    54    23     -    47     - |  288   0.07
 HOFN |     -     -     -     -    28     -    28     - |  286    >>>
 HRAO |     -   120     -     -     -     -   110     - |  236  34.75
 IISC |     -    25     -    40     -     -    26     - |  288  39.68
 JAB1 |     -    41     -     -     -     -    38     - |  288  26.40
 KOUR |     -    34    35    29     -     -    25     - |  288  38.46
 KSTU |     -    24     -     -    48     -    37     - |  288  13.40
 LHAS |     -    34     -    56     -     -     -     - |  287  13.31
 LPGS |     -    31     -     -     -     -    29     - |  165  24.62
 MAC1 |     -    78     -    78    25     -    38     - |  288  14.56
 MAG0 |     -    40     -     -     -     -    37     - |  287  15.11
 MALI |     -    51     -   109    31     -     -     - |  288  13.02
 MAS1 |     -    68     -     X    64     -     -     - |  259   2.66
 MATE |     -    39     -    64     -     -     -     - |  287   0.09
 MAW1 |     -    51     -     -    25     -    36     - |  288  32.85
 MKEA |     -    37     -    55    65     -    46     - |  288  44.60
 NLIB |     -     -     -   235     -     -   133     - |  283    >>>
 NRC2 |     -     -    48    64    25     -     -     - |  288   0.05
 NRIL |     -     -     -     -    25     -    25     - |  288  18.53
 OHI2 |     -    55     -     -    65     -    22     - |  287  10.51
 PERT |     -    69    76    60     -     -    43     - |  288  20.96
 PIE1 |     -     -    48    45     -     -     X     - |  288   0.04
 POTS |     -    35     -    58     -     -     -     - |  284  17.38
 RAMO |     -   295     -     -     -     -   271     - |  283  38.62
 RESO |     -    40     -     -    38     -     -     - |  286  14.63
 RIOG |     -    52     -    59    72     -     -     - |  288  16.17
 SANT |     -   120     -   339    73     -     -     - |  288  36.45
 STJO |     -    42    71     -     -     -     -     - |  260  37.17
 SUTH |     -    32     -    51     -     -     -     - |  272  33.70
 TIXI |     -    46     -     -     -     -    43     - |  284  12.46
 TOW2 |     -    38     -     -     -     -    35     - |  288  21.63
 USNO |     -    33    57     -     -     -     -     - |  287   0.03
 VILL |     -    41     -    67     -     -     -     - |  288  32.42
 WTZR |     -    47     -    77     -     -     -     - |  288   0.06
 WUHN |     -    33     -    69    45     -    55     - |  287  33.16
 YELL |     -    12     -    20     -     -     -     - |  288   0.02
 YSSK |     -    24     -     -     -     -    22     - |  287  16.17
 -----+-------------------------------------------------+--------------
 TOT  |  4979    79   121   122    77  5010    79     - |


 BEST CLOCK FIT: AMC2   288   0.02 (ns) 

