
 GPS week: 1163   Day: 5   MJD: 52390                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2680      0    -0.05    -0.01     5.29     0.00
 cod |   288     0  26697     29     0.15    -0.30     0.08    19.44
 emr |   288     0  11747     58  1577.79    24.50     0.09    18.05
 esa |   288     0  17037    953     1.20    -0.12     0.10    14.49
 gfz |   288     0  16341    507    -0.04     0.06     0.07    22.37
 igu |    96     0   2300      0    -0.01    -0.07     4.80     0.00
 jpl |   283     0  11937   2006    -1.57    -1.26     0.13     8.60
 ngs |    96     0   2680      0    -0.05    -0.01     4.87     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  29013    575   153.80   -12.81     0.09    17.06

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -1216  -102   -85    23   131 -8963    74 -1849     -    -1 |
    2 |  2228    36  -141   382     1     -  -329  3076     -  -152 |
    3 | -5281   105   -96    80    31 -8161  -198 -4115     -   -86 |
    4 | -2456   244  -187   -50   126  1869   104 -2448     -  -222 |
    5 |  6462    90   -60    92   -12  7892    -3  5222     -  -101 |
    6 | -5934   145   -32   -93   143 -1065    77 -5464     -  -261 |
    7 |  1057    76  -173   133    88 14101  -129  1264     -  -106 |
    8 |   333   -57  -317   659   102-23199     X   528     -  -294 |
    9 |  1160    51    39  -140    59 12048    88   668     -   -81 |
   10 |  5384   201    85  -557   151 26168  -181  4618     -   -44 |
   11 |  2039    13   -84   308  -122 -1533  -102  2160     -    -8 |
   13 |  7148   -59   -39    -7   125    87   -21  6790     -   -44 |
   14 |  4756   -42   138   -14  -188 -1086    94  4532     -   134 |
   15 |-10690    86    12     -    58   599   170-10200     -  -216 |
   17 |  1387   100    24  -113   299     -  -424  1029     -  -347 |
   18 |  5063  -113   238    -6    -3   606    28  4749     -  -122 |
   20 |  5593   -70    54   224   -89  2029    75  5379     -   -73 |
   21 | -1110   109   -54     X     2     -  -350 -1236     -     X |
   22 | -4905    27   -46   148    -9  -564    49 -4782     -  -110 |
   23 | -1810   176   161  -562   239  1452  -173 -1289     -  -225 |
   24 |  -875   196   -63   -63    90 -6417   134 -1235     -  -255 |
   25 | -2911    41    33    76   -28 -1678  -222 -2207     -   -65 |
   26 |  3287   -90   -78   207   149  -135   136  3093     -  -220 |
   27 |-10062    -8  -220   387   172 -6084    -9 -8449     -  -310 |
   28 |   252    74     0   -36   -44 -1512  -210   109     -    46 |
   29 |  4660    28    43   -77   182 -3335  -226  3673     -  -229 |
   30 |  -672    22   -63   221    55 -2502    25  -854     -  -225 |
   31 | -2825   -92  -308   825   -98     -   168 -2733     -  -117 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -188     -     -     -     -    83     -     -   177 |
 ALGO |     -  -105   133  -240     -     -     -     -     -    62 |
 AMC2 |     -  -116     -     -     -     -     -     -     -   133 |
 AOML |     -   -12     -     -     -     -     -     -     -    14 |
 ARTU |     -    72     -     -   -85     -    60     -     -     - |
 AUCK |     -   -11     -   104     -     -     -     -     -   -20 |
 BAHR |     -    92    76   -13  -110     -   -70     -     -     4 |
 BILI |     -   -35     -     -    30     -     -     -     -     - |
 BOR1 |     -   -94     -     -     -     -     -     -     -   107 |
 BRMU |     -    74     -  -176     X     -     -     -     -    65 |
 BRUS |     -   -50     -     -     -     -    -3     -     -    59 |
 CAS1 |     -   -35     -    18   -20     -    31     -     -    36 |
 CEDU |     -   -56     -  -129     -     -     -     -     -   174 |
 CHAT |     -  -104     -   139     -     -   -43     -     -    90 |
 CHUR |     -   135     -     -     -     -     -     -     -  -154 |
 COCO |     -   105     -  -103    -6     -   -95     -     -   -31 |
 CRO1 |     -     0     -     -     -     -  -108     -     -    52 |
 DAV1 |     -   -24     -     -   -63     -     -     -     -   110 |
 DRAO |     -   -16    -3     -     -     -     -     -     -    22 |
 FAIR |     -     -   267  -153   -93     -     X     -     -    17 |
 FORT |     -     -     -     -     X     -    -2     -     -     1 |
 GALA |     -   -77     -   -81    51     -   -26     -     -    86 |
 GOLD |     -   -89     -     -     -     -     X     -     -   102 |
 GRAZ |     -    23     -  -208     -     -     -     -     -   152 |
 GUAT |     -     -     -     -   -55     -     -     -     -    72 |
 HOB2 |     -   -34   111  -184     -     -     -     -     -   -13 |
 IISC |     -     -     -  -393     -     -     -     -     -   334 |
 JPLM |     -     -     -     -   -71     -     -     -     -    93 |
 KARR |     -     3     -     -    -2     -     -     -     -     - |
 KERG |     -    56     -     -  -130     -     X     -     -   106 |
 KIRU |     -   -35     -     -     -     -   -43     -     -    62 |
 KOSG |     -  -120     -     -     -     -     -     -     -   136 |
 KOUR |     -   100     -  -169     -     -     -     -     -    29 |
 KSTU |     -   -88     -     -     -     -     -     -     -   101 |
 KWJ1 |     -     -     -     -    31     -    39     -     -   -53 |
 LPGS |     -   -32     -     -     -     -     -     -     -    37 |
 MAC1 |     -  -102     -    43  -133     -    48     -     -   234 |
 MALI |     -     -     -  -132     -     -     -     -     -   112 |
 MAS1 |     -   -52    64    70   -76     -     -     -     -    31 |
 MATE |     -   -96   -79   -25     -     -     X     -     -   215 |
 MAW1 |     -    43     -     -   -90     -    36     -     -    52 |
 MBAR |     -   -34     -     -   -89     -     -     -     -   150 |
 MCM4 |     -    76     -     -     -     -     X     -     -   -86 |
 MDO1 |     -   -25     -   -62     -     -     -     -     -    72 |
 MEDI |     -  -150     -     -     -     -     -     -     -   170 |
 METS |     -   -45     -     -     -     -     -     -     -    51 |
 MKEA |     -   123     -   -53   -50     -    44     -     -   -50 |
 NKLG |     -     -     -     -  -176     -     -     -     -   231 |
 NLIB |     -     -     -  -181     -     -     -     -     -   154 |
 NRC2 |     -    66   199  -653    24     -  -132     -     -   -22 |
 NTUS |     -   -98     -     -     -     -     -     -     -   112 |
 ONSA |     -   -48     -   -84     -     -     -     -     -   127 |
 PENC |     -   201     -     -     -     -     -     -     -  -229 |
 PERT |     -    84     -     1     -     -     -     -     -   -97 |
 PIE1 |     -   -44     -     X     -     -     -     -     -    50 |
 PIMO |     -     -     -    54   -35     -     X     -     -     X |
 POL2 |     -    26     -     -     -     -     -     -     -   -30 |
 POTS |     -     5     -     -   -53     -     -     -     -    64 |
 PRDS |     -   -72     -     -     -     -     -     -     -    82 |
 PTBB |     -    26     -     -     -     -     -     -     -   -29 |
 REYK |     -    -2     -     -   -62     -     -     -     -    84 |
 RIOG |     -   191     -     -  -190     -   -57     -     -    57 |
 SANT |     -     7     -   158  -125     -   -17     -     -    30 |
 SCH2 |     -    10     -     -     -     -     -     -     -   -11 |
 SELE |     -     -     -   -66     -     -   102     -     -     7 |
 SFER |     -   -92     -     -     -     -     -     -     -   105 |
 STJO |     -   -90    47     -     -     -     -     -     -    54 |
 SUTH |     -   -93     -   -68     -     -   -60     -     -   194 |
 THTI |     -     -     -   171     -     -     -     -     -  -145 |
 TSKB |     -     -   191     X     -     -     -     -     -  -202 |
 USNO |     -   -16    88     -     -     -   -93     -     -   -31 |
 USUD |     -   -24     -    66     -     -    78     -     -   -66 |
 VILL |     -   -25    99  -140     -     -     -     -     -    43 |
 WILL |     -   -54     -     -     -     -     -     -     -    62 |
 WSRT |     -   -57     -   -49     -     -     -     -     -   107 |
 WTZR |     -  -124     -    92     -     -   -58     -     -    92 |
 YELL |     -    38   135  -292    19     -  -232     -     -   101 |
 YSSK |     -   102     -     -   -88     -     -     -     -     - |
 ZWEN |     -   -74     -   -66    80     -     -     -     -    35 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  7500    86    68   197   115  4819   108  7518     -    81 |  288   4.47
    2 |  8868    74    30   141   108     -   158  7766     -   102 |  288   1.91
    3 |  7653    83    65   116    56  3625   190  6890     -    54 |  288   3.80
    4 |  1376    48    54    87    35  1989   233  1273     -    46 |  288   0.50
    5 |  7581    93    52    59    34  5741   174  6492     -    56 |  288   3.73
    6 | 11235    64    62    69    57  3634   147 10785     -   102 |  288  10.66
    7 |  5582    89    47   101    41 10000   163  5146     -    93 |  288   0.76
    8 | 10692    62    81    62    69 14305     X  9499     -    59 |  288   5.11
    9 |  2251    71    53    38    31  3991   157  2280     -    96 |  288   1.99
   10 |  4721   173    55    70    54  7731   175  3484     -   117 |  282   2.51
   11 |  2048    66    60    97    63   751   170  1294     -    57 |  288   0.28
   13 |  1886    65    49    90    57   824   199  2027     -    32 |  288   0.23
   14 |  1647    99    48    94    44  1006   165  1666     -    83 |  288   0.29
   15 |  4308   211    67     -   185  2797   239  4322     -    96 |  288   2.61
   17 |  1622    72    67   144    60     -   172  1637     -   136 |  288   3.69
   18 |  1205    51    49   120   103   772   190  1080     -   111 |  288   0.33
   20 |   656    79    91   114    49   691    82   719     -    58 |  288   0.24
   21 |  7528   168   193     X   116     -   190  6249     -     X |  277   4.34
   22 |  1546    77    50   120    32  1449   181  1399     -    94 |  288   1.18
   23 |  7234   121   261    87    73  4336   273  6277     -   179 |  282   6.07
   24 |  5212    56    66    83    73  4278    60  5115     -    78 |  288   2.18
   25 |  5320    62    58    76    74  3014   156  5852     -   119 |  288   2.76
   26 |  1122    65   162    68   125  1036    51  1063     -    83 |  288   0.61
   27 |  3281    93    63    78    61  5201   236  3401     -    90 |  288   2.63
   28 |  2685    72    58    41    37  1250   178  2675     -    41 |  288   0.31
   29 |  4320    61    69   145    76  1645   157  4176     -   285 |  288   0.75
   30 |   977    78    69   192    74   656   171   934     -   110 |  288   0.77
   31 |  1423   201   133   173   137     -   186  1288     -   103 |  288   1.53
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    48     -     -     -     -    55     -     -    58 |  288   0.11
 ALGO |     -    64    38   204     -     -     -     -     -    59 |  288   0.04
 AMC2 |     -    43     -     -     -     -     -     -     -    50 |  286   0.04
 AOML |     -    32     -     -     -     -     -     -     -    37 |  284  33.02
 ARTU |     -    65     -     -    27     -   102     -     -     - |  287  20.76
 AUCK |     -    57     -   213     -     -     -     -     -    59 |  264  20.55
 BAHR |     -    41    40    43    34     -    82     -     -    30 |  288   0.54
 BILI |     -    26     -     -    23     -     -     -     -     - |  287   8.27
 BOR1 |     -    20     -     -     -     -     -     -     -    22 |  286   0.55
 BRMU |     -    52     -    61     X     -     -     -     -    50 |  288  22.35
 BRUS |     -    59     -     -     -     -   112     -     -    57 |  288   0.08
 CAS1 |     -   148     -   127    71     -    69     -     -   172 |  288   8.84
 CEDU |     -    14     -    29     -     -     -     -     -    21 |  288  14.97
 CHAT |     -    54     -    46     -     -    73     -     -    52 |  287  20.28
 CHUR |     -    62     -     -     -     -     -     -     -    71 |  286   1.06
 COCO |     -    52     -    81    60     -    95     -     -    37 |  288  12.56
 CRO1 |     -    54     -     -     -     -    83     -     -    55 |  288   0.25
 DAV1 |     -    65     -     -    45     -     -     -     -    27 |  288  28.82
 DRAO |     -    63    20     -     -     -     -     -     -    54 |  288   0.06
 FAIR |     -     -   188   100    71     -     X     -     -   121 |  286   0.11
 FORT |     -     -     -     -     X     -   155     -     -    78 |  220   0.21
 GALA |     -    84     -    75    62     -    90     -     -    87 |  288  33.70
 GOLD |     -    33     -     -     -     -     X     -     -    38 |  286  21.98
 GRAZ |     -    90     -   223     -     -     -     -     -    98 |  287  71.65
 GUAT |     -     -     -     -    90     -     -     -     -   119 |  286    >>>
 HOB2 |     -    45    45    51     -     -     -     -     -    24 |  288   0.06
 IISC |     -     -     -   204     -     -     -     -     -   173 |  180  20.08
 JPLM |     -     -     -     -    25     -     -     -     -    33 |  286  25.94
 KARR |     -    22     -     -    19     -     -     -     -     - |  288  15.41
 KERG |     -    35     -     -    44     -     X     -     -    37 |  287   1.27
 KIRU |     -    69     -     -     -     -   113     -     -    36 |  288   2.17
 KOSG |     -    34     -     -     -     -     -     -     -    39 |  286 167.00
 KOUR |     -    47     -    50     -     -     -     -     -    70 |  288  34.98
 KSTU |     -   123     -     -     -     -     -     -     -   140 |  282  16.30
 KWJ1 |     -     -     -     -   125     -   217     -     -   128 |  251  91.94
 LPGS |     -   142     -     -     -     -     -     -     -   162 |  275  40.42
 MAC1 |     -    27     -    60    46     -    71     -     -    34 |  288  13.10
 MALI |     -     -     -    42     -     -     -     -     -    36 |  214  15.53
 MAS1 |     -    33    48    35    23     -     -     -     -    39 |  288   3.35
 MATE |     -    64    65    26     -     -     X     -     -    16 |  288   0.11
 MAW1 |     -    81     -     -   106     -   103     -     -   176 |  251  22.90
 MBAR |     -    60     -     -    28     -     -     -     -    46 |  283  35.03
 MCM4 |     -   250     -     -     -     -     X     -     -   285 |  239  18.19
 MDO1 |     -   102     -   158     -     -     -     -     -    50 |  285    >>>
 MEDI |     -    17     -     -     -     -     -     -     -    20 |  286   0.11
 METS |     -    15     -     -     -     -     -     -     -    17 |  285  35.76
 MKEA |     -    41     -    47    60     -    64     -     -    70 |  288  38.17
 NKLG |     -     -     -     -    43     -     -     -     -    56 |  269    >>>
 NLIB |     -     -     -    36     -     -     -     -     -    31 |  288   0.04
 NRC2 |     -    55    24    93    16     -    79     -     -    51 |  288   0.03
 NTUS |     -    55     -     -     -     -     -     -     -    62 |  277   8.23
 ONSA |     -    36     -    32     -     -     -     -     -    33 |  288   0.12
 PENC |     -    28     -     -     -     -     -     -     -    32 |  285   8.73
 PERT |     -    44     -    61     -     -     -     -     -    29 |  288  23.35
 PIE1 |     -    40     -     X     -     -     -     -     -    46 |  282   0.06
 PIMO |     -     -     -   169   109     -     X     -     -     X |  255  31.74
 POL2 |     -    20     -     -     -     -     -     -     -    22 |  286  25.47
 POTS |     -   148     -     -    77     -     -     -     -    77 |  277  14.27
 PRDS |     -    54     -     -     -     -     -     -     -    62 |  286   1.33
 PTBB |     -    37     -     -     -     -     -     -     -    42 |  285   0.09
 REYK |     -    53     -     -    40     -     -     -     -    23 |  288   9.81
 RIOG |     -    82     -     -    60     -   198     -     -    69 |  285  18.01
 SANT |     -    65     -    63    37     -    79     -     -    32 |  288  31.59
 SCH2 |     -    36     -     -     -     -     -     -     -    41 |  286   3.75
 SELE |     -     -     -    51     -     -    94     -     -    53 |  288  47.10
 SFER |     -    15     -     -     -     -     -     -     -    17 |  283   1.09
 STJO |     -    52    46     -     -     -     -     -     -    31 |  288   5.69
 SUTH |     -    27     -    77     -     -    88     -     -    37 |  288  31.14
 THTI |     -     -     -    92     -     -     -     -     -    79 |  287   1.87
 TSKB |     -     -   155     X     -     -     -     -     -   164 |  280   1.49
 USNO |     -    47    42     -     -     -    82     -     -    50 |  288   0.04
 USUD |     -   148     -   103     -     -    90     -     -   270 |  288   0.46
 VILL |     -    49    73    41     -     -     -     -     -    20 |  288  16.40
 WILL |     -    51     -     -     -     -     -     -     -    58 |  286   1.98
 WSRT |     -    43     -    43     -     -     -     -     -    41 |  288   0.04
 WTZR |     -    67     -    35     -     -    86     -     -    67 |  286 514.08
 YELL |     -    66    20    53    20     -    86     -     -    58 |  288   0.08
 YSSK |     -    17     -     -    15     -     -     -     -     - |  287  16.55
 ZWEN |     -    26     -    44    27     -     -     -     -    25 |  288  17.85
 -----+-------------------------------------------------------------+--------------
 TOT  |  5289    79    87   101    70  4798   132  4866     -    88 |


 BEST CLOCK FIT: NRC2   288   0.03 (ns) 

