
 GPS week: 1157   Day: 1   MJD: 52344                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2688      0    -0.01     0.28     4.79     0.00
 cod |   288     0  24901     25    -0.09     0.36     0.07    23.86
 emr |   288     0  11470      0   644.41    20.06     0.07    27.61
 esa |   288     0  17327   2056    -0.31    -0.67     0.14    10.66
 gfz |   288     0  16011    270    -0.06     0.45     0.08    21.55
 igu |    96     0   2208      0    -0.03     0.37     4.98     0.00
 ngs |    96     0   2688      0    -0.01     0.28     4.63     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  23654   1168   534.95    -5.20     0.10    16.32

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 | -5022   -32   -19   531   -13 10707 -3616     -  -250 |
    2 |  -324    51  -120   502  -151     -  -593     -     - |
    3 |   634    64   -89   281   -12 -3878  -217     -  -110 |
    4 | -4891   223  -239   -68   149 -5194 -4879     -   -73 |
    5 |  1720    36   -58  -272   279 13110  1727     -  -147 |
    6 |  3261   141  -217  -257   255 12865  2158     -     X |
    7 | -4188   128  -139   -34   133-13214 -4617     -  -106 |
    8 |  2863     2    -3   240   -17   999  2807     -  -133 |
    9 | -2745    84   -67   -28   158  2301 -2806     -  -200 |
   10 | -7937    96  -109  -272   292-14718 -8096     -  -171 |
   11 |  6539   -75   172   285  -382  -587  6601     -   138 |
   13 |  6714    51   -69   482  -220  2070  6647     -    19 |
   14 |  6048   -64   163  -171    -8  5304  5895     -   -61 |
   15 | -1550   131  -108     -   100     - -1020     -  -141 |
   17 |  3583   124  -120     X   188     -  3362     -  -226 |
   18 |  5874   -32    84  -269    20  2663  5725     -    53 |
   20 |  5982  -171   133   507  -175  2871  5659     -   -76 |
   21 | -3116    93    60     X  -113     - -2210     -   -88 |
   22 | -9808    57    95     X    -9-11064 -9670     -  -233 |
   23 | -4787   128   -93  -190   231     - -4394     -  -213 |
   24 |  5241   151  -241     3   243  6783  4885     -  -137 |
   25 | -3941   -16   -85   652   -54  5123 -4036     -  -187 |
   26 | -2571   -37  -140    35   172 -1343 -2221     -    52 |
   27 | -1222   -32    83   320   -28 -2192 -1087     -  -266 |
   28 |   556    82    78  -215  -107   368   787     -    31 |
   29 |  1096    89    17  -171   -19  2163   796     -   -34 |
   30 | -2451   125   -97  -119   191-22380 -2508     -  -194 |
   31 |  4441    37   140   291  -206  7243  4920     -  -210 |
 -----+-------------------------------------------------------+
 ALBH |     -  -108     -     X     -     -     -     -   157 |
 ALGO |     -  -102   109     X   -63     -     -     -    49 |
 AMC2 |     -   -89     -     -     -     -     -     -   129 |
 ANKR |     -     1     -    -3     -     -     -     -     - |
 AUCK |     -   -20     -    79     -     -     -     -   -11 |
 BAHR |     -    60    55    88   -80     -     -     -  -132 |
 BILI |     -     1     -     -    -2     -     -     -     - |
 BOR1 |     -   128     -     -     -     -     -     -  -187 |
 BRMU |     -     -     -  -688   340     -     -     -     X |
 BRUS |     -   -38     -     -     -     -     -     -    55 |
 CAS1 |     -   -78     -   347   -85     -     -     -     X |
 CEDU |     -   361     -  -809     -     -     -     -     - |
 CHAT |     -  -127     -    57     -     -     -     -   150 |
 COCO |     -    24     -  -317    77     -     -     -    71 |
 CRO1 |     -   -90     -     -     -     -     -     -   132 |
 DAEJ |     -    84     -     -     -     -     -     -  -123 |
 DAV1 |     -    19     -     -  -100     -     -     -   108 |
 DRAO |     -   -60    51     -     -     -     -     -     1 |
 FAIR |     -     -    60   -80     -     -     -     -   -49 |
 FORT |     -    83     -   -66     -     -     -     -   -73 |
 GALA |     -   -34     -   -34   -40     -     -     -   158 |
 GOLD |     -   -53     -     -     -     -     -     -    77 |
 GRAZ |     -   -25     -     -     -     -     -     -    37 |
 GUAM |     -   123     -   -81   -70     -     -     -   -32 |
 GUAT |     -     -     -     -  -172     -     -     -   227 |
 HOB2 |     -    39   261  -972     -     -     -     -   112 |
 HRAO |     -  -113     -     -     1     -     -     -   194 |
 IISC |     -  -118     -    37     -     -     -     -   136 |
 KARR |     -    37     -     -   -41     -     -     -     - |
 KERG |     -   106     -     -     -     -     -     -  -155 |
 KOUR |     -   -50     -     -    55     -     -     -     1 |
 KWJ1 |     -     -     -     -   -20     -     -     -    26 |
 LPGS |     -   -61     -     -     X     -     -     -    89 |
 MAC1 |     -   -40     -   103  -223     -     -     -   288 |
 MALI |     -  -683     -     X   756     -     -     -     - |
 MAS1 |     -   -32    98   -23  -122     -     -     -    55 |
 MATE |     -   -67   -68   -27     -     -     -     -   258 |
 MAW1 |     -    10     -     -     -     -     -     -   -15 |
 MDO1 |     -  -375   258   -98     -     -     -     -    26 |
 MEDI |     -  -117     -     -     -     -     -     -   172 |
 METS |     -   128     -     -     -     -     -     -  -188 |
 MKEA |     -   156   101  -114  -250     -     -     -     6 |
 MSKU |     -   -30     -     -    33     -     -     -     - |
 NKLG |     -    60     -     -     -     -     -     -   -88 |
 NPLD |     -  -119     -     -     -     -     -     -   174 |
 NYA1 |     -    13     -     -  -105     -     -     -   121 |
 NYAL |     -     -    -2   144     -     -     -     -   -90 |
 OHI2 |     -    98     -     -  -109     -     -     -     - |
 ONSA |     -   -56     -    79     -     -     -     -    30 |
 PENC |     -   -41     -     -     -     -     -     -    61 |
 PIE1 |     -    -6     -    13     -     -     -     -     - |
 POTS |     -   -74     -    85     -     -     -     -    54 |
 REYK |     -  -106     -     -     -     -     -     -   155 |
 SANT |     -    26     -    69   -78     -     -     -    23 |
 SELE |     -   144     -  -323     -     -     -     -     - |
 SEY1 |     -     -     -   -82     -     -     -     -    53 |
 STJO |     -  -104   117     -  -103     -     -     -    90 |
 SUTH |     -   -95     -   -10     -     -     -     -   145 |
 TIDB |     -    24     -     X   -27     -     -     -     X |
 TRO1 |     -  -104     -     -    23     -     -     -   123 |
 TROM |     -     -     -  -122     -     -     -     -    80 |
 TSKB |     -     -   -56   146     -     -     -     -     - |
 URUM |     -    43     -     -   -85     -     -     -    48 |
 VILL |     -   -11     -     5     -     -     -     -    13 |
 WHIT |     -    34     -     -   -38     -     -     -     - |
 WSRT |     -   -24     -     -     -     -     -     -    35 |
 WTZR |     -  -134     -   150     -     -     -     -    98 |
 YELL |     -    14  -261  -175     -     -     -     -   132 |
 ZWEN |     -   -10     -     -   -77     -     -     -   116 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  7196   103    67   133    74  7827  6653     -   121 |  288   3.66
    2 |  3333    75    78   217    62     -  3319     -     - |  288   2.90
    3 |  4078    73    59    94   183  2253  3959     -   118 |  288   2.34
    4 |  1767    54    31   146   115  1922  1663     -    59 |  288   0.52
    5 |  4897    87   120    83    63  7691  5033     -    68 |  288   4.34
    6 |  7942    47    56   180   123  4254  7586     -     X |  288   6.02
    7 |  5224    51    32    94    48  8230  4819     -    47 |  288   0.29
    8 |  3310    49    59    83    66  2175  3209     -    64 |  288   3.23
    9 |  2494    58    32   101    58  2630  2505     -    79 |  288   2.27
   10 |  8545    71    47   232    67  7661  7743     -    34 |  288   2.45
   11 |   674    60   149   178   112   929   660     -   103 |  288   0.39
   13 |   718    69    81   135    92  1210   603     -   206 |  288   0.36
   14 |   911    68    66   191    42  3085   913     -    78 |  288   0.25
   15 |  5947    67    67     -   109     -  6210     -    47 |  288   2.74
   17 |  1683    64   114     X   159     -  1496     -    72 |  288   2.74
   18 |  1541    83    63    97    32  1537  1580     -    74 |  288   0.35
   20 |  1009    82    26   104    40  1589  1190     -   117 |  288   0.21
   21 |  6217   100    53     X    39     -  7204     -   164 |  288   4.37
   22 |  3775    56   117     X   169  9300  3668     -    69 |  288   2.48
   23 |  8016    83    90   105    79     -  7672     -   146 |  288   5.80
   24 |  2344   120    44   157    70  4650  2910     -    74 |  288   2.77
   25 |  2470    52    26   128    42  2108  2472     -    76 |  288   1.98
   26 |  1371   129    53   291    72  1414  1292     -   278 |  288   0.63
   27 |  7762    66    31    89    63  4025  7813     -   136 |  288   4.33
   28 |  1864    70    96    84   100  1513  2227     -    43 |  288   0.72
   29 |  1217    69    88   252    87  1661  1322     -   135 |  288   0.80
   30 |  3308    66    56    77    60  9825  3272     -    41 |  288   1.59
   31 | 10607    39    79    74   150  6426  9149     -   204 |  288   5.16
 -----+-------------------------------------------------------+--------------
 ALBH |     -    46     -     X     -     -     -     -    67 |  286   0.13
 ALGO |     -    58    16     X    23     -     -     -    79 |  288   0.05
 AMC2 |     -    26     -     -     -     -     -     -    37 |  286   0.03
 ANKR |     -    26     -    59     -     -     -     -     - |  288  11.64
 AUCK |     -    83     -   327     -     -     -     -    89 |  264  22.78
 BAHR |     -   115    69   240    90     -     -     -    53 |  286   0.44
 BILI |     -    14     -     -    16     -     -     -     - |  287  12.65
 BOR1 |     -    34     -     -     -     -     -     -    49 |  286   0.60
 BRMU |     -     -     -    76    37     -     -     -     X |  110  29.61
 BRUS |     -    43     -     -     -     -     -     -    63 |  286   0.18
 CAS1 |     -    42     -    47    37     -     -     -     X |  288   9.46
 CEDU |     -    32     -    72     -     -     -     -     - |  286  16.47
 CHAT |     -    34     -    60     -     -     -     -    30 |  287  23.46
 COCO |     -    37     -    59    65     -     -     -    79 |  288   9.57
 CRO1 |     -    50     -     -     -     -     -     -    73 |  287   0.13
 DAEJ |     -    27     -     -     -     -     -     -    39 |  125   1.60
 DAV1 |     -    71     -     -    33     -     -     -    80 |  288  20.96
 DRAO |     -    40    18     -     -     -     -     -    55 |  288   0.07
 FAIR |     -     -    82   133     -     -     -     -   190 |  286   0.35
 FORT |     -    77     -   183     -     -     -     -    57 |  287   0.25
 GALA |     -    53     -   121    89     -     -     -   157 |  288  48.59
 GOLD |     -    49     -     -     -     -     -     -    71 |  286  39.35
 GRAZ |     -    88     -     -     -     -     -     -   129 |  285  74.53
 GUAM |     -    26     -   102    21     -     -     -    48 |  288  24.98
 GUAT |     -     -     -     -    69     -     -     -    91 |  261    >>>
 HOB2 |     -    53    44    50     -     -     -     -    36 |  288   0.08
 HRAO |     -    77     -     -   111     -     -     -   275 |  288  35.11
 IISC |     -    58     -   128     -     -     -     -    37 |  288  55.36
 KARR |     -    32     -     -    35     -     -     -     - |  285  14.28
 KERG |     -    25     -     -     -     -     -     -    36 |  285   1.73
 KOUR |     -    20     -     -    27     -     -     -    48 |  288  45.54
 KWJ1 |     -     -     -     -   158     -     -     -   208 |  209 113.67
 LPGS |     -    44     -     -     X     -     -     -    65 |  270  28.75
 MAC1 |     -    40     -    45    23     -     -     -    45 |  288  17.90
 MALI |     -    20     -     X    22     -     -     -     - |  247  26.86
 MAS1 |     -    29    20    67    33     -     -     -    27 |  288   2.00
 MATE |     -    91    45   106     -     -     -     -    70 |  278   0.22
 MAW1 |     -    24     -     -     -     -     -     -    35 |  286  24.40
 MDO1 |     -    40    32   138     -     -     -     -    55 |  288  30.99
 MEDI |     -    28     -     -     -     -     -     -    40 |  286   0.44
 METS |     -    43     -     -     -     -     -     -    63 |  285  18.46
 MKEA |     -    26    17    98    37     -     -     -    36 |  288  50.74
 MSKU |     -    27     -     -    30     -     -     -     - |  272  27.22
 NKLG |     -    24     -     -     -     -     -     -    35 |  268    >>>
 NPLD |     -    29     -     -     -     -     -     -    43 |  285   0.05
 NYA1 |     -    40     -     -    21     -     -     -    78 |  288   0.06
 NYAL |     -     -    25    39     -     -     -     -    59 |  288   0.07
 OHI2 |     -    21     -     -    23     -     -     -     - |  287   9.65
 ONSA |     -    30     -    44     -     -     -     -    43 |  264   0.13
 PENC |     -   200     -     -     -     -     -     -   292 |  279   6.81
 PIE1 |     -    17     -    39     -     -     -     -     - |  203   0.05
 POTS |     -    33     -    46     -     -     -     -    46 |  287  15.03
 REYK |     -    40     -     -     -     -     -     -    58 |  285  11.29
 SANT |     -   101     -   215   159     -     -     -    57 |  288  34.52
 SELE |     -   104     -   233     -     -     -     -     - |  206  29.04
 SEY1 |     -     -     -   182     -     -     -     -   119 |  117  40.37
 STJO |     -    49    34     -    44     -     -     -    73 |  288   1.96
 SUTH |     -    72     -   152     -     -     -     -    32 |  288  34.65
 TIDB |     -    19     -     X    21     -     -     -     X |  269   0.10
 TRO1 |     -    50     -     -    22     -     -     -    77 |  288   8.84
 TROM |     -     -     -    56     -     -     -     -    37 |  286  10.35
 TSKB |     -     -    20    51     -     -     -     -     - |  229   1.51
 URUM |     -    12     -     -    48     -     -     -    59 |  288  29.80
 VILL |     -    18     -    97     -     -     -     -    51 |  288  23.58
 WHIT |     -    15     -     -    17     -     -     -     - |  288   4.26
 WSRT |     -    23     -     -     -     -     -     -    34 |  288   0.05
 WTZR |     -    35     -    56     -     -     -     -    58 |  288   0.04
 YELL |     -   225    97   154     -     -     -     -   269 |  288   0.13
 ZWEN |     -   123     -     -   107     -     -     -    63 |  277  19.96
 -----+-------------------------------------------------------+--------------
 TOT  |  4792    67    66   136    81  4977  4625     -   102 |


 BEST CLOCK FIT: AMC2   286   0.03 (ns) 

