
 GPS week: 1155   Day: 1   MJD: 52330                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2675      0     0.09    -0.04     4.39     0.00
 cod |   288     0  26133    806     0.13    -0.13     0.10    16.50
 emr |   288     0  11841      6   400.12    18.38     0.09    19.19
 esa |   288     0  17664   1135     0.16    -0.80     0.14    10.91
 gfz |   288     0  14905    164     0.27    -0.55     0.09    19.02
 igu |    96     0   2294      0     0.09    -0.08     3.16     0.00
 jpl |   273     0  11943    975     1.92    -0.82     0.11    14.71
 ngs |    96     0   2675      0     0.09    -0.04     4.04     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  26167    933   605.82    -3.13     0.09    19.67

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -1816    79  -110   283   -29 -4230   271 -2059     -  -240 |
    2 | -3287   110  -391   274   117     -   185 -3307     -     - |
    3 |-10138   100  -302   224   203 -6175    93 -9267     -  -122 |
    4 | -5569   217   -14    42  -153 -3680  -141 -6161     -   -23 |
    5 |  5731    34    -7   -16    20  8949   -68  5506     -   -23 |
    6 |   154    98   -44    25    58  4469   -85   356     -   -60 |
    7 | -1990   260  -188  -274   208 -5572    97 -2148     -  -138 |
    8 |   765  -102   -44   580   -43 -2366    44   730     -  -136 |
    9 | -8397   133   -57    37    34 -3667  -100 -7283     -   -52 |
   10 |  1810    80   -58  -295   336  8229  -100  1575     -  -116 |
   11 |  2835     0   -24   326  -255  2736   145  2700     -     7 |
   13 |  4803   -57   129   165  -226  2376   -36  4512     -    69 |
   14 |  4052   -12    70     5  -107  2894    76  4018     -     X |
   15 |  3046   116  -100     -    76     -    73  2468     -  -119 |
   17 |  2975    -8   -60    -4   250     -   -78  2385     -  -166 |
   18 |  5842   -73    60   -12    26  4415   -99  5679     -     X |
   20 |  3507  -101    43   132    83  2859   256  3522     -  -145 |
   21 |  2514     X    57     X    50     -    52  1238     -  -111 |
   22 | -6560  -112  -132   304   138   118   207 -5407     -  -197 |
   23 |  1580   102    57  -222   161  3596    82  1685     -  -221 |
   24 | -1964   127   -74  -136   125-11329   -38 -1783     -   -55 |
   25 | -2629   145  -198   319    72 -1177    22 -2517     -  -173 |
   26 |  -426    87   -10  -125   124  3151  -201  -542     -   -87 |
   27 | -1102    53    53    83    27 -1743   102 -1342     -  -225 |
   28 |  1382   142    10  -118  -115  2019    62  1737     -    44 |
   29 | -1554    78   -16   138  -114 -1479   -49 -1555     -    -9 |
   30 |    38    91    40   -10    30 -7856  -140   205     -   -61 |
   31 |  4157   130  -260   345   115  3189   196  4824     -  -184 |
 -----+-------------------------------------------------------------+
 ALBH |     -    29     -     -     -     -  -278     -     -   174 |
 ALGO |     -    11   139     X  -234     -  -134     -     -   176 |
 AMC2 |     -   -82     -     -     -     -     -     -     -    69 |
 AREQ |     -    79     -  -120     -     -   -63     -     -    46 |
 ARTU |     -   -76     -     -     -     -    85     -     -     - |
 ASC1 |     -   -79     -     -     -     -     -     -     -    66 |
 AUCK |     -  -105     -   132     -     -     -     -     -    27 |
 BAHR |     -     -   104   -54  -105     -     -     -     -    30 |
 BILI |     -    69     -     -   -60     -     -     -     -     - |
 BOR1 |     -   149     -     -     -     -     -     -     -  -125 |
 BRMU |     -   332     -  -348   -29     -     -     -     -   -49 |
 BRUS |     -  -103     -     -     -     -   -12     -     -    95 |
 CAS1 |     -  -147     -   102   -55     -   -71     -     -   169 |
 CHAT |     -  -110     -   243    12     -  -208     -     -    93 |
 COCO |     -   217     -  -422    28     -   -34     -     -    49 |
 CRO1 |     -  -169     -     -     -     -   137     -     -    44 |
 DARW |     -   -79     -     -     -     -    89     -     -     - |
 DAV1 |     -  -100     -     -   -80     -     -     -     -   161 |
 DRAO |     -    55    36     -     -     -     -     -     -   -82 |
 FAIR |     -     -    75  -102     -     -     X     -     -   -14 |
 FORT |     -     -   150  -265     -     -     -     -     -     - |
 GALA |     -  -101     -  -184    35     -    29     -     -   125 |
 GOLD |     -   -18     -     -     -     -     X     -     -    15 |
 GUAM |     -   120     -  -109    25     -  -213     -     -    86 |
 HOB2 |     -    16    50  -261     -     -     -     -     -    83 |
 HRAO |     -   -61     -     -   -24     -  -167     -     -   193 |
 IISC |     -  -465     -     -     -     -     -     -     -   390 |
 KARR |     -  -160     -     -   139     -     -     -     -     - |
 KERG |     -    21     -     -     -     -     -     -     -   -18 |
 KIRU |     -     8     -   -13     -     -     -     -     -     - |
 KOSG |     -  -119     -     -     -     -     -     -     -    99 |
 KOUR |     -    -4     -    50     -     -     -     -     -   -25 |
 KSTU |     -   -45     -     -     -     -     4     -     -    35 |
 LPGS |     -     -     -     -     X     -    44     -     -   -33 |
 MAS1 |     -   -49   173     -  -134     -   -33     -     -    25 |
 MATE |     -  -169    86  -284     -     -     X     -     -   188 |
 MAW1 |     -    50     -     -   -58     -    42     -     -   -14 |
 MCM4 |     -   209     -     -  -128     -     X     -     -   -60 |
 MDO1 |     -     -     -   250     -     -     -     -     -  -139 |
 MEDI |     -  -229     -     -     -     -     -     -     -   192 |
 METS |     -    34     -     -     -     -     -     -     -   -29 |
 MKEA |     -   187   186     -  -246     -  -120     -     -   -16 |
 NKLG |     -   -18     -    99     -     -     -     -     -   -41 |
 NPLD |     -   -68     -     -     -     -     -     -     -    57 |
 NRC2 |     -   -57    97   -38     -     -   -39     -     -     1 |
 NTUS |     -  -113     -     -     -     -     -     -     -    95 |
 NYA1 |     -   -56     -     -  -181     -    46     -     -   196 |
 NYAL |     -     -     -    50     -     -     -     -     -   -28 |
 ONSA |     -     -     -   -13     -     -     -     -     -     7 |
 PENC |     -   -22     -     -     -     -     -     -     -    19 |
 PERT |     -   101     -   -29     -     -     -     -     -   -66 |
 PIMO |     -     -     -     -     -     -   809     -     -  -605 |
 POTS |     -   -51     -     -     -     -     -     -     -    43 |
 REYK |     -   -70     -     -     -     -     -     -     -    59 |
 RIOG |     -   -26     -   130  -167     -    70     -     -    62 |
 SANT |     -     X     -     -    -7     -     -     -     -     7 |
 SELE |     -   -85     -   128     -     -     -     -     -     - |
 SEY1 |     -     -     -  -738     -     -     -     -     -   409 |
 SFER |     -  -311     -  -205     -     -     -     -     -   377 |
 STJO |     -  -106   209     -  -213     -     -     -     -    92 |
 SUTH |     -   106     -   -37     -     -     -     -     -   -64 |
 THTI |     -     -     -    -5   168     -     -     -     -  -160 |
 TIDB |     -     X     -     -     -     -   -92     -     -    69 |
 TRO1 |     -    41     -     -   140     -     -     -     -  -211 |
 TROM |     -     -     -   137     -     -     -     -     -   -76 |
 TSKB |     -     -    -5     X     -     -     -     -     -     5 |
 URUM |     -   -30     -     -     -     -     -     -     -    25 |
 USNO |     -    36   195     -     -     -   -10     -     -  -213 |
 USUD |     -   -15     -     X     -     -     -     -     -    13 |
 VILL |     -   -44     -   -37     -     -     -     -     -    58 |
 WES2 |     -    61     -   -93     -     -     -     -     -     - |
 WHIT |     -    75     -     -   -65     -     -     -     -     - |
 WSRT |     -   -60     -   -79     -     -     -     -     -    94 |
 WTZR |     -  -117     -    22     -     -    16     -     -    75 |
 YAR2 |     -  -137     -    -2     -     -   154     -     -     X |
 YELL |     -    12   141  -240     -     -   -35     -     -    13 |
 YSSK |     -    41     -     -     -     -   -46     -     -     - |
 ZWEN |     -  -137     -     -   -10     -     -     -     -   125 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5172    93    92   141    89  3364    92  5088     -   126 |  288   3.79
    2 |  1886   153    98   274   109     -   142  1871     -     - |  288   1.72
    3 |  4835    55   149   307    59  1598    45  4054     -    72 |  288   1.50
    4 |  5120    89   117    77    47  2650    55  4059     -   131 |  288   0.56
    5 |  4538    72    85   167    52  2113    62  3961     -    91 |  288   2.40
    6 |  6271    57   103    48    69  1942    56  6484     -    83 |  288   5.60
    7 |  1529   113    83   156    39  2090    37  1634     -   117 |  288   0.58
    8 |  2534   141   221   356    46  2863    92  2502     -   144 |  281   2.25
    9 |  3744   271    75   142   102  2276    85  3596     -    85 |  281   2.28
   10 |  3080    92    56   170    73  4650   236  3157     -   111 |  288   1.92
   11 |   993    86    49    80    30  1350   133   789     -    68 |  288   0.41
   13 |   891   109    75    64   108  1079    55   856     -   107 |  288   0.39
   14 |  1140    49    98    46    46  1336    40   939     -     X |  288   0.23
   15 |  7541   110    27     -    60     -   124  7258     -    70 |  285   2.83
   17 |  2402    66    53    56    64     -   112  2144     -    87 |  286   3.08
   18 |   892    45    94   169   150  2130    92  1018     -     X |  288   0.48
   20 |   715    77    39    65    86  1395    78   721     -    65 |  288   0.31
   21 |  6393     X   227     X   178     -   220  5730     -   228 |  285   4.01
   22 |  4291    80    40    81    78  1864    63  3313     -    45 |  288   1.19
   23 |  5706    79    45    99    47  2655    36  5718     -    66 |  288   5.24
   24 |  2557    74   106    88   213  4509    89  3239     -   122 |  288   2.71
   25 |  3289   202   104   151   191  2348    43  3241     -   111 |  282   1.91
   26 |   874    62    73    58    57   927    62   783     -    64 |  288   0.77
   27 | 10073   145    71   441   238  5396    74  9143     -   123 |  282   5.71
   28 |  3287   115    33    70   120  1688    60  2717     -   117 |  288   1.05
   29 |   942    77    68    77    84  1420    41   857     -    74 |  288   0.84
   30 |  1855    58   149   114    79  7056    69  1768     -   106 |  288   1.85
   31 |  9064    54   103   187   100  6390   105  7527     -   115 |  288   3.29
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    38     -     -     -     -    25     -     -    28 |  288   0.15
 ALGO |     -    82    51     X    25     -    37     -     -    20 |  288   0.07
 AMC2 |     -    18     -     -     -     -     -     -     -    15 |  286   0.03
 AREQ |     -    68     -    95     -     -   115     -     -   155 |  277  36.43
 ARTU |     -    43     -     -     -     -    48     -     -     - |  271  41.02
 ASC1 |     -   257     -     -     -     -     -     -     -   216 |  255    >>>
 AUCK |     -   123     -   243     -     -     -     -     -   108 |  264  19.11
 BAHR |     -     -    50    64    58     -     -     -     -    39 |  288   0.38
 BILI |     -    53     -     -    46     -     -     -     -     - |  287  19.06
 BOR1 |     -    37     -     -     -     -     -     -     -    31 |  285   0.46
 BRMU |     -    65     -   125    46     -     -     -     -    54 |  288  36.05
 BRUS |     -    56     -     -     -     -    84     -     -    36 |  288   0.07
 CAS1 |     -   112     -    64   101     -    45     -     -    86 |  288   8.48
 CHAT |     -    61     -    39    42     -    60     -     -    95 |  287  16.82
 COCO |     -    86     -    41    51     -    66     -     -    62 |  288   9.58
 CRO1 |     -    49     -     -     -     -    41     -     -    47 |  288   0.10
 DARW |     -   412     -     -     -     -   463     -     -     - |  266  24.11
 DAV1 |     -    81     -     -    56     -     -     -     -    37 |  288  17.90
 DRAO |     -    33    34     -     -     -     -     -     -    33 |  288   0.07
 FAIR |     -     -    27    84     -     -     X     -     -    52 |  280   0.13
 FORT |     -     -   136   239     -     -     -     -     -     - |  167   0.32
 GALA |     -    77     -    72    44     -   108     -     -    52 |  288  44.77
 GOLD |     -   104     -     -     -     -     X     -     -    87 |  253  39.53
 GUAM |     -    39     -    45   101     -    74     -     -    75 |  288  29.15
 HOB2 |     -    96    44    51     -     -     -     -     -    50 |  288   0.07
 HRAO |     -    83     -     -    50     -    71     -     -    60 |  288  32.55
 IISC |     -    45     -     -     -     -     -     -     -    37 |  205  48.88
 KARR |     -    42     -     -    36     -     -     -     -     - |  288  21.22
 KERG |     -    88     -     -     -     -     -     -     -    74 |  287   1.76
 KIRU |     -    34     -    52     -     -     -     -     -     - |  288   3.11
 KOSG |     -    34     -     -     -     -     -     -     -    28 |  286  12.26
 KOUR |     -    64     -    82     -     -     -     -     -    26 |  288  42.33
 KSTU |     -   181     -     -     -     -    85     -     -   157 |  236  25.12
 LPGS |     -     -     -     -     X     -   198     -     -   148 |  206  88.20
 MAS1 |     -    63    14     -    24     -    68     -     -    22 |  288   3.05
 MATE |     -    45    53    89     -     -     X     -     -    35 |  288   0.15
 MAW1 |     -    87     -     -    60     -    32     -     -    32 |  252  27.17
 MCM4 |     -   135     -     -   192     -     X     -     -   128 |  264    >>>
 MDO1 |     -     -     -    57     -     -     -     -     -    32 |  220  14.92
 MEDI |     -    35     -     -     -     -     -     -     -    29 |  286   0.29
 METS |     -   192     -     -     -     -     -     -     -   161 |  284  19.60
 MKEA |     -    43    71     -    38     -    47     -     -    78 |  285  48.14
 NKLG |     -    55     -    77     -     -     -     -     -    47 |  287    >>>
 NPLD |     -    41     -     -     -     -     -     -     -    34 |  285   0.04
 NRC2 |     -    52    32    78     -     -    39     -     -    24 |  288   0.05
 NTUS |     -    48     -     -     -     -     -     -     -    40 |  285   7.35
 NYA1 |     -    66     -     -    96     -   102     -     -    98 |  288   0.05
 NYAL |     -     -     -    96     -     -     -     -     -    53 |  279   0.09
 ONSA |     -     -     -    63     -     -     -     -     -    35 |  277    >>>
 PENC |     -    38     -     -     -     -     -     -     -    32 |  285   8.42
 PERT |     -    71     -    41     -     -     -     -     -    46 |  288  17.10
 PIMO |     -     -     -     -     -     -   192     -     -   144 |  146  34.79
 POTS |     -    39     -     -     -     -     -     -     -    33 |  274  15.34
 REYK |     -    38     -     -     -     -     -     -     -    32 |  286  11.38
 RIOG |     -    72     -    72   100     -    57     -     -    83 |  288  20.45
 SANT |     -     X     -     -    74     -     -     -     -    71 |  228  31.15
 SELE |     -    77     -   116     -     -     -     -     -     - |  224  25.21
 SEY1 |     -     -     -   196     -     -     -     -     -   109 |  154  55.83
 SFER |     -   199     -   148     -     -     -     -     -   247 |  287  28.74
 STJO |     -    28    38     -    29     -     -     -     -    38 |  288   2.54
 SUTH |     -   259     -   153     -     -     -     -     -   162 |  251  29.37
 THTI |     -     -     -    37    57     -     -     -     -    56 |  287   2.56
 TIDB |     -     X     -     -     -     -    53     -     -    40 |  260 383.18
 TRO1 |     -    35     -     -    25     -     -     -     -    34 |  288  10.28
 TROM |     -     -     -   152     -     -     -     -     -    84 |  283  10.25
 TSKB |     -     -    29     X     -     -     -     -     -    28 |  288   1.71
 URUM |     -    29     -     -     -     -     -     -     -    24 |  288  31.63
 USNO |     -    37    38     -     -     -    33     -     -    20 |  288   0.03
 USUD |     -    57     -     X     -     -     -     -     -    48 |  215   0.27
 VILL |     -    36     -    45     -     -     -     -     -    22 |  288  24.72
 WES2 |     -    74     -   112     -     -     -     -     -     - |  285   0.10
 WHIT |     -    30     -     -    26     -     -     -     -     - |  287  35.03
 WSRT |     -    32     -    70     -     -     -     -     -    31 |  288   0.03
 WTZR |     -    43     -    84     -     -    89     -     -    23 |  288   0.06
 YAR2 |     -    69     -    53     -     -    63     -     -     X |  236   5.13
 YELL |     -   132   127   274     -     -   125     -     -    49 |  288   0.23
 YSSK |     -    34     -     -     -     -    38     -     -     - |  269  21.82
 ZWEN |     -    34     -     -    24     -     -     -     -    25 |  277  21.09
 -----+-------------------------------------------------------------+--------------
 TOT  |  4394   102    90   139    91  3155   112  4037     -    87 |


 BEST CLOCK FIT: AMC2   286   0.03 (ns) 

