
 GPS week: 1151   Day: 1   MJD: 52302                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2670      0     0.15    -0.44     4.36     0.00
 cod |   288     0  25008     10    -0.72     0.44     0.08    21.89
 emr |   288     0  10470    276     5.83    -1.75     0.16     8.31
 esa |   288     0  17243   1736    -0.13    -0.08     0.13    11.88
 gfz |   288     0  14666    181     0.15    -0.47     0.08    20.46
 igu |    96     0   2300      0    -0.03    -0.12     3.18     0.00
 jpl |   280     0  10450   1263     1.23     0.94     0.11    15.73
 ngs |    96     0   2670      0     0.13    -0.44     4.22     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  23620    404   690.85    -3.45     0.08    21.72

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |-10212   -46   -59  -112   192-17928    46 -7634     -   -66 |
    2 | -4351    51  -204  1010  -212 -8485    55 -3038     -  -302 |
    3 |  2501   207  -146  -232   -55 -2572   209  1382     -   -45 |
    4 |  -240    26     X  -391   263  3966     X  -934     -   -75 |
    5 | -4096    53     1  -342   350 -8427  -145 -4896     -  -147 |
    6 | -1868   122    -4   194   114  6299   -33 -1749     -  -324 |
    7 |  2754   122  -289   104    35  4881    95  2385     -  -136 |
    8 | -9427    -3  -198   362   -46    -5   144 -8626     -  -126 |
    9 |  7931    80   -59    12   164 18415  -221  7019     -  -143 |
   10 | -6915   -57  -305  1095   -46 -4316   -46 -6752     -  -366 |
   11 |  3443    18   230  -517  -132   334    91  3458     -   264 |
   13 |  7859   -52   202  -195   128 -1215  -132  7598     -     7 |
   14 |  1574  -131   -12   845  -211   892   -94  1468     -   -94 |
   15 |    64     -   132     -     -     -   153  -761     -  -103 |
   17 | -3134     -   230     X   215     -    41 -3612     -  -304 |
   18 | 11200   116    99  -460    43 -1397   292 10950     -   -45 |
   20 |  5309   -85   135   152  -138   -83   263  5367     -   -11 |
   21 |  1405    30    15     X    95     -   128  1320     -  -170 |
   22 |-10635   137   133  -272    75  -880   262 -9001     -  -202 |
   23 | -4364    54   -89   305   144 -1159   119 -3536     -  -367 |
   24 |  2126    87  -240  -528   256  -601   172  1569     -   -56 |
   25 | -6020   -77  -126   427   128 -6367     7 -4786     -  -232 |
   26 | -4423   269   -88  -664   294  5539    -1 -4005     -  -152 |
   27 |  7831  -109  -213   882    13  6919    -9  6939     -  -300 |
   28 | 11850   -26   -93   204   -66 -1763    35 10792     -     1 |
   29 |  -506   -27   -67   324    79     -   -58  -962     -  -178 |
   30 | -1125   -20   -93  -361   504   227  -263 -1346     -  -131 |
   31 |  1422   218   -91  -174  -243  7800   412  1196     -    -6 |
 -----+-------------------------------------------------------------+
 ALBH |     -   -47     -     -     -     -  -135     -     -   141 |
 AMC2 |     -   -25     -     -     -     -     -     -     -    25 |
 AOML |     -   -38     -     -     -     -     -     -     -    38 |
 ARTU |     -   -72     -     -     -     -   100     -     -     - |
 AUCK |     -   -68     -     X     -     -     -     -     -    68 |
 BAHR |     -   -79    -3   104     -     -     -     -     -    23 |
 BOR1 |     -    28     -     -     -     -     -     -     -   -28 |
 BRMU |     -    81     -   101     -     -     -     -     -  -145 |
 BRUS |     -    48     -     -     -     -   -46     -     -   -16 |
 CAS1 |     -  -180     -    74     -     -    31     -     -   120 |
 CEDU |     -   225     -  -415     -     -     -     -     -     - |
 CHAT |     -   -63     -     X     -     -  -188     -     -   201 |
 CRO1 |     -   -26     -     -     -     -    36     -     -     X |
 DAV1 |     -   -92     -     -     -     -     -     -     -    93 |
 DRAO |     -   111   136     -  -145     -     -     -     -   -27 |
 EISL |     -  -151     -   278     -     -     -     -     -     - |
 FAIR |     -     -    88  -135  -120     -   -78     -     -   249 |
 FORT |     -  -302   156   257     -     -     -     -     -    56 |
 GALA |     -    23     -  -126    49     -   -80     -     -    57 |
 GOLD |     -   -28     -     -   -28     -     X     -     -    56 |
 GRAZ |     -   -94     -   -33     -     -     -     -     -   114 |
 GUAM |     -   147     -   -84  -116     -   -58     -     -    48 |
 HARB |     -  -117     -     -   125     -     -     -     -     - |
 HOB2 |     -   -59     -     -     -     -     -     -     -    59 |
 HRAO |     -   -61     -     -     -     -  -130     -     -   155 |
 IISC |     -   -32     -  -188     -     -     -     -     -   133 |
 KIRU |     -    64     -  -210     -     -    71     -     -     - |
 KOSG |     -   -32     -     -     -     -     -     -     -    32 |
 MAC1 |     -    32     -  -112  -331     -   211     -     -   196 |
 MALI |     -  -139     -   256     X     -     -     -     -     - |
 MAS1 |     -   -73   -24   118    34     -   -13     -     -    -5 |
 MATE |     -    59  -259    15     -     -     X     -     -    32 |
 MAW1 |     -    42     -     -   -80     -     -     -     -    33 |
 MCM4 |     -   238     -     -  -563     -     X     -     -   291 |
 MDO1 |     -  -201   126  -101     -     -     -     -     -   174 |
 MEDI |     -   -24     -     -     -     -     -     -     -    24 |
 METS |     -  -129     -     -     -     -     -     -     -   130 |
 MKEA |     -     -   637   -37  -158     -   -33     -     -   -51 |
 MSKU |     -    75     -     -   -81     -     -     -     -     - |
 NLIB |     -    65     -     X  -271     -     -     -     -   191 |
 NPLD |     -   -49     -     -     -     -     -     -     -    49 |
 NSSP |     -    33     -     -     -     -  -259     -     -   157 |
 NTUS |     -  -136     -     -     -     -     -     -     -   137 |
 OHIG |     -   -91     -  -207   144     -     -     -     -    69 |
 ONSA |     -    40     -     -  -117     -     -     -     -    70 |
 PENC |     -   291     -     -     -     -     -     -     -  -294 |
 PERT |     -    35     -  -173    48     -     -     -     -    14 |
 PETP |     -   -27     -     -    29     -     -     -     -     - |
 PIE1 |     -   -58     -   -43     -     -     -     -     -    76 |
 REYK |     -   -21     -     -     -     -     -     -     -    21 |
 RIOG |     -   -63     -     -     3     -    88     -     -     - |
 SANT |     -   -93     -     X     5     -     -     -     -   104 |
 SELE |     -   210     -  -387     -     -     -     -     -     - |
 SEY1 |     -     -     -     -  -307     -     -     -     -   289 |
 SFER |     -  -363     -     -     -     -     -     -     -   366 |
 SUTH |     -  -137     -    33     -     -     -     -     -   111 |
 THTI |     -     -     -   173     -     -  -119     -     -   -12 |
 TSKB |     -     8     -  -203   -15     -     -     -     -   118 |
 USNO |     -   157   423  -889     -     -     X     -     -   166 |
 USUD |     -   -96     -   141     -     -   105     -     -   -53 |
 VILL |     -   -70     -   128     -     -     -     -     -     1 |
 WES2 |     -    19     -     -     -     -     -     -     -   -19 |
 WSRT |     -    28     -   -22     -     -     -     -     -   -16 |
 WTZR |     -  -144     -   208     -     -    19     -     -    19 |
 WUHN |     -    11     -   -12  -112     -     -     -     -   101 |
 YAKT |     -   192     -     -     -     -  -267     -     -     - |
 YSSK |     -   -49     -     -    52     -     -     -     -     - |
 ZWEN |     -    -2     -     -  -109     -     -     -     -   104 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  9796    58   125    73    85  5231    57  8152     -    60 |  288   3.75
    2 |  5172    37    62   121    43  3214    48  4592     -    65 |  288   2.65
    3 |  6797   239    45    87    75  3940    76  6498     -   129 |  288   2.49
    4 |  2915   151     X   360   196  2309     X  2827     -    77 |  280   0.72
    5 |  5385    69   130   125    26  4101   118  5452     -    77 |  288   3.02
    6 |  5677   107   172    41    79  2810    54  5937     -    42 |  288   6.00
    7 |  2571   113   147   185    64  1473   168  2250     -   171 |  288   1.16
    8 |  4222    59   221   108    52  3437    47  4599     -    56 |  288   2.26
    9 |  4391    88   194   141    49  7083   178  4462     -    65 |  288   2.27
   10 |  2637    77   163    46    43  3338    41  2765     -    30 |  288   2.13
   11 |   527    39    70   127   107   476    72   478     -    87 |  288   0.33
   13 |   906    57   238   268    77   964   158  1076     -    60 |  288   0.33
   14 |  1072    77    73    94    42   526    48  1028     -    64 |  288   0.36
   15 |  4349     -   208     -     -     -   373  4447     -   196 |  260   2.83
   17 |  3186     -   214     X   208     -   170  3454     -   154 |  276   3.78
   18 |  1462   106   170   142    89   953    63  1554     -    43 |  288   0.35
   20 |   953    64   153   113    64   575    71   939     -    42 |  288   0.29
   21 |  3192   117   136     X    43     -   111  3111     -    73 |  288   3.25
   22 |  6837    32   138   113   164  1291    73  6125     -    95 |  288   2.27
   23 |  8248    99   175    83    94  3956    55  8824     -    64 |  288   7.54
   24 |  2724    95   186   326   175  1564   107  2810     -   144 |  282   1.64
   25 |  3964    51   306    76    62  1262    74  3013     -    51 |  288   1.47
   26 |  2900   117   138   221    96  2754   113  2473     -    47 |  288   0.61
   27 |  4472    80    86   113    49  3995    35  4598     -    70 |  288   2.74
   28 |  2958    76   311    80   153  2301    50  3392     -    93 |  288   0.66
   29 |  3072   102    61   225    94     -   126  2897     -    29 |  288   0.46
   30 |  1225    69    73    63    33   759   212  1286     -    52 |  288   1.43
   31 |  4153   121    99    58    50  5708    62  4259     -   105 |  288   3.01
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    51     -     -     -     -    66     -     -    15 |  287   0.24
 AMC2 |     -    33     -     -     -     -     -     -     -    34 |  286   0.04
 AOML |     -    27     -     -     -     -     -     -     -    28 |  283  26.87
 ARTU |     -    52     -     -     -     -    73     -     -     - |  279  41.44
 AUCK |     -    95     -     X     -     -     -     -     -    96 |  264  20.55
 BAHR |     -    36   154    37     -     -     -     -     -    33 |  288   0.51
 BOR1 |     -    29     -     -     -     -     -     -     -    30 |  279   0.46
 BRMU |     -    64     -    98     -     -     -     -     -    97 |  279  48.91
 BRUS |     -    58     -     -     -     -    70     -     -    70 |  287   0.08
 CAS1 |     -    79     -    95     -     -    50     -     -    39 |  288   9.64
 CEDU |     -    25     -    46     -     -     -     -     -     - |  288  14.72
 CHAT |     -    99     -     X     -     -   138     -     -    58 |  264  18.95
 CRO1 |     -    43     -     -     -     -    60     -     -     X |  272   0.44
 DAV1 |     -   171     -     -     -     -     -     -     -   172 |  287  17.30
 DRAO |     -    58   156     -    37     -     -     -     -    21 |  288   0.04
 EISL |     -    92     -   170     -     -     -     -     -     - |  237  47.03
 FAIR |     -     -   126   225   196     -   190     -     -   231 |  288   0.13
 FORT |     -    89   219    52     -     -     -     -     -    55 |  175   0.52
 GALA |     -    51     -    58    39     -   119     -     -    30 |  288  37.59
 GOLD |     -    48     -     -    35     -     X     -     -    44 |  288  38.62
 GRAZ |     -    80     -   283     -     -     -     -     -    84 |  283  39.77
 GUAM |     -   101     -    71    32     -    82     -     -    37 |  288  31.10
 HARB |     -    66     -     -    70     -     -     -     -     - |  287   2.65
 HOB2 |     -   128     -     -     -     -     -     -     -   129 |  288   0.11
 HRAO |     -    63     -     -     -     -    42     -     -    69 |  288  29.14
 IISC |     -    48     -    72     -     -     -     -     -    46 |  288  40.39
 KIRU |     -    30     -    44     -     -    34     -     -     - |  288   2.33
 KOSG |     -    55     -     -     -     -     -     -     -    55 |  286  64.85
 MAC1 |     -   169     -   172    45     -   153     -     -    67 |  288  18.56
 MALI |     -    25     -    46     X     -     -     -     -     - |  180  12.67
 MAS1 |     -    48    71    58    38     -    78     -     -    25 |  288   2.37
 MATE |     -    20   128    35     -     -     X     -     -    38 |  288   0.24
 MAW1 |     -   111     -     -    51     -     -     -     -    85 |  285  57.96
 MCM4 |     -    73     -     -    46     -     X     -     -    50 |  288  34.13
 MDO1 |     -    50   170    99     -     -     -     -     -    37 |  288  17.37
 MEDI |     -    39     -     -     -     -     -     -     -    40 |  286   1.52
 METS |     -    23     -     -     -     -     -     -     -    24 |  285   1.84
 MKEA |     -     -   185    75    53     -    90     -     -    86 |  288  54.74
 MSKU |     -    65     -     -    70     -     -     -     -     - |  282  36.97
 NLIB |     -    40     -     X    36     -     -     -     -    32 |  286   0.03
 NPLD |     -    49     -     -     -     -     -     -     -    50 |  285   0.09
 NSSP |     -    30     -     -     -     -   212     -     -   140 |  287  55.56
 NTUS |     -    46     -     -     -     -     -     -     -    46 |  288   6.01
 OHIG |     -    47     -    62    26     -     -     -     -    26 |  288  15.19
 ONSA |     -    75     -     -    66     -     -     -     -    33 |  288   0.35
 PENC |     -    40     -     -     -     -     -     -     -    41 |  285   7.11
 PERT |     -    33     -    54    56     -     -     -     -    44 |  288  17.27
 PETP |     -    32     -     -    34     -     -     -     -     - |  286  30.84
 PIE1 |     -    36     -    72     -     -     -     -     -    41 |  237   1.12
 REYK |     -    46     -     -     -     -     -     -     -    47 |  286   8.96
 RIOG |     -    35     -     -    45     -    86     -     -     - |  288  13.34
 SANT |     -    89     -     X   104     -     -     -     -    46 |  288  25.44
 SELE |     -    26     -    48     -     -     -     -     -     - |  241  42.64
 SEY1 |     -     -     -     -    51     -     -     -     -    48 |  174  30.21
 SFER |     -   294     -     -     -     -     -     -     -   296 |  285  26.81
 SUTH |     -    38     -   106     -     -     -     -     -    49 |  236  27.48
 THTI |     -     -     -    72     -     -    49     -     -    38 |  287   2.18
 TSKB |     -    45     -   116    47     -     -     -     -    42 |  287   0.87
 USNO |     -    40    53    37     -     -     X     -     -    28 |  288   0.03
 USUD |     -    42     -    73     -     -    61     -     -    35 |  288   0.46
 VILL |     -    41     -    41     -     -     -     -     -    30 |  288  29.29
 WES2 |     -    47     -     -     -     -     -     -     -    48 |  277  49.98
 WSRT |     -    76     -    60     -     -     -     -     -    55 |  288   0.09
 WTZR |     -    43     -    40     -     -    52     -     -    27 |  288   0.09
 WUHN |     -    91     -    32    74     -     -     -     -    36 |  287  21.79
 YAKT |     -    48     -     -     -     -    66     -     -     - |  275   0.72
 YSSK |     -    42     -     -    45     -     -     -     -     - |  287  23.76
 ZWEN |     -    42     -     -    54     -     -     -     -    80 |  276  38.37
 -----+-------------------------------------------------------------+--------------
 TOT  |  4360    82   161   128    85  3177   108  4218     -    81 |


 BEST CLOCK FIT: NLIB   286   0.03 (ns) 

