
 GPS week: 1149   Day: 0   MJD: 52287                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2668      0    -0.22     0.31     4.89     0.00
 cod |   288     0  14590      1     0.84    -0.40     0.09    37.18
 emr |   288     0  10586      0    10.49    -3.31     0.10    30.97
 esa |     0     0      0      0     0.00     0.00     0.00     0.00
 gfz |   288     0  12809      0    -0.11    -0.08     0.10    31.84
 igu |    96     0   2477      6    -0.27     0.76     5.90     0.00
 ngs |    96     0   2668      0    -0.22     0.30     4.62     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio |
 -----+-------------------------------------------------+
    1 |-11499   101    69     -  -186  5699-10687     - |
    2 | -1999    10  -232     -   214  7803 -1980     - |
    3 | -5064   -92  -286     -   390  2451 -4429     - |
    4 | -2957    21  -107     -    79  1994 -3022     - |
    5 |  5589    67   -24     -   -55 17627  5204     - |
    6 | -4244   -34     2     -    38 -8500 -3221     - |
    7 | -2333    31  -156     -   116-13226 -3139     - |
    8 |  2024   129  -108     -   -45  2609  2003     - |
    9 | -4767   -19  -177     -   195   975 -4200     - |
   10 |  6667    -6     1     -     5  5819  5129     - |
   11 |  6083   -86   134     -   -32  4020  5392     - |
   13 |  3657    49    33     -   -93  3546  3661     - |
   14 |  5229   -42    98     -   -48  4800  5075     - |
   15 |  3285  -182    90     -   128     -  4642     - |
   17 | -3291  -171    78     -   124-32576 -3277     - |
   18 |  5377  -129   118     -    36  5652  5491     - |
   20 |  5419   -51   226     -  -161  4399  5282     - |
   21 | -7020     -   -29     -    28-12722 -5912     - |
   22 | -6001    -1   -91     -    89-16115 -5081     - |
   23 | -2194    -9    77     -   -67     - -2150     - |
   24 |  -905   -93    32     -    80  1673  -957     - |
   25 | -1766  -120  -101     -   238  1357 -1462     - |
   26 | -3335     8  -169     -   154  -288 -3172     - |
   27 |  3773    43  -105     -    52 13097  2819     - |
   28 |  6064   145    -7     -  -162 11506  6089     - |
   29 |   769    21  -127     -    99 -1463   238     - |
   30 |  -457     0  -105     -   102-14248  -726     - |
   31 |  3090   -33  -209     -   242  2679  1613     - |
 -----+-------------------------------------------------+
 ALGO |     -   -13     -     -    15     -     -     - |
 AOML |     -   374     -     -  -437     -     -     - |
 ARTU |     -   -22     -     -    25     -     -     - |
 BAHR |     -  -114   137     -     -     -     -     - |
 COCO |     -     7     -     -    -8     -     -     - |
 DAV1 |     -    49     -     -   -57     -     -     - |
 DRAO |     -   -34    41     -     -     -     -     - |
 HARB |     -   -70     -     -    82     -     -     - |
 HOB2 |     -     6    34     -   -40     -     -     - |
 LPGS |     -   184     -     -  -214     -     -     - |
 MAC1 |     -    89     -     -  -104     -     -     - |
 MALI |     -  1002     -     - -1170     -     -     - |
 MATE |     -  -134   160     -     -     -     -     - |
 MAW1 |     -    79     -     -   -93     -     -     - |
 NRC2 |     -   -76    91     -     -     -     -     - |
 NYA1 |     -    15     -     -   -17     -     -     - |
 ONSA |     -  -159   191     -     -     -     -     - |
 RIOG |     -   -39     -     -    46     -     -     - |
 STJO |     -  -139   212     -   -44     -     -     - |
 TOW2 |     -   -85     -     -    99     -     -     - |
 TRO1 |     -   -80     -     -    94     -     -     - |
 USNO |     -   -64    77     -     -     -     -     - |
 WHIT |     -   -51     -     -    60     -     -     - |
 YELL |     -   -98   118     -     -     -     -     - |
 ZWEN |     -   -21     -     -    25     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  5444    95    99     -    97  3286  5840     - |  276   2.74
    2 |  1786   140    63     -   144  4670  1943     - |  288   1.82
    3 |  3657   118   163     -    84  4244  3882     - |  288   2.99
    4 |  1483    67    52     -   103  1644  1503     - |  279   1.02
    5 |  2612    67    70     -    28  8106  2400     - |  288   3.02
    6 | 14349    96    45     -    93  6743 12779     - |  288  11.36
    7 |  5779    91   156     -   205  6697  5156     - |  288   0.63
    8 |  3398    91    87     -    44  3201  3377     - |  288   2.97
    9 |  3538    43   122     -   138  2376  3255     - |  283   1.99
   10 |  4945    94   118     -    63  5417  4684     - |  288   3.07
   11 |  4541   142   147     -   104  1899  3839     - |  286   0.45
   13 |   611   135   141     -   221  2652   820     - |  288   0.50
   14 |  1035   103   134     -    95  2030   980     - |  288   0.37
   15 |  7499   108    99     -   143     -  7546     - |  288   2.96
   17 |  1894    89    49     -    89 18973  1838     - |  288   2.95
   18 |   805   102   107     -    70  2913   953     - |  288   0.36
   20 |   847    43   164     -   143  2162   991     - |  288   0.20
   21 |  6648     -   185     -   180  3780  6357     - |  287   4.17
   22 |  4237   194   154     -   101  7932  3672     - |  288   0.63
   23 |  4895    84   125     -    96     -  4700     - |  285   4.72
   24 |  2302   118    61     -   106  2996  2277     - |  288   2.54
   25 |  2750    50    83     -    52  2312  3034     - |  288   2.14
   26 |   861   143    87     -   129   888   776     - |  277   0.58
   27 |  6470    72    92     -    40  5082  5588     - |  288   3.14
   28 |  2492    81   141     -   123  7251  2609     - |  288   0.20
   29 |  3088   113   165     -   113  2344  2989     - |  277   0.75
   30 |  1661   142    64     -   173  8277  1797     - |  288   0.79
   31 |  9380    50    57     -    49  6561  9309     - |  288   6.26
 -----+-------------------------------------------------+--------------
 ALGO |     -    44     -     -    51     -     -     - |  288   0.02
 AOML |     -    43     -     -    50     -     -     - |  277  45.41
 ARTU |     -    69     -     -    81     -     -     - |  267  23.85
 BAHR |     -    14    17     -     -     -     -     - |  288   0.48
 COCO |     -    49     -     -    57     -     -     - |  288  17.02
 DAV1 |     -    67     -     -    78     -     -     - |  288  18.65
 DRAO |     -    42    51     -     -     -     -     - |  288   0.15
 HARB |     -    54     -     -    63     -     -     - |  287   5.82
 HOB2 |     -   125    63     -    90     -     -     - |  288   0.06
 LPGS |     -   171     -     -   200     -     -     - |  119  23.63
 MAC1 |     -    71     -     -    83     -     -     - |  288  19.77
 MALI |     -    20     -     -    24     -     -     - |  279 108.69
 MATE |     -    43    51     -     -     -     -     - |  288   0.14
 MAW1 |     -    71     -     -    83     -     -     - |  253  14.90
 NRC2 |     -    48    58     -     -     -     -     - |  288   0.05
 NYA1 |     -    58     -     -    68     -     -     - |  288   0.12
 ONSA |     -    23    27     -     -     -     -     - |  288   0.28
 RIOG |     -    18     -     -    21     -     -     - |  228  15.40
 STJO |     -    22    18     -    26     -     -     - |  288   1.82
 TOW2 |     -    35     -     -    41     -     -     - |  288  11.16
 TRO1 |     -    35     -     -    40     -     -     - |  287   9.55
 USNO |     -    52    63     -     -     -     -     - |  288   0.03
 WHIT |     -    39     -     -    46     -     -     - |  288   9.53
 YELL |     -    61    73     -     -     -     -     - |  288   0.08
 ZWEN |     -    40     -     -    47     -     -     - |  277  26.97
 -----+-------------------------------------------------+--------------
 TOT  |  4891    86   103     -   102  5904  4617     - |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

