
 GPS week: 1138   Day: 3   MJD: 52213                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2685      0    -0.03     0.04     5.08     0.00
 cod |   288     0  23728    242     0.50     0.73     0.08    27.94
 esa |   288     0  17315    929   828.70    11.57     0.14    15.60
 gfz |   277     0  14006     23    -0.12    -0.07     0.11    22.60
 igu |    96     0   2303      0     0.00    -0.02     4.37     0.00
 jpl |    96     3   2369      5    -0.14     0.14     0.14    16.06
 ngs |    96     0   2685      0     0.00     0.01     5.00     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  23713   1029   615.47     3.05     0.13    17.79

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 | -1533    -8   105    35 -2017   -67  -912     -  -105 |
    2 | -4659    -5   253  -138     -  -169 -3729     -     - |
    3 | -1098  -110    19   314  -705     7  -785     -  -236 |
    4 | -3785   -60   213     2 -2942  -202 -4239     -   -41 |
    5 |  1455   -55   177  -162  6771    63   452     -   113 |
    6 |  3676  -192   189   164  3491   -36  2717     -   -63 |
    7 | -8091    78    69  -130    53  -121 -7598     -     8 |
    8 |  2523   -13   223   -48   563    42  2368     -  -128 |
    9 | -7195   147   114  -247 -4374    -4 -6024     -   -26 |
   10 |  3555   -88  -115   -72  8802   190  2205     -   272 |
   11 |  7070    57   176    35   629    -3  6758     -  -284 |
   13 |  1782   -77   190    -5  -217  -153  2191     -     X |
   14 |  2737    73    29   -94  1032    32  2746     -   -33 |
   15 |   206   -63     -    58  1397   141  -564     -    -9 |
   17 |   975   -82   696     3     -    42  1058     -  -355 |
   18 |  5885   -38   -60   -69   581   161  5959     -   150 |
   20 |  5834   -79    48   -26  -506    68  5818     -    94 |
   21 |  2215   103  -107    53     -     5  2152     -  -138 |
   22 |  6048   -35  -140   114 18736   269  5064     -   -34 |
   23 |  2198   -17     6   -13     -   146  1513     -     X |
   24 | -9850   -40     7    29 -4331  -170 -8811     -    67 |
   25 |  -809   104    58   238-14462  -215  -444     -  -447 |
   26 | -1061    99    77   -71  1934    84 -1206     -  -158 |
   27 | -3663   -11   149    66 -8010    -9 -2557     -  -190 |
   28 | 10359   -50    68   -19 12420   -12  9648     -    43 |
   29 | -4362    44    86   146 -3519   -37 -4123     -  -313 |
   30 | -5457    51   267    19 -6598   -16 -4808     -  -332 |
   31 | -4865   -20   -76   380 -8639   -35 -4798     -  -358 |
 -----+-------------------------------------------------------+
 ALBH |     -   -43     X     -     -     -     -     -    68 |
 ALGO |     -    22     X     -     -     -     -     -   -35 |
 AMC2 |     -   -33     -     -     -     -     -     -    52 |
 ANKR |     -    37   -66     -     -     -     -     -     - |
 AOML |     -   -26     -     -     -     -     -     -    41 |
 ARTU |     -   286     -  -353     -     -     -     -     - |
 AUCK |     -  -287     X   643     -     -     -     -  -332 |
 BAHR |     -    67    41   -49     -     -     -     -   -80 |
 BILI |     -   -22     -    27     -     -     -     -     - |
 BOR1 |     -   201     -     -     -     -     -     -  -316 |
 BRMU |     -   147  -205   -49     -     -     -     -     9 |
 BRUS |     -   -22     -     -     -     -     -     -    35 |
 CAS1 |     -   -52    -9   -48     -     -     -     -   148 |
 CRO1 |     -    54     -     -     -     -     -     -   -85 |
 DAV1 |     -   -27     -  -123     -     -     -     -   201 |
 DRAO |     -    38     -     -     -     -     -     -   -59 |
 FAIR |     -     -   -69     -     -     -     -     -    60 |
 FORT |     -   -52    93     -     -     -     -     -     - |
 GALA |     -   -86   -82   -40     -     -     -     -   296 |
 GODE |     -     0  -121     -     -     -     -     -    85 |
 GUAM |     -   -67    78     -     -     -     -     -    36 |
 HOB2 |     -   356  -738     -     -     -     -     -    87 |
 HRAO |     -  -159     -     -     -     -     -     -   250 |
 IISC |     -  -354   142     -     -     -     -     -   281 |
 KARR |     -   -20     -    24     -     -     -     -     - |
 KERG |     -    23     -     -     -     -     -     -   -36 |
 KOKB |     -     -    17    71     -     -     -     -  -128 |
 KOSG |     -     -    37     -     -     -     -     -   -33 |
 KWJ1 |     -     -    51   -49     -     -     -     -    12 |
 LPGS |     -     -   -72    50     -     -     -     -     - |
 MAC1 |     -   139   -46  -291     -     -     -     -   178 |
 MATE |     -   -63     -     -     -     -     -     -    99 |
 MAW1 |     -    96     -  -114     -     -     -     -    -9 |
 MCM4 |     -   113  -115   -21     -     -     -     -   -48 |
 MDO1 |     -  -247     -     -     -     -     -     -   388 |
 MEDI |     -   -84     -     -     -     -     -     -   132 |
 METS |     -   -69     -     -     -     -     -     -   109 |
 MKEA |     -  -101  -120     -     -     -     -     -   266 |
 NKLG |     -     -   -43     -     -     -     -     -    38 |
 NLIB |     -    21     -     -     -     -     -     -   -34 |
 NPLD |     -   -63     -     -     -     -     -     -    99 |
 NRC2 |     -    19     -   -53     -     -     -     -    36 |
 NTUS |     -   -88     -     -     -     -     -     -   139 |
 NYA1 |     -    55     -   -60     -     -     -     -   -12 |
 NYAL |     -     -    90     -     -     -     -     -   -79 |
 ONSA |     -  -116   113     -     -     -     -     -    83 |
 PENC |     -   181     -     -     -     -     -     -  -285 |
 PIE1 |     -  -227  -138     -     -     -     -     -   457 |
 PIMO |     -   140  -251     -     -     -     -     -     X |
 REYK |     -    10    84     -     -     -     -     -   -93 |
 RIOG |     -     -   131   -91     -     -     -     -     - |
 SANT |     -     X   150    36     -     -     -     -  -223 |
 SFER |     -  -567     -     -     -     -     -     -   891 |
 STJO |     -     7     -  -128     -     -     -     -   147 |
 SUTH |     -   -35    63     -     -     -     -     -     - |
 THU1 |     -   158     -     -     -     -     -     -  -248 |
 TLSE |     -  -122     -     -     -     -     -     -   191 |
 TRO1 |     -   -55     -    68     -     -     -     -     - |
 TROM |     -     -    51     -     -     -     -     -   -45 |
 TSKB |     -   -43  -119     -     -     -     -     -   162 |
 URUM |     -     -     -   -66     -     -     -     -    84 |
 USUD |     -    21  -103     -     -     -     -     -    57 |
 WES2 |     -    80     -     -     -     -     -     -  -126 |
 WHIT |     -    74     -   -91     -     -     -     -     - |
 WSRT |     -   -12     -     -     -     -     -     -    19 |
 WTZR |     -   -78    83     -     -     -     -     -    50 |
 WUHN |     -   -35  -186   123     -     -     -     -    68 |
 YAR2 |     -   728 -1270     -     -     -     -     -   -10 |
 YELL |     -   105  -177     -     -     -     -     -   -10 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  9834    64    88    87  5939   103  9869     -    61 |  288   3.85
    2 |  5088    91    72   120     -    85  5455     -     - |  288   2.61
    3 |  3849    68   267    86  2657    49  3503     -   216 |  288   2.01
    4 |  4506    85   113    98  2099   126  4159     -    70 |  288   0.99
    5 |  6110    91   126   119  5461    90  6017     -   139 |  288   3.27
    6 |  9212   104    99   118  4125    86  9191     -    85 |  288   9.39
    7 |  1371   133    96   155   734   139  1713     -    76 |  288   1.27
    8 |  4288    66    56   112  1578   111  3880     -   144 |  288   3.64
    9 |  3389    68   102   139  2721   214  3819     -    92 |  288   1.87
   10 |  5067   191   200   143  3062   118  5300     -   360 |  283   2.78
   11 |  1833   141   119   139   892    69  1813     -   174 |  288   0.43
   13 |  1574    56   116    88   537    54  1438     -     X |  286   0.22
   14 |  1109    73   105   135   454   229   972     -   183 |  288   0.23
   15 |  4546    85     -   140  1866   103  4673     -   116 |  288   2.23
   17 |  1732   115   168   222     -   317  1745     -   202 |  288   2.71
   18 |  1009   165   148   144   545    86   969     -   268 |  288   0.36
   20 |  1873   120   131   134   347    65  1514     -    66 |  288   0.30
   21 |  3528   142   105    91     -   152  3455     -   235 |  284   2.46
   22 |  4682    73   126   127  9125    79  4001     -   173 |  288   1.37
   23 | 10964   161   287   169     -   337 10744     -     X |  281   8.39
   24 |  4862    90   149    85  4041    72  4311     -    59 |  288   1.76
   25 |  4649    86    60   102  7253    79  4689     -    69 |  288   3.03
   26 |  1249   124   299    63  1187   114  1217     -   107 |  288   0.91
   27 |  6689   124   228   109  3556   109  6733     -   111 |  288   3.12
   28 |  3751    94   108    75  6784    73  3170     -    93 |  288   0.44
   29 |  1439   112    86   119  1613   129  1421     -   100 |  288   0.87
   30 |  2152    70   117   125  3810   120  1950     -   122 |  288   1.61
   31 |  9601    65   154   102 10761    82  9513     -    91 |  288   4.95
 -----+-------------------------------------------------------+--------------
 ALBH |     -    50     X     -     -     -     -     -    79 |  286   0.12
 ALGO |     -    24     X     -     -     -     -     -    37 |  270   0.09
 AMC2 |     -    30     -     -     -     -     -     -    47 |  286   0.13
 ANKR |     -    42    75     -     -     -     -     -     - |  288  11.83
 AOML |     -    72     -     -     -     -     -     -   114 |  286  63.95
 ARTU |     -    67     -    83     -     -     -     -     - |  269  25.19
 AUCK |     -   147     X   113     -     -     -     -   143 |  264  21.15
 BAHR |     -   104   120   111     -     -     -     -    73 |  287   0.45
 BILI |     -    52     -    64     -     -     -     -     - |  276  22.17
 BOR1 |     -   107     -     -     -     -     -     -   168 |  224   2.26
 BRMU |     -    39    68    92     -     -     -     -   157 |  288  68.72
 BRUS |     -    42     -     -     -     -     -     -    66 |  286   0.09
 CAS1 |     -    60   133    62     -     -     -     -    57 |  288   8.17
 CRO1 |     -    69     -     -     -     -     -     -   108 |  285   0.12
 DAV1 |     -    92     -    93     -     -     -     -    96 |  288  22.95
 DRAO |     -    37     -     -     -     -     -     -    58 |  288   0.15
 FAIR |     -     -   121     -     -     -     -     -   106 |   97   0.20
 FORT |     -    72   129     -     -     -     -     -     - |  122   0.12
 GALA |     -    60   137    67     -     -     -     -   193 |  287  36.98
 GODE |     -   103   237     -     -     -     -     -   153 |  265  25.74
 GUAM |     -    59    97     -     -     -     -     -    56 |  288  35.51
 HOB2 |     -   139   165     -     -     -     -     -    90 |  288   0.12
 HRAO |     -   120     -     -     -     -     -     -   189 |  280  40.98
 IISC |     -    61    45     -     -     -     -     -    75 |  278  43.10
 KARR |     -    60     -    74     -     -     -     -     - |  277  20.26
 KERG |     -    53     -     -     -     -     -     -    83 |  287   2.01
 KOKB |     -     -   209    98     -     -     -     -   244 |  285   0.42
 KOSG |     -     -    38     -     -     -     -     -    33 |  286 129.02
 KWJ1 |     -     -   196    95     -     -     -     -   175 |  247 148.45
 LPGS |     -     -   162   112     -     -     -     -     - |   81  26.34
 MAC1 |     -    58   217   113     -     -     -     -   286 |  287  16.21
 MATE |     -    56     -     -     -     -     -     -    89 |  270   0.10
 MAW1 |     -    43     -    73     -     -     -     -    85 |  286  27.86
 MCM4 |     -   146   175   147     -     -     -     -   154 |  276    >>>
 MDO1 |     -    22     -     -     -     -     -     -    35 |  226   5.60
 MEDI |     -    62     -     -     -     -     -     -    98 |  214   0.13
 METS |     -    23     -     -     -     -     -     -    36 |  285   0.80
 MKEA |     -    81    53     -     -     -     -     -   112 |  288  61.10
 NKLG |     -     -   120     -     -     -     -     -   105 |  286    >>>
 NLIB |     -    19     -     -     -     -     -     -    31 |  286   0.09
 NPLD |     -    41     -     -     -     -     -     -    64 |  285   0.09
 NRC2 |     -    61     -    99     -     -     -     -    48 |  286   0.11
 NTUS |     -    27     -     -     -     -     -     -    43 |  288   7.06
 NYA1 |     -    80     -    63     -     -     -     -   114 |  285   0.15
 NYAL |     -     -   259     -     -     -     -     -   227 |  278   0.23
 ONSA |     -    63    75     -     -     -     -     -    56 |  288   4.40
 PENC |     -    31     -     -     -     -     -     -    49 |  285   3.25
 PIE1 |     -    27   101     -     -     -     -     -    94 |  244   0.06
 PIMO |     -    63   113     -     -     -     -     -     X |  244  31.94
 REYK |     -    50   124     -     -     -     -     -    94 |  288   8.69
 RIOG |     -     -    83    57     -     -     -     -     - |  277  18.04
 SANT |     -     X   250   102     -     -     -     -   310 |  284  26.17
 SFER |     -    32     -     -     -     -     -     -    50 |  207   1.00
 STJO |     -    52     -    78     -     -     -     -    60 |  286  22.09
 SUTH |     -    94   169     -     -     -     -     -     - |  185  78.08
 THU1 |     -   150     -     -     -     -     -     -   236 |  239  18.37
 TLSE |     -    58     -     -     -     -     -     -    90 |  204   0.55
 TRO1 |     -    50     -    62     -     -     -     -     - |  277  10.60
 TROM |     -     -    38     -     -     -     -     -    33 |  281  11.16
 TSKB |     -    65   170     -     -     -     -     -   111 |  227   1.03
 URUM |     -     -     -    43     -     -     -     -    55 |  277 112.93
 USUD |     -    93    64     -     -     -     -     -   103 |  288   0.40
 WES2 |     -    33     -     -     -     -     -     -    52 |  286   0.10
 WHIT |     -    69     -    85     -     -     -     -     - |  277   3.70
 WSRT |     -    32     -     -     -     -     -     -    51 |  288   0.11
 WTZR |     -    54    59     -     -     -     -     -    54 |  288   0.15
 WUHN |     -    71    82    58     -     -     -     -    53 |  287  39.26
 YAR2 |     -    45   102     -     -     -     -     -    37 |  288   5.63
 YELL |     -    49    33     -     -     -     -     -    74 |  288   0.10
 -----+-------------------------------------------------------+--------------
 TOT  |  5078    85   143   108  4373   138  5001     -   129 |


 BEST CLOCK FIT: NLIB   286   0.09 (ns) 

