
 GPS week: 1136   Day: 0   MJD: 52196                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2649      0    10.09   -32.99     4.82     0.00
 cod |   288     0  23009      3     9.26   -35.24     0.09    22.16
 emr |    96     0   2645     94   -60.21   -31.78     0.12    13.98
 gfz |   287     0  14133    484    10.02   -35.62     0.12    15.63
 igu |    96     0   2457      0    10.06   -32.91     4.23     0.00
 jpl |   280     1   9904    243     8.14   -28.47     0.08    25.40
 ngs |    96     0   2649      0    10.08   -33.01     4.63     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  23615    579   883.97   -67.96     0.08    22.83

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |  -555   -70   141   107 -3989   196  -311     -  -173 |
    2 | -3926   -62  -204   -60 -1417  -304 -3122     -   236 |
    3 |    89   126   238   132  7633   116  -524     -  -303 |
    4 | -2226    51   -23   178 -2247  -201 -2626     -   -23 |
    5 |    16   -66  -115   149  6562   231   328     -   -93 |
    6 |  4172    83   -44   104 12682    25  3136     -  -161 |
    7 |   926   -65  -161    62 -8053  -107   446     -    93 |
    8 | -1088   117   -97  -104-12016  -171 -1347     -    99 |
    9 |  4866    88  -190    16  9283    69  3966     -  -107 |
   10 | -5092    -1   -88   141  -754   -65 -4352     -   -55 |
   11 |  4838   -40   192  -193  2377   170  4698     -    11 |
   13 |  7940    13   287    27  3263  -154  7823     -   -36 |
   14 |  3391   111   144   -64   470   113  3485     -  -175 |
   15 | -2001   103    58   -31  5349   303 -1973     -  -198 |
   17 |  2884   106   158  -275 -7430    43  2658     -     X |
   18 |  2038   -77    29    -7  -904    39  2016     -    47 |
   20 |  5029  -134    60  -118   872   174  4882     -    72 |
   21 |  2465    10   -30    79-11365   224  3194     -  -217 |
   22 |-16535   -62     X   -44-12708   251-15409     -     X |
   23 |  -564   243  -295   -63  3937   135  -651     -  -180 |
   24 | -9634    36  -133   173     -  -161 -8414     -   -12 |
   25 | -6269   167    23   202 -5995   140 -5383     -  -406 |
   26 | -1938   117  -135   -44 -6600   -17 -1852     -   -51 |
   27 |  4502    58   -89    80 11317  -113  3909     -   -53 |
   28 | -3527   -16   170  -241     -   -93 -2948     -   173 |
   29 | -1790   209    33   220 -5865   171 -1896     -  -421 |
   30 |  4685   160    78   249  6193   -30  3402     -  -322 |
   31 |  4243    51    43   155  6361   122  4109     -  -207 |
 -----+-------------------------------------------------------+
 ALBH |     -  -203     -     -     -    58     -     -   137 |
 ALGO |     -   108     -   -56     -  -104     -     -    44 |
 AMC2 |     -    37     -     -     -  -179     -     -   156 |
 AOML |     -     2     -     -     -     -     -     -    -2 |
 AREQ |     -  -138     -     -     -     -     -     -   134 |
 AUCK |     -   -21     -     -     -     -     -     -    20 |
 BAHR |     -    48     -   -35     -    47     -     -   -73 |
 BOR1 |     -   -22     -     -     -     -     -     -    22 |
 BRUS |     -   -10     -     -     -   -33     -     -    45 |
 CAS1 |     -  -124     -  -101     -    60     -     -   129 |
 CRO1 |     -  -134     -     -     -  -100     -     -   237 |
 DAV1 |     -    18     -  -105     -     -     -     -    56 |
 DRAO |     -  -177     -     -     -     -     -     -   171 |
 FAIR |     -     -     -     -     -  -103     -     -   115 |
 GALA |     -     -     -   -12     -     -     -     -     8 |
 GRAZ |     -   -66     -     -     -     -     -     -    64 |
 HOB2 |     -    24     -   -40     -     -     -     -     4 |
 HRAO |     -  -168     -     -     -  -173     -     -   347 |
 KERG |     -   -71     -     -     -   168     -     -  -109 |
 KOSG |     -  -116     -     -     -     -     -     -   113 |
 KWJ1 |     -     -     -   179     -    15     -     -  -122 |
 LPGS |     -   -53     -     X     -    15     -     -    34 |
 MAC1 |     -    -9     -  -204     -     -     -     -   150 |
 MAS1 |     -   153     -  -154     -     -     -     -   -44 |
 MATE |     -    46     -     -     -     X     -     -   -44 |
 MAW1 |     -    63     -     -     -     -     -     -   -61 |
 MCM4 |     -   152     -   446     -     -     -     -  -407 |
 MDO1 |     -    25     -     -     -     -     -     -   -24 |
 MEDI |     -    31     -     -     -     -     -     -   -30 |
 METS |     -    -8     -     -     -     -     -     -     8 |
 MKEA |     -   -82     -  -130     -     -     -     -   170 |
 NKLG |     -     -     -  -272     -     -     -     -   186 |
 NLIB |     -  -379     -     -     -     -     -     -   368 |
 NPLD |     -  -155     -     -     -     -     -     -   151 |
 NRC2 |     -   -13     -     -     -    -6     -     -    19 |
 NTUS |     -   -81     -     -     -     -     -     -    79 |
 NYA1 |     -     4     -   -55     -   -18     -     -    54 |
 OHIG |     -  -108     -   -81     -    33     -     -   126 |
 ONSA |     -   -98     -     -     -     -     -     -    96 |
 PENC |     -   227     -     -     -     -     -     -  -221 |
 PERT |     -   131     -     -     -     -     -     -  -128 |
 PIE1 |     -  -304     -     -     -     -     -     -   295 |
 POTS |     -   -84     -     -     -     -     -     -    82 |
 REYK |     -     8     -     -     -     -     -     -    -8 |
 RIOG |     -   -46     -   151     -     -     -     -   -59 |
 SANT |     -    83     -     X     -     -     -     -   -81 |
 STJO |     -   -70     -  -171     -     -     -     -   186 |
 THTI |     -     -     -     -     -   -51     -     -    57 |
 TLSE |     -    18     -     -     -     -     -     -   -17 |
 TRO1 |     -   -82     -   116     -     -     -     -     - |
 TSKB |     -   105     -     -     -     -     -     -  -102 |
 URUM |     -   100     -     -     -     -     -     -   -97 |
 USNO |     -   -17     -     -     -     3     -     -    13 |
 USUD |     -   -38     -     -     -    36     -     -    -1 |
 VILL |     -    62     -     -     -     -     -     -   -60 |
 WES2 |     -    31     -     -     -     -     -     -   -30 |
 WHIT |     -    -9     -    12     -     -     -     -     - |
 WSRT |     -   -19     -     -     -   -85     -     -   109 |
 WTZR |     -   -53     -     -     -   -27     -     -    80 |
 WUHN |     -   -28     -    11     -     -     -     -    20 |
 YAR2 |     -     -     -     -     -   -25     -     -    28 |
 YELL |     -   125     -   -75     -  -112     -     -    50 |
 YSSK |     -    -7     -    10     -     -     -     -     - |
 ZWEN |     -     -     -  -244     -     -     -     -   167 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  4655   124   138    38  3751    36  4805     -    66 |  288   4.31
    2 |  5215   280   133   284  2676   242  4629     -   182 |  278   2.25
    3 |  5027    77    92   100  5691    35  5248     -   113 |  288   2.73
    4 |  4588    58    42   102  3601    39  4348     -    84 |  288   1.38
    5 |  3173   129   139   223  3653    78  3112     -   171 |  277   2.66
    6 | 10420    86   135    70  6435    85  8981     -    53 |  288   8.88
    7 |  2168    71    70    57  4240    81  1934     -    54 |  288   1.81
    8 |  4743    48    72    97  7545    40  4441     -    58 |  288   3.28
    9 |  4076    46    44    58  3628    44  4683     -    43 |  288   1.99
   10 |  4955    59   181   132  2431    39  5124     -    59 |  288   1.68
   11 |  1334    63    83   101  1704    61   955     -    80 |  288   0.33
   13 |  2154    92    85    76  1862   121  2223     -   105 |  288   0.26
   14 |  1047    64    67   115  1629    55  1029     -   100 |  288   0.25
   15 |  2620   118   220   127  4691    81  2569     -    82 |  288   2.18
   17 |  4732   124   179   183  2801   165  4761     -     X |  274   2.28
   18 |  1175    72   114   126  1759   100  1122     -   136 |  288   0.37
   20 |  1058   106    91   207  1853    58   946     -    40 |  288   0.26
   21 |  8578    79    63    52  4337    43  8293     -    88 |  288   3.68
   22 |  6043    75     X    89  7002    87  5930     -     X |  261   1.58
   23 |  9030    91   190    72  7721    65  9290     -    79 |  288   7.68
   24 |  3765    87    44    60     -    35  4386     -   104 |  288   2.29
   25 |  3669   118   113    48  3524    90  3650     -    42 |  288   1.53
   26 |  1199   103   181    70  3852    42  1180     -    96 |  288   0.37
   27 |  6334    56   104    30  3663    39  5497     -    34 |  288   4.75
   28 |  3092    97    77    39     -    82  2653     -    87 |  288   0.72
   29 |  2133    73    84    88  4271    72  1925     -    57 |  288   0.83
   30 |  6549   209   138    91  3536    52  5926     -   111 |  277   1.80
   31 |  4707   114   100   140  3897    79  4228     -    37 |  288   3.17
 -----+-------------------------------------------------------+--------------
 ALBH |     -    44     -     -     -    24     -     -    39 |  287   0.05
 ALGO |     -    23     -    65     -    53     -     -    27 |  287   0.06
 AMC2 |     -    43     -     -     -    19     -     -    32 |  287   0.04
 AOML |     -    46     -     -     -     -     -     -    45 |  254  20.45
 AREQ |     -    78     -     -     -     -     -     -    76 |  252  37.37
 AUCK |     -    62     -     -     -     -     -     -    60 |  253  15.03
 BAHR |     -    67     -    47     -    51     -     -    39 |  288   0.60
 BOR1 |     -    24     -     -     -     -     -     -    24 |  254   2.59
 BRUS |     -    43     -     -     -    34     -     -    33 |  287   0.04
 CAS1 |     -   155     -   188     -   116     -     -   168 |  288  13.87
 CRO1 |     -    57     -     -     -    46     -     -    34 |  287   0.25
 DAV1 |     -    82     -   106     -     -     -     -   114 |  287  23.88
 DRAO |     -    50     -     -     -     -     -     -    49 |  253   0.14
 FAIR |     -     -     -     -     -   177     -     -   197 |  241   0.14
 GALA |     -     -     -    74     -     -     -     -    51 |  247  30.60
 GRAZ |     -    43     -     -     -     -     -     -    42 |  250  30.28
 HOB2 |     -    50     -    34     -     -     -     -    36 |  287   0.07
 HRAO |     -   168     -     -     -   116     -     -    88 |  285    >>>
 KERG |     -    47     -     -     -    40     -     -    29 |  286   1.23
 KOSG |     -    39     -     -     -     -     -     -    38 |  254  17.16
 KWJ1 |     -     -     -   168     -   157     -     -   165 |  210 155.84
 LPGS |     -   112     -     X     -   101     -     -   136 |  273  28.82
 MAC1 |     -    40     -    52     -     -     -     -    32 |  288  18.42
 MAS1 |     -    53     -    39     -     -     -     -    36 |  287   1.58
 MATE |     -    38     -     -     -     X     -     -    37 |  253   0.11
 MAW1 |     -    58     -     -     -     -     -     -    57 |  254  29.08
 MCM4 |     -    95     -   305     -     -     -     -   143 |  199  22.67
 MDO1 |     -    34     -     -     -     -     -     -    33 |  249   5.63
 MEDI |     -    35     -     -     -     -     -     -    34 |  253   0.19
 METS |     -    23     -     -     -     -     -     -    22 |  253   0.57
 MKEA |     -    43     -    44     -     -     -     -    37 |  288  56.57
 NKLG |     -     -     -    16     -     -     -     -    11 |  130  49.27
 NLIB |     -    30     -     -     -     -     -     -    29 |  195   0.05
 NPLD |     -    37     -     -     -     -     -     -    36 |  253   0.04
 NRC2 |     -    39     -     -     -    29     -     -    20 |  287   0.09
 NTUS |     -   148     -     -     -     -     -     -   144 |  252   6.80
 NYA1 |     -   113     -   165     -   101     -     -   126 |  288   0.15
 OHIG |     -   112     -    62     -    41     -     -    56 |  288  15.35
 ONSA |     -    22     -     -     -     -     -     -    21 |  253   3.12
 PENC |     -    22     -     -     -     -     -     -    21 |  252   2.25
 PERT |     -    27     -     -     -     -     -     -    26 |  253  17.73
 PIE1 |     -    51     -     -     -     -     -     -    50 |  247   0.04
 POTS |     -    45     -     -     -     -     -     -    44 |  245  12.79
 REYK |     -    30     -     -     -     -     -     -    29 |  254   7.01
 RIOG |     -   157     -    65     -     -     -     -   138 |  288  15.40
 SANT |     -   321     -     X     -     -     -     -   312 |  141  25.25
 STJO |     -    45     -    43     -     -     -     -    34 |  288  12.19
 THTI |     -     -     -     -     -    19     -     -    21 |  241   4.32
 TLSE |     -    56     -     -     -     -     -     -    54 |  166   0.35
 TRO1 |     -    36     -    51     -     -     -     -     - |  287  12.24
 TSKB |     -    52     -     -     -     -     -     -    50 |  229   1.03
 URUM |     -    18     -     -     -     -     -     -    18 |  253  28.40
 USNO |     -    51     -     -     -    44     -     -    34 |  287   0.05
 USUD |     -    74     -     -     -    62     -     -    21 |  286   0.27
 VILL |     -    53     -     -     -     -     -     -    51 |  253  26.77
 WES2 |     -    30     -     -     -     -     -     -    29 |  252   0.06
 WHIT |     -    47     -    66     -     -     -     -     - |  286  11.63
 WSRT |     -    49     -     -     -    25     -     -    33 |  287   0.04
 WTZR |     -    42     -     -     -    30     -     -    24 |  287   0.11
 WUHN |     -    56     -    71     -     -     -     -    20 |  287  35.96
 YAR2 |     -     -     -     -     -    21     -     -    24 |  241   2.62
 YELL |     -    81     -    66     -   110     -     -   122 |  285   0.05
 YSSK |     -    65     -    93     -     -     -     -     - |  278  20.97
 ZWEN |     -     -     -   353     -     -     -     -   241 |  207    >>>
 -----+-------------------------------------------------------+--------------
 TOT  |  4824    87   119   117  4231    78  4630     -    83 |


 BEST CLOCK FIT: WSRT   287   0.04 (ns) 

