
 GPS week: 1135   Day: 4   MJD: 52193                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2679      0     0.00     0.03     4.64     0.00
 cod |   288     0  24023    456     0.97    -1.22     0.12    20.81
 emr |    96     0   3904    113   577.01    11.86     0.13    18.02
 esa |   288     0  17515   1462   572.57    11.13     0.12    19.99
 gfz |   288     0  14520    567    -0.60     0.41     0.12    19.49
 igu |    96     0   2394     15     0.31    -0.64     2.85     0.00
 ngs |    96     0   2679      0    -0.01     0.03     4.43     0.00
 usn |   288     0  25292     85   840.06     5.06     0.11    21.69

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   usn |
 -----+-------------------------------------------------+
    1 | -3176   150   136   -73   -38  3892 -3215   -81 |
    2 | -2685    37    68  -343   -10     - -2624   200 |
    3 | -3389   107    84     X   138 -1258 -3848  -238 |
    4 | -2098    44  -230   131   -77 -1882 -2236   -29 |
    5 |  1510    25  -157    -5   197  9117  2146  -155 |
    6 |  -401    48  -337   370    84 -6629     0  -370 |
    7 | -2296   -64    -2   -55    86 -4261 -2176    37 |
    8 | -2496   170   -98  -207     5 -2728 -2016    50 |
    9 | -1082    12  -373   248   136  5288 -1344  -259 |
   10 | -8180   -22  -238   250   -47 -3438 -7530  -102 |
   11 |  2620     3   106    20   -75  -337  3188    17 |
   13 |  2730    68   426  -342    48 -2215  2746    90 |
   14 |  5325   117    68   140   -71  2262  5062  -196 |
   15 |   127   107   -90     -    -9  1818   -57   -69 |
   17 |  -476   216  -141     X   196 -1159  -343  -372 |
   18 |  7251   -11     X     0   -27  1214  6826    35 |
   20 |  4638   127   264   -75  -186   456  4344    41 |
   21 |  1523    23    54     X    36     -  1482   -67 |
   22 | 11694   202   109   -24    51 28709  8987  -254 |
   23 |  1593    -1  -341   672  -208     -  2160  -340 |
   24 |  -268   -33  -385   291   -81 -3974  -283   -58 |
   25 | -4767    64    -7    90   242 -5726 -3661  -361 |
   26 | -3244    -3  -375   385   -33 -1879 -3171  -218 |
   27 | -5722   103    55  -213   -43-10498 -4886   122 |
   28 |  2560    16   183  -130  -167 -5648  2609   197 |
   29 | -6909    91   -57   -15   339 -2915 -6596  -362 |
   30 | -1677    15  -128   144   248  4533 -1592  -329 |
   31 |  7510    49   240    -4    68  2712  6178  -170 |
 -----+-------------------------------------------------+
 ALBH |     -  -125     -     X     -     -     -   120 |
 ALGO |     -    -2   131     X   -63     -     -    22 |
 AMC2 |     -    -2     -     -     -     -     -     2 |
 ANKR |     -    22     -   -23     -     -     -     - |
 AOML |     -    18     -     -     -     -     -   -18 |
 AREQ |     -  -104     -     6     -     -     -    94 |
 AUCK |     -  -165     -    73     -     -     -    91 |
 BAHR |     -    77     -    -7   -66     -     -    -9 |
 BOR1 |     -    15     -     -     -     -     -   -15 |
 BRMU |     -  -102     -   120    47     -     -   -56 |
 BRUS |     -   -21     -     -     -     -     -    20 |
 CAS1 |     -     -     -     -  -182     -     -   164 |
 CRO1 |     -    -7     -     -     -     -     -     7 |
 DAEJ |     - -1020     -     -     -     -     -   979 |
 DAV1 |     -   -44     -     -   -88     -     -   122 |
 DRAO |     -   -24    44     -     -     -     -    11 |
 EISL |     -     -     -  -184   189     -     -     - |
 FAIR |     -     -   109  -149     -     -     -   108 |
 GRAZ |     -   -78     -     -     -     -     -    75 |
 GUAM |     -     X     -   -44     7     -     -    34 |
 HOB2 |     -   -28   242  -100    31     -     -    24 |
 IISC |     -   -34     -   -73     -     -     -    99 |
 KERG |     -   358     -     -     -     -     -  -344 |
 KIRU |     -   167     -  -174     -     -     -     - |
 KOKB |     -     -     -   218     4     -     -  -229 |
 KOUR |     -    79     -  -145     -     -     -    55 |
 KWJ1 |     -     -     -    39    98     -     -  -124 |
 LPGS |     -   -55     -     X     X     -     -    53 |
 MAC1 |     -  -111     -     -  -192     -     -   284 |
 MAS1 |     -   -51    50   143   -60     -     -   -43 |
 MATE |     -    49     -     -     -     -     -   -47 |
 MAW1 |     -   -79     -     -     -     -     -    75 |
 MCM4 |     -   143     -   100   -41     -     -  -186 |
 MDO1 |     -  -323  -106     -     -     -     -   342 |
 MEDI |     -    24     -     -     -     -     -   -23 |
 METS |     -    -6     -     -     -     -     -     5 |
 MKEA |     -    83     -  -105     -     -     -    17 |
 NKLG |     -     -     -  -124     X     -     -   114 |
 NLIB |     -  -287     -     -     -     -     -   276 |
 NPLD |     -    -7     -     -     -     -     -     7 |
 NRC2 |     -  -103   131     -     -     -     -    63 |
 NYA1 |     -    50     -     -  -157     -     -    94 |
 OHIG |     -    78     -  -154   -98     -     -   162 |
 ONSA |     -   -13     -   -94     -     -     -    99 |
 PENC |     -   176     -     -     -     -     -  -169 |
 PERT |     -   -79     -   201     -     -     -  -110 |
 PIE1 |     -  -362     -   250     -     -     -    83 |
 POTS |     -     3     -   -97     -     -     -    87 |
 REYK |     -   -81     -     -     -     -     -    78 |
 RIOG |     -     -     -    32   -33     -     -     - |
 SANT |     -     X     -    33   -19     -     -   -16 |
 STJO |     -   -86   170     -  -149     -     -   170 |
 SUTH |     -   142     -   -61     -     -     -   -53 |
 THU1 |     -    30     -     -     -     -     -   -29 |
 TLSE |     -  -118     -     -     -     -     -   113 |
 TRO1 |     -   -58     -     -    62     -     -     - |
 TROM |     -     -     -    77     -     -     -   -71 |
 TSKB |     -   344     2  -332     -     -     -    -7 |
 URUM |     -    16     -     -     -     -     -   -16 |
 USNO |     -   186   323  -583     -     -     -   270 |
 USUD |     -   -63  -120    63     -     -     -    35 |
 VILL |     -    20   -24   -53     -     -     -    37 |
 WES2 |     -   -13     -     -     -     -     -    13 |
 WHIT |     -    38     -     -   -41     -     -     - |
 WTZR |     -   -83     -   -14     -     -     -    92 |
 WUHN |     -  -114     -   -13    84     -     -    46 |
 YELL |     -     -   199  -236     -     -     -   159 |
 ZWEN |     -     -     -     -   -45     -     -    40 |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  3183   160    70   115    49  3022  3049    84 |  288   2.53
    2 |  8132   282   244   279   117     -  8149   158 |  283   4.11
    3 |  4104   312   298     X   185  2977  3882   298 |  288   1.59
    4 |  1428    98    80    35    84  1859  1441    77 |  288   1.23
    5 |  7280    71   171   270   163  5403  5800   140 |  283   3.83
    6 |  7528    70    96    73    78  2813  7744    63 |  288   7.23
    7 |  1405    83   126    86   159  1791  1569    81 |  288   1.07
    8 |  3225   123   102    62   118  1639  3445    97 |  288   2.60
    9 |  3164    81    85   119   170  2239  3383    54 |  288   2.40
   10 |  5208   145   103   228    78  3264  5525    51 |  288   2.03
   11 |  3535    55    79   141    78  1023  3307    74 |  288   0.48
   13 |   636    90   183    53    35   891   589    69 |  288   0.16
   14 |  1339   105   143    64   152  1018  1724    91 |  288   0.19
   15 |  3804    79    65     -    43  3012  3744    41 |  288   2.25
   17 |  1093   138   234     X   252  1273  1106   238 |  288   3.47
   18 |  1836   122     X    70   124   625  1757    60 |  288   0.34
   20 |  2071    84    56    54    41   637  1935    59 |  288   0.26
   21 |  3038   249   246     X   139     -  3057   197 |  287   2.88
   22 | 11022   145    76    51    88  6800  9058    87 |  282   5.17
   23 |  7731    70   159    44    79     -  7819    86 |  288   5.14
   24 |  3794   101    77    38    51  3304  3805    77 |  288   3.71
   25 |  6526    75   114    80    54  2054  6586    77 |  288   1.70
   26 |   485   105    79    72   141  1826   445   109 |  288   0.49
   27 |  5939    90    94   198   148  3362  6148   122 |  288   4.15
   28 |  1913   186    94    63   116  3228  1833    49 |  288   0.41
   29 |  1148    78    79   156    74  1850  1121   110 |  288   0.64
   30 |  2314   135   161    64    69  3800  1891   101 |  283   1.81
   31 |  5051   133   107    99    83  3804  4553    40 |  288   3.92
 -----+-------------------------------------------------+--------------
 ALBH |     -    43     -     X     -     -     -    41 |  285   0.08
 ALGO |     -   144    93     X    64     -     -    72 |  288   0.06
 AMC2 |     -    68     -     -     -     -     -    65 |  286   0.04
 ANKR |     -    41     -    43     -     -     -     - |  288  42.27
 AOML |     -    67     -     -     -     -     -    64 |  282  44.50
 AREQ |     -    33     -    82     -     -     -    69 |  288  36.39
 AUCK |     -    67     -    47     -     -     -    66 |  288  19.33
 BAHR |     -    90     -    50    38     -     -    55 |  288   0.53
 BOR1 |     -    47     -     -     -     -     -    45 |  286   3.50
 BRMU |     -   172     -    76   107     -     -    88 |  288  33.17
 BRUS |     -    90     -     -     -     -     -    86 |  286   0.11
 CAS1 |     -     -     -     -   109     -     -    98 |  285   9.40
 CRO1 |     -    27     -     -     -     -     -    26 |  285   0.39
 DAEJ |     -   130     -     -     -     -     -   124 |  287   2.03
 DAV1 |     -    54     -     -    54     -     -    66 |  288  20.38
 DRAO |     -    22    29     -     -     -     -    19 |  288   0.08
 EISL |     -     -     -    77    79     -     -     - |  178  52.60
 FAIR |     -     -   151   170     -     -     -   124 |  284   0.19
 GRAZ |     -    16     -     -     -     -     -    15 |  284  32.94
 GUAM |     -     X     -    71    53     -     -    95 |  288  29.02
 HOB2 |     -    83    63    44    46     -     -    67 |  288   0.09
 IISC |     -    93     -    58     -     -     -    66 |  288  37.87
 KERG |     -    78     -     -     -     -     -    75 |  225   1.73
 KIRU |     -    43     -    45     -     -     -     - |  254   1.73
 KOKB |     -     -     -   337   225     -     -   439 |  279   1.53
 KOUR |     -    46     -    85     -     -     -    83 |  288  40.05
 KWJ1 |     -     -     -   215   169     -     -   274 |  241 129.44
 LPGS |     -    62     -     X     X     -     -    59 |  280  24.02
 MAC1 |     -    57     -     -    42     -     -    54 |  288  15.81
 MAS1 |     -   132    81    61    78     -     -    49 |  288   1.84
 MATE |     -    24     -     -     -     -     -    23 |  288   0.12
 MAW1 |     -    56     -     -     -     -     -    53 |  273  27.70
 MCM4 |     -   282     -   182   171     -     -   211 |  284    >>>
 MDO1 |     -    84   119     -     -     -     -    52 |  234  29.95
 MEDI |     -    45     -     -     -     -     -    43 |  286   0.27
 METS |     -    69     -     -     -     -     -    66 |  285   0.33
 MKEA |     -   100     -    38     -     -     -    92 |  288  54.01
 NKLG |     -     -     -    71     X     -     -    66 |  287    >>>
 NLIB |     -   337     -     -     -     -     -   323 |  218 217.11
 NPLD |     -    74     -     -     -     -     -    71 |  285   0.05
 NRC2 |     -   101   114     -     -     -     -    69 |  286   0.12
 NYA1 |     -    53     -     -    63     -     -    50 |  288   0.06
 OHIG |     -    97     -    54    46     -     -    65 |  288  14.14
 ONSA |     -    69     -    57     -     -     -    26 |  288   1.97
 PENC |     -   174     -     -     -     -     -   167 |  284   6.35
 PERT |     -    81     -    42     -     -     -    47 |  288  17.91
 PIE1 |     -    54     -    74     -     -     -    40 |  264   0.07
 POTS |     -    54     -    55     -     -     -    88 |  277  13.60
 REYK |     -    47     -     -     -     -     -    45 |  286   7.33
 RIOG |     -     -     -    53    55     -     -     - |  238    >>>
 SANT |     -     X     -   220   152     -     -   270 |  272  22.96
 STJO |     -    43    93     -    33     -     -    28 |  288  13.29
 SUTH |     -   143     -   140     -     -     -   103 |  242  67.05
 THU1 |     -    77     -     -     -     -     -    74 |  253  26.24
 TLSE |     -    80     -     -     -     -     -    77 |  255   0.50
 TRO1 |     -    41     -     -    44     -     -     - |  288  12.65
 TROM |     -     -     -   141     -     -     -   130 |  283  13.49
 TSKB |     -   177   112   179     -     -     -    40 |  284   1.17
 URUM |     -    59     -     -     -     -     -    57 |  288  39.58
 USNO |     -   104   113    39     -     -     -    96 |  288   0.04
 USUD |     -   173    63    94     -     -     -    93 |  288   0.29
 VILL |     -    52    74   103     -     -     -    37 |  288  27.77
 WES2 |     -    24     -     -     -     -     -    23 |  286   0.08
 WHIT |     -    76     -     -    81     -     -     - |  287   6.88
 WTZR |     -    82     -    34     -     -     -    58 |  286   0.11
 WUHN |     -   181     -    94   400     -     -   112 |  287  37.09
 YELL |     -     -    76   122     -     -     -   100 |  274   0.16
 ZWEN |     -     -     -     -    26     -     -    24 |  271  23.08
 -----+-------------------------------------------------+--------------
 TOT  |  4635   116   127   118   122  2855  4426   111 |


 BEST CLOCK FIT: USNO   288   0.04 (ns) 

