
 GPS week: 1135   Day: 3   MJD: 52192                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2680      0     0.12    -0.30     4.69     0.00
 cod |   288     0  24716    518    -0.02     0.27     0.08    24.16
 emr |    96     0   3910      0   567.04     9.26     0.10    18.32
 esa |   288     0  17108   1824   569.32     9.31     0.11    15.81
 gfz |   288     0  14524    320     0.18    -0.68     0.11    17.03
 igu |    96     0   2015      2     0.19    -0.37     2.78     0.00
 ngs |    96     0   2680      0     0.12    -0.26     4.62     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  24722    352   836.27     2.60     0.08    24.68

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 | -2769    -8   -12    75    24  -974 -1790     -   -54 |
    2 | -3982    20  -147   -81     1     - -3192     -    65 |
    3 |  -408   127    62    18    48  -397  -699     -  -183 |
    4 |  1580   -31  -107    30   145  1564   898     -   -62 |
    5 | -4605    56  -167   163   -66     - -3988     -   -68 |
    6 | -2697    29   -67   410   -47     - -2132     -  -242 |
    7 | -1546   -19  -101  -131   -39 -4871 -1159     -   155 |
    8 | -3406   161  -276  -213   258 -6159 -3383     -  -128 |
    9 | -3613   108  -241   160    65 -4612 -3072     -  -194 |
   10 | -5058   190  -168   143   -81 -6980 -4933     -  -180 |
   11 |    47    68   164   103   -77 -2589   336     -  -119 |
   13 |  4087    98   145  -109    74  -476  3960     -  -114 |
   14 |  5403   166    62    23   -30  2170  5190     -  -171 |
   15 |  5833   101    85     -  -149     -  4581     -   -17 |
   17 |  1370   235    29     X   -60  -842  1383     -  -196 |
   18 |  8546    17    68   122    41  2835  8452     -  -141 |
   20 |  5075    49    88  -102   -78   680  5144     -    49 |
   21 |-11557    89    19     X   -55     --10947     -   -54 |
   22 |  6342    53   -97     X    74     -  5490     -   -79 |
   23 |  -660   197  -195   633  -133     - -1193     -  -411 |
   24 |  -306    93  -174    68     2  3806  -450     -   -93 |
   25 | -4861   138    63    13   193 -3611 -4523     -  -293 |
   26 | -1818    50  -232   517    57   -22 -1966     -  -362 |
   27 |  4508   143  -160  -174   253  8103  3750     -  -168 |
   28 |  4821    74   150  -210  -172  1205  4675     -   139 |
   29 | -6165   228   -34   104   133 -4363 -5483     -  -373 |
   30 | -3159   145    96   263    -7 -3590 -2712     -  -324 |
   31 |  8990   -89   131    62   214 19504  7755     -  -132 |
 -----+-------------------------------------------------------+
 ALBH |     -  -203     -     X     -     -     -     -   199 |
 ALGO |     -    30    68     X   -59     -     -     -    -5 |
 AMC2 |     -   -81     -     -     -     -     -     -    79 |
 ANKR |     -    46     -   -71     -     -     -     -     - |
 AOML |     -   -42     -     -     -     -     -     -    41 |
 AREQ |     -  -171     -    43     -     -     -     -   140 |
 AUCK |     -   -15     -    93     -     -     -     -   -45 |
 BAHR |     -    62     -   -30   -61     -     -     -     - |
 BILI |     -    30     -     -   -42     -     -     -     - |
 BOR1 |     -     8     -     -     -     -     -     -    -7 |
 BRMU |     -    17     -  -150    88     -     -     -    18 |
 BRUS |     -     2     -     -     -     -     -     -    -2 |
 CRO1 |     -  -169     -   310     -     -     -     -   -33 |
 DAEJ |     -  -985     -     -     -     -     -     -   964 |
 DAV1 |     -     3     -     -   -74     -     -     -    49 |
 DRAO |     -   -74   -52     -     -     -     -     -    85 |
 FAIR |     -     -    92   -85     -     -     -     -    33 |
 GALA |     -  -111     -   -84   -25     -     -     -   172 |
 GUAM |     -   -71     -   180    63     -     -     -   -84 |
 HOB2 |     -   144   228     -     0     -     -     -  -197 |
 HRAO |     -  -572     -     -     -     -     -     -   560 |
 IISC |     -    35     -    13     -     -     -     -   -42 |
 KERG |     -   140     -     -     -     -     -     -  -137 |
 KIRU |     -   134     -  -204     -     -     -     -     - |
 KOKB |     -     -     -  -127   118     -     -     -     X |
 KOSG |     -   -27     -  -120     -     -     -     -   103 |
 LPGS |     -  -151     -     X     X     -     -     -   148 |
 MAC1 |     -   -50     -     -   -75     -     -     -   102 |
 MAS1 |     -    19    60    19  -105     -     -     -    27 |
 MATE |     -   -20     -     -     -     -     -     -    20 |
 MAW1 |     -   128     -     -  -180     -     -     -    -1 |
 MCM4 |     -     X     -  -111   254     -     -     -  -115 |
 MDO1 |     -    60   -92     -     -     -     -     -   -32 |
 MEDI |     -   -48     -     -     -     -     -     -    47 |
 METS |     -  -564     -     -     -     -     -     -   552 |
 MKEA |     -     -     -  -142     -     -     -     -    91 |
 NKLG |     -   -67     -     3     X     -     -     -    61 |
 NLIB |     -   -38     -     -     -     -     -     -    37 |
 NPLD |     -   -13     -     -     -     -     -     -    13 |
 NRC2 |     -   -39    76     -     -     -     -     -    19 |
 NTUS |     -    14     -     -     -     -     -     -   -14 |
 NYA1 |     -   124     -     -  -176     -     -     -     0 |
 OHIG |     -    46     -  -155   -77     -     -     -   108 |
 ONSA |     -   -93     -   -26   -35     -     -     -   132 |
 PENC |     -   233     -     -     -     -     -     -  -228 |
 PERT |     -   -33     -   456     -     -     -     -  -256 |
 PIE1 |     -    10     -  -435     -     -     -     -   269 |
 POTS |     -     7     -  -143     -     -     -     -    86 |
 REYK |     -   -50     -     -     -     -     -     -    49 |
 RIOG |     -     -     -    98   -91     -     -     -     - |
 SANT |     -     X     -   209   113     -     -     -  -252 |
 SFER |     -  -617     -     -     -     -     -     -   604 |
 STJO |     -   -97   133     -  -171     -     -     -   181 |
 SUTH |     -     -     -  -291     -     -     -     -   186 |
 THU1 |     -    26     -     -     -     -     -     -   -26 |
 TLSE |     -  -230     -     -     -     -     -     -   225 |
 TRO1 |     -    34     -     -   -48     -     -     -     - |
 TROM |     -     -     -    33     -     -     -     -   -21 |
 TSKB |     -    54   -16     X     -     -     -     -   -48 |
 USNO |     -   216   292  -928     -     -     -     -   313 |
 USUD |     -   -27    94   136     -     -     -     -   -81 |
 VILL |     -    53     2  -160     -     -     -     -    51 |
 WES2 |     -   -46     -     -     -     -     -     -    45 |
 WHIT |     -    26     -     -   -37     -     -     -     - |
 WSRT |     -    -3     -     -     -     -     -     -     3 |
 WTZR |     -   -79     -   -51     -     -     -     -   110 |
 WUHN |     -   -26     -     X    24     -     -     -     9 |
 YELL |     -     -   129  -173     -     -     -     -    79 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 | 11069    63    60    77    86  4178 10902     -    27 |  288   3.25
    2 |  5379   194   154    93   112     -  4779     -    98 |  282   2.45
    3 |  2276   165   134   123   314  2678  2274     -    85 |  288   1.94
    4 |  4252    58    86    62    43   930  4056     -    46 |  288   0.91
    5 |  7733   104   163    78   105     -  8088     -    77 |  282   3.52
    6 |  7741    79   122   115    54     -  8501     -    91 |  288   8.01
    7 |  3221    43    72    44   134  1646  3150     -    58 |  288   1.54
    8 |  3344    67    54    49   120  2739  3392     -    75 |  288   2.73
    9 |  3522    83    53    44    94  2969  2811     -    42 |  288   2.41
   10 |  4676    95    87    77   109  5386  4125     -    43 |  288   2.21
   11 |  1076    69    73    88    75  1370  1151     -   115 |  288   0.37
   13 |  1140    82    67    47   107   409  1142     -    41 |  288   0.36
   14 |   943   162   228   113   231  1787   973     -   143 |  288   0.25
   15 |  8078   120   122     -    62     -  8038     -   109 |  288   4.06
   17 |   836    60   121     X    98   754   977     -    91 |  288   3.36
   18 |   967    73   170    56   129  1116  1044     -   122 |  288   0.30
   20 |  1535    83    69    67    51   619  1621     -    51 |  288   0.27
   21 |  6045    99   143     X    68     -  5529     -    51 |  288   4.52
   22 |  2922   192   147     X    62     -  2808     -   145 |  277   1.49
   23 |  5698    83   161   223   167     -  5510     -    55 |  288   5.64
   24 |  3257    82   101    77    62  3658  3254     -    47 |  288   2.69
   25 |  2780    96   115    66   103  2294  2916     -    39 |  288   1.65
   26 |  1233   108    90    76    79   718  1207     -   101 |  288   0.71
   27 |  8008   117   109   228   191  3684  7693     -    75 |  288   4.76
   28 |  1374    88   139    69   106  1082  1388     -    49 |  288   0.48
   29 |  2611    65    41    99    87  1783  2449     -   111 |  288   0.88
   30 |  3908   170    67   129   126  2620  3495     -    84 |  283   1.62
   31 |  3683    77    81    61    95  6324  3997     -    90 |  288   3.33
 -----+-------------------------------------------------------+--------------
 ALBH |     -    29     -     X     -     -     -     -    28 |  286   0.06
 ALGO |     -    42    31     X    38     -     -     -    43 |  288   0.04
 AMC2 |     -    17     -     -     -     -     -     -    17 |  286   0.06
 ANKR |     -    73     -   111     -     -     -     -     - |  285  32.40
 AOML |     -    36     -     -     -     -     -     -    35 |  286  46.42
 AREQ |     -    65     -    49     -     -     -     -    43 |  288  42.69
 AUCK |     -    36     -    59     -     -     -     -    44 |  288  29.04
 BAHR |     -    25     -    43    23     -     -     -     - |  288   0.58
 BILI |     -    36     -     -    51     -     -     -     - |  287  15.98
 BOR1 |     -    27     -     -     -     -     -     -    26 |  286   3.85
 BRMU |     -    33     -    35    44     -     -     -    38 |  288  37.69
 BRUS |     -    30     -     -     -     -     -     -    30 |  286   0.32
 CRO1 |     -    48     -    60     -     -     -     -    69 |  288   0.51
 DAEJ |     -    44     -     -     -     -     -     -    43 |  287   1.85
 DAV1 |     -    42     -     -    35     -     -     -    46 |  288  20.22
 DRAO |     -    19    55     -     -     -     -     -    20 |  288   0.08
 FAIR |     -     -    99   158     -     -     -     -    82 |  284   0.23
 GALA |     -    58     -    30    56     -     -     -    36 |  286  27.69
 GUAM |     -    77     -   321   104     -     -     -    79 |  280  26.36
 HOB2 |     -    38    57     -    39     -     -     -    36 |  288   0.11
 HRAO |     -    29     -     -     -     -     -     -    28 |  189  21.77
 IISC |     -   221     -    92     -     -     -     -   269 |  288  38.79
 KERG |     -    83     -     -     -     -     -     -    81 |  287   1.81
 KIRU |     -    29     -    45     -     -     -     -     - |  284   3.30
 KOKB |     -     -     -   239   222     -     -     -     X |  280   2.19
 KOSG |     -    54     -    66     -     -     -     -    31 |  288  40.56
 LPGS |     -   164     -     X     X     -     -     -   160 |  255  29.96
 MAC1 |     -    33     -     -    42     -     -     -    43 |  287  17.69
 MAS1 |     -    36    21    48    33     -     -     -    39 |  288   2.77
 MATE |     -    30     -     -     -     -     -     -    29 |  288   0.11
 MAW1 |     -    56     -     -    60     -     -     -    33 |  285  28.05
 MCM4 |     -     X     -   231   141     -     -     -   209 |  286  62.98
 MDO1 |     -    24    44     -     -     -     -     -    27 |  268  14.95
 MEDI |     -    39     -     -     -     -     -     -    38 |  286   0.17
 METS |     -    50     -     -     -     -     -     -    49 |  188   0.58
 MKEA |     -     -     -    72     -     -     -     -    46 |  282  52.91
 NKLG |     -    59     -    68     X     -     -     -    58 |   81    >>>
 NLIB |     -    48     -     -     -     -     -     -    47 |  288   0.07
 NPLD |     -    37     -     -     -     -     -     -    36 |  285   0.05
 NRC2 |     -    45    44     -     -     -     -     -    35 |  286   0.12
 NTUS |     -    54     -     -     -     -     -     -    53 |  288   7.36
 NYA1 |     -    29     -     -    50     -     -     -    22 |  288   0.15
 OHIG |     -   122     -    91    52     -     -     -    56 |  288  17.22
 ONSA |     -    46     -    85    72     -     -     -    41 |  288   2.62
 PENC |     -    40     -     -     -     -     -     -    39 |  285   7.61
 PERT |     -    92     -   241     -     -     -     -    69 |  288  17.02
 PIE1 |     -    24     -    41     -     -     -     -    16 |  288   0.08
 POTS |     -    70     -   118     -     -     -     -   127 |  274  39.32
 REYK |     -    30     -     -     -     -     -     -    29 |  286   8.61
 RIOG |     -     -     -    57    53     -     -     -     - |  281  17.54
 SANT |     -     X     -   196   138     -     -     -   205 |  280  24.88
 SFER |     -    38     -     -     -     -     -     -    37 |  220  25.90
 STJO |     -    32    36     -    41     -     -     -    23 |  288  12.68
 SUTH |     -     -     -   188     -     -     -     -   121 |  210  58.81
 THU1 |     -    64     -     -     -     -     -     -    62 |  253  41.36
 TLSE |     -   164     -     -     -     -     -     -   160 |  203   0.57
 TRO1 |     -    51     -     -    72     -     -     -     - |  245  13.78
 TROM |     -     -     -    35     -     -     -     -    22 |  284  15.36
 TSKB |     -    79    57     X     -     -     -     -    68 |  279   1.07
 USNO |     -    37    58    39     -     -     -     -    20 |  288   0.04
 USUD |     -    72    42   146     -     -     -     -    40 |  288   0.31
 VILL |     -    58    30    57     -     -     -     -    45 |  288  34.49
 WES2 |     -    44     -     -     -     -     -     -    43 |  285   0.06
 WHIT |     -    18     -     -    26     -     -     -     - |  288   9.02
 WSRT |     -    37     -     -     -     -     -     -    36 |  286   0.06
 WTZR |     -    35     -    47     -     -     -     -    33 |  288   0.10
 WUHN |     -    45     -     X    47     -     -     -    27 |  287  37.29
 YELL |     -     -   114    82     -     -     -     -    53 |  286   0.06
 -----+-------------------------------------------------------+--------------
 TOT  |  4687    80   101   115   106  2782  4622     -    77 |


 BEST CLOCK FIT: ALGO   288   0.04 (ns) 

