
 GPS week: 1135   Day: 2   MJD: 52191                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2674      0    -0.10    -0.25     4.83     0.00
 cod |   288     0  23540    308    -1.75     0.82     0.10    19.14
 emr |    96     0   3598    108   830.33     5.11     0.13    14.66
 esa |   288    12  17381    774  -227.73   -10.58     0.12    16.48
 gfz |   288     0  15171    267    -0.26    -0.65     0.07    29.73
 igu |    96     0   2392      0     0.05    -0.54     5.11     0.00
 ngs |    96     0   2674      0    -0.09    -0.27     4.55     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  21992   1174   830.11     5.21     0.10    19.99

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 | -7423   -25   -37    78    36 -9085 -6824     -   -82 |
    2 |  3502    70  -218  -222    54  5527  3094     -    76 |
    3 | -3867   -60    49   424    35 -5988 -3574     -  -342 |
    4 | -2215    66  -139    92    50  -342 -1941     -  -176 |
    5 | -3893    72  -298   124    35 -4209 -3144     -  -144 |
    6 |  4472  -126  -190   463    61  9788  3567     -  -289 |
    7 |   664   -71   -39  -219   131 -3287   316     -    56 |
    8 | -3459    82  -259   -87    83 -3754 -2819     -   -70 |
    9 | -5706    41  -305   363    26 -4010 -5112     -  -290 |
   10 | -4410   101  -184   200  -142 -9502 -3850     -     X |
   11 |  1404  -118     5   233    33   156  1706     -  -121 |
   13 |  4844   159   236  -138    62  4440  4898     -  -194 |
   14 |  3934   221   126   183  -167  3910  3902     -  -139 |
   15 | -3071   164   183     -  -106-20588 -3095     -   -44 |
   17 |  -497   126   179     X   -58     -    37     -   -78 |
   18 | 12653  -101   227    97     8  3554 12889     -   -47 |
   20 |  2656    68    91  -136    32  1240  2850     -   -28 |
   21 |  1098     -   320     X   -37     -  -505     -   -11 |
   22 | -1286   -77   226   284     6 17209 -1149     -   -80 |
   23 |  3694    78   -54   286   -74     -  2256     -  -178 |
   24 |  -328   -36  -191   206    28  6054  -611     -  -124 |
   25 |  -478    11   -56    65   216  -701  -399     -  -369 |
   26 | -4124    66  -308   491   -33   -97 -3644     -  -326 |
   27 |  2751    58  -179  -179   237  7665  2209     -  -224 |
   28 | -1449   117    -9  -238   -37  4484  -708     -   120 |
   29 | -3054   138    30    51   108  1429 -3039     -  -341 |
   30 |  2140  -225   -62   468   135  2448  1619     -  -313 |
   31 |  1450  -266   252   274    72 -5736   979     -  -130 |
 -----+-------------------------------------------------------+
 ALBH |     -   -91     -     X     -     -     -     -    88 |
 ALGO |     -   203     X  -186  -114     -     -     -   121 |
 AMC2 |     -   -31     -     -     -     -     -     -    29 |
 ANKR |     -    65     -   -76     -     -     -     -     - |
 AREQ |     -   -55     -    57     -     -     -     -     7 |
 ARTU |     -     5     -     -    -3     -     -     -     - |
 AUCK |     -   -22     -     0     -     -     -     -    21 |
 BAHR |     -    -1   141   -21    29     -     -     -   -60 |
 BILI |     -   -11     -     -     7     -     -     -     - |
 BRMU |     -     -     -  -124   -33     -     -     -   147 |
 BRUS |     -   -11     -     -     -     -     -     -    10 |
 CAS1 |     -  -111     -   206   -76     -     -     -    55 |
 CHAT |     -  -143     -   167     -     -     -     -     - |
 CRO1 |     -  -105     -    15     -     -     -     -    87 |
 DAEJ |     - -1118     -     -     -     -     -     -  1070 |
 DAV1 |     -    17     -     -   -42     -     -     -    46 |
 DRAO |     -   -57     -     -     -     -     -     -    55 |
 EISL |     -    50     -   -58     -     -     -     -     - |
 FAIR |     -     -   -10     X     -     -     -     -     7 |
 GALA |     -  -130     -     -    11     -     -     -   107 |
 GRAZ |     -   -78     -     -     -     -     -     -    75 |
 GUAM |     -     X     -   194   -88     -     -     -   -24 |
 HOB2 |     -     6     -     -    63     -     -     -  -100 |
 IISC |     -    -8     -    13     -     -     -     -    -3 |
 IRKT |     -     3     -    -4     -     -     -     -     - |
 KERG |     -   282     -     -     -     -     -     -  -270 |
 KIRU |     -   161     -  -187     -     -     -     -     - |
 KOKB |     -     -     -   140   -78     -     -     -     X |
 KSTU |     -   -87     -     -     -     -     -     -    84 |
 LHAS |     -   -36     -    42     -     -     -     -     - |
 LPGS |     -   258     -  -851     X     -     -     -   384 |
 MAC1 |     -    86     -     -  -262     -     -     -   313 |
 MAS1 |     -    56    37    77   -50     -     -     -   -49 |
 MATE |     -   -49     -     -     -     -     -     -    47 |
 MAW1 |     -    89     -     -   -62     -     -     -     7 |
 MCM4 |     -    85     -   140  -134     -     -     -     X |
 MDO1 |     -    80  -156     -     -     -     -     -   -28 |
 MEDI |     -   -75     -     -     -     -     -     -    71 |
 MKEA |     -     -     -   -83     -     -     -     -    68 |
 NKLG |     -     -     -  -118   -48     -     -     -   166 |
 NLIB |     -  -197     -     -     -     -     -     -   189 |
 NPLD |     -    37     -     -     -     -     -     -   -35 |
 NRC2 |     -   -12   106     -     -     -     -     -   -14 |
 OHIG |     -    28     -   -33     -     -     -     -     - |
 ONSA |     -   -29     -    34     -     -     -     -     - |
 PERT |     -    32     -   117     -     -     -     -  -122 |
 PETP |     -   -89     -     -    58     -     -     -     - |
 PIE1 |     -   -22     -  -419     -     -     -     -   350 |
 POTS |     -   -33     -   -57    24     -     -     -    42 |
 REYK |     -   111     -  -129     -     -     -     -     - |
 RIOG |     -  -139     -    99    16     -     -     -    30 |
 SANT |     -     -     -  -126    70     -     -     -     X |
 STJO |     -   -55     -     -   -92     -     -     -   191 |
 SUTH |     -   263     -  -445     -     -     -     -   128 |
 THTI |     -     -     -     -  -196     -     -     -   292 |
 TSKB |     -   -17    64    51     -     -     -     -   -41 |
 USNO |     -   271   332  -732     -     -     -     -   238 |
 USUD |     -   -64     -    78     -     -     -     -     0 |
 VILL |     -    -4   -31    95     -     -     -     -   -64 |
 WES2 |     -    26     -     -     -     -     -     -   -25 |
 WHIT |     -    79     -     -   -51     -     -     -     - |
 WTZR |     -     1     -    -1     -     -     -     -     - |
 WUHN |     -  -113     -    -5    34     -     -     -    62 |
 YELL |     -   184   182  -351     -     -     -     -    63 |
 ZWEN |     -     -     -  -790   182     -     -     -   327 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  4295    59   126   104    50  5552  3967     -    66 |  288   3.42
    2 |  3753   104   157   213    94  2998  3419     -   101 |  282   3.00
    3 |  3192   168    75   158   111  3014  3049     -    53 |  288   2.84
    4 |  3019    65    53    48    49   803  2854     -    68 |  288   0.76
    5 |  6133   102   258   101   143  7348  5485     -   137 |  282   3.44
    6 |  9186    57    81    40    40  8848  8467     -    63 |  288   8.07
    7 |  3240    74    44    67    90  5534  3276     -    63 |  288   2.75
    8 |  4079    69   116    54    55  1936  4269     -    52 |  288   3.16
    9 |  5582    39    88   132    62  3096  5629     -   150 |  288   2.31
   10 |  2781   100    49   121    50  5202  2637     -     X |  288   1.98
   11 |   833   196   173   111    75   400   695     -   130 |  288   0.35
   13 |   776   109   110   190    36  1754   753     -    83 |  288   0.24
   14 |   807   160   149   113   162  1444   823     -    83 |  288   0.23
   15 |  4795    96   132     -   113 11119  4406     -   155 |  286   2.84
   17 |  1918    77   160     X    49     -  1460     -    88 |  288   2.63
   18 |  2583    84   295   138    90  1714  2591     -    86 |  288   0.31
   20 |   876    47    61    91    40   825   961     -    89 |  288   0.31
   21 | 10317     -   193     X   135     -  9748     -   223 |  282   4.19
   22 |  3583   131   118    49    39 13952  3588     -    98 |  279   0.68
   23 |  8804    94   182   223    83     -  8623     -    69 |  288   6.21
   24 |  2430   119   135    65    45  3904  2166     -    53 |  288   1.76
   25 |  2810   199   141    40    79  3338  2885     -    64 |  288   2.51
   26 |  2044   132    88   215    29   979  2117     -   142 |  288   0.58
   27 |  8585    83    65   135    67  6165  7484     -    73 |  288   4.61
   28 |  2610    59    66   180    77  2311  3037     -    67 |  288   0.34
   29 |  1150   154   130    84    96  1431  1124     -    50 |  288   0.91
   30 |  4304   224   178   314    97  1590  4468     -   262 |  282   2.16
   31 |  8535   144    82   216    45  3285  7671     -    54 |  288   2.53
 -----+-------------------------------------------------------+--------------
 ALBH |     -    36     -     X     -     -     -     -    34 |  286   0.05
 ALGO |     -    84     X    58    31     -     -     -    58 |  288   0.04
 AMC2 |     -    65     -     -     -     -     -     -    62 |  286   0.05
 ANKR |     -    46     -    53     -     -     -     -     - |  270  32.95
 AREQ |     -    64     -    47     -     -     -     -    64 |  288  36.22
 ARTU |     -    53     -     -    34     -     -     -     - |  280  24.52
 AUCK |     -    62     -    95     -     -     -     -    76 |  288  28.35
 BAHR |     -   132    60    41    36     -     -     -   149 |  288   0.34
 BILI |     -    66     -     -    42     -     -     -     - |  287  13.41
 BRMU |     -     -     -    56    56     -     -     -    59 |  288  40.25
 BRUS |     -    33     -     -     -     -     -     -    32 |  286   0.09
 CAS1 |     -    58     -    81    27     -     -     -    76 |  288   8.10
 CHAT |     -    50     -    59     -     -     -     -     - |  270  21.20
 CRO1 |     -   108     -    50     -     -     -     -    84 |  288   0.23
 DAEJ |     -    45     -     -     -     -     -     -    43 |  279   1.51
 DAV1 |     -    28     -     -    34     -     -     -    62 |  288  23.02
 DRAO |     -    25     -     -     -     -     -     -    24 |  288   0.05
 EISL |     -    59     -    68     -     -     -     -     - |  173  30.05
 FAIR |     -     -   149     X     -     -     -     -   109 |   82   0.16
 GALA |     -    88     -     -    58     -     -     -    62 |  288  32.49
 GRAZ |     -   122     -     -     -     -     -     -   117 |  283    >>>
 GUAM |     -     X     -    57   174     -     -     -   248 |  284  24.89
 HOB2 |     -    34     -     -    28     -     -     -    49 |  288   0.05
 IISC |     -   227     -   147     -     -     -     -    96 |  266  35.68
 IRKT |     -   107     -   124     -     -     -     -     - |  270   0.09
 KERG |     -    56     -     -     -     -     -     -    53 |  287   1.73
 KIRU |     -    79     -    92     -     -     -     -     - |  266   6.63
 KOKB |     -     -     -   176    97     -     -     -     X |  264   1.03
 KSTU |     -   153     -     -     -     -     -     -   147 |  282  15.21
 LHAS |     -    63     -    73     -     -     -     -     - |  270  11.48
 LPGS |     -   420     -   142     X     -     -     -   357 |  269  35.38
 MAC1 |     -    79     -     -    36     -     -     -    93 |  287  17.48
 MAS1 |     -    31    33    48    35     -     -     -    45 |  288   1.63
 MATE |     -    69     -     -     -     -     -     -    66 |  288   0.12
 MAW1 |     -    25     -     -    50     -     -     -    69 |  285  28.94
 MCM4 |     -    87     -    86    28     -     -     -     X |  286  46.54
 MDO1 |     -    40    89     -     -     -     -     -    51 |  254   6.12
 MEDI |     -    76     -     -     -     -     -     -    73 |  286   0.24
 MKEA |     -     -     -    80     -     -     -     -    66 |  268  56.43
 NKLG |     -     -     -    48    31     -     -     -    30 |  124 113.14
 NLIB |     -    50     -     -     -     -     -     -    48 |  228   0.07
 NPLD |     -    31     -     -     -     -     -     -    30 |  285   0.08
 NRC2 |     -    26    61     -     -     -     -     -    27 |  286   0.07
 OHIG |     -    73     -    85     -     -     -     -     - |  270  20.68
 ONSA |     -    61     -    71     -     -     -     -     - |  270   2.45
 PERT |     -    44     -    71     -     -     -     -    49 |  288  13.50
 PETP |     -    39     -     -    25     -     -     -     - |  282  20.61
 PIE1 |     -   163     -   235     -     -     -     -    64 |  285   0.08
 POTS |     -   115     -    67    50     -     -     -    32 |  288  12.63
 REYK |     -    42     -    49     -     -     -     -     - |  266   8.24
 RIOG |     -    79     -    94    31     -     -     -   103 |  288  20.14
 SANT |     -     -     -   130    72     -     -     -     X |  260  29.48
 STJO |     -    33     -     -    24     -     -     -    48 |  288  18.80
 SUTH |     -    61     -   114     -     -     -     -    48 |  275  84.93
 THTI |     -     -     -     -    24     -     -     -    35 |  287   1.36
 TSKB |     -    57   114    87     -     -     -     -    53 |  274   0.88
 USNO |     -    37    81    49     -     -     -     -    34 |  288   0.06
 USUD |     -   111     -   113     -     -     -     -    48 |  288   0.32
 VILL |     -    83    34    58     -     -     -     -    47 |  288  28.33
 WES2 |     -    62     -     -     -     -     -     -    59 |  286   0.10
 WHIT |     -    30     -     -    19     -     -     -     - |  288  43.27
 WTZR |     -    78     -    91     -     -     -     -     - |  270   0.12
 WUHN |     -    85     -    80    40     -     -     -    70 |  287  29.08
 YELL |     -   120    82    88     -     -     -     -   103 |  288   0.13
 ZWEN |     -     -     -    88    29     -     -     -    70 |  271    >>>
 -----+-------------------------------------------------------+--------------
 TOT  |  4826   104   127   117    71  5115  4550     -    98 |


 BEST CLOCK FIT: ALGO   288   0.04 (ns) 

