
 GPS week: 1127   Day: 4   MJD: 52137                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2721      0    -0.18    -0.19     4.71     0.00
 cod |   288     0  24046      0     2.76    -6.42     0.09    27.29
 esa |   288     0  17627   1081    45.22     1.04     0.15    14.76
 gfz |   288     0  14512     25    -0.67     0.53     0.13    17.28
 igu |    96     0   2292      3    -0.41    -0.33     4.38     0.00
 jpl |   283     0   8277      0    -1.98     4.85     0.12    17.65
 ngs |    96     0   2721      0    -0.16    -0.34     4.43     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  25533    962   385.03    12.06     0.10    23.01

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |  6499   -10   -41    -8   108     2  5597     -    44 |
    2 |   369    36  -188  -127  6886    97   332     -   130 |
    3 | -7703    73  -116   124  3277    36 -7058     -  -121 |
    4 |  -324   163    87   178  4193   -31  -486     -  -460 |
    5 | -5096   160     3    28 13470   358 -4413     -  -369 |
    6 | -1450   259    48   -63 -4743    42 -1985     -  -309 |
    7 | -3703   -19  -152  -154  -293   107 -3302     -   247 |
    8 | -2518   -69   111   -51 10956    38 -2396     -    37 |
    9 |  8172   232   -79   152  6124   113  7565     -  -379 |
   10 |  -497    16    70   -20 -5483   322   -86     -  -186 |
   11 |  7467   -25  -159   -84 -1187    59  7303     -   175 |
   13 |  2393    45    70   -84  1926  -231  2837     -    33 |
   14 |  3376    99   194    37   754     9  3559     -  -273 |
   15 |-10022     -     -   216     -   384 -7949     -  -271 |
   17 | -6405   250     7   -40     -   233 -6183     -  -379 |
   18 |  3281   121    46   -76   715   239  3556     -  -187 |
   19 |-30240   -38     X    60     -     --29525     -     - |
   20 |  6022  -139    21   168  -931    31  5938     -    12 |
   21 |  4672   170     X    79     -   261  3921     -  -339 |
   22 | 24395   112   144  -160    78   172 19998     -  -181 |
   23 | 10841   196  -119  -301     -   178  9993     -     X |
   24 |  3382    89     5    49 17740   204  2534     -  -205 |
   25 |  1869   141     X   255 -9520   -21  1942     -  -350 |
   26 |  1675   211   355    90 -1870   135  1591     -  -604 |
   27 |-12213   -74   180   -55-40683  -214-10244     -    82 |
   28 |  1253   -75   105  -137  5409   121  1513     -    72 |
   29 | -1400    22   153   239 -4221   133 -1079     -  -343 |
   30 | -7179   134   116   160  1099    34 -6660     -  -369 |
   31 | -9468    18    53   -93 -5680     2 -8705     -    13 |
 -----+-------------------------------------------------------+
 ALBH |     -  -264    -9     -     -   134     -     -   221 |
 ALGO |     -   -78    17   -35     -    36     -     -    82 |
 AMC2 |     -   -94     -     -     -  -189     -     -   254 |
 AOML |     -  -207     -     -     -     -     -     -   246 |
 AREQ |     -     5  -362     -     -     -     -     -   205 |
 ARTU |     -   125     -  -197     -     -     -     -     - |
 AUCK |     -   -98   282     -     -     -     -     -   -65 |
 BAHR |     -   154  -236   -29     -     -     -     -   -10 |
 BOR1 |     -    19     -     -     -     -     -     -   -22 |
 BRUS |     -    47     -     -     -   133     -     -  -156 |
 CAS1 |     -   -62   199  -100     -   114     -     -   -65 |
 CRO1 |     -  -232    43     -     -    88     -     -   177 |
 DAEJ |     -  -903     -     -     -     -     -     -  1071 |
 DAV1 |     -    21     -   -87     -     -     -     -    41 |
 DRAO |     -   -74     -     -     -     -     -     -    88 |
 EISL |     -   -58     -     -     -     -     -     -    69 |
 FORT |     -   -22   261     -     -     -     -     -  -143 |
 GALA |     -     4     -    -6     -     -     -     -     X |
 GODE |     -   -62  -259     -     -     -     -     -   211 |
 GUAM |     -   -12   208     3     -  -114     -     -    -7 |
 HOB2 |     -  -257   232     -     -     -     -     -   157 |
 HRAO |     -   134     -     -     -  -350     -     -   107 |
 IISC |     -   192  -329     -     -     -     -     -   -37 |
 KERG |     -   108     -     -     -     -     -     -  -128 |
 KIRU |     -   272  -503     -     -     -     -     -     - |
 KOKB |     -     -   -19    72     -   -58     -     -     X |
 LPGS |     -     -  -411   142     -   -33     -     -   135 |
 MAC1 |     -    12     -  -101     -     -     -     -    63 |
 MALI |     -     -   -60     -     -     -     -     -    38 |
 MAS1 |     -     7   -25  -111     -     -     -     -    91 |
 MATE |     -   204     -     -     -  -999     -     -   490 |
 MAW1 |     -     6     -     -     -     -     -     -    -7 |
 MCM4 |     -     -   454    96     -     -     -     -  -314 |
 MEDI |     -    -4     -     -     -     -     -     -     5 |
 METS |     -    -8     -     -     -     -     -     -     9 |
 MKEA |     -   -54  -227     -     -     -     -     -   211 |
 NLIB |     -   -65     -     -     -     -     -     -    77 |
 NPLD |     -    15     -     -     -     -     -     -   -18 |
 NRC2 |     -   -75     -     -     -  -140     -     -   193 |
 NTUS |     -   -81     -     -     -     -     -     -    96 |
 OHIG |     -    27    26  -209     -     -     -     -   111 |
 ONSA |     -   -38   -62     -     -     -     -     -    85 |
 PENC |     -   157     -     -     -     -     -     -  -186 |
 PERT |     -    30    55     -     -     -     -     -   -71 |
 PIE1 |     -  -356  1245     -     -     -     -     -  -376 |
 POTS |     -     -  -148     -     -     -     -     -    95 |
 REYK |     -   -75     -     -     -     -     -     -    89 |
 SANT |     -     -    88   -20     -     -     -     -   -42 |
 SEY1 |     -     -  -175   -43     -     -     -     -   145 |
 SFER |     -  -190     -     -     -     -     -     -   225 |
 STJO |     -   -91     -   -74     -     -     -     -   161 |
 THTI |     -     -     -   -36     -     -     -     -    27 |
 TLSE |     -  -161     -     -     -     -     -     -   191 |
 TRO1 |     -  -100     -   157     -     -     -     -     - |
 TROM |     -     -  -196     -     -     -     -     -   126 |
 TSKB |     -    22   -54     -     -     -     -     -     8 |
 USNO |     -   -17  -164     -     -    11     -     -   118 |
 USUD |     -    20    50     -     -     -     -     -   -55 |
 VILL |     -    14   -97     -     -     -     -     -    46 |
 WES2 |     -  -101     -     -     -     -     -     -   120 |
 WHIT |     -   -64     -   101     -     -     -     -     - |
 WSRT |     -    -5     -     -     -   -75     -     -    62 |
 WTZR |     -   -52  -294     -     -   168     -     -   124 |
 WUHN |     -   243  -172    59     -     -     -     -  -222 |
 YAR2 |     -     -     -     -     -  -116     -     -    89 |
 YELL |     -   -56  -168    61     -  -121     -     -   218 |
 YSSK |     -     5     -    -7     -     -     -     -     - |
 ZWEN |     -     -  -249    12     -     -     -     -   151 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  5391    98   251    35  2548    60  4614     -    65 |  288   3.47
    2 |  4134   100   141   175  4038   179  4136     -   102 |  288   2.74
    3 |  1941    56   145    74  1955    90  2011     -   115 |  288   1.83
    4 |  1611   140    98   227  2811   213  1534     -   376 |  282   0.74
    5 |  3402    49   132    64  4084   141  3864     -    69 |  288   2.56
    6 | 10392   146   205   147  4879   104  9978     -    77 |  288   6.12
    7 |  3068    81   131   260  1628   149  2947     -   306 |  288   0.98
    8 |  4132    66    84    54  6064   114  4044     -    50 |  288   2.55
    9 |  5237    47   139    68  1067   138  5111     -    45 |  282   1.27
   10 |  2958    59   140    56  3609   126  2906     -    88 |  288   2.36
   11 |  1187    46   136    89   846   128  1203     -   127 |  288   0.34
   13 |  3817    75   122   154  1945   128  3694     -    63 |  288   0.24
   14 |  2109   146    58    55  1576   145  2054     -   130 |  288   0.20
   15 |  6376     -     -   165     -   247  5179     -   128 |  249   3.85
   17 |  2643   274   121   146     -   128  2628     -   340 |  279   3.67
   18 |  1206   137   269   120   880   125  1159     -   194 |  288   0.41
   19 |  4561   191     X   301     -     -  4587     -     - |  187   3.47
   20 |  1561   137   131   162   851   216  1420     -   222 |  288   0.19
   21 |  8217   208     X   212     -   143  7664     -   171 |  288   3.72
   22 |  5301    61   148    75  2789    86  4820     -   138 |  288   1.15
   23 |  8301   133   358   102     -   212  7944     -     X |  288   5.85
   24 |  5583   268   245   162  5326   227  4984     -   172 |  281   2.31
   25 |  3158   175     X   312  5385   107  3163     -    81 |  277   2.52
   26 |  1762   136   278    75  1171   189  1646     -    94 |  288   0.30
   27 |  6441   143   123    68 14288   122  6284     -    63 |  282   4.88
   28 |  2215    83   213   158  3088    94  2202     -   103 |  288   0.57
   29 |  1954    69    99    50  1591   108  1981     -    63 |  288   0.80
   30 |  3870    85    60   102  2330    71  4421     -    55 |  288   1.67
   31 |  7152    60   271   140  6991   108  5464     -   228 |  288   4.00
 -----+-------------------------------------------------------+--------------
 ALBH |     -    70    55     -     -    81     -     -    40 |  288   0.09
 ALGO |     -    60    68    41     -    79     -     -    31 |  288   0.07
 AMC2 |     -    32     -     -     -    54     -     -    24 |  288   0.03
 AOML |     -    52     -     -     -     -     -     -    61 |  286  23.43
 AREQ |     -    59    89     -     -     -     -     -    45 |  264   8.50
 ARTU |     -    14     -    22     -     -     -     -     - |  281  10.75
 AUCK |     -    28   103     -     -     -     -     -    58 |  288  20.22
 BAHR |     -    37    62    70     -     -     -     -    45 |  288   0.35
 BOR1 |     -    33     -     -     -     -     -     -    39 |  286   2.20
 BRUS |     -    36     -     -     -    51     -     -    40 |  288   0.06
 CAS1 |     -    69    49    29     -    59     -     -    52 |  288   9.32
 CRO1 |     -    65    60     -     -    72     -     -    34 |  288   0.17
 DAEJ |     -    34     -     -     -     -     -     -    40 |  279   1.71
 DAV1 |     -    28     -    22     -     -     -     -    28 |  288  24.64
 DRAO |     -    28     -     -     -     -     -     -    34 |  288   0.10
 EISL |     -    80     -     -     -     -     -     -    95 |  249  24.49
 FORT |     -    43   113     -     -     -     -     -    40 |  288   0.15
 GALA |     -    46     -    73     -     -     -     -     X |  288  20.85
 GODE |     -    72   267     -     -     -     -     -    80 |  286   0.07
 GUAM |     -    25   112   154     -   105     -     -    69 |  288  19.16
 HOB2 |     -    49    64     -     -     -     -     -    42 |  288   0.09
 HRAO |     -   183     -     -     -    78     -     -   168 |  288  21.38
 IISC |     -    75    92     -     -     -     -     -    60 |  288  23.11
 KERG |     -    31     -     -     -     -     -     -    37 |  287   2.05
 KIRU |     -    18    33     -     -     -     -     -     - |  287   5.25
 KOKB |     -     -   305    90     -   293     -     -     X |  255   1.62
 LPGS |     -     -   264   309     -   192     -     -   202 |  262    >>>
 MAC1 |     -    29     -    70     -     -     -     -    56 |  287  16.12
 MALI |     -     -    88     -     -     -     -     -    57 |  288  40.09
 MAS1 |     -    37    96    47     -     -     -     -    49 |  288   2.54
 MATE |     -    28     -     -     -    46     -     -    36 |  287   0.10
 MAW1 |     -    35     -     -     -     -     -     -    42 |  286  27.74
 MCM4 |     -     -   198   329     -     -     -     -   165 |  282  55.67
 MEDI |     -    33     -     -     -     -     -     -    39 |  286   0.38
 METS |     -    29     -     -     -     -     -     -    34 |  285   0.07
 MKEA |     -    46   104     -     -     -     -     -    32 |  283  35.18
 NLIB |     -    34     -     -     -     -     -     -    40 |  287 471.18
 NPLD |     -    28     -     -     -     -     -     -    33 |  285   0.07
 NRC2 |     -    64     -     -     -    58     -     -    61 |  288   0.13
 NTUS |     -    97     -     -     -     -     -     -   115 |  269   6.79
 OHIG |     -    74   105   104     -     -     -     -    93 |  203  46.63
 ONSA |     -    68    66     -     -     -     -     -    49 |  288   2.61
 PENC |     -   160     -     -     -     -     -     -   189 |  283   4.38
 PERT |     -    40    77     -     -     -     -     -    59 |  288  12.00
 PIE1 |     -    34    45     -     -     -     -     -    27 |  288   0.04
 POTS |     -     -    66     -     -     -     -     -    42 |  275  23.86
 REYK |     -    26     -     -     -     -     -     -    31 |  286  10.10
 SANT |     -     -    91    90     -     -     -     -    94 |  279  20.86
 SEY1 |     -     -    78    90     -     -     -     -    58 |  288  46.62
 SFER |     -    35     -     -     -     -     -     -    41 |  285   1.86
 STJO |     -    46     -    59     -     -     -     -    62 |  286   1.90
 THTI |     -     -     -    67     -     -     -     -    50 |  286   5.94
 TLSE |     -    26     -     -     -     -     -     -    30 |  281   0.77
 TRO1 |     -    14     -    23     -     -     -     -     - |  288  12.91
 TROM |     -     -    28     -     -     -     -     -    18 |  286  15.53
 TSKB |     -    24    74     -     -     -     -     -    37 |  288   1.04
 USNO |     -    62    66     -     -    72     -     -    32 |  288   0.04
 USUD |     -    57    61     -     -     -     -     -    75 |  288    >>>
 VILL |     -    25    43     -     -     -     -     -    28 |  288  17.93
 WES2 |     -    30     -     -     -     -     -     -    36 |  285  10.77
 WHIT |     -    39     -    62     -     -     -     -     - |  288  12.28
 WSRT |     -    39     -     -     -    43     -     -    42 |  288   0.08
 WTZR |     -    32    31     -     -    42     -     -    36 |  288   0.15
 WUHN |     -    34    66    77     -     -     -     -    38 |  287  21.06
 YAR2 |     -     -     -     -     -    87     -     -    67 |   89   1.86
 YELL |     -    85   307    50     -    64     -     -    54 |  288   0.12
 YSSK |     -    26     -    41     -     -     -     -     - |  287   9.88
 ZWEN |     -     -   150    43     -     -     -     -    98 |  277  13.80
 -----+-------------------------------------------------------+--------------
 TOT  |  4712    88   148   133  4377   124  4431     -   104 |


 BEST CLOCK FIT: AMC2   288   0.03 (ns) 

