
 GPS week: 1116   Day: 3   MJD: 52059                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2749      0    -0.25     0.61     5.06     0.00
 cod |   288     1  17135    126     0.33     0.77     0.13    14.33
 esa |   288     0  16338   1082   674.97     4.12     0.12    15.75
 gfz |   288     0  14561    177    -0.44     0.97     0.08    23.32
 igu |    96     0   2377      0     0.40    -0.81     3.72     0.00
 jpl |   281     0   8611    290     3.19    -1.41     0.09    21.74
 ngs |    96     0   2749      0    -0.20     0.56     4.83     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15853    548   294.84    29.76     0.08    24.85

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 | -5962    69   203  -145  2060   -69 -6046     -     7 |
    2 |  7943   -40   -48   136     -   319  7031     -  -199 |
    3 |  7519    53    69   -68  3867  -162  7190     -    60 |
    4 | -1909  -157   356    10-10349   -83 -1778     -  -120 |
    5 |  1031   -58   112    89   522    65   513     -  -152 |
    6 |-12200    -5    42   106-12449  -211-10954     -   -28 |
    7 |  1533   -79    57    34  2355   332  1270     -  -175 |
    8 | -2088   163   -38   103 14985   190 -2142     -  -222 |
    9 | -1486    23   180   151  7430   101 -1570     -  -314 |
   10 |   869    60    83    47  2313   311   832     -  -248 |
   11 |  3779  -121   199  -111  1760    61  3815     -    16 |
   13 |  6459    80    19    -1 -1199  -225  6105     -    34 |
   14 |  7011   117    11  -130  1993  -131  6684     -   110 |
   15 |    31    -6     -    46  4515   167   388     -  -109 |
   17 |-12058    77     X    28     -  -146-12515     -     X |
   18 |  3675    31   -69    22 -7120  -115  3677     -    54 |
   19 |  -998   -51   244   -21     -   257   -61     -  -216 |
   20 |  4784    56   -10   -92  -428   268  4968     -   -44 |
   21 | -8360   170   -25    82     -  -173 -7238     -   -72 |
   22 |  1013   115  -158  -150  9842   261   709     -    76 |
   23 |  5810   268   -73    91  1060   293  5240     -  -300 |
   24 |   647  -262   216   -10 -2426    32   355     -     - |
   25 |  -380    30   -41    94  -446  -158  -826     -    -8 |
   26 | -3004    47   282   123 -1766   -21 -2998     -  -312 |
   27 | -4545    43   -45    27 -2454   322 -3936     -  -145 |
   28 |  7685     6  -123   -73 -1072   145  7298     -    90 |
   29 |  3428    23    92   -42 -3486  -125  2898     -    17 |
   30 | -4249    19    91   229 -5472  -493 -3709     -   -67 |
   31 | -7357    84   -39   -18 -4124   182 -6540     -   -91 |
 -----+-------------------------------------------------------+
 ALBH |     -  -287     X     -     -   189     -     -     - |
 ALGO |     -   -90     X   -45     -     -     -     -    94 |
 AREQ |     -   -42    63     -     -  -149     -     -   110 |
 AUCK |     -     -   -62   175     -   -88     -     -   -51 |
 BAHR |     -    75    39  -117     -     -     -     -    42 |
 BRMU |     -  -241   -59   -24     -     -     -     -   198 |
 CRO1 |     -    -4     5     -     -    -1     -     -     - |
 DRAO |     -  -136     -     -     -     -     -     -    78 |
 EISL |     -  -147    25    68     -     -     -     -     - |
 FAIR |     -     -   -92     -     -    11     -     -    48 |
 GODE |     -    24   -22     -     -     -     -     -     - |
 GOLD |     -    -9     X     -     -     6     -     -     - |
 GRAZ |     -   -26   -40     -     -     -     -     -    36 |
 GUAM |     -     -  -361    60     -    26     -     -   151 |
 HRAO |     -   246     -     -     -  -162     -     -     - |
 JPLM |     -     -     -    -6     -     7     -     -     - |
 KERG |     -    36     -  -108     -     -     -     -    82 |
 KIRU |     -   752  -684     -     -     -     -     -     - |
 KOKB |     -     -    48    11     -   -47     -     -     X |
 LPGS |     -     -  -137     X     -     -     -     -    87 |
 MALI |     -    69  -173  -164     -     -     -     -   225 |
 MAS1 |     -    20    24   -58     -     -     -     -    27 |
 MCM4 |     -  -204   301   -80     -     -     -     -    -2 |
 MDO1 |     -   -81     -     -     -    32     -     -    20 |
 MKEA |     -     -   -98     -     -   -70     -     -   122 |
 OHIG |     -  -163   449  -301     -     -     -     -    89 |
 ONSA |     -   -62   -29   -69     -     -     -     -   119 |
 PIE1 |     -   108  -220     -     -     X     -     -    77 |
 POTS |     -   -61   -33   -69     -     -     -     -   121 |
 REYK |     -    24   -22     -     -     -     -     -     - |
 SEY1 |     -   117   -33   -45     -     -     -     -     - |
 STJO |     -   -83     -    51     -     -     -     -     - |
 SUTH |     -   399  -111     -     -  -188     -     -     - |
 THTI |     -     -     -   -82     -     -     -     -    77 |
 TRO1 |     -  -189     -   116     -     -     -     -     - |
 USNO |     -     -   -93     -     -     -     -     -    59 |
 USUD |     -   -21   -40     -     -   -66     -     -    91 |
 WHIT |     -  -129     -    79     -     -     -     -     - |
 WILL |     -  -116     -     -     -    76     -     -     - |
 WSRT |     -  -157     -     -     -     -     -     -    91 |
 WTZR |     -   -63   -83     -     -     -     -     -    89 |
 WUHN |     -     7     -  -106     -     -     -     -    95 |
 YELL |     -  -100  -197     -     -     -     -     -   182 |
 YSSK |     -  -151     -   172     -   -87     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  4579   116    49    51  4535    98  4471     -    49 |  288   4.48
    2 |  5125   189   119    28     -    38  4365     -    75 |  288   3.53
    3 |  4576   152   224   136  4157    96  4569     -   119 |  278   2.31
    4 |  1669   233   144    51  4996    95  1519     -    37 |  288   0.71
    5 | 11840    95    41    52  4066    48 10692     -    43 |  288   2.30
    6 |  8946   130   254   118  5476    77  7924     -    50 |  276   7.47
    7 |  1685   195   148    52  1227   106  1787     -    98 |  279   1.55
    8 |  6266   104    83    29  8590    88  6033     -    65 |  288   5.37
    9 |  1694    93   119   117  2540    51  1842     -   115 |  288   1.48
   10 |  2260   130   146   163  2020   158  2218     -    49 |  277   1.74
   11 |   925   220    60    78   764    84   934     -   107 |  288   0.60
   13 |  2163    87   103    54   808   228  2115     -    93 |  288   0.35
   14 |  1350   129   115    57   940    40  1526     -    44 |  288   0.24
   15 |  5398   153     -   115  4163   274  5154     -   116 |  287   4.40
   17 |  6906   104     X    63     -    60  6404     -     X |  271   2.87
   18 |  1387   272   141    48  3470    66  1345     -    67 |  288   0.45
   19 | 12170   153    75   114     -   162 12148     -    74 |  287   2.74
   20 |   719   207    85   134   434   122   601     -   146 |  288   0.19
   21 |  6286   237   171    50     -    71  5811     -   127 |  278   2.47
   22 |  1602   115   165    67  5726   152  1657     -    55 |  287   0.61
   23 |  4997   248   213   204  3039    86  4989     -   174 |  276   4.51
   24 |  3534   187    85    51  4331   104  3706     -     - |  288   3.16
   25 |  3060    58    76    69  2001    52  2915     -    39 |  288   2.16
   26 |  1995   122   129   137  1191    65  1940     -    31 |  288   0.46
   27 |  4428    65   110    43  3279   125  3827     -    74 |  288   2.42
   28 |  1217    88    43    54   771   146  1379     -    46 |  288   0.46
   29 |  2867   100   107    71  2842   125  3041     -    34 |  288   0.79
   30 |  2912   129   124    57  3753    96  3162     -    58 |  288   1.62
   31 |  6872   151   245   229  4828    66  7162     -    57 |  278   3.91
 -----+-------------------------------------------------------+--------------
 ALBH |     -    56     X     -     -    37     -     -     - |  281   0.10
 ALGO |     -   121     X    38     -     -     -     -    42 |  288   0.05
 AREQ |     -    61    35     -     -    36     -     -    29 |  288  32.91
 AUCK |     -     -    42    28     -    78     -     -    47 |  288  27.66
 BAHR |     -   104    80    58     -     -     -     -   135 |  288   0.35
 BRMU |     -   109    39    59     -     -     -     -    30 |  288  34.66
 CRO1 |     -   174    54     -     -    98     -     -     - |  287   1.45
 DRAO |     -   101     -     -     -     -     -     -    58 |  287   0.07
 EISL |     -   185    48   124     -     -     -     -     - |  276  17.92
 FAIR |     -     -   161     -     -    70     -     -   133 |  288   0.13
 GODE |     -   233   212     -     -     -     -     -     - |  144  10.66
 GOLD |     -    29     X     -     -    19     -     -     - |  213  14.77
 GRAZ |     -   183   273     -     -     -     -     -   176 |  281    >>>
 GUAM |     -     -    52    38     -    80     -     -    31 |  288  14.20
 HRAO |     -    75     -     -     -    49     -     -     - |  281   1.29
 JPLM |     -     -     -    61     -    66     -     -     - |  274  39.23
 KERG |     -   132     -    87     -     -     -     -    30 |  287   2.29
 KIRU |     -    52    48     -     -     -     -     -     - |  287   7.72
 KOKB |     -     -    99   114     -   136     -     -     X |  277   2.41
 LPGS |     -     -   273     X     -     -     -     -   173 |  164 517.24
 MALI |     -    80   109    57     -     -     -     -    44 |  288   6.30
 MAS1 |     -    53    60    47     -     -     -     -    37 |  288   3.00
 MCM4 |     -   205   173    66     -     -     -     -    60 |  281    >>>
 MDO1 |     -    99     -     -     -    27     -     -    61 |  287  14.47
 MKEA |     -     -    65     -     -    70     -     -    72 |  288  29.96
 OHIG |     -    66    41    49     -     -     -     -    45 |  288  12.05
 ONSA |     -    74    44    16     -     -     -     -    28 |  288   0.18
 PIE1 |     -    45    52     -     -     X     -     -    38 |  288   0.08
 POTS |     -    66    48    25     -     -     -     -    37 |  281  12.11
 REYK |     -    41    37     -     -     -     -     -     - |  286   8.50
 SEY1 |     -    98    99   101     -     -     -     -     - |  282  31.12
 STJO |     -    51     -    31     -     -     -     -     - |  287   3.87
 SUTH |     -    52    99     -     -    83     -     -     - |  287  30.81
 THTI |     -     -     -    20     -     -     -     -    19 |  287   1.33
 TRO1 |     -    57     -    35     -     -     -     -     - |  287  12.02
 USNO |     -     -    53     -     -     -     -     -    33 |  288   0.04
 USUD |     -    91    36     -     -    64     -     -    70 |  288   0.18
 WHIT |     -    96     -    59     -     -     -     -     - |  287  12.38
 WILL |     -    65     -     -     -    43     -     -     - |  273   1.95
 WSRT |     -    40     -     -     -     -     -     -    23 |  287   0.03
 WTZR |     -    97    36     -     -     -     -     -    41 |  288   0.17
 WUHN |     -    95     -    21     -     -     -     -    38 |  287  23.60
 YELL |     -    49    67     -     -     -     -     -    58 |  288   0.06
 YSSK |     -    72     -    26     -    42     -     -     - |  287  10.20
 -----+-------------------------------------------------------+--------------
 TOT  |  5057   128   119    83  3719    93  4827     -    77 |


 BEST CLOCK FIT: WSRT   287   0.03 (ns) 

