
 GPS week: 1116   Day: 1   MJD: 52057                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2763      0    -0.17     0.14     4.63     0.00
 cod |   288     1  17450     28    -1.46    -3.70     0.07    27.73
 emr |    96     0   3699    186   670.13     5.47     0.10    18.30
 esa |   288     0  14128    568   671.57    -9.46     0.35     0.00
 gfz |   288     0  14160     30     0.08     0.13     0.10    20.03
 igu |    96     0   2477      0    -0.20     0.16     4.10     0.00
 jpl |   267     0   7531    659     3.46     5.84     0.14    10.84
 ngs |    96     0   2763      0    -0.15     0.12     4.38     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  13984    358   228.90    32.15     0.09    23.11

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -5813    89    12    55     4-20571  -113 -4895     -   -92 |
    2 | -5281    43  -273   236   -58 -3506   356 -5589     -     - |
    3 |  4980   -45   103   383    18  8676  -108  4189     -    35 |
    4 |  3632    34    44    53    62 -5579   -66  3019     -   -90 |
    5 |  9492    57  -114  -127    29 16255   274  8082     -  -124 |
    6 |  3741    58  -137   287    74  9657  -166  3485     -   -65 |
    7 | -3692   121   -25   120    18 -1818   548 -3500     -  -266 |
    8 | -2764   148    70  -151    48 10918   219 -2621     -  -283 |
    9 | -5589   -37  -206   262   311 -3618   262 -5283     -  -222 |
   10 | -3097   231  -196   294    16 -4329   244 -2975     -  -289 |
   11 |   930   -67   218   100   -11  2519  -286  1211     -    90 |
   13 |  5823   -12   246  -122  -116  2661     X  5765     -    50 |
   14 |  6975   -27   250  -255  -175  4032  -144  6652     -   151 |
   15 | -4209     2  -352     -    30 -1252    80 -2973     -    50 |
   17 | -6402   141  -346  -188   -95     -    31 -6020     -     X |
   18 |  5881  -105    -7  -276   167 -1380  -247  5686     -    44 |
   19 | -1505   116    78   120  -117-12021     X -1322     -   -66 |
   20 |  7045    67    -5  -239  -173  4150   221  6735     -    16 |
   21 |  3437    70  -161   -91   -84     -   -35  3358     -    35 |
   22 | -1297    97   -88  -179    21 -1698   -57 -2246     -   -99 |
   23 |   333   135  -312   -39    90     -   241  -193     -  -215 |
   24 | -5642   102     X    24  -156 -1088    68 -4879     -     - |
   25 |  3933    -1   -52   -17    94 -1291  -131  3042     -   -43 |
   26 |  2995    91  -138   268   216   204   -39  2750     -  -252 |
   27 |-12456   110    57  -166    16-12610   240 -9745     -  -215 |
   28 |  -352  -106   373  -158   -49  4723   136  -447     -    44 |
   29 |  -185   -50    71   -47    14 -2147  -258  -626     -    88 |
   30 |  7443   -62   -47    31   206 10603     X  7398     -   -92 |
   31 | -8943   205     X   310   267 -1276     X -8649     -  -607 |
 -----+-------------------------------------------------------------+
 ALBH |     -   -72     -     3     -     -   185     -     -     - |
 ALGO |     -   -75   158     X  -131     -     -     -     -   162 |
 AREQ |     -  -128     -  -193     -     -  -127     -     -   201 |
 AUCK |     -  -140     -   -48     -     -    14     -     -   162 |
 BAHR |     -    65    23   -86   -32     -     -     -     -   -57 |
 BRMU |     -     -     -     -    -7     -     -     -     -     6 |
 CAS1 |     -    31     -  -165   -64     -     -     -     -    19 |
 CRO1 |     -   -22     -     -     -     -    56     -     -     - |
 DAV1 |     -    37     -     -   -51     -     -     -     -     - |
 DRAO |     -   -82     3     -     -     -     -     -     -    97 |
 FORT |     -     -     -  1758 -1053     -     -     -     -   913 |
 GOLD |     -   121     -     X     -     -  -311     -     -     - |
 GUAM |     -  -133     -  -181    85     -   -59     -     -   111 |
 HOB2 |     -  -225   -71   633     -     -     -     -     -   288 |
 HRAO |     -   -30     -     -     -     -    76     -     -     - |
 JPLM |     -     -     -     -   -81     -   151     -     -     - |
 KARR |     -  -107     -     -   148     -     -     -     -     - |
 KERG |     -    58     -     -     -     -     -     -     -   -69 |
 LPGS |     -     -     -   200   164     -     -     -     -  -142 |
 MAC1 |     -    20     -   181   -27     -     -     -     -     - |
 MALI |     -   -48     -  -255     -     -     -     -     -    57 |
 MAS1 |     -    26   208   -10  -257     -     -     -     -   136 |
 MCM4 |     -     -     -    34    -3     -     -     -     -     3 |
 MDO1 |     -     -     8     -     -     -   -13     -     -     - |
 MKEA |     -   -44     -  -150    50     -    22     -     -     - |
 NRC2 |     -  -163   247     -     -     -     -     -     -     - |
 NYA1 |     -   -24     -     -    33     -     -     -     -     - |
 OHIG |     -     -     -   139  -161     -     -     -     -   139 |
 PIE1 |     -     -     -    64     -     -   -80     -     -    37 |
 POTS |     -  -136     -   -29     -     -     -     -     -   163 |
 STJO |     -   -46   239     -   -10     -     -     -     -     - |
 SUTH |     -    62     -   313     -     -  -159     -     -     - |
 THTI |     -     -     -     -   -70     -     -     -     -    61 |
 TRO1 |     -  -154     -     -   213     -     -     -     -     - |
 TSKB |     -     -   -28    22     -     -     -     -     -    22 |
 USNO |     -    -2     -  -468     -     -     -     -     -     3 |
 USUD |     -   -15     -   178     -     -    38     -     -     - |
 WHIT |     -   -16     -     -    23     -     -     -     -     - |
 WILL |     -    -3     -     -     -     -     7     -     -     - |
 WSRT |     -   -54     -     -     -     -     -     -     -    65 |
 WTZR |     -  -112     -   -19     -     -     -     -     -   134 |
 WUHN |     -  -141     -     -    22     -     -     -     -   151 |
 YELL |     -   -50    76  -380     -     -     -     -     -     - |
 YSSK |     -    29     -     -   -17     -   -45     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  6341   100   160   125    61  9556   121  5463     -    63 |  288   3.95
    2 |  3830    85   181   227   168  2866   131  3888     -     - |  287   3.75
    3 |  2607   104   173   533   140  3893   127  3271     -    63 |  279   2.20
    4 |  1690    53    50   184    74  3160   169  1782     -   100 |  288   0.70
    5 |  6974    62    58    85    70  6999   136  6052     -    57 |  288   3.11
    6 |  8946   108   128   353   110  5491   199  8812     -    81 |  277   9.01
    7 |  2208   173    64   275    74  1587   218  1877     -   147 |  279   0.83
    8 |  6324    92   178   119    99  6856   121  6909     -    67 |  288   5.34
    9 |  3160    70   174   288    71  3261    80  3045     -    46 |  288   1.51
   10 |  3959    66   187   231   112  3194   135  3631     -    57 |  278   2.43
   11 |  2317   219    98   114    94  1418   224  2219     -   226 |  288   0.30
   13 |  1731    61   197   104   107  1761     X  1537     -    39 |  288   0.42
   14 |  1615    54    65   293    89  2079    88  1616     -   121 |  288   0.26
   15 |  9303    53    75     -   119  4624   166  8844     -    99 |  288   3.31
   17 |  2561    70    99  1232   113     -   187  2644     -     X |  288   2.75
   18 |  1165    62   112   328    64  1094   197  1212     -    92 |  288   0.57
   19 |  3831   153    75   463   172  2380     X  3731     -    85 |  283   2.50
   20 |  1205    79    87   164    79  1640   127  1219     -    47 |  286   0.27
   21 |  8621    71    87   638   144     -   212  6590     -   150 |  288   2.42
   22 |  5753    94    91    66   172  2751   141  5143     -    56 |  288   1.81
   23 |  5949    61    89   418    42     -   189  6078     -    56 |  281   5.59
   24 |  3966    38     X   154    41  1881   100  3443     -     - |  287   2.16
   25 |  2292    43    92   148    58  2018   149  2394     -    51 |  288   1.52
   26 |   920   109    73   321   112  1243   160   879     -    62 |  288   0.70
   27 |  5936    83    73   277   108  6842   232  6076     -    58 |  288   3.05
   28 |  2383    62    92    51    97  1717   144  2377     -    45 |  288   1.48
   29 |  1593    73    65   170    44  1343   133  1623     -    92 |  288   0.34
   30 |  3813    65   119    89   133  5739     X  3680     -    86 |  288   1.35
   31 |  4635    58     X   488   160  5043     X  4724     -   116 |  276   2.79
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    30     -   851     -     -    77     -     -     - |  266   0.16
 ALGO |     -    40    34     X    49     -     -     -     -    65 |  288   0.06
 AREQ |     -    67     -    85     -     -   176     -     -    39 |  287  21.41
 AUCK |     -    44     -   122     -     -    80     -     -    53 |  287  23.57
 BAHR |     -    28    87    77    58     -     -     -     -    44 |  288   0.39
 BRMU |     -     -     -     -    85     -     -     -     -    74 |  288  24.20
 CAS1 |     -    56     -    88    57     -     -     -     -   104 |  286  11.85
 CRO1 |     -    36     -     -     -     -    93     -     -     - |  266  25.81
 DAV1 |     -    25     -     -    35     -     -     -     -     - |  287  21.17
 DRAO |     -    47    26     -     -     -     -     -     -    56 |  288   0.05
 FORT |     -     -     -   674    32     -     -     -     -    27 |  132   0.06
 GOLD |     -    28     -     X     -     -    72     -     -     - |  266  21.16
 GUAM |     -    35     -   116    59     -   121     -     -    56 |  288  11.89
 HOB2 |     -    27    29    98     -     -     -     -     -    32 |  288   0.13
 HRAO |     -    39     -     -     -     -    99     -     -     - |  264   1.73
 JPLM |     -     -     -     -   118     -   219     -     -     - |  259  11.46
 KARR |     -    16     -     -    22     -     -     -     -     - |  287 109.94
 KERG |     -   108     -     -     -     -     -     -     -   129 |  287   1.29
 LPGS |     -     -     -  1161   233     -     -     -     -   202 |  135    >>>
 MAC1 |     -    24     -   177    33     -     -     -     -     - |  287  12.92
 MALI |     -    72     -   226     -     -     -     -     -    87 |  277  36.10
 MAS1 |     -    23    43    65    19     -     -     -     -    23 |  288   1.93
 MCM4 |     -     -     -   611   183     -     -     -     -   158 |  235   3.13
 MDO1 |     -     -    45     -     -     -    75     -     -     - |   84  20.00
 MKEA |     -    65     -   103    79     -   103     -     -     - |  287  32.55
 NRC2 |     -    16    24     -     -     -     -     -     -     - |   95   0.17
 NYA1 |     -    13     -     -    18     -     -     -     -     - |  287   0.10
 OHIG |     -     -     -   201   188     -     -     -     -   163 |  288  20.89
 PIE1 |     -     -     -   137     -     -    90     -     -    42 |  266   0.07
 POTS |     -    40     -    99     -     -     -     -     -    48 |  287  18.37
 STJO |     -    36    63     -    41     -     -     -     -     - |  288   3.32
 SUTH |     -    37     -   195     -     -    94     -     -     - |  264  11.15
 THTI |     -     -     -     -    99     -     -     -     -    86 |  287   1.38
 TRO1 |     -    19     -     -    26     -     -     -     -     - |  287  11.52
 TSKB |     -     -    74   172     -     -     -     -     -    58 |   96   1.44
 USNO |     -    30     -   168     -     -     -     -     -    36 |  287   0.05
 USUD |     -    35     -   177     -     -    89     -     -     - |  261   0.23
 WHIT |     -    13     -     -    18     -     -     -     -     - |  287   5.07
 WILL |     -    28     -     -     -     -    72     -     -     - |  262   1.52
 WSRT |     -    29     -     -     -     -     -     -     -    34 |  287   0.06
 WTZR |     -    44     -    86     -     -     -     -     -    53 |  287   0.09
 WUHN |     -    61     -     -    46     -     -     -     -    48 |  287  20.58
 YELL |     -    22    34    76     -     -     -     -     -     - |   95   0.05
 YSSK |     -    61     -     -    64     -   114     -     -     - |  287  14.92
 -----+-------------------------------------------------------------+--------------
 TOT  |  4628    71   103   345    99  4097   136  4383     -    87 |


 BEST CLOCK FIT: DRAO   288   0.05 (ns) 

