
 GPS week: 1104   Day: 2   MJD: 51974                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2662      0    -0.09     0.11     5.25     0.00
 cod |   288     0  20345     21    -1.95     3.13     0.11    20.97
 emr |    96     0   3512    197   -84.89    -0.70     0.15    13.15
 esa |   288     0  18483    642   521.38    14.40     0.13    17.32
 gfz |   288     0  13392      0    -0.12     0.21     0.09    25.35
 igp |    96     0   2474      0    -0.08     0.17     5.20     0.00
 igu |    96     0   2286      0    -0.12     0.19     3.24     0.00
 jpl |   288     0   8141     58     3.36    -1.75     0.20     0.00
 ngs |    96     0   2662      0    -0.10     0.12     5.23     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15501      1   526.44    14.12     0.10    23.22

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |  4053    83   -93   154    17 29084  8101   473  2825     -  -190 |
    2 | -8816   193   -74   177   -16-15171  1690   281 -9288     -  -274 |
    3 | -1116    40     X   348   -34 -8508  2060   484 -1453     -  -259 |
    4 | -4818    32  -382    -9   334 12631 -2268   247 -4800     -  -315 |
    5 |-10729    82   -80  -145   161-25353-12963    69 -9684     -  -122 |
    6 |    54   107   -93  -389   242-15765  -712   258   194     -   -52 |
    7 |  -842   251   -28  -102   148-20349 -1371   342  -864     -  -307 |
    8 | -2114   283   -10   -28   -12  3555-11505   413 -1732     -  -222 |
    9 | -5807    68  -281  -245   127 -5258 -5023   -13 -5733     -    -2 |
   10 |  1951   246  -126    56     7-24000  6390   527  2068     -  -246 |
   11 |  9354   152   216   -53   -74 23744 -2406   659  8751     -   -58 |
   13 |  3936    44   119    31   -37  7614  1000   677  4007     -   -44 |
   14 |  4954   -33   -28    73    46 17545   169   418  4929     -   -70 |
   17 |   438    12    -2   -95   -90     -     -  -231  -309     -   153 |
   18 |  5407  -183  -168    85   -32 -1380 -8560     2  5682     -   167 |
   19 |  2187   205    39   125   -85 13075     -   641  1390     -  -188 |
   20 |  3821    27   283     5    13  8749   944   561  3917     -   -95 |
   21 | -3099   -30  -217   -12    95   428     -    94 -2332     -   -27 |
   22 |-11554    -9  -165   386  -132-68106 -4556   484 -9954     -  -105 |
   23 | -4958    63  -331   103   -66     -     -   -71 -4610     -     - |
   24 |  1100    35  -302  -116   235 19259  1690  -125   505     -  -152 |
   25 | -3099    55   -67    80   -55 -1637 -2289   542 -2918     -   -33 |
   26 | -2771    -2  -263   -44   124  -630  -174   183 -2735     -   -51 |
   27 | 10303   246     8   130  -142 10848 13660   616 10373     -  -160 |
   28 |  7035    32   320   150  -172   150 14034   727  6653     -   -13 |
   29 | -1486     1     X     8    80 -2916    11   427 -1458     -   -95 |
   30 | -3399  -110    32   -85   157 12251 -3956   246 -2219     -   -14 |
   31 |  9801    56    72   213    39 31828  5503   515  8513     -  -266 |
 -----+-------------------------------------------------------------------+
 ALBH |     -   -68     -    83     -     -     -     -     -     -     - |
 ALGO |     -   -86     6     X    -1     -     -   159     -     -    78 |
 AREQ |     -    18     -   -22     -     -     -   211     -     -     - |
 AUCK |     -    -5     -  -174     -     -     -   239     -     -   135 |
 BAHR |     -   150     -     5  -145     -     -   399     -     -    46 |
 BOR1 |     -    16     -   -19     -     -     -     -     -     -     - |
 BRMU |     -  -168     -    83  -116     -     -     -     -     -   216 |
 CAS1 |     -  -185     -   172  -257     -     -     -     -     -   322 |
 CRO1 |     -   -22     -    27     -     -     -   521     -     -     - |
 DAEJ |     - -1096     -     -     -     -     -     -     -     -   990 |
 DAV1 |     -    84     -     -   -70     -     -     -     -     -     - |
 DRAO |     -   -97     -     -     -     -     -     -     -     -    88 |
 EISL |     -     -     -   -73     -     -     -     -     -     -    55 |
 FAIR |     -     -     -  -118     -     -     -   306     -     -    88 |
 FORT |     -     -     -  -616     -     -     -     -     -     -   459 |
 GALA |     -   -23     -  -149   121     -     -   300     -     -     - |
 GRAZ |     -   -27     -    33     -     -     -     -     -     -     - |
 GUAM |     -    -7     -   151   -98     -     -   392     -     -     - |
 HOB2 |     -  -150     -   262  -176     -     -     -     -     -   128 |
 KERG |     -  -125     -     -     -     -     -     -     -     -   113 |
 KOKB |     -     -     -   560     -     -     -     -     -     -  -418 |
 KOSG |     -   -94     -   114     -     -     -     -     -     -     - |
 KWJ1 |     -     -     -  -111     -     -     -     -     -     -    83 |
 MAC1 |     -   133     -    21  -120     -     -     -     -     -     - |
 MAS1 |     -  -134   104    56   -23     -     -     -     -     -    83 |
 MATE |     -  -127     -     -     -     -     -     -     -     -   115 |
 MCM4 |     -     -     -     X    74     -     -     -     -     -   -80 |
 MDO1 |     -  -139    96   144     -     -     -     -     -     -     - |
 MKEA |     -   -18   249   -41     -     -     -   192     -     -     - |
 NLIB |     -   -60     -     -     -     -     -     -     -     -    54 |
 NRC2 |     -   -14   296   -58     -     -     -     -     -     -     - |
 NYA1 |     -    93     -     -   -77     -     -     -     -     -     - |
 OHIG |     -     -     -  -164   112     -     -     -     -     -     - |
 PIE1 |     -  -306     -   336     -     -     -     -     -     -    77 |
 POTS |     -   -64     -    77     -     -     -     -     -     -     - |
 REYK |     -  -127     -   154     -     -     -   229     -     -     - |
 SANT |     -     -     -  -169   182     -     -     -     -     -   -38 |
 STJO |     -  -108   191    14    46     -     -     -     -     -     - |
 SUTH |     -   241     -     -  -199     -     - -8708     -     -     - |
 THTI |     -    37     -     -     -     -     -     -     -     -   -34 |
 THU1 |     -    20     -     -     -     -     -   216     -     -   -18 |
 TRO1 |     -   -58     -     -    48     -     -     -     -     -     - |
 TROM |     -     -     -    24     -     -     -     -     -     -   -18 |
 TSKB |     -     -     -  -274     -     -     -     -     -     -   205 |
 URUM |     -   124     -     -  -123     -     -     -     -     -    22 |
 USNO |     -    -8   244  -140     -     -     -     -     -     -    65 |
 USUD |     -  -161     -   195     -     -     -   396     -     -     - |
 VILL |     -   605     -  -732     -     -     -     -     -     -     - |
 WHIT |     -   -87     -     -    72     -     -     -     -     -     - |
 WSRT |     -   -20     -     -     -     -     -     -     -     -    18 |
 WTZR |     -   -82     -     9     -     -     -     -     -     -    67 |
 YAR2 |     -   284    86  -560     -     -     -   232     -     -   160 |
 YELL |     -   -19   312   -56     -     -     -   235     -     -     - |
 YSSK |     -    17     -     -   -14     -     -     -     -     -     - |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  4742   111    32    96    61  6908  3169    70  5652     -    43 |  288   3.90
    2 | 10005    78   120    91   121  5881  4233   138  9499     -    67 |  288   3.44
    3 |  2245    97     X   103   145  2008  2204    93  2242     -   107 |  288   1.96
    4 |   925   170   218   197   106  2245   900   200   982     -   130 |  276   0.53
    5 |  3874   111    78   135    89  5189  5247    88  3389     -    62 |  288   3.62
    6 |  6645   130    99   102    54  5713  2990   107  6747     -    95 |  288   5.40
    7 |  1672    97   155   130   100 10455  1992   121  1691     -    43 |  288   1.16
    8 |  2989   161   151   135   100  3778  6728   143  3190     -    74 |  278   2.09
    9 |  2298   252   158   103   217  3001  1942   126  2243     -    77 |  278   2.39
   10 |  7819   107    63   192   125  3880  4879   688  8065     -   101 |  288   3.71
   11 |  2825    96   150    71    71  3750  1195   149  2932     -    68 |  288   0.43
   13 |   947    59   149   149    95  1351   896   114   896     -    56 |  288   0.73
   14 |   996    53    80    76   125  3075   715   176  1055     -    98 |  288   0.22
   17 |  5243    86   138   251   169     -     -   202  5387     -   191 |  278   3.65
   18 |  1771   194   345    68    65  3488  3218    96  2148     -    72 |  288   0.37
   19 |  9543   100   198   205   143  5937     -   117  9890     -   197 |  277   4.60
   20 |   616   158    45    63   131  1475   667   129   700     -    50 |  288   0.18
   21 |  7767   119   109   180    72  5184     -   195  7563     -    82 |  288   2.83
   22 |  8699    68   194   129    72 13970  1694   104  8495     -    63 |  288   1.10
   23 |  8611    74   199   177    89     -     -   107  9203     -     - |  288   6.00
   24 |  5275   164   181   147    94  2556  3629   250  4613     -   123 |  278   2.62
   25 |  2954   187   177   166    72  3201  2491   126  2709     -    45 |  278   2.63
   26 |   914   195    76   206    55  1916   759   276   889     -    86 |  288   0.82
   27 |  8086   143    69   178    72  5724  4893    95  7442     -    75 |  278   3.23
   28 |  1950    68   277   167    79   899  6100   143  1847     -    56 |  288   0.51
   29 |  1463   128     X    61   174  1188  1333   144  1538     -    64 |  288   0.52
   30 |  6681    81   171    43    38  5024  1670    99  5213     -    39 |  288   1.62
   31 |  4387    54    87    60    22  5721  2504   228  5700     -    66 |  288   2.70
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    54     -    65     -     -     -     -     -     -     - |  288   0.19
 ALGO |     -    29    77     X    60     -     -   111     -     -    48 |  288   0.02
 AREQ |     -    36     -    44     -     -     -   230     -     -     - |  272    >>>
 AUCK |     -   132     -   105     -     -     -   104     -     -   129 |  286  19.81
 BAHR |     -   397     -    94   153     -     -    92     -     -   110 |  288   0.81
 BOR1 |     -    24     -    29     -     -     -     -     -     -     - |  287   1.78
 BRMU |     -    59     -    62    83     -     -     -     -     -    91 |  288  22.95
 CAS1 |     -    49     -   217    67     -     -     -     -     -    73 |  288  14.28
 CRO1 |     -    19     -    23     -     -     -   121     -     -     - |  285    >>>
 DAEJ |     -    58     -     -     -     -     -     -     -     -    53 |  285    >>>
 DAV1 |     -    39     -     -    32     -     -     -     -     -     - |  283  15.10
 DRAO |     -    22     -     -     -     -     -     -     -     -    20 |  285   0.03
 EISL |     -     -     -   101     -     -     -     -     -     -    76 |  231  28.95
 FAIR |     -     -     -   184     -     -     -   160     -     -   137 |  287   0.10
 FORT |     -     -     -   185     -     -     -     -     -     -   138 |  179   0.15
 GALA |     -    53     -    47    29     -     -   112     -     -     - |  288  47.48
 GRAZ |     -    36     -    43     -     -     -     -     -     -     - |  287  42.11
 GUAM |     -   153     -   145    49     -     -   102     -     -     - |  288  26.24
 HOB2 |     -    87     -    58    45     -     -     -     -     -    75 |  288   0.05
 KERG |     -    80     -     -     -     -     -     -     -     -    72 |  287    >>>
 KOKB |     -     -     -   385     -     -     -     -     -     -   287 |  190   1.10
 KOSG |     -    33     -    40     -     -     -     -     -     -     - |  288  62.35
 KWJ1 |     -     -     -   217     -     -     -     -     -     -   162 |  200 118.25
 MAC1 |     -    88     -    71    48     -     -     -     -     -     - |  287  13.25
 MAS1 |     -    47    72    40    56     -     -     -     -     -    70 |  288   2.59
 MATE |     -    74     -     -     -     -     -     -     -     -    67 |  287   0.19
 MCM4 |     -     -     -     X   162     -     -     -     -     -   177 |  261   5.79
 MDO1 |     -    36   102    62     -     -     -     -     -     -     - |  288  35.14
 MKEA |     -    49   123    83     -     -     -   107     -     -     - |  288  46.23
 NLIB |     -   222     -     -     -     -     -     -     -     -   201 |  287   0.11
 NRC2 |     -   209   155   287     -     -     -     -     -     -     - |  287   0.25
 NYA1 |     -    25     -     -    21     -     -     -     -     -     - |  288   0.04
 OHIG |     -     -     -    65    44     -     -     -     -     -     - |  276  15.80
 PIE1 |     -    58     -    79     -     -     -     -     -     -    40 |  288 154.93
 POTS |     -    27     -    33     -     -     -     -     -     -     - |  288  18.12
 REYK |     -    39     -    48     -     -     -   143     -     -     - |  287  11.00
 SANT |     -     -     -   188    61     -     -     -     -     -   155 |  160   7.90
 STJO |     -    61    90    38    26     -     -     -     -     -     - |  288   3.84
 SUTH |     -    74     -     -    62     -     -   669     -     -     - |  285  23.12
 THTI |     -    76     -     -     -     -     -     -     -     -    69 |  281   3.03
 THU1 |     -    49     -     -     -     -     -   124     -     -    44 |  286  16.40
 TRO1 |     -    68     -     -    56     -     -     -     -     -     - |  287  12.22
 TROM |     -     -     -    86     -     -     -     -     -     -    64 |  288  15.00
 TSKB |     -     -     -    50     -     -     -     -     -     -    37 |  288   1.11
 URUM |     -   100     -     -    27     -     -     -     -     -   103 |  288  22.52
 USNO |     -    28    66    71     -     -     -     -     -     -    43 |  288   0.04
 USUD |     -    66     -    79     -     -     -   114     -     -     - |  285   0.26
 VILL |     -    38     -    46     -     -     -     -     -     -     - |  288   5.14
 WHIT |     -    54     -     -    45     -     -     -     -     -     - |  288  25.24
 WSRT |     -    44     -     -     -     -     -     -     -     -    40 |  288   0.03
 WTZR |     -    73     -    30     -     -     -     -     -     -    72 |  288   0.21
 YAR2 |     -    59   115    41     -     -     -   134     -     -    40 |  288   6.84
 YELL |     -   156   125   190     -     -     -   148     -     -     - |  287   0.14
 YSSK |     -    31     -     -    26     -     -     -     -     -     - |  185  13.01
 -----+-------------------------------------------------------------------+--------------
 TOT  |  5251   110   146   129    93  5204  3238   200  5233     -    97 |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

