
 GPS week: 1102   Day: 4   MJD: 51962                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2659      0     0.18    -0.15     4.84     0.00
 cod |   288     0  19848    126     1.07    -4.23     0.12    20.03
 emr |    96     0   3501    111  1024.89    10.74     0.15    13.53
 esa |   288     0  18236   1113   338.14    14.41     0.14    16.84
 gfz |   288     0  14572      0    -0.08    -0.20     0.08    30.90
 igp |    96     0   2563      0     0.08     0.11     4.94     0.00
 igu |    96     0   2283      0     0.16    -0.09     3.45     0.00
 jpl |   288     0   8330     12     6.01   -10.00     0.16     0.00
 ngs |    96     0   2659      0     0.18    -0.16     4.57     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  16850    185   342.30    14.07     0.13    18.70

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |    92   149   -74  -148    28 14337  5796   517  -466     -   -55 |
    2 | -4966   312  -139    63   -43-10080  1073    68 -5035     -  -286 |
    3 | -2211    77   281    38   -67  7527  -230   382 -1510     -   -73 |
    4 | -4842   -38  -338   491   215 -7552  1509  -105 -4723     -  -641 |
    5 |  4982   150  -196   104   -56-26521     -  -122  4564     -  -109 |
    6 | -1201    39  -101  -117   130 10801 -3212   120  -843     -  -127 |
    7 | -3182   145  -475     8   196-34774 -3218   -22 -3035     -  -363 |
    8 |  -174   251   -77   105  -178-19341 -1046   123  -231     -   -46 |
    9 |  2088   218   -57     X   120-12594  2506    44  2113     -  -406 |
   10 | -2879  -109  -239   106   249 14580-12118  -240 -3116     -  -348 |
   11 |  4516    33    31    95    43 17100  3779   352  4462     -  -197 |
   13 |  4229   146   154  -118   -45  9652  -835   396  4301     -    -9 |
   14 |  4334  -112   294  -350   150   450   429   212  4423     -   112 |
   17 | -6943    32   173    44   -29 -2804     -   -98 -6819     -   -58 |
   18 |  1011  -123   233    48  -111-10612     -   139  1054     -   214 |
   19 |  3406   193     X   151  -197 54454     -   444  1198     -     - |
   20 |  1689    24   -66   -13   102 11799  -293   391  1832     -  -166 |
   21 |  -357   -46    37   188   -70   425 10175   166  1082     -   -14 |
   22 |  4020   -49   153  -147    17-40858 18000   315  2914     -   119 |
   23 | -3999   168    50   300  -203     - -9106    23 -3912     -  -128 |
   24 | -5961  -104  -591   691   130 26842-10591  -492 -5769     -  -490 |
   25 | -3818  -128   -38  -127   195 -7892 10104   478 -4034     -   -77 |
   26 |  -854   198    48   -43    17 -8757 -1604   -12  -545     -  -210 |
   27 |  1734   142   -55    82   -32  8566 -1524   303  1530     -  -151 |
   28 |  5982  -152   337   -76   -75  -322 -2830   447  6448     -   267 |
   29 | -2303   -71  -108  -149   167-14690 -3265   353 -2085     -   -43 |
   30 |   385    12   -92  -142   206 11520  1384   247   859     -  -204 |
   31 |  4615    96   -40    95  -180 10441 -4758   205  4643     -   119 |
 -----+-------------------------------------------------------------------+
 ALBH |     -   182     -  -217     -     -     -     -     -     -     - |
 ALGO |     -    -3     -     X  -119     -     -   296     -     -   200 |
 AREQ |     -   -17     -    20     -     -     -   158     -     -     - |
 AUCK |     -  -242     -   147     -     -     -   169     -     -   110 |
 BAHR |     -    77     -  -138     -     -     -     -     -     -    42 |
 BOR1 |     -  -264     -   314     -     -     -     -     -     -     - |
 BRMU |     -   -74     -    98   -70     -     -     -     -     -   105 |
 CAS1 |     -     -     -    66  -120     -     -     -     -     -   139 |
 COCO |     -     -     -     -  -110     -     -     -     -     -   182 |
 CRO1 |     -     2     -    -2     -     -     -     -     -     -     - |
 DAEJ |     - -1070     -     -     -     -     -     -     -     -  1147 |
 DRAO |     -   -65    34     -     -     -     -     -     -     -    61 |
 EISL |     -     -     -  -227     -     -     -     -     -     -   204 |
 FAIR |     -    17     -   139     -     -     -   366     -     -  -166 |
 FLIN |     -   -84     -    99     -     -     -     -     -     -     - |
 FORT |     -     -     -  -753     -     -     -     -     -     -   678 |
 GALA |     -  -102     -  -113    -2     -     -   224     -     -   203 |
 GUAM |     -    87     -   -93    -6     -     -   294     -     -     - |
 HOB2 |     -     -     -  -127     -     -     -     -     -     -   114 |
 HRAO |     -   -96     -     -     -     -     -     -     -     -   102 |
 IISC |     -     -     -  -276     -     -     -    24     -     -   249 |
 KOKB |     -     X    38    27   -49     -     -   123     -     -    27 |
 KOUR |     -    53     -   -64     -     -     -   197     -     -     - |
 KSTU |     -    44     -     -   -28     -     -    42     -     -     - |
 KWJ1 |     -    31     -    23  -178     -     -   166     -     -   238 |
 MAC1 |     -     -     -   108   -59     -     -     -     -     -     - |
 MALI |     -     -     -     X   -95     -     -     -     -     -   156 |
 MAS1 |     -    91     -    28  -131     -     -     -     -     -    95 |
 MATE |     -  -119     -     -     -     -     -     -     -     -   127 |
 MCM4 |     -   286     -     X   -25     -     -     -     -     -  -327 |
 MDO1 |     -  -529     -   629     -     -     -     -     -     -     - |
 MKEA |     -   -16     -    20     -     -     -     -     -     -     - |
 NLIB |     -   -21   -66    38     -     -     -     -     -     -     3 |
 NRC2 |     -    72   254  -155     -     -     -     -     -     -     - |
 NYA1 |     -    27     -     -   -18     -     -     -     -     -     - |
 OHIG |     -    28     -  -113    47     -     -     -     -     -     - |
 PIE1 |     -   -48    31   -73     -     -     -     -     -     -   108 |
 POTS |     -   -36     -    43     -     -     -     -     -     -     - |
 SANT |     -     -     -   100     -     -     -     -     -     -   -90 |
 STJO |     -   -59   183  -160    99     -     -     -     -     -     - |
 SUTH |     -   243     -     -  -197     -     - -4582     -     -   119 |
 THU1 |     -   -12     -     -     -     -     -    27     -     -    13 |
 TRO1 |     -  -159     -     -   103     -     -     -     -     -     - |
 TROM |     -     -     -    62     -     -     -     -     -     -   -56 |
 TSKB |     -    82    66  -275     -     -     -     -     -     -   147 |
 URUM |     -  -130     -     -   -38     -     -     -     -     -   202 |
 USNO |     -    15     -  -103     -     -     -     -     -     -    77 |
 USUD |     -  -131     -   156     -     -     -   117     -     -     - |
 WHIT |     -   -35     -     -    22     -     -     -     -     -     - |
 WSRT |     -     6     -     -     -     -     -     -     -     -    -7 |
 WTZR |     -     3     -     -     -     -     -     -     -     -    -3 |
 WUHN |     -    80     -     -   -52     -     -     -     -     -     - |
 YAR2 |     -   385   318  -471     -     -     -   204     -     -   -43 |
 YELL |     -   -45   -28   172   -61     -     -    15     -     -     - |
 YSSK |     -   -48     -     -    31     -     -     -     -     -     - |
 ZWEN |     -     -     -     -   328     -     -     -     -     -  -542 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  7930    75   183   148    79  4317  4316    93  7213     -    35 |  288   4.12
    2 |  6736   100    86    68    41  4335  3460   159  6502     -    74 |  288   2.20
    3 |  3702   111   217   101   105  2157  2196    66  3850     -   118 |  288   1.89
    4 |   988   209   159    87   112  3950  1813   164  1156     -   139 |  277   0.66
    5 |  3200    83    80    96    29  3411     -    67  3093     -    84 |  288   3.21
    6 |  8612   156    93   130   114  8678  2520    69  8553     -   192 |  288   6.17
    7 |  1336    73   117    99    34 11044  2410   113  1433     -    64 |  288   0.56
    8 |  2439   160   245   207    62  6324  1719   106  2516     -   130 |  276   2.42
    9 |  2803   180   127     X   103  2924  3279   176  2825     -    62 |  281   1.93
   10 |  2193   182    81   178    57  3926  2138    80  2261     -   107 |  288   1.84
   11 |  1914   131    50    93    47  4677  2184   102  1870     -    24 |  288   0.50
   13 |  1052    96   332    64    68  1893  1222    60   990     -    73 |  288   0.69
   14 |   594    66   110    67    60  1165   475   126   581     -    42 |  288   0.47
   17 |  6809   209   261   344   206  4614     -   226  7117     -   121 |  276   4.91
   18 |  1689   114    74    96    80  6234     -    67  1622     -    78 |  288   0.67
   19 | 10426   197     X   158    71  7561     -   131  8730     -     - |  278   3.34
   20 |   591    93    73    57    55  1397   660   116   623     -    73 |  288   0.19
   21 |  9263   177    72   209   133  5834  5921   132  7804     -    61 |  288   2.04
   22 |  6785   163    94    95    68  5621  8749   157  6783     -   194 |  288   1.39
   23 |  5909   250   167   262    70     -  3921   143  5817     -   150 |  288   5.43
   24 |  3842   183   143   160   133  1537  4389   295  3797     -   266 |  279   1.46
   25 |  3676   140   121   188    92  4418  4661   210  3714     -   117 |  277   2.51
   26 |  1538    77   128    86    91  2483  1528    78  1508     -    49 |  288   1.00
   27 |  5745   171   257    96    79  7861  5181   150  5642     -    99 |  276   4.66
   28 |  4527   102   123    77    44   874   750    90  4268     -    66 |  288   0.53
   29 |   855   134   161    65    58  3198  1637   167  1085     -    74 |  288   0.40
   30 |  3708   171    78    86    80  3388  1116    61  3493     -   199 |  288   1.40
   31 |  2947    95   114    66    85  3614  3373   195  2787     -   133 |  288   3.13
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    57     -    68     -     -     -     -     -     -     - |  263   0.19
 ALGO |     -    74     -     X    55     -     -    47     -     -    42 |  288   0.05
 AREQ |     -    91     -   108     -     -     -    49     -     -     - |  288  36.72
 AUCK |     -   119     -   337     -     -     -   217     -     -   300 |  288  17.07
 BAHR |     -   115     -    38     -     -     -     -     -     -   118 |  288   0.62
 BOR1 |     -   144     -   171     -     -     -     -     -     -     - |  286   2.39
 BRMU |     -   112     -    57    57     -     -     -     -     -    74 |  288  18.92
 CAS1 |     -     -     -    81   107     -     -     -     -     -   244 |  288  12.26
 COCO |     -     -     -     -    22     -     -     -     -     -    37 |  288  12.47
 CRO1 |     -    63     -    75     -     -     -     -     -     -     - |  286    >>>
 DAEJ |     -    70     -     -     -     -     -     -     -     -    75 |  287    >>>
 DRAO |     -    51    81     -     -     -     -     -     -     -    37 |  288   0.09
 EISL |     -     -     -   351     -     -     -     -     -     -   316 |  220  29.03
 FAIR |     -   148     -   187     -     -     -   455     -     -   224 |  276   0.45
 FLIN |     -    57     -    68     -     -     -     -     -     -     - |  287  10.46
 FORT |     -     -     -   109     -     -     -     -     -     -    98 |  161   0.10
 GALA |     -    89     -    55    46     -     -   122     -     -    60 |  288  45.10
 GUAM |     -   137     -    96    43     -     -    70     -     -     - |  288  28.15
 HOB2 |     -     -     -    38     -     -     -     -     -     -    34 |  288   0.06
 HRAO |     -    53     -     -     -     -     -     -     -     -    57 |  251    >>>
 IISC |     -     -     -   236     -     -     -   280     -     -   213 |  240  41.85
 KOKB |     -     X   137   199   180     -     -   222     -     -   195 |  284   0.35
 KOUR |     -    62     -    74     -     -     -    43     -     -     - |  276  26.45
 KSTU |     -    93     -     -    61     -     -    84     -     -     - |  265  11.40
 KWJ1 |     -   193     -   183   166     -     -   255     -     -   270 |  255  93.44
 MAC1 |     -     -     -    58    32     -     -     -     -     -     - |  287  13.71
 MALI |     -     -     -     X    80     -     -     -     -     -   132 |  236  58.75
 MAS1 |     -    97     -    37    27     -     -     -     -     -    94 |  288   3.35
 MATE |     -    82     -     -     -     -     -     -     -     -    88 |  287   0.21
 MCM4 |     -    74     -     X    84     -     -     -     -     -   202 |  284  77.07
 MDO1 |     -    30     -    36     -     -     -     -     -     -     - |  176   9.54
 MKEA |     -   101     -   120     -     -     -     -     -     -     - |  276  40.38
 NLIB |     -    68    58    82     -     -     -     -     -     -    38 |  288   0.07
 NRC2 |     -   192   172   266     -     -     -     -     -     -     - |  285   0.20
 NYA1 |     -    44     -     -    29     -     -     -     -     -     - |  288   0.15
 OHIG |     -   186     -   206   131     -     -     -     -     -     - |  232  71.25
 PIE1 |     -    76    67    85     -     -     -     -     -     -    32 |  288   0.07
 POTS |     -    51     -    61     -     -     -     -     -     -     - |  287  17.58
 SANT |     -     -     -    81     -     -     -     -     -     -    73 |   78   8.81
 STJO |     -    89    71    74    32     -     -     -     -     -     - |  288   2.11
 SUTH |     -    99     -     -    70     -     -   119     -     -    96 |  288  23.93
 THU1 |     -   170     -     -     -     -     -   153     -     -   182 |  265  14.10
 TRO1 |     -    97     -     -    63     -     -     -     -     -     - |  287  12.84
 TROM |     -     -     -    49     -     -     -     -     -     -    44 |  288  12.70
 TSKB |     -   102    55    58     -     -     -     -     -     -    73 |  288   1.02
 URUM |     -   113     -     -    46     -     -     -     -     -    48 |  288  74.63
 USNO |     -    52     -    50     -     -     -     -     -     -    73 |  288   0.08
 USUD |     -    76     -    90     -     -     -    40     -     -     - |  288   0.20
 WHIT |     -    62     -     -    40     -     -     -     -     -     - |  288  61.14
 WSRT |     -   106     -     -     -     -     -     -     -     -   113 |  288   0.06
 WTZR |     -    80     -     -     -     -     -     -     -     -    86 |  286   0.10
 WUHN |     -   117     -     -    76     -     -     -     -     -     - |  286  25.12
 YAR2 |     -   141   203   219     -     -     -   195     -     -   105 |  287  14.05
 YELL |     -    64   369    49    80     -     -    54     -     -     - |  288   0.07
 YSSK |     -    93     -     -    61     -     -     -     -     -     - |  287  17.21
 ZWEN |     -     -     -     -    34     -     -     -     -     -    57 |  288  23.25
 -----+-------------------------------------------------------------------+--------------
 TOT  |  4841   121   155   140    82  4940  3449   164  4566     -   129 |


 BEST CLOCK FIT: ALGO   288   0.05 (ns) 

