
 GPS week: 1101   Day: 1   MJD: 51952                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2631      0    -0.08     0.13     4.89     0.00
 cod |   288     0  15986     10    -2.55     1.90     0.09    45.39
 gfz |   288     0  14165    299    -0.04    -0.26     0.13    29.68
 igp |    96     0   2478      0    -0.09     0.32     4.72     0.00
 igu |    96     0   2290      0     0.00     0.16     3.06     0.00
 jpl |   288     1   6429      6     5.10    -2.85     0.24     0.00
 ngs |    96     0   2631      0    -0.09     0.15     4.55     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  14802    366   188.06    12.08     0.16    24.93

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   gfz   igp   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |  8657    78   -65 22938 16728   821  7368     -   -65 |
    2 |  2434   145   -65 23528 -4834   520  2066     -  -182 |
    3 |  4315   -32   250 13133  1022   508  4291     -  -242 |
    4 |  -812    21   255 -2210 -2660   453  -676     -  -342 |
    5 | -1843    52     1  2620 -3036   288 -2638     -   -96 |
    6 |-10221     3   228-25336     -   794 -8508     -  -277 |
    7 | -4771    50   -31-12974 -8866   509 -4647     -   -54 |
    8 |   322    67  -178-29731  3769   547  -539     -    86 |
    9 |  3845    49   168 22516  1422   333  4086     -  -293 |
   10 | -6935   -12    61 -6930 -2472   289 -6277     -   -51 |
   11 |  3289    42   -14  9593    37   891  3395     -   -58 |
   13 |    86   -23   -44  2443 -3091   766   348     -    95 |
   14 |  2736   -15    53 -5538 -5029   549  2900     -   -36 |
   15 | -3804   173     -     -     -   754 -3956     -  -315 |
   17 |  1862   142   -54 14142     -    32   920     -  -181 |
   19 |  1509     5    -7  3063 -4330   800  1873     -     - |
   20 |  1800    18  -121  5461 -1670   970  1945     -   111 |
   21 |  3986   -45   205-12348 13758   453  4154     -  -162 |
   22 |  2895    57   -44  3785  4986   435  1773     -   -47 |
   23 | -5297   171   -95     -     -   320 -4352     -  -188 |
   24 |  2311   -33   245-20526    62   294  2467     -  -235 |
   25 | -1452   -24   170 -1664  6143   690 -1542     -  -159 |
   26 | -1604   -43   189-14692 -1289   377 -1636     -  -152 |
   27 | -8383    27   -41  3808 -8618   739 -6944     -     X |
   28 |  5327   -63   -77 -1037  2953   755  4978     -   206 |
   29 | -2516    13   258-18243 -1824   806 -2276     -  -380 |
   30 | -4131    24   120 -4842 -2270   445 -4160     -  -186 |
   31 |  4979   120   -98 28817 -1156   690  4102     -  -101 |
 -----+-------------------------------------------------------+
 ALGO |     -  -101    14     -     -   556     -     -   167 |
 AREQ |     -  -119   -30     -     -   512     -     -   249 |
 ARTU |     -    50   -76     -     -     -     -     -     - |
 AUCK |     -  -174     X     -     -   926     -     -   317 |
 BRMU |     -    31   -93     -     -     -     -     -    58 |
 CAS1 |     -   -40   -70     -     -     -     -     -   156 |
 COCO |     -     -    45     -     -     -     -     -   -54 |
 DRAO |     -   -64     -     -     -     -     -     -   116 |
 EISL |     -  -310   -53     -     -     -     -     -   289 |
 GUAM |     -     -  -763     -     -   -60     -     -   909 |
 HOB2 |     -  -106     -     -     -     -     -     -   192 |
 HRAO |     -    58     -     -     -     -     -     -  -106 |
 IISC |     -     -    46     -     -   231     -     -   -55 |
 KARR |     -    -3     4     -     -     -     -     -     - |
 KOKB |     -     -   185     -     -     -     -     -  -221 |
 MALI |     -     -  -182     -     -   739     -     -   217 |
 MAS1 |     -    23   -43     -     -     -     -     -    11 |
 MATE |     -   -95     -     -     -     -     -     -   173 |
 MAW1 |     -    71  -108     -     -     -     -     -     - |
 MCM4 |     -    20  -183     -     -     -     -     -   212 |
 NLIB |     -   -93     -     -     -     -     -     -   170 |
 OHIG |     -  -103   -20     -     -     -     -     -   203 |
 PIE1 |     -  -147     -     -     -     -     -     -   268 |
 POTS |     -    19   -29     -     -     -     -     -     - |
 STJO |     -   -71   108     -     -   517     -     -     - |
 SUTH |     -   164  -179     -     --11681     -     -   -72 |
 THU1 |     -    -3     -     -     -   428     -     -     5 |
 TIDB |     -    38   -58     -     -     -     -     -     - |
 TSKB |     -   -21     -     -     -     -     -     -    38 |
 URUM |     -    30  -148     -     -     -     -     -   123 |
 USNO |     -   -71     -     -     -     -     -     -   129 |
 WHIT |     -   -20    30     -     -     -     -     -     - |
 WSRT |     -   -27     -     -     -     -     -     -    49 |
 WTZR |     -   -37     -     -     -     -     -     -    68 |
 YELL |     -   -16    24     -     -   548     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   gfz   igp   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 | 10406    73    86  3399  2878   235  9729     -   137 |  288   3.26
    2 |  4569    47    65  5234  1990   125  4254     -    65 |  288   1.80
    3 |  4391    76   131  3085  1549   304  4295     -   137 |  288   1.69
    4 |  1172   143   191  3769  2586   180  1040     -   129 |  277   0.82
    5 |  5726   164   122  3530  2653   165  5941     -   158 |  288   2.67
    6 | 10011    93    72  6498     -   575  8626     -   127 |  288   5.93
    7 |  2853    50    97 11396  6326    85  2656     -    64 |  288   1.09
    8 |  6004    78   114  4864  4198   127  6180     -   236 |  287   3.74
    9 |  4136    59    91  6130  3118   172  4227     -    56 |  285   2.87
   10 |  3725    80   143  2100  2509    71  3599     -    91 |  288   1.42
   11 |   654    62    66  1321   522   132   770     -    68 |  287   0.36
   13 |  1223    92    76  1434  1842   268  1153     -   161 |  288   0.45
   14 |   749   172    59  3241  2607   187   784     -   318 |  288   0.55
   15 |  3779    95     -     -     -   340  3627     -   173 |  171   3.24
   17 |  5983   174   320  7762     -   611  5237     -   242 |  277   2.07
   19 |  6676    91   139  3908  4307   236  5642     -     - |  285   3.94
   20 |  1010    62    69   474  1334   161   929     -    80 |  288   0.19
   21 |  2635    56    46  3130  5681   103  2737     -    68 |  288   2.72
   22 |  7346    69   176  2655  1492   182  6604     -   298 |  288   0.66
   23 |  7870    76   177     -     -    98  7817     -   110 |  288   4.69
   24 |  2348   161   120  3780  1805   455  2320     -   220 |  278   1.82
   25 |  1897    71   107  3137  2835   530  1958     -    90 |  288   1.75
   26 |  1164    71   114  4386   895   170  1273     -    85 |  288   0.76
   27 |  6791    39    60  4763  4373   175  5373     -     X |  286   4.90
   28 |  1873    92    49  1498  1023   192  1845     -   127 |  288   0.90
   29 |  1012    82   158  4989  1815   127  1117     -   315 |  288   1.11
   30 |  3836   102   100  2701  2961   120  3466     -   157 |  288   1.15
   31 |  4092    91   161  8094  3960   422  4314     -    66 |  288   3.47
 -----+-------------------------------------------------------+--------------
 ALGO |     -    54   105     -     -    73     -     -    52 |  288   0.07
 AREQ |     -    91   109     -     -   140     -     -   109 |  286    >>>
 ARTU |     -    65    99     -     -     -     -     -     - |  286  25.19
 AUCK |     -    46     X     -     -   191     -     -    84 |  264  19.40
 BRMU |     -    88   151     -     -     -     -     -    45 |  288  19.27
 CAS1 |     -   144   215     -     -     -     -     -   479 |  288  11.28
 COCO |     -     -    43     -     -     -     -     -    51 |  288  15.51
 DRAO |     -    34     -     -     -     -     -     -    63 |  287   0.05
 EISL |     -   290   153     -     -     -     -     -   155 |  232  35.68
 GUAM |     -     -    37     -     -    95     -     -    44 |  162  15.46
 HOB2 |     -    54     -     -     -     -     -     -    99 |  288   0.14
 HRAO |     -    68     -     -     -     -     -     -   125 |  272    >>>
 IISC |     -     -   204     -     -   179     -     -   243 |  256  34.76
 KARR |     -    81   124     -     -     -     -     -     - |  288 155.98
 KOKB |     -     -    47     -     -     -     -     -    56 |  187   0.55
 MALI |     -     -   437     -     -   386     -     -   521 |  192  19.32
 MAS1 |     -   111   143     -     -     -     -     -    45 |  288   2.94
 MATE |     -    43     -     -     -     -     -     -    79 |  231   0.19
 MAW1 |     -    61    94     -     -     -     -     -     - |  286  25.91
 MCM4 |     -    81   104     -     -     -     -     -    69 |  277  27.43
 NLIB |     -    54     -     -     -     -     -     -    98 |  280   0.17
 OHIG |     -    62    85     -     -     -     -     -    43 |  286  14.87
 PIE1 |     -    23     -     -     -     -     -     -    42 |  268   0.09
 POTS |     -    49    76     -     -     -     -     -     - |  288  35.05
 STJO |     -    41    63     -     -   149     -     -     - |  288   5.29
 SUTH |     -    82    84     -     -   123     -     -    75 |  288  20.33
 THU1 |     -    95     -     -     -   187     -     -   173 |  267  15.38
 TIDB |     -    60    91     -     -     -     -     -     - |  288   0.33
 TSKB |     -    28     -     -     -     -     -     -    51 |  283   1.54
 URUM |     -    68    74     -     -     -     -     -    47 |  284  96.72
 USNO |     -    43     -     -     -     -     -     -    78 |  288   0.14
 WHIT |     -    27    42     -     -     -     -     -     - |  288  20.42
 WSRT |     -    31     -     -     -     -     -     -    56 |  288   0.11
 WTZR |     -    36     -     -     -     -     -     -    66 |  288   0.04
 YELL |     -    78   119     -     -   166     -     -     - |  286   0.12
 -----+-------------------------------------------------------+--------------
 TOT  |  4889    86   131  4719  3062   243  4547     -   160 |


 BEST CLOCK FIT: WTZR   288   0.04 (ns) 

