
 GPS week: 1099   Day: 5   MJD: 51942                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2575      0     0.11     0.23     5.54     0.00
 cod |   288     0  14045    213    -0.31     0.49     0.09    35.81
 esa |   288     0  16373      0    40.81    16.01     0.09    34.84
 gfz |   288     0  13567      0     0.10     0.06     0.11    29.35
 igp |    96     0   2384      0     0.15     0.16     5.43     0.00
 igu |    96     0   2288      0     0.15     0.12     4.12     0.00
 jpl |   288     0   6550     48    20.30   -38.70     0.16     0.00
 ngs |    96     0   2575      0     0.11     0.22     5.26     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   jpl   ngs   sio |
 -----+-------------------------------------------------------+
    1 | -4292   164    -9  -141-36874 12032   300 -2954     - |
    2 |  1317   121  -100    14 25033  -369   -54   662     - |
    3 |   -96   -46    89   -62 -1829  7852    48   448     - |
    4 | -3427   -15    44   -35-21410 -2364   -99 -3017     - |
    5 | -4567   136  -201   112 16699-23001  -200 -4036     - |
    6 |  8015   -46   -75   132 19578 11302  -265  5998     - |
    7 | -2898  -128    76    29-38523 -6416  -125 -2716     - |
    8 |  1689   152   -71   -50-51667  4567    -6  1793     - |
    9 |  2471   151  -138    19  -901  2338    98  2535     - |
   10 |  2611    24   -19     4 19602  9894  -116  1913     - |
   11 |  2454    -1   167  -206 11628 -1715    54  2788     - |
   13 |  4148   114   -18   -82 10053 -2832   184  3980     - |
   14 |  4447    60   -37    -7 -2378 -2828   354  4402     - |
   17 |  7519   -92    -2    81  5165 18239  -373  5468     - |
   19 | -7138   -63   198  -181     -     -     8 -4562     - |
   20 |  2030   -50   176  -167 13981 -2816   -81  2013     - |
   21 | -3515   -33    43   -22 17034     -   -86 -2605     - |
   22 |  1264  -129   155   -72 14493 -1644   -42   505     - |
   23 |   589   142     7  -132     -     -   -19    48     - |
   24 | -2092  -108   203  -137   366  4767  -256 -2054     - |
   25 |  1578  -134     8   109 21557 -1650   247  1264     - |
   26 | -2041    26   -85    79-14021 -5850   -54 -2399     - |
   27 |-10154   -14    51   -48-19781 -9589    91 -9043     - |
   28 |  3565   -75   121   -78 14402  8180   192  4195     - |
   29 | -2037    -7  -151   185-11440 -7066   315 -2104     - |
   30 |  1854    76  -235   204 20261 -3609   107   718     - |
   31 | -3511   -65   140  -110-12093 -7151  -160 -3440     - |
 -----+-------------------------------------------------------+
 ALBH |     -   -96    99     -     -     -     -     -     - |
 ALGO |     -  -201   406  -237     -     -  -129     -     - |
 AREQ |     -   -21    22     -     -     -    23     -     - |
 ARTU |     -    40     -   -49     -     -     -     -     - |
 AUCK |     -     - -1025  1217     -     -     -     -     - |
 BAHR |     -    78    33  -130     -     -     -     -     - |
 BOR1 |     -    26   -27     -     -     -     -     -     - |
 BRMU |     -  -227   408  -211     -     -     -     -     - |
 CAS1 |     -     -    36   -43     -     -     -     -     - |
 EISL |     -  -197   203     -     -     -     -     -     - |
 GALA |     -     -  -521   618     -     -     -     -     - |
 GRAZ |     -   160  -164     -     -     -     -     -     - |
 GUAM |     -     -    24   -28     -     -     -     -     - |
 KIT3 |     -   139   -87   -59     -     -   134     -     - |
 KOKB |     -     -   -51    61     -     -     -     -     - |
 KOSG |     -   -79    82     -     -     -   -94     -     - |
 KOUR |     -   -89    91     -     -     -   -20     -     - |
 KWJ1 |     -     -   -93   111     -     -     -     -     - |
 MALI |     -     -   269  -320     -     -     -     -     - |
 MAS1 |     -    66    22  -107     -     -     -     -     - |
 MCM4 |     -     X  -331   392     -     -     -     -     - |
 MDO1 |     -   -49    51     -     -     -     -     -     - |
 NRC2 |     -  -202   207     -     -     -     -     -     - |
 OHIG |     -  -263   349  -112     -     -     -     -     - |
 POTS |     -    19    60   -58     -     -     -     -     - |
 REYK |     -    10   -10     -     -     -     -     -     - |
 SANT |     -     -   104  -123     -     -     -     -     - |
 STJO |     -   -10  -115   149     -     -    -1     -     - |
 SUTH |     -   183     -  -224     -     -  -231     -     - |
 TSKB |     -    55   -57     -     -     -    74     -     - |
 USNO |     -   -23    24     -     -     -     -     -     - |
 USUD |     -   -97   100     -     -     -     -     -     - |
 VILL |     -   466  -479     -     -     -     -     -     - |
 WHIT |     -     4     -    -5     -     -     -     -     - |
 WTZR |     -    36   -37     -     -     -     -     -     - |
 WUHN |     -   -14     -    17     -     -   177     -     - |
 YAR2 |     -   143  -146     -     -     -     -     -     - |
 YELL |     -    47   -88    48     -     -    -8     -     - |
 YSSK |     -     1     -    -1     -     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   jpl   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  7478    89    64    55  6496  6118   101  7451     - |  288   4.28
    2 |  6210   136   106    40  3082  3785    69  5880     - |  287   2.31
    3 |  6202   112    76    80  4745  6414   115  6164     - |  288   1.81
    4 |  2182    89    73   105  4270   718   134  1948     - |  278   1.03
    5 |  4277    96    88    47  5263  5542    67  4567     - |  288   3.05
    6 |  9299   101    63    57 11877  4200   327  7639     - |  288   8.94
    7 |  1693   156   139    81  9756  2310   243  1625     - |  288   1.35
    8 |  2661    46    98   124  9265  2813    81  2676     - |  288   2.38
    9 |  4667    65    58    58  3817  4576   123  4608     - |  287   4.26
   10 |  6241    92   113   106  6307  4826   190  6101     - |  288   2.95
   11 |   885   173   124    82  2652   657   176   848     - |  288   0.48
   13 |  1013   143    46   129  1964   769   160   879     - |  288   0.39
   14 |  1079    79    44    50  1800   899   272  1175     - |  288   0.42
   17 |  5230   131    59   140  6083  6928   129  5948     - |  282   3.54
   19 | 12041   103   130   175     -     -   141 10358     - |  283   6.60
   20 |   859    95    59    45  1641  1070   169   821     - |  288   0.25
   21 |  5500    78   191   169  2836     -    87  5196     - |  288   2.85
   22 |  6882    66    99    90  1414  3837   123  7171     - |  288   1.91
   23 | 10096   137   162    81     -     -   286  9964     - |  288   6.23
   24 |  3057   214   204    99  4056  4452   137  3150     - |  276   1.57
   25 |  2585   109   222   170  4465  1839   186  2481     - |  288   1.86
   26 |  2300    52    54    62  4101  2787   134  2255     - |  280   0.60
   27 |  6825    72    83    95  9010  7846   181  6363     - |  288   4.02
   28 |  4858   139    42   106  2672  4684   217  4648     - |  288   0.33
   29 |  1311   136    94    56  3953  3287   275  1226     - |  288   0.78
   30 |  7870   119    50    98  3531  2738   182  7227     - |  288   1.25
   31 |  3547   105    49   109  3506  3776   172  3512     - |  286   3.24
 -----+-------------------------------------------------------+--------------
 ALBH |     -    66    68     -     -     -     -     -     - |  288   0.10
 ALGO |     -    71   111    62     -     -    70     -     - |  288   0.05
 AREQ |     -    45    46     -     -     -    72     -     - |  288 123.40
 ARTU |     -    35     -    42     -     -     -     -     - |  287  22.28
 AUCK |     -     -    40    48     -     -     -     -     - |  157  41.47
 BAHR |     -    52    31    32     -     -     -     -     - |  288   0.47
 BOR1 |     -    38    39     -     -     -     -     -     - |  288   1.93
 BRMU |     -    65    28    69     -     -     -     -     - |  288  16.44
 CAS1 |     -     -    34    40     -     -     -     -     - |  288  13.08
 EISL |     -    54    55     -     -     -     -     -     - |  234  20.73
 GALA |     -     -    19    23     -     -     -     -     - |  286  32.98
 GRAZ |     -    32    33     -     -     -     -     -     - |  288  55.34
 GUAM |     -     -    52    61     -     -     -     -     - |  288  24.32
 KIT3 |     -    47    43    59     -     -   136     -     - |  287  40.57
 KOKB |     -     -    80    95     -     -     -     -     - |  150   0.65
 KOSG |     -    61    62     -     -     -    63     -     - |  288  78.57
 KOUR |     -    78    80     -     -     -   116     -     - |  254   2.10
 KWJ1 |     -     -   106   126     -     -     -     -     - |  183 109.93
 MALI |     -     -   169   200     -     -     -     -     - |  187    >>>
 MAS1 |     -    86    50    57     -     -     -     -     - |  288   2.52
 MCM4 |     -     X   184   218     -     -     -     -     - |  287  18.91
 MDO1 |     -    39    40     -     -     -     -     -     - |  287  27.25
 NRC2 |     -    41    42     -     -     -     -     -     - |  288   0.08
 OHIG |     -    73    76    57     -     -     -     -     - |  271  31.81
 POTS |     -    55    65    33     -     -     -     -     - |  288  17.85
 REYK |     -    48    49     -     -     -     -     -     - |  288   9.64
 SANT |     -     -   108   128     -     -     -     -     - |  103   6.79
 STJO |     -    77    40    55     -     -    87     -     - |  288   1.41
 SUTH |     -    49     -    59     -     -    97     -     - |  208  15.97
 TSKB |     -    81    83     -     -     -   166     -     - |  287   1.52
 USNO |     -    40    41     -     -     -     -     -     - |  288   0.09
 USUD |     -    35    36     -     -     -     -     -     - |  251   0.31
 VILL |     -    63    64     -     -     -     -     -     - |  288   4.47
 WHIT |     -    66     -    80     -     -     -     -     - |  287   5.26
 WTZR |     -    53    54     -     -     -     -     -     - |  288   0.06
 WUHN |     -    44     -    54     -     -    92     -     - |  287  27.00
 YAR2 |     -    84    87     -     -     -     -     -     - |  119 166.94
 YELL |     -   189   147   397     -     -   193     -     - |  288   0.12
 YSSK |     -    87     -   107     -     -     -     -     - |  287  14.29
 -----+-------------------------------------------------------+--------------
 TOT  |  5543    90    92   110  5427  4123   156  5258     - |


 BEST CLOCK FIT: ALGO   288   0.05 (ns) 

