
 GPS week: 1099   Day: 2   MJD: 51939                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2684      0     0.14    -0.29     4.96     0.00
 cod |   287     0  20775     17     0.39     1.99     0.08    27.14
 emr |    96     0   2684    194    -0.08     0.08     0.17     9.54
 esa |   288     0  18610    917     0.59    13.72     0.11    19.27
 gfz |   288     0  14362      9    -0.29     0.19     0.11    17.62
 igp |    96     0   2396      0     0.04    -0.08     5.10     0.00
 igu |    96     0   2300      0     0.10    -0.22     4.42     0.00
 jpl |   284     0   9173    286     2.51     6.23     0.15    11.29
 ngs |    96     0   2684      0     0.13    -0.29     4.76     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  16240    112    -1.99    12.87     0.13    15.14

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |  3563    70  -184   156   -80 15966  2277  -103  2682     -  -139 |
    2 | -3090   171  -212  -102    34 11095 -5038    34 -2787     -  -181 |
    3 |-12144    33  -234   199   101-21053-10595  -248-10854     -  -273 |
    4 |   416    16   -45    27   104  5719 -1501   -70   266     -  -143 |
    5 |  4889    73    46   -64     6-18386     -  -389  4125     -   103 |
    6 |   237   -35    87    41    61 18991     -   130   -23     -  -116 |
    7 | -4221    94   -15  -102    17-46432 -2443    15 -4248     -   -59 |
    8 |  1921    88  -145    89   -78-10439  7508   136  2054     -  -188 |
    9 | -8724    23   -94    47   144 16947-23283  -288 -8074     -  -123 |
   10 |  1241    26   -70   289   -51  -762  4888  -411  1823     -  -162 |
   11 |  1422  -165   -46   491   -44 11726  2001   251  1605     -  -349 |
   13 |  1351   -36   127    16     7  8655 -3288   -75  1288     -    41 |
   14 |  1271    -2   212    61  -105  -610  1202   360  1336     -  -107 |
   15 |    44     -  -172     -   195     -     -   441  -822     -  -300 |
   17 |  4839   -31   110   201   -16  8636 10598  -165  3235     -  -158 |
   19 |   602  -100     X   227   -66  2547  6996   -77   503     -     - |
   20 |  7474    16   151    46   -53  3110   261   -54  7592     -   -34 |
   21 |  -388    35    51    48    70     -     -  -157    18     -  -146 |
   22 |  3494    56   112    52   -31-10820  5453   -34  2811     -  -125 |
   23 | -4524    72    91   179   -16     --10945  -201 -3704     -  -270 |
   24 |  1239   -94    49   126    39 17122 12958   -73  1170     -   -14 |
   25 |   474  -137   104   174    26 -3996  5558   480   581     -  -170 |
   26 | -2747   -58  -298   177   -52-18383  4746  -139 -2242     -    83 |
   27 |  -489    63  -140    17   -11 15691  4875   322  -709     -  -182 |
   28 |  8292   -49   256   -23  -109-12171  7806   225  8293     -   123 |
   29 |  -830   -44     X   176    43-18136   225   122  -450     -  -249 |
   30 |  3096   -23    74    10   -10 23136 -1347   352  3156     -   -76 |
   31 | -8660   299   183  -742   166  2092-18967   478 -8601     -    39 |
 -----+-------------------------------------------------------------------+
 ALBH |     -  -146     -   206     -     -     -     -     -     -     - |
 ALGO |     -   -35     -     X  -170     -     -    43     -     -   229 |
 AOML |     -    -2     -     -     -     -     -     5     -     -     - |
 AREQ |     -   -84     -    98    -9     -     -  -100     -     -   108 |
 ARTU |     -    47     -     -   -73     -     -     -     -     -     - |
 AUCK |     -  -226     -  -315   955     -     -  -268     -     -  -109 |
 BAHR |     -   -84     -    65   -69     -     -    58     -     -   105 |
 BOR1 |     -    21     -   -30     -     -     -     -     -     -     - |
 BRMU |     -  -109     -   108     -     -     -     -     -     -    57 |
 CAS1 |     -   -22     -   -21   -84     -     -     -     -     -   165 |
 COCO |     -   161     -     -  -290     -     -     -     -     -    52 |
 CRO1 |     -   -60     -    93   -21     -     -    18     -     -     - |
 DAV1 |     -   -18     -     -     3     -     -     -     -     -    29 |
 DRAO |     -    33     -     -     -     -     -     -     -     -   -60 |
 EISL |     -  -100     -  -229     -     -     -     -     -     -   400 |
 FAIR |     -   620     -    -5    38     -     -   140     -     -  -239 |
 FLIN |     -   -29     -    41     -     -     -     -     -     -     - |
 FORT |     -     -     -  -149     -     -     -     -     -     -   190 |
 GALA |     -    27     -   -42  -181     -     -    78     -     -   159 |
 GRAZ |     -   504     -  -709     -     -     -     -     -     -     - |
 GUAM |     -   -33     -   -77     -     -     -    44     -     -   124 |
 HOB2 |     -  -173     -   108     -     -     -     -     -     -   172 |
 KERG |     -   -17     -     -     -     -     -     -     -     -    30 |
 KIT3 |     -   -43     -   -21    15     -     -   114     -     -     - |
 KOKB |     -   144     -   -50   -73     -     -     X     -     -   105 |
 KOSG |     -  -187     -   263     -     -     -     -     -     -     - |
 KWJ1 |     -     -     -   -20   -42     -     -    34     -     -    48 |
 MALI |     -     -     -  -104   -10     -     -     -     -     -   143 |
 MATE |     -   -37     -     -     -     -     -     -     -     -    67 |
 MCM4 |     -   136     -  -181   -69     -     -     -     -     -    71 |
 MDO1 |     -   -88     -   124     -     -     -     -     -     -     - |
 MKEA |     -   -55     -    78     -     -     -     -     -     -     - |
 NLIB |     -    -8     -   -69     -     -     -     -     -     -   102 |
 NRC2 |     -  -183     -   394  -150     -     -     -     -     -     - |
 NSSP |     -   -20     -     -     -     -     -    49     -     -     - |
 OHIG |     -  -144     -    16     0     -     -     -     -     -   239 |
 PIE1 |     -  -132     -   -64     -     -     -     -     -     -   317 |
 POTS |     -    80     -    -8   -89     -     -   -39     -     -     - |
 REYK |     -    14     -   -20     -     -     -     -     -     -     - |
 SANT |     -     -     -    22     -     -     -     -     -     -   -29 |
 SEY1 |     -     -     -  -141   154     -     -     -     -     -     - |
 SUTH |     -     0     -     -     -     -     -     1     -     -     - |
 THU1 |     -   -17     -     -     -     -     -   -48     -     -    65 |
 TIXI |     -    -6     -     -     -     -     -    16     -     -     - |
 TSKB |     -   -27     -   -18     -     -     -     -     -     -    71 |
 URUM |     -   -98     -     -     -     -     -     -     -     -   175 |
 USNO |     -    -4     -  -149     -     -     -     -     -     -   197 |
 USUD |     -   -21     -     X     -     -     -    50     -     -     - |
 VILL |     -   796     - -1121     -     -     -     -     -     -     - |
 WES2 |     -   115     -  -162     -     -     -     -     -     -     - |
 WSRT |     -   -46     -     -   -11     -     -     -     -     -    96 |
 WTZR |     -  -141     -    63    10     -     -     -     -     -   160 |
 YELL |     -    34     -     X   -51     -     -    -1     -     -     - |
 YSSK |     -    21     -     -   -33     -     -     -     -     -     - |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  4929    66   158   110    87  5331  3266   156  5486     -    53 |  288   4.29
    2 |  7978    33   132   109    41  3072  5792   187  7516     -   168 |  288   2.67
    3 |  4859   136   194    62   185  4773  4381   230  4491     -   109 |  288   1.65
    4 |  1457    80   131   104    81  2428  1244   134  1372     -    86 |  277   0.79
    5 |  6670    40   183   129    89  2521     -   170  6955     -    74 |  288   2.59
    6 | 10119    65   213    46    80 11018     -   260  9605     -    69 |  288   7.82
    7 |  1844    53   146    63    65 11298  1299   182  1697     -    73 |  288   1.80
    8 |  3094    60   126    43    72  5703  3156   174  2968     -    52 |  288   2.99
    9 |  4376    87   215    48   104  5059 11134   123  3046     -   218 |  288   2.46
   10 |  5709    82   208   302   185  4032  3489   152  5808     -   122 |  288   3.35
   11 |  1561   127   144   180   108  1773  1350   313  1631     -    55 |  288   0.35
   13 |  1309    80   181    99    70  1388  1547   136  1366     -    48 |  288   0.31
   14 |   745    84   257    69    68  2020   716   178   785     -    73 |  288   0.35
   15 |  6982     -   233     -   223     -     -   223  6707     -   169 |  279   2.56
   17 |  5987   125   302   149    74  9338  8107   204  5914     -    97 |  288   4.15
   19 |  3495    67     X    28    52  4977  5057   144  3161     -     - |  288   2.86
   20 |  1308    53   127    64    46   981   464   125  1270     -    40 |  288   0.24
   21 |  4727   153   130    53   153     -     -   178  4473     -    69 |  288   2.99
   22 |  4587    87    62    95    79  2253  2459   224  4865     -   130 |  288   1.60
   23 |  8159    87   157   143    91     -  5381   160  8208     -    46 |  288   6.65
   24 |  2082   113    67    87   151  5618  4278   222  2244     -    80 |  288   1.90
   25 |  3676    89   113   170   136  4365  5323   220  3393     -    76 |  288   1.70
   26 |  3310    92    80   143   134  3644  3026   131  3152     -   337 |  288   0.86
   27 |  9575   104   239   119    50  3964  5011   161  8291     -    88 |  288   3.80
   28 |  2020   107   122    73   146  1431  3087   197  1906     -   102 |  288   0.22
   29 |  1687   160     X    54    99  4290  1124   225  1468     -    75 |  288   0.74
   30 |  3849    76   140    79   104  4889  1908   194  3725     -    74 |  288   1.90
   31 |  3734    40    93    94    79  3053  5825   346  3772     -    69 |  288   2.42
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    20     -    29     -     -     -     -     -     -     - |  287   0.08
 ALGO |     -    56     -     X    50     -     -    67     -     -    50 |  288   0.09
 AOML |     -    28     -     -     -     -     -    66     -     -     - |  283  25.93
 AREQ |     -    42     -    42    46     -     -    88     -     -    51 |  288  35.94
 ARTU |     -    27     -     -    42     -     -     -     -     -     - |  178  18.11
 AUCK |     -    66     -    94    43     -     -   111     -     -    35 |  288  19.05
 BAHR |     -   226     -   254    86     -     -   124     -     -   108 |  288   0.74
 BOR1 |     -   103     -   146     -     -     -     -     -     -     - |  285   2.46
 BRMU |     -    59     -    65     -     -     -     -     -     -    40 |  288  18.17
 CAS1 |     -    58     -    51    60     -     -     -     -     -    22 |  288  11.90
 COCO |     -    20     -     -    37     -     -     -     -     -    40 |  288  15.62
 CRO1 |     -    50     -    36    39     -     -    75     -     -     - |  288   1.34
 DAV1 |     -    48     -     -    78     -     -     -     -     -    31 |  288  14.99
 DRAO |     -    15     -     -     -     -     -     -     -     -    27 |  287   0.06
 EISL |     -   272     -   269     -     -     -     -     -     -   157 |  288  62.54
 FAIR |     -   193     -    87   202     -     -   141     -     -   188 |  287   0.41
 FLIN |     -    29     -    41     -     -     -     -     -     -     - |  287   9.63
 FORT |     -     -     -   119     -     -     -     -     -     -   151 |  189   1.20
 GALA |     -    36     -    39    25     -     -    82     -     -    42 |  288  33.35
 GRAZ |     -    21     -    30     -     -     -     -     -     -     - |  286  20.31
 GUAM |     -    97     -   106     -     -     -    90     -     -    94 |  288  27.45
 HOB2 |     -    29     -    32     -     -     -     -     -     -    36 |  288   0.08
 KERG |     -    46     -     -     -     -     -     -     -     -    83 |  273    >>>
 KIT3 |     -   120     -   124   117     -     -   122     -     -     - |  287  41.11
 KOKB |     -   120     -   165   185     -     -     X     -     -   403 |  288   0.34
 KOSG |     -    17     -    25     -     -     -     -     -     -     - |  287 318.79
 KWJ1 |     -     -     -   142   126     -     -   183     -     -   172 |  246  92.62
 MALI |     -     -     -    68   398     -     -     -     -     -   492 |  217  25.64
 MATE |     -    32     -     -     -     -     -     -     -     -    57 |  282   0.21
 MCM4 |     -    60     -    53   106     -     -     -     -     -    65 |  288  22.60
 MDO1 |     -    54     -    76     -     -     -     -     -     -     - |  287  31.97
 MKEA |     -    26     -    37     -     -     -     -     -     -     - |  207  44.63
 NLIB |     -    30     -    52     -     -     -     -     -     -    42 |  288   0.08
 NRC2 |     -    68     -    81    39     -     -     -     -     -     - |  288   0.07
 NSSP |     -    16     -     -     -     -     -    38     -     -     - |  283  18.55
 OHIG |     -    51     -    83    75     -     -     -     -     -    48 |  288  21.88
 PIE1 |     -   105     -    80     -     -     -     -     -     -   283 |  288   0.09
 POTS |     -    37     -    27    49     -     -    51     -     -     - |  288  17.01
 REYK |     -    20     -    28     -     -     -     -     -     -     - |  287   9.30
 SANT |     -     -     -   130     -     -     -     -     -     -   165 |  122   7.88
 SEY1 |     -     -     -   183   200     -     -     -     -     -     - |  173  32.70
 SUTH |     -    74     -     -     -     -     -   177     -     -     - |  214  16.74
 THU1 |     -    44     -     -     -     -     -    77     -     -    78 |  288  14.71
 TIXI |     -    18     -     -     -     -     -    42     -     -     - |  283  11.43
 TSKB |     -    37     -    44     -     -     -     -     -     -    51 |  288   1.28
 URUM |     -    34     -     -     -     -     -     -     -     -    60 |  286  43.10
 USNO |     -    41     -    50     -     -     -     -     -     -    52 |  288   0.05
 USUD |     -    17     -     X     -     -     -    40     -     -     - |  282   0.24
 VILL |     -    25     -    35     -     -     -     -     -     -     - |  273   5.69
 WES2 |     -    32     -    45     -     -     -     -     -     -     - |  282   0.08
 WSRT |     -    54     -     -    53     -     -     -     -     -    47 |  284   0.07
 WTZR |     -    49     -    58    19     -     -     -     -     -    38 |  288   0.06
 YELL |     -    26     -     X    21     -     -    53     -     -     - |  288   0.06
 YSSK |     -    53     -     -    81     -     -     -     -     -     - |  279  15.88
 -----+-------------------------------------------------------------------+--------------
 TOT  |  4958    78   169   106   112  5102  4421   146  4762     -   129 |


 BEST CLOCK FIT: USNO   288   0.05 (ns) 

