
 GPS week: 1097   Day: 0   MJD: 51923                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2633      0    -0.02    -0.20     5.87     0.00
 cod |   288     0  17962      1     1.56    -6.86     0.10    38.24
 esa |   288     0  16880    595  2546.38     8.96     0.16    25.14
 gfz |   288     0  12600      0     0.12    -0.78     0.11    36.61
 igp |    96     0   2537      0     0.12    -0.52     4.84     0.00
 igu |    96     0   2096      0    -0.06    -0.27     3.68     0.00
 ngs |    96     0   2633      0    -0.05    -0.20     5.70     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  13254    718  6165.48  1878.25     1.15     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |  -175   213  -217   -59 15119     - -1143     -  -618 |
    2 | -3578   -27   -68    73-13463 -2334 -2913     -  -346 |
    3 |  2199   -29    77   -26 23329 -4137  1710     -    84 |
    4 | -1569  -114    54    77   -98  1120 -1527     -  -350 |
    5 |  -846    29   225  -180 -6141     -   443     -   -84 |
    6 |  1081   -65    78     6 18363 -3645   801     -    23 |
    7 | -2255    -8  -393   235-35302   369 -1935     -  -556 |
    8 |  2586   154  -210    -5-24947  3758  2564     -  -270 |
    9 |  7171    15    92   -77  2456 11924  7628     -  -280 |
   10 |   705   161     X  -168  7219 -1860   740     -  5361 |
   11 |  7230  -205   643  -250  7968  -864  7294     -  -122 |
   13 |  3023   183  -315    66 18111 -6957  2947     -   392 |
   14 |   421   -17   176  -108 -2749 -2117   400     -    71 |
   15 | -9508    50     -   -52-12202     - -9555     - -2615 |
   17 |  2738    11     X   -11  6206     -  2077     -     X |
   19 | -5997    48  -258   133-30784 -9065 -5296     -     - |
   20 |  6409  -197   603  -243 27606  -940  6065     -  -252 |
   21 | -2760   147  -408   148 16116  -234 -3524     -   167 |
   22 |  2991    -8  -102    77  9867 -1947  2363     -   342 |
   23 | -4975    38   358  -275     -   786 -4418     -   367 |
   24 |  -686    -2    89   -56  4432     -  -335     -   -92 |
   25 |  1353   -78  -154   182 18130  6909   738     -    48 |
   26 | -4663   -61   291  -133-11750 -8692 -4652     - -4637 |
   27 |  9346  -119   -65   157  5023 11241  8263     -  -520 |
   28 | -3214   -48   -41    76-33632  4819 -1748     -  1204 |
   29 | -2218   112   -62   -80-18200     - -2108     -   397 |
   30 | -2968    84  -373   179 15937 -4925 -3148     -   -21 |
   31 | -3279   -36  -143   127 -8168  6076 -3267     -   282 |
 -----+-------------------------------------------------------+
 ALBH |     -    -8    12     -     -     -     -     -     - |
 AREQ |     -  -198   197    56     -     -     -     -   143 |
 ARTU |     -   -60     -    62     -     -     -     -     - |
 AUCK |     -   -37    56     -     -     -     -     -  -531 |
 BAHR |     -    23   112  -101     -     -     -     -    60 |
 BARB |     -  -202   308     -     -     -     -     -     - |
 BOR1 |     -    31   -47     -     -     -     -     -     - |
 BRMU |     -   -23    34     -     -     -     -     -  -811 |
 CRO1 |     -   -63    97     -     -     -     -     -     - |
 DRAO |     -    79     -   -83     -     -     -     -   162 |
 FLIN |     -   -28    42     -     -     -     -     -     - |
 GALA |     -   -16   100   -52     -     -     -     -     - |
 GODE |     -   -12    18     -     -     -     -     -     - |
 GRAZ |     -   677 -1030     -     -     -     -     -     X |
 GUAM |     -    24   -37     -     -     -     -     -   275 |
 KOSG |     -   -82   125     -     -     -     -     -    -8 |
 LHAS |     -   -41   114   -36     -     -     -     -     - |
 MALI |     -     -  -391   269     -     -     -     -     X |
 MAS1 |     -    27   -96    38     -     -     -     -   427 |
 MCM4 |     -   109   -23   -93     -     -     -     -   334 |
 MDO1 |     -   -99   151     -     -     -     -     -   229 |
 MKEA |     -    80    54  -120     -     -     -     -   215 |
 NRC2 |     -   -66   100     -     -     -     -     -     - |
 ONSA |     -   -23    35     -     -     -     -     -    74 |
 PIE1 |     -   -26    39     -     -     -     -     -   445 |
 POTS |     -    59   -90     -     -     -     -     -     - |
 RBAY |     -   118     -  -123     -     -     -     -     - |
 REYK |     -  -196   298     -     -     -     -     -     - |
 STJO |     -   -69  -160   182     -     -     -     -     - |
 TRO1 |     -   -81     -    85     -     -     -     -     - |
 TSKB |     -    22  -130    67     -     -     -     -   122 |
 USNO |     -   -57    87     -     -     -     -     -    57 |
 USUD |     -   -84   128     -     -     -     -     -     - |
 VILL |     -   130  -198     -     -     -     -     -   348 |
 WES2 |     -   -18    27     -     -     -     -     -     - |
 WHIT |     -   -12     -    12     -     -     -     -     - |
 WTZR |     -   -50    76     -     -     -     -     -   117 |
 YELL |     -    46  -135    46     -     -     -     -   146 |
 YSSK |     -    38     -   -40     -     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 | 11059    54    75    54  4669     - 10990     -   472 |  276   4.11
    2 |  6088    74   133    50  4833  5033  5112     -   112 |  288   4.39
    3 |  5638   146   105    90  3587  2795  5397     -   264 |  288   2.41
    4 |  1377   142   407   157  3438   758  1492     -   187 |  288   1.22
    5 | 12708    76   122    79  6816     - 12446     -   121 |  288   3.92
    6 |  7155    72    66    69  7614  6464  7193     -   161 |  288   7.49
    7 |  4104   144   219   106 11668  2255  4016     -   195 |  288   2.44
    8 |  4778    78    57    60  5077  5877  4817     -    89 |  288   3.62
    9 |  4433   118   224    55  4535  4991  3814     -   146 |  288   1.76
   10 |  2779    72     X    75  3877  2093  2838     -  5403 |  278   2.55
   11 |   877    66   107    46  1690  1118   856     -    77 |  288   0.46
   13 |  1088    45    98    75  1836  2635  1211     -    99 |  288   0.24
   14 |   852    81   226   109  2975  1507   938     -   149 |  288   0.27
   15 | 10771   107     -   112  5396     - 10337     -  2769 |  252   3.84
   17 |  3835    65     X    68  3667     -  3666     -     X |  237   2.54
   19 |  4471   201   222   177  2797  4291  4713     -     - |  288   1.76
   20 |  2724   138   134    57  2628  1096  2391     -   207 |  288   0.27
   21 |  8598   102   238   125  3259  2198  8423     -   134 |  288   3.19
   22 |  4798    89   157    57  1948  2400  4974     -   303 |  287   1.47
   23 |  7582   167   398   128     -  1957  7480     -   456 |  288   6.03
   24 |  4543   137   448   179  4293     -  4576     -   208 |  285   2.28
   25 |  4424   144   162   159  6232  4278  4164     -   195 |  287   2.57
   26 |  1256   175   200   269  3671  2989  1185     -  4476 |  260   0.90
   27 |  5249    62    75    74  6923  6637  4582     -   128 |  288   2.98
   28 |  9890    64   145   111  5665  4803  9561     -  1026 |  286   0.87
   29 |  1319   131   273   202  4197     -  1339     -   519 |  274   1.15
   30 |  3863    43    61    47  1263  3321  3636     -   139 |  288   0.78
   31 |  3316   177   102   144  2910  2307  3210     -   491 |  287   2.74
 -----+-------------------------------------------------------+--------------
 ALBH |     -    32    48     -     -     -     -     -     - |  287   0.11
 AREQ |     -    43   179   107     -     -     -     -   116 |  288  22.13
 ARTU |     -    57     -    60     -     -     -     -     - |  283  18.09
 AUCK |     -    51    78     -     -     -     -     -   562 |  270  21.58
 BAHR |     -    33    90    79     -     -     -     -   177 |  288   0.47
 BARB |     -    64    97     -     -     -     -     -     - |  277  25.72
 BOR1 |     -    35    53     -     -     -     -     -     - |  288   2.85
 BRMU |     -   178   270     -     -     -     -     -  1056 |  285  17.19
 CRO1 |     -    66   100     -     -     -     -     -     - |  278   0.19
 DRAO |     -    53     -    56     -     -     -     -    54 |  288   0.06
 FLIN |     -    19    29     -     -     -     -     -     - |  288   8.69
 GALA |     -    37    88    62     -     -     -     -     - |  288  30.07
 GODE |     -   223   340     -     -     -     -     -     - |  284   0.17
 GRAZ |     -    51    77     -     -     -     -     -     X |  256  23.65
 GUAM |     -    52    79     -     -     -     -     -   115 |  288  26.48
 KOSG |     -    28    43     -     -     -     -     -    44 |  288  41.88
 LHAS |     -    64   193    94     -     -     -     -     - |  288  15.39
 MALI |     -     -   196   135     -     -     -     -     X |  225  12.69
 MAS1 |     -    39    84    33     -     -     -     -   421 |  287  21.51
 MCM4 |     -    52   142    65     -     -     -     -   437 |  287  18.87
 MDO1 |     -    44    67     -     -     -     -     -    70 |  286  21.24
 MKEA |     -    53    43    58     -     -     -     -    42 |  288  37.17
 NRC2 |     -    26    39     -     -     -     -     -     - |  287   0.05
 ONSA |     -    36    55     -     -     -     -     -    51 |  288   0.16
 PIE1 |     -    33    50     -     -     -     -     -    43 |  288   0.12
 POTS |     -    22    33     -     -     -     -     -     - |  287  16.78
 RBAY |     -    54     -    57     -     -     -     -     - |  189  87.23
 REYK |     -    33    49     -     -     -     -     -     - |  288   9.12
 STJO |     -    34    76    29     -     -     -     -     - |  288   1.78
 TRO1 |     -    18     -    19     -     -     -     -     - |  288  10.92
 TSKB |     -    57    83    44     -     -     -     -    89 |  288   0.93
 USNO |     -    32    49     -     -     -     -     -   132 |  288   0.06
 USUD |     -    34    52     -     -     -     -     -     - |  285   0.17
 VILL |     -    42    64     -     -     -     -     -    46 |  288   3.56
 WES2 |     -    32    48     -     -     -     -     -     - |  285   0.05
 WHIT |     -    47     -    49     -     -     -     -     - |  288  23.02
 WTZR |     -    33    50     -     -     -     -     -    43 |  288  82.99
 YELL |     -   409   236   263     -     -     -     -   225 |  288   0.13
 YSSK |     -    40     -    42     -     -     -     -     - |  279  15.13
 -----+-------------------------------------------------------+--------------
 TOT  |  5873   101   163   108  4841  3676  5705     -  1146 |


 BEST CLOCK FIT: WES2   285   0.05 (ns) 

