
 GPS week: 1096   Day: 1   MJD: 51917                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2677      0    -0.03    -0.11     5.01     0.00
 cod |   288     0  16203     37     0.93    -3.06     0.10    28.79
 emr |    96     0   3243     14   432.59     7.72     0.15    18.01
 esa |   288     1  15418   1573  -107.89   -12.81     0.12    23.79
 gfz |   288     0  12666    230     0.16    -0.79     0.10    29.40
 igp |    96     0   2389      0     0.05    -0.27     5.40     0.00
 igu |    96     0   2581      0     0.02    -0.23     5.49     0.00
 jpl |   288     0   6724    239    14.14    -4.46     0.14     0.00
 ngs |    96     0   2677      0    -0.03    -0.11     4.94     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  12748      0   428.16 -1463.58    25.97     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |  1917    26  -185     X    17 14339 13257  -205  1798     - -6075 |
    2 |  1382    84    53   -97    -6-13843-14917    92   692     - -1100 |
    3 | -1485   -78  -146  -117   193-26130-27203    21 -1245     -   176 |
    4 | -3908    -1   189   274  -259 -8928-10002   -78 -3881     -   -58 |
    5 |  2153  -161    30   334  -129   851  -223  -122  2702     -   -52 |
    6 |  1386   -13   -47    56   -24 -5180 -6254  -148  1035     -     2 |
    7 | -5295    99    94  -264   110-30148-31222   295 -5635     - -2992 |
    8 |  1051   172    75  -394   150 -2190 -3264   202   481     -  -125 |
    9 | -1037   217   206  -404    91     -     -   192 -1424     -   162 |
   10 | -2850    64   -63     X   -43  1256   182   108 -3130     --44139 |
   11 |  3788  -256   -59   428  -106 27893 26820    42  3645     -  -231 |
   13 |  2383   147   246  -527   211 12848 11774    75  2279     -   238 |
   14 |  1965   -25    61     X     9 -9311-10385    28  1415     - 67640 |
   15 |  -658   -10  -271     -    70 14715 13641   -16  -159     - 41983 |
   17 |  1020    92  -206  -150    85     - 10241  -460  1015     - 13378 |
   19 |    55    30  -152   -93    82 53922 52848  -174   428     -     - |
   20 |  6183    87   132  -204    59 15885 14811   274  6030     -  -165 |
   21 |  6509  -163  -270   219    12  -323 -1397   -15  6534     -   -83 |
   22 | -1209  -176   -47   357  -110-27238-28312    60 -1414     --37526 |
   23 | -2498     4    66   128  -119     - 16484   124 -1929     - 11437 |
   24 | -4160    17   210   -80     7-26966-28040  -318 -3336     - -8859 |
   25 | -2376   -98  -222   328   -98  -744 -1818  -193 -1996     - -6569 |
   26 | -3243   122    77     X  -130 -5935 -7009   -35 -3155     - 40835 |
   27 |  1766    65  -201  -189   140 -8694 -9768   -72  2212     -  -460 |
   28 |  -690  -310  -276   461   -31  4673  3599  -392  -140     --31789 |
   29 | -1758    20  -151     X    17 -8919 -9991    78 -1746     - 21085 |
   30 | -1572   -74  -191   195   -51 11384 10311   -47 -1655     -  -129 |
   31 |  1072   -70   -95    30    51 16857 15783  -144   474     -  -340 |
 -----+-------------------------------------------------------------------+
 ALBH |     -   -80     -    97     -     -     -     -     -     -     - |
 AOML |     -    34     -     -   -33     -     -     -     -     -     - |
 AREQ |     -    12     -   -15     -     -     -     -     -     -   800 |
 ARTU |     -    58     -     -   -57     -     -     -     -     -     - |
 AUCK |     -    38     -   -46     -     -     -    17     -     -  -195 |
 BAHR |     -    15   -11    38   -43     -     -   -12     -     -    70 |
 BARB |     -   194     -     X  -190     -     -   329     -     -     - |
 BRMU |     -  -188     -   227     -     -     -     -     -     --10210 |
 CRO1 |     -   -90     -   109     -     -     -     -     -     -     - |
 DRAO |     -     6   249     -   -57     -     -     -     -     -   178 |
 EISL |     -  -255     -   309     -     -     -     -     -     --39053 |
 FAIR |     -     -   173    67   -89     -     -   -28     -     -    79 |
 GODE |     -   -32     -    39     -     -     -     -     -     -     - |
 GRAZ |     -    41     -   -49     -     -     -     -     -     -     - |
 GUAM |     -   109     -  -131     -     -     -   269     -     - 12917 |
 KOKB |     -     -     -     4    -3     -     -   140     -     --32129 |
 KOSG |     -   -69     -    84     -     -     -     -     -     -     - |
 KWJ1 |     -     -     -   -27    22     -     -    44     -     -****** |
 LHAS |     -    75     -   -91     -     -     -     -     -     -     - |
 LPGS |     -   508     -  -614     X     -     -     -     -     -     - |
 MALI |     -     -     -  -127   103     -     -     -     -     -130848 |
 MCM4 |     -   -32     -  -130   129     -     -     -     -     - -4671 |
 MDO1 |     -    32     -   -39     -     -     -     -     -     -     - |
 MKEA |     -     -   387  -293     -     -     -     -     -     -     - |
 NLIB |     -     0     -   163  -131     -     -     -     -     -   867 |
 NYA1 |     -    55     -     -   -53     -     -     -     -     -     - |
 ONSA |     -    -4     -     5     -     -     -     -     -     -   719 |
 POTS |     -    41     -   -49     -     -     -     -     -     -   680 |
 RBAY |     -  -157     -     -   154     -     -     -     -     -     - |
 REYK |     -   -99     -   120     -     -     -     2     -     -     - |
 SANT |     -   211     -   -51   -76     -     -   -76     -     --17250 |
 TRO1 |     -  -133     -     -   131     -     -     -     -     -     - |
 URUM |     -   -37     -     -    36     -     -     -     -     -   -62 |
 USNO |     -   -99     -   119     -     -     -     -     -     -   643 |
 USUD |     -   -74   217    34     -     -     -   -40     -     -     - |
 VILL |     -   214     -  -259     -     -     -     -     -     -     - |
 WES2 |     -   -17     -    20     -     -     -     -     -     -     - |
 WTZR |     -   -40   126    16     -     -     -     -     -     -   -64 |
 WUHN |     -   -62     -     -    61     -     -  -127     -     -   692 |
 YSSK |     -   -26     -     -    26     -     -     -     -     -     - |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  5104   112    77     X   110  8363  8136    99  5123     -  4621 |  251   4.25
    2 |  6029   220   142   263   174  3283  3313   257  6052     -   289 |  284   2.99
    3 |  4068    88    93    48    46  1985  2037   120  4088     -   807 |  288   1.84
    4 |  2361    82   191   123    97  5952  6280   147  2374     -   765 |  288   0.63
    5 |  8982   196   394   125   128  7399  7101   179  9019     -   807 |  288   3.47
    6 |  7403    81   128    48    62  8349  8114    72  7075     -   764 |  288   8.04
    7 |  4331   156   154   125    49 11125 11450   106  3939     -  1969 |  280   1.40
    8 |  6234   102   104    91    83  6359  6748    57  6045     -   825 |  288   3.85
    9 |  3642    91    91   163    83     -     -   125  3705     -   769 |  288   1.38
   10 |  3809    63    80     X    63  2077  2163   157  3668     - 43313 |  250   2.04
   11 |  2563   200   264   107   122  2399  2129   137  2402     -   786 |  288   0.42
   13 |  1592   178   166   238    90  1252  1100   127  1616     -   785 |  288   0.30
   14 |  3818    91    60     X    81  4543  4854   106  3707     - 68290 |  240   0.48
   15 |  5955   106   124     -    93  5289  5154   156  5472     - 42834 |  264   5.27
   17 |  6456   125   131   154   176     -  6581   109  6507     - 14354 |  284   5.26
   19 |  6116   152    62   191   112  4166  3918   198  6123     -     - |  286   2.83
   20 |  1774    96   155   201    94   930   846    77  1742     -   791 |  288   0.25
   21 |  5098    98    56    92   117  6157  5923    59  5040     -   801 |  288   2.79
   22 |  3834    75   222    44    98  6923  7241    94  3929     - 36651 |  263   0.72
   23 |  7981    95   117   161    90     -  6317   121  7634     - 12204 |  284   5.79
   24 |  5597    99   111   177    99  2515  2450    93  5515     -  8313 |  281   2.78
   25 |  2711    85   201    55    90  2320  2094   200  2610     -  5565 |  276   2.21
   26 |   817    92   168     X    99  4233  4541    87   883     - 41610 |  251   0.50
   27 |  8075    73   110    70    42  7092  6864    40  8211     -   799 |  288   3.59
   28 |  2148   157   104    81   176  3782  4066   161  1949     - 31136 |  272   0.38
   29 |  2728   196    93     X   183  3554  3805   201  2826     - 21888 |  240   1.22
   30 |  2157    73   142    53    64  1450  1544    76  2128     -   761 |  288   1.38
   31 |  5988    75   176    62    63  7412  7186    70  6138     -   773 |  288   3.51
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    62     -    75     -     -     -     -     -     -     - |  287   0.07
 AOML |     -    79     -     -    77     -     -     -     -     -     - |  282  36.13
 AREQ |     -    35     -    42     -     -     -     -     -     -  1367 |  287  28.54
 ARTU |     -    24     -     -    24     -     -     -     -     -     - |  283  14.89
 AUCK |     -    53     -    65     -     -     -    71     -     -   475 |  268  19.20
 BAHR |     -    55    48    57    30     -     -   110     -     -   789 |  288   0.50
 BARB |     -    64     -     X    63     -     -    87     -     -     - |  286  20.32
 BRMU |     -    41     -    50     -     -     -     -     -     -  9538 |  279  19.03
 CRO1 |     -    52     -    63     -     -     -     -     -     -     - |  276   0.13
 DRAO |     -    67    69     -    63     -     -     -     -     -   788 |  288   0.05
 EISL |     -   164     -   198     -     -     -     -     -     - 38912 |  169  17.81
 FAIR |     -     -   159    77    84     -     -   149     -     -   812 |  288   0.37
 GODE |     -   158     -   191     -     -     -     -     -     -     - |  269   0.13
 GRAZ |     -    64     -    77     -     -     -     -     -     -     - |  249  23.33
 GUAM |     -    87     -   106     -     -     -   124     -     - 13303 |  268  26.14
 KOKB |     -     -     -    75    60     -     -    83     -     - 31513 |  253   0.76
 KOSG |     -    20     -    25     -     -     -     -     -     -     - |  287  18.23
 KWJ1 |     -     -     -   200   162     -     -   267     -     -103430 |  208  59.52
 LHAS |     -    50     -    60     -     -     -     -     -     -     - |  286  20.44
 LPGS |     -    71     -    86     X     -     -     -     -     -     - |  226  23.69
 MALI |     -     -     -   213   172     -     -     -     -     -131400 |  138    >>>
 MCM4 |     -    72     -   138   100     -     -     -     -     -  3994 |  285  31.26
 MDO1 |     -   237     -   287     -     -     -     -     -     -     - |  203  16.31
 MKEA |     -     -    64    48     -     -     -     -     -     -     - |   95  40.11
 NLIB |     -    51     -    32    34     -     -     -     -     -  1374 |  287   0.03
 NYA1 |     -    32     -     -    31     -     -     -     -     -     - |  287   0.14
 ONSA |     -    26     -    31     -     -     -     -     -     -  1362 |  287   0.42
 POTS |     -    64     -    77     -     -     -     -     -     -  1372 |  287  26.23
 RBAY |     -    53     -     -    52     -     -     -     -     -     - |  122  35.03
 REYK |     -    97     -   117     -     -     -   129     -     -     - |  281   7.75
 SANT |     -   102     -   225   190     -     -   320     -     - 16812 |  265   7.24
 TRO1 |     -    61     -     -    60     -     -     -     -     -     - |  287  10.81
 URUM |     -    69     -     -    67     -     -     -     -     -   768 |  288  52.51
 USNO |     -    56     -    68     -     -     -     -     -     -  1357 |  287  28.05
 USUD |     -    62    71    70     -     -     -   133     -     -     - |  288   0.13
 VILL |     -    28     -    34     -     -     -     -     -     -     - |  287   5.26
 WES2 |     -    33     -    40     -     -     -     -     -     -     - |  283   0.22
 WTZR |     -   101   126   148     -     -     -     -     -     -   541 |  284 446.09
 WUHN |     -    65     -     -    64     -     -    78     -     -  1351 |  287  28.04
 YSSK |     -    40     -     -    39     -     -     -     -     -     - |  287  15.82
 -----+-------------------------------------------------------------------+--------------
 TOT  |  5009   100   146   124    99  5398  5494   143  4941     - 25970 |


 BEST CLOCK FIT: NLIB   287   0.03 (ns) 

