
 GPS week: 1094   Day: 1   MJD: 51903                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2673      0     0.07    -0.21     4.55     0.00
 cod |   287     0  18477     41    -0.29     3.35     0.09    31.25
 esa |   288     0  17704    740  2349.12     6.06     0.14    18.89
 gfz |   288     0  13902    514     0.07    -0.49     0.12    23.53
 igp |    96     0   2481      0    -0.04    -0.05     5.20     0.00
 igu |    96     0   2385      0     0.05    -0.10     4.41     0.00
 jpl |   288     0   8076    239     6.83    -1.85     0.14     0.00
 ngs |    96     0   2673      0     0.08    -0.19     4.46     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15532    356  2369.02     6.06     0.11    26.33

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  4288   186   389   199 18659  1887    19  3097     -  -625 |
    2 | -1447   211  -444   288 12933 -5242   180 -1775     -  -178 |
    3 |  3356   -63   343    52  4146 14139    23  2879     -  -186 |
    4 |   685  -119   673  -229 -9183  4335  -524   781     -  -139 |
    5 | -9666   -43   318  -174-34464 -4646  -155 -8646     -   -24 |
    6 |  1201    11    86   -11 15434  8969   -39   756     -   -60 |
    7 |  -186    28   -73   196-36014  1578   149   192     -  -161 |
    8 | -3051   166  -210   239-23984     -   161 -3142     -  -248 |
    9 | -4756  -133   117    87 -5152 -9493  -260 -4777     -   -14 |
   10 |   872   300  -445    62 21721 -6666   173   500     -   -85 |
   11 |  6962    52   -99    86 20452 -1111   181  6834     -   -67 |
   13 |  5852    47  -374   246 28674  1795  -199  5351     -    -2 |
   14 |   186    -7  -326    71 -2666  3092     -   565     -   178 |
   15 |  2376   -16     -    21 22005  8100   173  1564     -     - |
   17 |   883   255  -463    47     -     -   -65   816     -    -4 |
   19 | -1856   156  -527   535 -2917   213   197  -496     -  -284 |
   20 |  6542   216  -253    76 13973   299   320  6405     -  -130 |
   21 | -4370   202   140   -80-12101 -1770   125 -3302     -  -253 |
   22 |  -560   235  -440   114-38507-16870   590  -642     -   -51 |
   23 |   413   -32   585  -303     - -2369   -56   -52     -  -105 |
   24 | -6386  -117    13   144 -9854 -4199  -530 -6137     -     - |
   25 | -1752   -43   390   -24  3708  2075   104 -1360     -  -209 |
   26 | -2225  -322   540   -89   160-11620  -526 -2441     -    66 |
   27 |  -741    88   110   283  3949 16732   -11  -844     -  -433 |
   28 |  4100   -42   123   -14 22194-12566   188  4159     -   -28 |
   29 | -2630  -134   596   -64-24940     -   -25 -2327     -  -118 |
   30 |  -989    18  -117    90 -2180  5624  -433  -734     -   -20 |
   31 |  3217    43   495   -29 15732  8959   294  3020     -  -341 |
 -----+-------------------------------------------------------------+
 ALBH |     -   -95   157     -     -     -     -     -     -     - |
 ALGO |     -  -104     X   -68     -     -   -65     -     -   183 |
 AREQ |     -   -90    73     -     -     -     -     -     -    55 |
 ARTU |     -    48     -   -63     -     -     -     -     -     - |
 AUCK |     -   113  -313     X     -     -  -384     -     -    91 |
 BAHR |     -   -92     6   -15     -     -   115     -     -   118 |
 BARB |     -   -89   147     -     -     -   -58     -     -     - |
 BRMU |     -  -212   379     -     -     -     -     -     -   -21 |
 CRO1 |     -  -133   220     -     -     -     -     -     -     - |
 DAEJ |     - -1005     -     -     -     -     -     -     -  1192 |
 DRAO |     -     5     -   -15     -     -  -145     -     -     7 |
 EISL |     -     -  -134  -482     -     -     -     -     -   631 |
 FAIR |     -     -   -88     -     -     -  -174     -     -    63 |
 FORT |     -     -   -92     -     -     -     -     -     -    66 |
 GODE |     -   -69   114     -     -     -     -     -     -     - |
 GUAM |     -   -49   -93     -     -     -    98     -     -   122 |
 IISC |     -     -  -125     -     -     -    81     -     -    90 |
 KELY |     -    -8    13     -     -     -  -113     -     -     - |
 KERG |     -    50     -     X     -     -     -     -     -   -59 |
 KIRU |     -   -92   261   -81     -     -    56     -     -     - |
 KIT3 |     -    85   -91   -39     -     -     -     -     -     - |
 KOKB |     -     -   -63    50     -     -   -83     -     -     X |
 KOUR |     -   -83   110     -     -     -     -     -     -    13 |
 KWJ1 |     -   -21  -144   125     -     -   -67     -     -    17 |
 LPGS |     -   543  -898     -     -     -     -     -     -     - |
 MALI |     -     -  -353  -218     -     -     -     -     -   432 |
 MATE |     -   -80     -     -     -     -     -     -     -    95 |
 MCM4 |     -   -93   503  -199     -     -     -     -     -   -78 |
 MDO1 |     -   -10    16     -     -     -   234     -     -     - |
 NLIB |     -  -101    40     -     -     -     -     -     -    90 |
 NRC2 |     -   177  -293     -     -     -     -     -     -     - |
 PERT |     -   194  -464   122     -     -     -     -     -     - |
 PIE1 |     -  -116  -123     -     -     -     -     -     -   224 |
 POTS |     -    -2   115   -90     -     -     -     -     -     - |
 RBAY |     -   160     -  -213     -     -     -     -     -     - |
 SANT |     -     -   145  -163     -     -   -65     -     -    30 |
 THU1 |     -   -12     -     -     -     -     -     -     -    14 |
 TIDB |     -    60     X   -80     -     -     -     -     -     - |
 URUM |     -   -35     -     -     -     -     -     -     -    42 |
 USNO |     -   -88    41     -     -     -     -     -     -    74 |
 USUD |     -    30  -131     -     -     -   -52     -     -    58 |
 VILL |     -    86  -142     -     -     -     -     -     -     - |
 WES2 |     -   104  -173     -     -     -     -     -     -     - |
 WHIT |     -   -28     -    37     -     -     -     -     -     - |
 WUHN |     -   -79     -  -153     -     -   306     -     -   230 |
 YAR2 |     -    81  -350     -     -     -     -     -     -   165 |
 YELL |     -     -   670  -384     -     -     -     -     -  -143 |
 ZWEN |     -     -     -   -96     -     -     -     -     -    86 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  9169   127   157    49  4244  3572    73  8659     -   109 |  288   4.08
    2 |  4483   105   114   179  2655  3125   137  4655     -   186 |  288   2.33
    3 |  2685   137   116    70  6350  8447    56  2045     -   101 |  288   1.89
    4 |  1830    70   219    64  2110  2317   164  1859     -   127 |  288   0.98
    5 |  6586   120   156   113  5443  4312   100  6494     -   106 |  288   3.29
    6 |  7566   118   131   108  9071  4450    68  7175     -   115 |  278   7.92
    7 |  3084   213   392   230  9206  3341   113  2980     -   164 |  282   0.83
    8 |  4462    39    56    49  6479     -    77  4478     -    44 |  288   3.98
    9 |  2781    36    38    42  3800  2921    74  2865     -    27 |  288   2.45
   10 |  3491   138   149   124  6053  2108   137  3570     -    65 |  288   2.38
   11 |   485    78    76    63  2961  1341   129   549     -    34 |  288   0.41
   13 |  1807    63    87    47  4042   766    88  1553     -   113 |  288   0.32
   14 |  1403   126    95   134  2701  1312     -  1377     -   207 |  288   0.46
   15 |  8277    62     -    82  5294  2767    84  7380     -     - |  272   4.25
   17 |  3092    90   299   215     -     -    55  3152     -    58 |  288   3.03
   19 |  6568   120   114   157  3816  3638    70  6742     -   244 |  288   3.96
   20 |  1729   151    81    75  1546   531   110  1691     -    88 |  288   0.30
   21 |  6564   111    76   128  2794  3353    95  6598     -    86 |  288   2.26
   22 |  5161   111   153    99 12394 12139    73  5128     -    80 |  288   1.50
   23 |  5800   202   177   172     -  2168   188  6035     -   147 |  288   6.41
   24 |  3604    85    61    87  1848  2946    71  3507     -     - |  288   1.40
   25 |  3195    78    75    56  3046  2992    57  3572     -    42 |  288   1.95
   26 |  2078    76   343    89  1829  4170   122  2036     -   128 |  288   1.10
   27 |  5689    78   134    49  7541  7555   107  5628     -   129 |  288   4.63
   28 |  2704   107    67   134  1555  5761    55  2602     -    50 |  288   1.17
   29 |  1271    74    80    65  5243     -    79  1545     -    49 |  288   0.67
   30 |  1926    99   127    59  2339  2474    72  1935     -    94 |  288   1.51
   31 |  4383   120   342    82  2545  2928   383  4409     -    86 |  280   2.51
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    40    65     -     -     -     -     -     -     - |  287   0.05
 ALGO |     -    26     X    70     -     -    35     -     -    47 |  288   0.01
 AREQ |     -    52    98     -     -     -     -     -     -    61 |  288  23.31
 ARTU |     -    30     -    40     -     -     -     -     -     - |  283  15.11
 AUCK |     -    84   104     X     -     -   461     -     -    82 |  288  15.89
 BAHR |     -    48    55    50     -     -    57     -     -    77 |  288   0.71
 BARB |     -    60   100     -     -     -    39     -     -     - |  275  29.94
 BRMU |     -   142   157     -     -     -     -     -     -   273 |  288  18.35
 CRO1 |     -    22    37     -     -     -     -     -     -     - |  278   0.11
 DAEJ |     -   131     -     -     -     -     -     -     -   155 |  282   2.46
 DRAO |     -    28     -    52     -     -    45     -     -    26 |  288   0.05
 EISL |     -     -    73    41     -     -     -     -     -    58 |  246  49.35
 FAIR |     -     -   119     -     -     -   107     -     -    86 |  284   0.08
 FORT |     -     -   188     -     -     -     -     -     -   135 |  193   0.44
 GODE |     -    90   148     -     -     -     -     -     -     - |  269  11.86
 GUAM |     -    67    99     -     -     -    74     -     -    83 |  288  26.73
 IISC |     -     -    78     -     -     -    81     -     -    56 |  230  47.90
 KELY |     -   145   241     -     -     -   235     -     -     - |  248  10.34
 KERG |     -    39     -     X     -     -     -     -     -    46 |  211    >>>
 KIRU |     -    43    82    36     -     -    82     -     -     - |  287   3.47
 KIT3 |     -    43    52    28     -     -     -     -     -     - |  288  22.19
 KOKB |     -     -   108    86     -     -   263     -     -     X |  262   2.60
 KOUR |     -    39    42     -     -     -     -     -     -    60 |  283   3.84
 KWJ1 |     -   106   155   157     -     -   263     -     -   151 |  255  70.27
 LPGS |     -    65   108     -     -     -     -     -     -     - |  248  18.60
 MALI |     -     -    95    81     -     -     -     -     -    42 |  200   4.19
 MATE |     -    47     -     -     -     -     -     -     -    56 |  287   0.21
 MCM4 |     -    58   100    44     -     -     -     -     -    94 |  287  14.45
 MDO1 |     -    34    56     -     -     -    35     -     -     - |  287  21.64
 NLIB |     -    20    26     -     -     -     -     -     -    18 |  288   0.04
 NRC2 |     -    13    22     -     -     -     -     -     -     - |  287   0.05
 PERT |     -   207    79   231     -     -     -     -     -     - |  288   2.79
 PIE1 |     -    38    58     -     -     -     -     -     -    29 |  288   0.08
 POTS |     -    54    85    27     -     -     -     -     -     - |  288  15.55
 RBAY |     -    56     -    74     -     -     -     -     -     - |  236  46.65
 SANT |     -     -   152   179     -     -   233     -     -   200 |  262   4.52
 THU1 |     -    42     -     -     -     -     -     -     -    50 |  277  15.81
 TIDB |     -    47     X    63     -     -     -     -     -     - |  287   0.35
 URUM |     -    71     -     -     -     -     -     -     -    84 |  276 179.24
 USNO |     -    19    26     -     -     -     -     -     -    20 |  288   0.02
 USUD |     -    58    66     -     -     -    83     -     -    64 |  288   0.66
 VILL |     -    47    77     -     -     -     -     -     -     - |  284   3.61
 WES2 |     -    27    45     -     -     -     -     -     -     - |  282   0.27
 WHIT |     -    25     -    33     -     -     -     -     -     - |  287  27.86
 WUHN |     -    43     -    33     -     -    43     -     -    41 |  286  26.21
 YAR2 |     -    31   107     -     -     -     -     -     -    70 |  275  79.69
 YELL |     -     -   351   376     -     -     -     -     -    88 |  288   0.26
 ZWEN |     -     -     -    79     -     -     -     -     -    70 |  252  18.14
 -----+-------------------------------------------------------------+--------------
 TOT  |  4550    89   142   117  5200  4411   138  4456     -   106 |


 BEST CLOCK FIT: ALGO   288   0.01 (ns) 

