
 GPS week: 1093   Day: 2   MJD: 51897                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2481     19     0.11    -0.17     4.72     0.00
 cod |   288     0  18126    127     4.53    -4.40     0.09    33.79
 esa |   288     0  16556   2965  2283.68    10.51     0.21    13.61
 gfz |   288     0  13636    193     0.00    -0.38     0.12    25.52
 igp |    96     0   2385      0  1497.61 -2244.68   417.60     0.00
 igu |    96     0   2101      0  1531.84 -2318.13   472.82     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  14873      0  2302.89    10.93     0.12    27.08

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   sio   usn |
 -----+-------------------------------------------------+
    1 |  7213   204     3    58************     -  -286 |
    2 |  -453   109  -224    -8************     -    -2 |
    3 | -6470    79     X   248************     -  -327 |
    4 | -3108    23   224  -140************     -    -7 |
    5 | -1360   -93   597    59************     -  -196 |
    6 | -1931    33    -7   110******     -     -  -141 |
    7 | -2318   -17     X    59************     -   -37 |
    8 |  -437   118   -67    42************     -  -145 |
    9 | -3811    19  -711   137************     -   194 |
   10 |  1616   102   139   -62************     -  -126 |
   11 |  1602   -94   888   -84************     -  -260 |
   13 |  1034    -6  -207    14************     -    98 |
   14 | -2190  -124     X   -24************     -   168 |
   15 | -7006   128     -    22******     -     -  -175 |
   17 |  5056    85     X   -95******     -     -    -6 |
   19 |-12316   160  -403   336************     -  -292 |
   20 |  5660   121     X  -140************     -   -10 |
   21 |  4101   139   309  -103************     -  -218 |
   22 | -4830    21   420     4************     -  -219 |
   23 |  5047   -60   350  -117     -     -     -     - |
   24 |  3855    91  -106   -68************     -    15 |
   25 |  9093   -94   122   259************     -  -195 |
   26 | -3252  -221   253    46************     -    81 |
   27 |  5938   168   -97   151************     -  -272 |
   28 | -1378    35   150   -71************     -   -49 |
   30 |   588   -42   537    48************     -  -251 |
 -----+-------------------------------------------------+
 ALGO |     -   -84     X   -87     -     -     -   186 |
 AREQ |     -  -125   262     -     -     -     -    24 |
 ARTU |     -   -87     -   115     -     -     -     - |
 AUCK |     -     -   -91     -     -     -     -    46 |
 BAHR |     -    37  -299    23     -     -     -    82 |
 BARB |     -  -273   677     -     -     -     -     - |
 BRMU |     -     -   277     -     -     -     -  -139 |
 CAS1 |     -   -20    49   -68     -     -     -    65 |
 CRO1 |     -  -196   488     -     -     -     -     - |
 DAEJ |     -  -943     -     -     -     -     -  1176 |
 DRAO |     -   -66     -   -88     -     -     -   166 |
 FAIR |     -     -  -311     -     -     -     -   156 |
 FORT |     -     -  -641     -     -     -     -   322 |
 GUAM |     -   104  -258     -     -     -     -     - |
 HOB2 |     -  -142    41     -     -     -     -   156 |
 IRKT |     -   343  -852     -     -     -     -     - |
 KARR |     -   -24     -    31     -     -     -     - |
 KERG |     -    64     -     X     -     -     -   -80 |
 KIRU |     -    31   -77     -     -     -     -     - |
 KOKB |     -     -     X   -16     -     -     -    15 |
 KOUR |     -   -39    96     -     -     -     -     - |
 KWJ1 |     -     -     X   108     -     -     -  -101 |
 LPGS |     -   442 -1098     -     -     -     -     - |
 MAC1 |     -   -31    99    -8     -     -     -     - |
 MALI |     -     -     X   -82     -     -     -    77 |
 MATE |     -    21     -     -     -     -     -   -27 |
 MAW1 |     -   135     -  -179     -     -     -     - |
 MCM4 |     -     -   268   -67     -     -     -   -71 |
 MKEA |     -   -59   147     -     -     -     -     - |
 NRC2 |     -   329  -816     -     -     -     -     - |
 NYA1 |     -    42     -   -56     -     -     -     - |
 ONSA |     -   -67   152   -72     -     -     -    74 |
 PIE1 |     -  -282  -123     -     -     -     -   399 |
 POTS |     -    64  -158     -     -     -     -     - |
 REYK |     -    66  -165     -     -     -     -     - |
 SANT |     -     X     X    61     -     -     -   -57 |
 STJO |     -   -29     -    39     -     -     -     - |
 THTI |     -   173     -     -     -     -     -  -215 |
 THU1 |     -   -30     -     -     -     -     -    37 |
 TIDB |     -    42     X   -55     -     -     -     - |
 TRO1 |     -   -81     -   107     -     -     -     - |
 TSKB |     -     -  -303     -     -     -     -   152 |
 URUM |     -    60     -  -104     -     -     -    30 |
 USNO |     -  -111   253     -     -     -     -    12 |
 USUD |     -   134  -333     -     -     -     -     - |
 VILL |     -    50  -124     -     -     -     -     - |
 WHIT |     -   -13     -    17     -     -     -     - |
 WSRT |     -    17     -     -     -     -     -   -21 |
 WTZR |     -   -22   -11     -     -     -     -    32 |
 WUHN |     -   125     -  -311     -     -     -   140 |
 YAR2 |     -     -  -268     -     -     -     -   135 |
 YELL |     -   -34   123   -20     -     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  6131    60   107    39424921483412     -   105 |  288   3.87
    2 |  5832   116   424   183425123483122     -   133 |  288   2.50
    3 |  4303   215     X   190430714488715     -   115 |  282   1.82
    4 |  2472    82   264   155425532483424     -    81 |  288   0.79
    5 |  4469    61   349    99425454482796     -    70 |  288   1.49
    6 |  8918   276   219   126434499     -     -   276 |  276   8.38
    7 |  2812   338     X   189430411488494     -   228 |  277   1.25
    8 |  5037    61   246   120423169482172     -    64 |  288   4.90
    9 |  2053   123   285    39426749484081     -    44 |  288   1.43
   10 |  5955    61   291    94426234484236     -    95 |  288   1.49
   11 |  1271    44   287   155425910483450     -    28 |  288   0.40
   13 |   766    43   167    52425875483387     -    84 |  288   0.17
   14 |  3831    88     X    45425793483358     -    72 |  288   0.50
   15 |  4376    59     -    61427022     -     -   119 |  288   3.60
   17 |  6777   233     X   258425018     -     -   171 |  288   4.99
   19 |  8938    84   191    72426112483981     -    93 |  288   3.52
   20 |  1707    61     X    63426008483577     -    48 |  288   0.23
   21 |  4390   140   400   132425421482479     -    58 |  288   2.73
   22 |  5597    73   177   100426145483570     -    66 |  288   0.48
   23 |  4133   126   247    97     -     -     -     - |  288   4.72
   24 |  2828   115    88   115426300483973     -    32 |  288   2.20
   25 |  3420   112   149   117425750483227     -   103 |  288   1.15
   26 |  1568    94   178    51425948483529     -    68 |  288   0.59
   27 |  4432    20   190   179423191481084     -    97 |  288   4.35
   28 |  5545    55   191    84425815483403     -    60 |  288   0.37
   30 |  3121   100   363    45190536215889     -    81 |  273   0.91
 -----+-------------------------------------------------+--------------
 ALGO |     -    54     X    78     -     -     -    40 |  288   0.03
 AREQ |     -    29   123     -     -     -     -    54 |  288  19.11
 ARTU |     -    32     -    42     -     -     -     - |  283  16.15
 AUCK |     -     -   245     -     -     -     -   123 |  287  19.19
 BAHR |     -   104   226    65     -     -     -    56 |  288   0.57
 BARB |     -    36    89     -     -     -     -     - |  282  29.28
 BRMU |     -     -   126     -     -     -     -    63 |  288  22.71
 CAS1 |     -    53   164    70     -     -     -    63 |  288  10.45
 CRO1 |     -    47   118     -     -     -     -     - |  262   0.19
 DAEJ |     -    26     -     -     -     -     -    32 |  287   1.64
 DRAO |     -    48     -    56     -     -     -    43 |  288   0.12
 FAIR |     -     -   190     -     -     -     -    96 |  287   0.09
 FORT |     -     -   172     -     -     -     -    87 |  186   1.42
 GUAM |     -    73   181     -     -     -     -     - |  274  30.02
 HOB2 |     -    56   178     -     -     -     -    66 |  288   0.14
 IRKT |     -    65   163     -     -     -     -     - |  285   0.45
 KARR |     -    38     -    51     -     -     -     - |  286  78.47
 KERG |     -    54     -     X     -     -     -    68 |  192    >>>
 KIRU |     -    28    70     -     -     -     -     - |  233   3.35
 KOKB |     -     -     X   335     -     -     -   315 |  239   0.59
 KOUR |     -    40   100     -     -     -     -     - |  263   4.32
 KWJ1 |     -     -     X   206     -     -     -   194 |  225 106.10
 LPGS |     -    62   153     -     -     -     -     - |  152 129.71
 MAC1 |     -    71   350    98     -     -     -     - |  266  14.89
 MALI |     -     -     X   319     -     -     -   301 |  198   9.60
 MATE |     -    27     -     -     -     -     -    34 |  286   0.14
 MAW1 |     -    54     -    72     -     -     -     - |  288  27.19
 MCM4 |     -     -   157    57     -     -     -    66 |  288   5.72
 MKEA |     -    69   170     -     -     -     -     - |  266  42.27
 NRC2 |     -    33    81     -     -     -     -     - |  218   0.03
 NYA1 |     -    35     -    46     -     -     -     - |  288   0.09
 ONSA |     -    28    85    29     -     -     -    34 |  288   0.39
 PIE1 |     -    83   163     -     -     -     -    46 |  288   0.08
 POTS |     -    64   160     -     -     -     -     - |  277  15.61
 REYK |     -    29    71     -     -     -     -     - |  288   8.58
 SANT |     -     X     X   294     -     -     -   277 |  247   5.50
 STJO |     -    40     -    53     -     -     -     - |  288   3.89
 THTI |     -   124     -     -     -     -     -   154 |  276   6.93
 THU1 |     -    20     -     -     -     -     -    24 |  283  14.60
 TIDB |     -    32     X    42     -     -     -     - |  286   0.28
 TRO1 |     -    26     -    34     -     -     -     - |  286  11.34
 TSKB |     -     -   172     -     -     -     -    86 |  288   1.44
 URUM |     -   107     -    90     -     -     -   198 |  288  45.23
 USNO |     -    39   131     -     -     -     -    55 |  288   0.04
 USUD |     -    85   211     -     -     -     -     - |  288   0.49
 VILL |     -    56   139     -     -     -     -     - |  284   8.18
 WHIT |     -    48     -    63     -     -     -     - |  287  68.53
 WSRT |     -    26     -     -     -     -     -    32 |  286   0.05
 WTZR |     -   110   409     -     -     -     -    83 |  282 338.66
 WUHN |     -    28     -    49     -     -     -    63 |  255  29.80
 YAR2 |     -     -   141     -     -     -     -    71 |  168 216.79
 YELL |     -    39   112    61     -     -     -     - |  288   0.09
 -----+-------------------------------------------------+--------------
 TOT  |  4718    92   213   125417598472818     -   116 |


 BEST CLOCK FIT: ALGO   288   0.03 (ns) 

