
 GPS week: 1090   Day: 5   MJD: 51879                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2554     11    -0.47     1.33     5.89     0.00
 cod |   287     0  17556    194    -0.03     3.77     0.10    21.75
 esa |   288     0  16267    407  2079.95     7.19     0.12    18.06
 gfz |   288     0  13400    475    -0.15     0.21     0.07    30.61
 igp |    96     0   2471     19    -0.28     0.34     5.19     0.00
 igu |    96     0   2376     24    -0.01    -0.41     4.04     0.00
 ngs |    96     0   2554      2    -0.61     2.03     5.88     0.00
 usn |   288     0  15572    508  2097.42     7.37     0.08    29.58

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   ngs   usn |
 -----+-------------------------------------------------+
    1 | -2693   406   -75    56  6857  -857 -3133  -269 |
    2 |  5717   225    -5   -39 14840 -5362  5535   -99 |
    3 | -2612  -186   645   -98 22950 -1289 -2701  -162 |
    4 | -4406    10   -63    13-12311  2196 -4227    20 |
    5 |   198    18   -23   164  9722   938  -568  -167 |
    6 | -4337    99   120    52 20203 -3954 -4446  -188 |
    7 | -6167   177  -147   193-27584  1758 -6326  -220 |
    8 | -5119   268     7   -34-12106-11286 -5343  -135 |
    9 |  5838    10   -75    48 10486    84  4799   -11 |
   10 |   -90   170    54   -95-12432  5897  -219   -27 |
   11 |  4488   -75   495  -318  9811  3611  4275    76 |
   13 |  1648   -41   388  -248   296   516  1527    41 |
   15 |  -262   123     -     3 20497     -  -167   -83 |
   17 | -5292   199   -69   113-18887 -7840 -4338  -183 |
   19 |   813   206    -5   179   278  2805   224  -308 |
   20 |  7588   160   124  -163 13499  2917  7292    -4 |
   21 | -7508   305    24   -97-12245-20732 -6016   -80 |
   22 | 13718   107   209    57 17321  8787 15482  -251 |
   23 | -3351     9   -59    23     -     - -3627     - |
   24 | -2816     2    30   -19-16039  5172 -3246     1 |
   25 |  4588    -4   -15   128  3335 -2549  4232  -120 |
   26 | -2865  -271   432   -53-23758 -5130 -3153   -37 |
   27 | -1254   184   119    -9 -1485   862 -1995  -182 |
   28 |  8773   -61    41    -7  9338 15631  9815    18 |
   29 |  -390   -46   -59   112 -7006  1935  -792   -52 |
   30 | -5004   105   -53   104-16031  3024 -4810  -144 |
   31 |  1147   -49   479    48  4112  4577   974  -302 |
 -----+-------------------------------------------------+
 ALGO |     -   -21     X  -171     -     -     -   192 |
 AREQ |     -  -122    53     -     -     -     -    57 |
 ARTU |     -    28     -   -20     -     -     -     - |
 ASC1 |     -     -  -201   -61     -     -     -   185 |
 AUCK |     -  -531  -657   987     -     -     -  -274 |
 BAHR |     -    46   -40     X     -     -     -    -9 |
 BAKO |     -   136     -     -     -     -     -  -100 |
 BOR1 |     -   -38    46     -     -     -     -     - |
 BRMU |     -  -183   186     -     -     -     -    19 |
 CRO1 |     -   -97   117     -     -     -     -     - |
 DAEJ |     - -1176     -     -     -     -     -   865 |
 DRAO |     -   -30     -  -127     -     -     -   153 |
 EISL |     -  -144   143  -347     -     -     -   344 |
 FAIR |     -     -  -119   -60     -     -     -   130 |
 FORT |     -     -  -429     -     -     -     -   262 |
 GRAZ |     -     X  -173     -     -     -     -   106 |
 GUAM |     -    61   -74     -     -     -     -     - |
 KIRU |     -   -33    40     -     -     -     -     - |
 KOKB |     -     -    -2     1     -     -     -     X |
 KOSG |     -   -87   105     -     -     -     -     - |
 KOUR |     -   -40    48     -     -     -     -     - |
 KWJ1 |     -   -33   -91     -     -     -     -    67 |
 LHAS |     -    15   -18     -     -     -     -     - |
 LPGS |     -   601  -724     X     -     -     -     - |
 MALI |     -     -  -238     -     -     -     -   145 |
 MATE |     -  -109     -     -     -     -     -    80 |
 MCM4 |     -   255  -615    -2     -     -     -   243 |
 MDO1 |     -    68   -82     -     -     -     -     - |
 NLIB |     -   -85     -     -     -     -     -    63 |
 NRC2 |     -    20   -24     -     -     -     -     - |
 NYA1 |     -    95     -   -67     -     -     -     - |
 ONSA |     -  -129   -19     -     -     -     -   106 |
 PIE1 |     -   -87  -195     -     -     -     -   182 |
 POTS |     -   122  -147     -     -     -     -     - |
 REYK |     -   -77    93     -     -     -     -     - |
 SANT |     -     -    -2     1     -     -     -     X |
 STJO |     -   -46     -    33     -     -     -     - |
 SUTH |     -  -272     -    18     -     -     -    46 |
 THTI |     -     9     -     -     -     -     -    -6 |
 THU1 |     -   -85     -     -     -     -     -    62 |
 TIXI |     -   -35     -    25     -     -     -     - |
 TRO1 |     -  -123     -    87     -     -     -     - |
 TSKB |     -   220  -279     -     -     -     -    29 |
 USNO |     -  -128    65     -     -     -     -    55 |
 USUD |     -    88   159  -156     -     -     -     - |
 VILL |     -   -18    22     -     -     -     -     - |
 WSRT |     -   -16     -     -     -     -     -    12 |
 WUHN |     -   151     -   -99     -     -     -    -8 |
 YAR2 |     -    78   118  -180     -     -     -    64 |
 ZWEN |     -     -     -   -37     -     -     -    39 |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  6396   101   133    68  6247  4167  6469    99 |  288   6.18
    2 |  4425   225   104   124  5458  2339  4237    78 |  288   2.98
    3 |  1853   108    59    54  2440  2365  1994    28 |  278   1.51
    4 |  1434   112   100    46  4973  1935  1580    43 |  288   1.15
    5 |  9211    99    83    40  2179  2622  9021    44 |  288   2.65
    6 |  9566    60    79    63  9080  7025  9777    63 |  278   8.43
    7 |  2853   101   304   160 11366  1193  3002    47 |  277   1.66
    8 |  4205   177    68    73  6348  3701  4179    65 |  288   4.10
    9 |  2696   116    66    41  4512  2467  2742    83 |  288   1.51
   10 |  2387   211   244   115  2608  3143  2398   238 |  277   2.15
   11 |   891   145    83    50  1745  1090  1167    46 |  288   0.40
   13 |  1314   180    72    45   944   832  1358    78 |  288   0.20
   15 |  5284    98     -    46  5726     -  5504    52 |  287   1.88
   17 |  8753   180   213    52  6852  6937  8413    96 |  286   3.25
   19 |  7191   150   164    54  6079  4838  6939    85 |  288   1.82
   20 |   742    78   125    41  2033  1128   858    63 |  288   0.25
   21 | 10840   245   142   131  5687  4126 10349    63 |  276   4.35
   22 | 11657   134    90    80  8209  5978 12683    78 |  288  10.94
   23 |  6683   206   331   211     -     -  6923     - |  254   6.94
   24 |  3618    95    41    38  1799  1828  3532    48 |  288   1.92
   25 |  2928    55    97    31  1781  1916  2970    50 |  288   1.63
   26 |  2121    53   177    48  5554  2399  2034   113 |  288   0.97
   27 |  4955   100   121    33  4381  4107  4591   100 |  288   3.88
   28 | 10225    82   120    64  2548  8965  9050    60 |  288   0.29
   29 |  1564   140    93    63  2613  1018  1769    82 |  288   0.78
   30 |  1899   112    65    34  1463  1230  1891    89 |  288   1.37
   31 |  7865    74    85    62  6456  7751  8014    85 |  280   5.50
 -----+-------------------------------------------------+--------------
 ALGO |     -    71     X    55     -     -     -    16 |  288   0.01
 AREQ |     -   124   181     -     -     -     -    42 |  282    >>>
 ARTU |     -    64     -    46     -     -     -     - |  286  20.07
 ASC1 |     -     -    61    39     -     -     -    40 |  268 181.55
 AUCK |     -    98    40    40     -     -     -    47 |  288  22.45
 BAHR |     -    94    86     X     -     -     -   115 |  248   0.38
 BAKO |     -    42     -     -     -     -     -    31 |  225    >>>
 BOR1 |     -    38    46     -     -     -     -     - |  287   2.08
 BRMU |     -    62    34     -     -     -     -    36 |  288  20.92
 CRO1 |     -    32    38     -     -     -     -     - |  279   0.17
 DAEJ |     -    87     -     -     -     -     -    64 |  277   1.46
 DRAO |     -   107     -    83     -     -     -    21 |  288   0.07
 EISL |     -    73   107    81     -     -     -    33 |  275  37.41
 FAIR |     -     -    52   148     -     -     -   161 |  287   0.16
 FORT |     -     -   199     -     -     -     -   122 |  172   0.23
 GRAZ |     -     X   203     -     -     -     -   124 |  181  12.52
 GUAM |     -    22    26     -     -     -     -     - |  280  32.54
 KIRU |     -    25    30     -     -     -     -     - |  286   2.63
 KOKB |     -     -   148    88     -     -     -     X |  237   0.93
 KOSG |     -    40    48     -     -     -     -     - |  287  36.83
 KOUR |     -    50    60     -     -     -     -     - |  259   2.18
 KWJ1 |     -   122   167     -     -     -     -   106 |  128    >>>
 LHAS |     -    37    44     -     -     -     -     - |  274  18.19
 LPGS |     -    71    86     X     -     -     -     - |  218  21.47
 MALI |     -     -   192     -     -     -     -   117 |  208  18.32
 MATE |     -    48     -     -     -     -     -    35 |  287   0.17
 MCM4 |     -   167    66    42     -     -     -    47 |  288  23.88
 MDO1 |     -    35    43     -     -     -     -     - |  281  38.38
 NLIB |     -    37     -     -     -     -     -    27 |  286   0.02
 NRC2 |     -    30    36     -     -     -     -     - |  287   0.06
 NYA1 |     -    59     -    42     -     -     -     - |  287   0.04
 ONSA |     -    64    33     -     -     -     -    42 |  288  16.18
 PIE1 |     -    57    39     -     -     -     -    29 |  288   0.02
 POTS |     -    34    41     -     -     -     -     - |  287  13.46
 REYK |     -    36    44     -     -     -     -     - |  287  10.12
 SANT |     -     -   104    62     -     -     -     X |  271  44.54
 STJO |     -    56     -    39     -     -     -     - |  287   3.71
 SUTH |     -   161     -    49     -     -     -    33 |  286  45.06
 THTI |     -    84     -     -     -     -     -    62 |  260    >>>
 THU1 |     -    51     -     -     -     -     -    37 |  274  15.29
 TIXI |     -    50     -    36     -     -     -     - |  286  14.91
 TRO1 |     -    60     -    42     -     -     -     - |  287  11.16
 TSKB |     -   100    83     -     -     -     -    50 |  288   1.38
 USNO |     -    52    29     -     -     -     -    35 |  288   0.02
 USUD |     -    58    56    66     -     -     -     - |  288   0.54
 VILL |     -    45    55     -     -     -     -     - |  287   2.29
 WSRT |     -    74     -     -     -     -     -    55 |  287   0.10
 WUHN |     -    56     -    55     -     -     -    33 |  287  37.93
 YAR2 |     -   266   353    63     -     -     -    94 |  256 528.83
 ZWEN |     -     -     -    22     -     -     -    22 |  288  15.40
 -----+-------------------------------------------------+--------------
 TOT  |  5886   103   121    73  5189  4042  5881    75 |


 BEST CLOCK FIT: ALGO   288   0.01 (ns) 

