
 GPS week: 1089   Day: 2   MJD: 51869                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2580      0     0.15    -0.19     4.27     0.00
 cod |   288     0  17312      2     2.65    -1.58     0.09    30.98
 esa |   288     0  15750    404  1972.30    10.64     0.12    21.64
 gfz |   288     0  13788     11     0.17    -0.26     0.11    24.36
 igp |    96     0   2488      0     0.17    -0.21     5.54     0.00
 igu |    96     0   2484      0     0.15    -0.19     5.63     0.00
 ngs |    96     0   2580      0     0.15    -0.19     4.04     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  14298    557  1988.87    10.68     0.12    23.01

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 | -4663   153     0   152 41580 41322 -4810     -  -357 |
    2 |  -553   188  -140   -94   523   264 -1091     -     - |
    3 |  3992  -179   581   -11 11811 11552  3473     -  -305 |
    4 |  4758  -107   -41   129 -1433 -1691  4408     -    45 |
    5 | -5269   125  -190    50 -4429 -4688 -4371     -   -32 |
    6 | -9018    19   120   -99 13558 13300 -8982     -   -32 |
    7 | -2688   147  -124   -44-39662-39921 -2474     -   -26 |
    8 |  7602    92   251   -34-11755-12013  7571     -  -313 |
    9 | -6236    73   -96   -33 -7746 -8004 -5660     -    35 |
   10 |  2107    98   -55    18  3336  3077  2049     -   -96 |
   11 |  1001  -144   371  -115  -927 -1186  1537     -   -49 |
   13 |  5976   -35   -12    34 16466 16207  5468     -    20 |
   15 |   434   186     -   -97-14439     -   678     -  -135 |
   17 |  6696   312  -247    12 23301 23043  5576     -  -172 |
   19 | -2187    -5   256   150 28177 27919 -1439     -  -395 |
   20 |  6651    94   -20   -35  2473  2215  6462     -   -63 |
   21 |  4554   290  -214   -79  7220  6960  3527     -  -101 |
   22 | -2940    28   198   106 10644 10385 -2961     -  -336 |
   23 |  5113   220  -119  -167     - -8357  5214     -     - |
   24 | -5762    72  -239    -7 -2562 -2820 -5612     -   139 |
   25 | -1955   -33    32   212  3950  3692 -1923     -  -210 |
   26 | -2028  -139     3   118-18231-18490 -1925     -    52 |
   27 |-12027   -80   369   176-12284-12542-10871     -  -430 |
   28 |  7823   -91   230   -38-23359-23617  7629     -   -53 |
   29 | -2296   -58   -49    64-22117-22376 -2266     -    42 |
   30 | -6093   -24  -227   209-16392-16650 -5168     -    23 |
   31 |  7558  -159   478   150 12768 12510  6442     -  -395 |
 -----+-------------------------------------------------------+
 ALGO |     -     0     X  -117     -     -     -     -   123 |
 ARTU |     -     6     -    -7     -     -     -     -     - |
 ASC1 |     -   436  -616  -165     -     -     -     -   223 |
 AUCK |     -   -50  -256     -     -     -     -     -   306 |
 BAHR |     -   -97   188   -43     -     -     -     -     X |
 BRMU |     -     -   119     -     -     -     -     -  -111 |
 CAS1 |     -     3     6   -86     -     -     -     -    82 |
 CRO1 |     -    22   -32     -     -     -     -     -     - |
 DAEJ |     -  -612     -     -     -     -     -     -   825 |
 DRAO |     -     8    74  -192     -     -     -     -   122 |
 FAIR |     -     -   -71  -111     -     -     -     -   178 |
 FORT |     -     -  -114     -     -     -     -     -   107 |
 GRAZ |     -  -145   207     -     -     -     -     -     - |
 GUAM |     -   -70  -122     -     -     -     -     -   209 |
 HOB2 |     -  -130   135   -40     -     -     -     -    91 |
 KIRU |     -     7   -10     -     -     -     -     -     - |
 KIT3 |     -    67  -136    39     -     -     -     -     - |
 KOKB |     -     -   -55  -143     -     -     -     -   201 |
 KOUR |     -    63   -90     -     -     -     -     -     - |
 KWJ1 |     -     -    77   -12     -     -     -     -   -56 |
 LHAS |     -   -16    23     -     -     -     -     -     - |
 MAC1 |     -    47     -   -59     -     -     -     -     - |
 MALI |     -     -    66     -     -     -     -     -   -63 |
 MATE |     -  -143     -     -     -     -     -     -   193 |
 MAW1 |     -    79     -  -100     -     -     -     -     - |
 MCM4 |     -     -  -178   174     -     -     -     -   -42 |
 NYA1 |     -    24     -   -31     -     -     -     -     - |
 ONSA |     -  -120   -47    13     -     -     -     -   192 |
 PIE1 |     -    40  -185     -     -     -     -     -   121 |
 POTS |     -    27   -39     -     -     -     -     -     - |
 REYK |     -   -90   129     -     -     -     -     -     - |
 SANT |     -     -   -60    53     -     -     -     -     X |
 STJO |     -   -15     -    19     -     -     -     -     - |
 THU1 |     -   -31     -     -     -     -     -     -    42 |
 TIXI |     -   -88     -   112     -     -     -     -     - |
 TRO1 |     -  -149     -   190     -     -     -     -     - |
 URUM |     -   -55     -     -     -     -     -     -    75 |
 USNO |     -    91  -370     -     -     -     -     -   225 |
 USUD |     -   -48   -59     -     -     -     -     -   120 |
 VILL |     -     0     1     -     -     -     -     -     - |
 WSRT |     -   -70     -     -     -     -     -     -    95 |
 WTZR |     -  -140    95     -     -     -     -     -    98 |
 WUHN |     -   -70     -  -174     -     -     -     -   278 |
 YELL |     -    15    71   -82     -     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  4365   165   119   159  7537  7634  4342     -   160 |  288   3.56
    2 |  3996    94   109    89  4096  4222  3708     -     - |  288   2.62
    3 |  2230    51    76    64  5152  5215  1808     -    51 |  288   2.35
    4 |  2062   108   107    56  2965  2949  1895     -    36 |  288   0.88
    5 |  5941    92    87   105  4505  4394  5781     -   126 |  288   4.34
    6 |  9319    77    80   110  8907  8770  9159     -    51 |  288   9.09
    7 |  1256   103    52   100 12340 12282  1564     -   110 |  288   1.61
    8 |  4146   106    55    72  6368  6416  4290     -   189 |  288   4.21
    9 |  2265    93    41   103  3780  3734  2536     -   172 |  288   1.82
   10 |  3043   244   203    97  3781  3849  3036     -   227 |  277   1.94
   11 |  2914    53   167    87   844   761  2950     -   149 |  288   0.73
   13 |  1974    78    82    92  2649  2729  1670     -    61 |  288   0.27
   15 |  4086    61     -   120  1839     -  3810     -    64 |  288   1.92
   17 |  8050   154    66    76 10047 10124  7905     -    85 |  288   4.68
   19 |  7838    84    52   131  5548  5545  6910     -   102 |  288   5.20
   20 |  1401    60    93    88  1458  1422  1209     -   174 |  288   0.38
   21 |  5261   195   205   206  6867  6960  4240     -   162 |  276   3.09
   22 |   731   105    93    72  1022   904   587     -    51 |  288   0.71
   23 |  5877   128   241   250     -  5520  5679     -     - |  278   5.25
   24 |  2478   171   398    72  2236  2175  2259     -   110 |  288   1.63
   25 |  2398   103   144   123  1979  2117  2367     -   158 |  288   1.76
   26 |   847    60    57    94  4911  4844   797     -   165 |  288   0.46
   27 |  5141   116    92    61  4876  4879  4321     -   134 |  288   3.48
   28 |  1092    67    59   105  2575  2527  1262     -   145 |  288   0.37
   29 |  1335   169   233   180  5667  5596  1200     -   127 |  288   0.81
   30 |  4263    64    80    85  2746  2700  4292     -    92 |  288   1.25
   31 |  4274    73    79    63  8885  8943  3663     -    45 |  288   3.13
 -----+-------------------------------------------------------+--------------
 ALGO |     -    59     X    50     -     -     -     -    39 |  288   0.04
 ARTU |     -    55     -    70     -     -     -     -     - |  276  18.18
 ASC1 |     -    46    73   242     -     -     -     -   266 |  268  20.50
 AUCK |     -    23    66     -     -     -     -     -    58 |  288  15.96
 BAHR |     -    51    55    77     -     -     -     -     X |  288   0.49
 BRMU |     -     -    29     -     -     -     -     -    27 |  288  18.10
 CAS1 |     -    91    48    79     -     -     -     -    35 |  288  10.49
 CRO1 |     -    35    50     -     -     -     -     -     - |  275   0.40
 DAEJ |     -    18     -     -     -     -     -     -    24 |  127   0.88
 DRAO |     -    25    42    24     -     -     -     -    36 |  288   0.09
 FAIR |     -     -   106   118     -     -     -     -   174 |  288   0.19
 FORT |     -     -    50     -     -     -     -     -    47 |  169   0.09
 GRAZ |     -    24    34     -     -     -     -     -     - |  247  68.47
 GUAM |     -    43    65     -     -     -     -     -    73 |  288  32.82
 HOB2 |     -    91    79    71     -     -     -     -    63 |  288   0.05
 KIRU |     -   151   216     -     -     -     -     -     - |  274 700.08
 KIT3 |     -    54    78    40     -     -     -     -     - |  288  28.61
 KOKB |     -     -   114   208     -     -     -     -   199 |  277   2.16
 KOUR |     -    57    82     -     -     -     -     -     - |  275   4.75
 KWJ1 |     -     -   302   210     -     -     -     -   201 |  186  78.59
 LHAS |     -    36    51     -     -     -     -     -     - |  284  15.63
 MAC1 |     -    72     -    92     -     -     -     -     - |  269  13.10
 MALI |     -     -   119     -     -     -     -     -   112 |  137   5.19
 MATE |     -    37     -     -     -     -     -     -    50 |  287   0.18
 MAW1 |     -    71     -    91     -     -     -     -     - |  282  26.23
 MCM4 |     -     -    82   111     -     -     -     -   104 |  288  14.00
 NYA1 |     -    18     -    22     -     -     -     -     - |  288   0.06
 ONSA |     -    43    42    48     -     -     -     -    53 |  288  13.91
 PIE1 |     -    25    48     -     -     -     -     -    38 |  288   0.06
 POTS |     -    40    57     -     -     -     -     -     - |  276  14.86
 REYK |     -    38    54     -     -     -     -     -     - |  279   7.51
 SANT |     -     -   107    95     -     -     -     -     X |  237 166.46
 STJO |     -    28     -    35     -     -     -     -     - |  287   3.55
 THU1 |     -   102     -     -     -     -     -     -   137 |  263  16.51
 TIXI |     -    15     -    19     -     -     -     -     - |  287  15.10
 TRO1 |     -    61     -    77     -     -     -     -     - |  287  11.78
 URUM |     -    36     -     -     -     -     -     -    49 |  287  71.97
 USNO |     -    65    69     -     -     -     -     -    35 |  288   0.02
 USUD |     -    42    70     -     -     -     -     -    62 |  288   0.48
 VILL |     -    62    88     -     -     -     -     -     - |  287   6.39
 WSRT |     -    24     -     -     -     -     -     -    32 |  288   0.03
 WTZR |     -    52    47     -     -     -     -     -    33 |  288   0.11
 WUHN |     -    48     -    63     -     -     -     -    27 |  287  18.33
 YELL |     -    95   286   145     -     -     -     -     - |  288   0.08
 -----+-------------------------------------------------------+--------------
 TOT  |  4269    87   123   110  5536  5632  4043     -   115 |


 BEST CLOCK FIT: USNO   288   0.02 (ns) 

