
 GPS week: 1088   Day: 4   MJD: 51864                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2485      0    -0.05     0.13     5.23     0.00
 cod |   287     0  17887     26     0.32    -0.52     0.08    32.44
 esa |   288     0  15646    349  1904.79    10.82     0.11    22.08
 gfz |   288     0  14068     21    -0.42     0.59     0.11    23.11
 igp |    96     0   2393      0    -0.03     0.14     4.84     0.00
 igu |    96     0   2393      0     0.00     0.01     4.65     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  14577    302  1922.18    10.71     0.11    22.37

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   sio   usn |
 -----+-------------------------------------------------+
    1 |   737    61    34   209   971 -2128     -  -337 |
    2 |  3447   249    -6  -125-10249 10749     -  -218 |
    3 |  2591  -202   365   163  3609 12670     -  -253 |
    4 |   777   -15   -95   -90-16360  5623     -   208 |
    6 | -6533    42   -13    40 -5949  2402     -   -89 |
    7 | -6755   229    52  -308-37440 -4861     -   -62 |
    8 |  3215   123  -104    20-13124-10690     -   -92 |
    9 | -1055   -55    32   131 15167 -2968     -   -91 |
   10 |  4719    71   337  -149 32701 -2450     -  -257 |
   11 |  3107  -124   253  -131 12791  3083     -    60 |
   13 |  3995    -1  -114   -26  8149 -3981     -   140 |
   15 | -4336   269     -  -105-11550  1630     -  -282 |
   17 | -4734   140    30   -33 51340-14311     -  -194 |
   19 |  1489    66   -57   154-14224 14668     -  -196 |
   20 |  6930   164  -202   -35 13568  5466     -    -2 |
   21 | -2549   205  -121    13 21273-13804     -  -193 |
   22 |  5336    48   103    87-29341 -5849     -  -262 |
   23 |   466    83   -61   -51     -     -     -     - |
   24 |  2623    -2    85  -172 17568  6467     -    97 |
   25 | -3408  -151   359   115 -4576 -2190     -  -261 |
   26 | -1570   -92   -26    94 -8876 -3212     -    56 |
   27 |-10634    55  -107   151-17370-19649     -  -125 |
   28 |  5277   -43  -121    93-12644  9932     -    83 |
   29 |  2147   -15     8   -28  9910  8914     -    42 |
   30 | -7134  -135   107   190-10327  -500     -  -110 |
   31 |  1830   -35    68   145  6481  4334     -  -170 |
 -----+-------------------------------------------------+
 ALGO |     -   -82     X   -81     -     -     -   202 |
 AREQ |     -   -72   -44     -     -     -     -   146 |
 ARTU |     -   -35     -    50     -     -     -     - |
 ASC1 |     -   -41  -218  -111     -     -     -   367 |
 AUCK |     -  -123    12     -     -     -     -   166 |
 BAHR |     -    49    81   -53     -     -     -  -115 |
 BRMU |     -  -162   211     -     -     -     -    25 |
 CAS1 |     -   -69    82   -79     -     -     -   101 |
 CRO1 |     -   -61    90     -     -     -     -     - |
 DAV1 |     -    28     -   -39     -     -     -     - |
 DRAO |     -   -34    12   -62     -     -     -   101 |
 FAIR |     -     -   -46     -     -     -     -    45 |
 FORT |     -     -   409     -     -     -     -  -404 |
 GALA |     -    82   -41   -72     -     -     -     - |
 GRAZ |     -    45     -     -     -     -     -   -65 |
 GUAM |     -     8  -198     -     -     -     -   184 |
 HOB2 |     -   -21  -118     -     -     -     -   147 |
 KARR |     -    99     -  -139     -     -     -     - |
 KIRU |     -    62   -91     -     -     -     -     - |
 KIT3 |     -   113  -130   -25     -     -     -     - |
 KOKB |     -     -    18    93     -     -     -  -105 |
 KOUR |     -   -50    74     -     -     -     -     - |
 KWJ1 |     -     -   -64   -45     -     -     -   115 |
 MAC1 |     -     9    96   -93     -     -     -     - |
 MALI |     -     -  -326     -     -     -     -   322 |
 MATE |     -  -149     -     -     -     -     -   216 |
 MAW1 |     -   123     -  -172     -     -     -     - |
 MCM4 |     -     -   -34   -50     -     -     -    84 |
 NLIB |     -   -83     -     -     -     -     -   120 |
 NYA1 |     -   -12     -    17     -     -     -     - |
 ONSA |     -   -56   -34   -21     -     -     -   137 |
 PIE1 |     -   -89  -116     -     -     -     -   243 |
 POTS |     -    11   -17     -     -     -     -     - |
 SANT |     -     -   -47    45     -     -     -     X |
 STJO |     -   -35     -    50     -     -     -     - |
 SUTH |     -     -     -    33     -     -     -   -34 |
 THU1 |     -   -71     -     -     -     -     -   102 |
 TRO1 |     -  -169     -   237     -     -     -     - |
 TSKB |     -   117  -309     -     -     -     -   138 |
 USNO |     -   -72  -149     -     -     -     -   251 |
 USUD |     -    51   -75     -     -     -     -     - |
 VILL |     -  -115   170     -     -     -     -     - |
 WHIT |     -   -21     -    30     -     -     -     - |
 WSRT |     -   -35     -     -     -     -     -    51 |
 YELL |     -    16     6   -29     -     -     -     - |
 YSSK |     -   -96     -   135     -     -     -     - |
 ZWEN |     -     -   -29     -     -     -     -    29 |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  9054    56    77    74  6039  6828     -    71 |  288   3.34
    2 |  5085    82    62   101  4798  5523     -    61 |  288   3.39
    3 |  3466    54    69    38  4096  5495     -    82 |  288   3.65
    4 |  2637    54    33    46  4452  2793     -    40 |  288   0.94
    6 |  7908    76    75    97  8893  4872     -    63 |  288   8.21
    7 |  3812    78    69    84 10767   903     -   100 |  288   1.33
    8 |  3773    66    51    83  5453  5290     -    59 |  288   3.42
    9 |  2025    46    46    92  3604  3106     -    33 |  288   2.17
   10 |  2397   154    67   148  5880  2289     -    59 |  278   1.50
   11 |  1061    59   101    72  2204  1740     -    33 |  288   0.49
   13 |  1096    65    24   114  1996  3297     -   122 |  288   0.27
   15 |  8356    72     -    67  4530  3761     -    75 |  287   3.25
   17 |  8065    98    53   104  5389 10562     -    55 |  288   5.45
   19 | 11657    46    98    54  5783  4677     -    61 |  288   3.53
   20 |  1237    87    42    79  2237  2609     -    57 |  288   0.27
   21 |  4857   201   292   272  3460  4388     -   262 |  278   2.43
   22 |  3065   152   194    33  2848  3215     -    47 |  288   0.61
   23 |  5086    71   290   276     -     -     -     - |  276   5.46
   24 |  5733    80   148    60  3742  2119     -    25 |  288   1.88
   25 |  2141    68    44    64  2708  2783     -    42 |  288   1.73
   26 |  1346    39    29    53  2599  2604     -    58 |  288   0.65
   27 |  6287    94   124   158  6650  6321     -   168 |  288   3.30
   28 |  1766    89    58   105  1363  7001     -    92 |  288   0.69
   29 |  2343   106    65    82  1389  5553     -    76 |  288   0.88
   30 |  2327    66    79    66  1453  1734     -    35 |  288   1.23
   31 |  8002    87    58    71  5251  4753     -    88 |  288   4.44
 -----+-------------------------------------------------+--------------
 ALGO |     -    58     X    72     -     -     -    24 |  288   0.03
 AREQ |     -    34    28     -     -     -     -    35 |  288  33.65
 ARTU |     -    32     -    45     -     -     -     - |  282  15.68
 ASC1 |     -    98   148    84     -     -     -    35 |  234    >>>
 AUCK |     -    98    96     -     -     -     -    60 |  288  23.20
 BAHR |     -    95   113    73     -     -     -   327 |  277   0.80
 BRMU |     -    28    29     -     -     -     -    36 |  288  19.04
 CAS1 |     -    41    73   114     -     -     -    24 |  288   9.90
 CRO1 |     -    40    59     -     -     -     -     - |  272   0.22
 DAV1 |     -    38     -    54     -     -     -     - |  286  13.97
 DRAO |     -    38    27    28     -     -     -    24 |  288   0.04
 FAIR |     -     -   129     -     -     -     -   128 |  214   0.15
 FORT |     -     -    82     -     -     -     -    81 |  185   0.10
 GALA |     -    55    31    53     -     -     -     - |  288  28.31
 GRAZ |     -    62     -     -     -     -     -    90 |  278  62.37
 GUAM |     -   106   104     -     -     -     -   207 |  287  29.40
 HOB2 |     -    40    39     -     -     -     -    35 |  288   0.11
 KARR |     -   100     -   140     -     -     -     - |  287  87.97
 KIRU |     -    51    75     -     -     -     -     - |  280   1.35
 KIT3 |     -    43    24    47     -     -     -     - |  288  23.38
 KOKB |     -     -   234   191     -     -     -   297 |  280   0.54
 KOUR |     -    31    45     -     -     -     -     - |  287   1.87
 KWJ1 |     -     -   151   117     -     -     -   226 |  239  66.96
 MAC1 |     -   102   219   134     -     -     -     - |  275  12.73
 MALI |     -     -   184     -     -     -     -   182 |  189    >>>
 MATE |     -   214     -     -     -     -     -   311 |  271   0.21
 MAW1 |     -    57     -    80     -     -     -     - |  287  29.93
 MCM4 |     -     -   255   287     -     -     -   113 |  287  15.21
 NLIB |     -    36     -     -     -     -     -    53 |  272   0.04
 NYA1 |     -    39     -    55     -     -     -     - |  287   0.10
 ONSA |     -    80    41    22     -     -     -    81 |  288  12.44
 PIE1 |     -    60    53     -     -     -     -    38 |  288   0.07
 POTS |     -    23    34     -     -     -     -     - |  286  15.54
 SANT |     -     -   175   167     -     -     -     X |  209  25.88
 STJO |     -    19     -    27     -     -     -     - |  287   2.62
 SUTH |     -     -     -    26     -     -     -    27 |  288  41.59
 THU1 |     -    55     -     -     -     -     -    80 |  286  14.16
 TRO1 |     -    26     -    37     -     -     -     - |  287  11.76
 TSKB |     -    52    74     -     -     -     -    41 |  288   1.60
 USNO |     -    57    58     -     -     -     -    33 |  288   0.03
 USUD |     -    57    83     -     -     -     -     - |  286   0.48
 VILL |     -    58    85     -     -     -     -     - |  287   3.81
 WHIT |     -    24     -    33     -     -     -     - |  287  19.68
 WSRT |     -    66     -     -     -     -     -    95 |  287   0.06
 YELL |     -    51    35    43     -     -     -     - |  288   0.03
 YSSK |     -    24     -    34     -     -     -     - |  279  17.91
 ZWEN |     -     -    67     -     -     -     -    66 |  153    >>>
 -----+-------------------------------------------------+--------------
 TOT  |  5229    77   110   107  4838  4646     -   113 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

