GMT Sep 27 11:40

244˚ 30' 244˚ 36' 244˚ 42' 244˚ 48' 244˚ 54' 245˚ 00'

32˚ 18'

32˚ 24'

32˚ 30'

32˚ 36'

relative NOAM

CD14

LACH

LN11

BG51

CG09

ASA1

LPUR

50 mm/yr