
 cls-file Version 2.0
 GPS week: 2151   Day: 4   MJD: 59305                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 cod |  2880     0 152598    353    -774     385      6      4      7     78     65     93   25.23
 emr |  2880     0 110490   1094  201400    1439     16     15     17    101    102     92    7.59
 esa |  2880     0 125101    907   -1165     469      7      7      9     90     85    102   20.87
 gfz |  2880     0 137373    238    -233      -9     11     11     12     71     65     81   12.36
 grg |  2880     0 119429    316     -38    -142      8      7     11     99     84    134   17.06
 jpl |  2880     0 107592     89     107    1504      8      7     11     70     70     72   16.89
 mit |  2880     0  96191     85     550    1746     29     30     19   1767   1549   3547    0.00
 igr |   288     0  44834      7    1364    1780     10     13     10     79     67     82    0.00
 ngs |    96     0   2976      0    -842     417    890    890      0   1695   1695      0    0.00
 sio |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   grg   jpl   mit   igr   ngs   sio |
 -----+-------------------------------------------------------------+
    1 |   -35   -54   -30    28     5    89 -1820    22  2142     - |
    2 |    64   144   -48    43  -156    25  1880   -31  -534     - |
    3 |  -131    86   112    -6    50   -27 -1584     2   467     - |
    4 |    48  -232    54   -13   -35    10  -779    13 -2184     - |
    5 |    95    78  -104    -3    72  -120 -1680   -71   750     - |
    6 |   -44    16    97   152   -61  -110 -1961   -16     4     - |
    7 |    28   -29   -26    -3   -65    70  -578    27  -678     - |
    8 |   -15   -66   157    96    -6  -206   122     3 -1983     - |
   10 |   -70    -2   107   -46   -48    55  -534    69  1885     - |
   11 |   -29    79     -    70   -29   -15  1063    39  1155     - |
   12 |   -14   -22    46  -102   141   -95  -941   -20  -526     - |
   13 |   -27   101    43   -88   -57    62  -490    39   273     - |
   14 |   -42  -214   -29    27   144    28  -767    -9 -2403     - |
   15 |   100    73  -125   -87    74   -38 -1599   -48  -441     - |
   16 |     1    76     3     3   -98    58  1720   -15    31     - |
   17 |    77    55  -125    83   -52     7  -761   -28  2718     - |
   18 |    86  -208    25   -73   -76    63 -1117    47 -2112     - |
   19 |    32   140   -98    25   -62    55  3201   -58  -310     - |
   20 |    11    61   -57    -5    69   -38  2768   -93   990     - |
   21 |   -44    11   -86    21   107    43  2643  -123  -184     - |
   22 |   -23    73   -19    39   -76    74  3488  -126 -1217     - |
   23 |    32  -211    12   -55    75    -3  -954    28 -2394     - |
   24 |   -39   103  -119   -57   156    44 -1421    66  -485     - |
   25 |   -32    -7    21    85  -113    76   879    23   111     - |
   26 |   -49     2   102   -31    18   -50    97    70   522     - |
   27 |   -47   -72    16    21   109   -44   141    10   439     - |
   28 |   -71    39    42    17    46   -23  1133   -76  2565     - |
   29 |   159   -22   -55   -63  -144    32 -1130   -11 -1135     - |
   30 |   -29    70    -3    -9    10    13  1121    97  -598     - |
   31 |    66   -38   -17   -69   -11     2  -910    78  3013     - |
   32 |   -60   -28   105     1    10   -39 -1233    92   118     - |
 -----+-------------------------------------------------------------+
 ABMF |   -39     -     -    19    94   -51     -   -23     -     - |
 ABPO |   -31     -     -    64     -     -     -  -105     -     - |
 ALBH |   -12   -37     -    71     -   -17     -    66     -     - |
 ALGO |   -25     3     -    49     -     - -4874    52     -     - |
 ALIC |   -93     -   123   -38    16     -     -     2     -     - |
 ANTC |   -11     -     -     -     -    16     -     -     -     - |
 AREG |  -133     -    53     -   132     -     -   -42     -     - |
 AREQ |   -44    51     -    58     -     -     -  -125     -     - |
 ARTU |   -49     -     -     -   107   -34     -   -23     -     - |
 ASCG |  -253     -   295     -     -    15     -    99     -     - |
 ASPA |  -120     -    97    87     -     -     -     -     -     - |
 AUCK |  -157     -    95   160     -     -     -     -     -     - |
 BADG |   -18    61     -     -     -     -     -     -     -     - |
 BAKE |  -102     -    77    82   -21    18     -     -     -     - |
 BJFS |  -141     -    46    24   121    14     -   -94     -     - |
 BOGT |   -22     -    80    37  -100     8     -   -66     -     - |
 BOR1 |   -39    42     -    54     -     -     -   -52     -     - |
 BRAZ |   -54     -    22    72     -     -     -     -     -     - |
 BREW |   -11    37     -     -     -     - -4342     -     -     - |
 BRST |   -46     -     2     -    66     -     -  -122     -     - |
 BRUX |    28     -     -     9   -47     - -4282   -18     -     - |
 CAS1 |   -83     -    55     -    40    19     -   -63     -     - |
 CCJ2 |  -205     -    -6   -36   337     -     -     -     -     - |
 CEBR |     -  -105    38     -     -     -     -    -2     -     - |
 CEDU |  -155     -   357  -285     -     -     -     -     -     - |
 CHAN |     -   -19     -    12     -     -     -     -     -     - |
 CHOF |    66     -     -     -   -98     -     -    39     -     - |
 CHPG |  -150     -     -     -   221     -     -     -     -     - |
 CHPI |  -103     -     -    42     -   123     -    79     -     - |
 CHTI |   -63     -     -   203   -53     -     -    11     -     - |
 CHUR |   -52    -6    30    60     -     -     -    12     -     - |
 CKIS |  -217     -    99     -    97   105     -     -     -     - |
 CNMR |  -124     -     -   -63     -   231     -    47     -     - |
 CORD |   -26     -     -    52     -     -     -     -     -     - |
 CPVG |  -225     -    40     -   362   -79     -  -109     -     - |
 CRO1 |    -9    -5    13     -     -     -     -     -     -     - |
 CUSV |     -     -    73  -101     -   -16     -    12     -     - |
 DAEJ |   -35    61     -   -25    43     -     -     -     -     - |
 DARW |   -94     -   -45  -118   304   -26     -   -60     -     - |
 DAV1 |     1     -   -65    40   101   -53     -   -24     -     - |
 DGAR |  -115     -   139    40     5   -34     -   -59     -     - |
 DJIG |     -     -    21     -   -28     2     -   -30     -     - |
 DLF1 |   -43     -     -     -    63     -     -     -     -     - |
 DRAO |    72     X  -206   199     -     -     -   116     -     - |
 DUBO |  -100     -     X     -   148     -     -     -     -     - |
 FAA1 |  -107     -    52   -25    31    83     -  -158     -     - |
 FAIR |   -91    62     -   -41   137     -     -  -162     -     - |
 FALK |     -     -    30   -51     -     -     -   -81     -     - |
 FLIN |  -170     -   115   -60   154     -     -   -77     -     - |
 GAMB |     -     -   125     -     -  -155     -   -94     -     - |
 GCGO |     -     -    -3     5     -     -     -   -72     -     - |
 GLPS |   -46     -    15    32   -11    38     -    41     -     - |
 GLSV |    40     -    63    31  -159     -     -     -     -     - |
 GMSD |   -72     -    -5     -   113     -     -     -     -     - |
 GODE |   -37   -24    37    37    -6     -     -     4     -     - |
 GOL2 |    -9    31     -     -     -     -     -   -16     -     - |
 GOLD |   -40     -    17    52     -     - -2808     -     -     - |
 GOP6 |   -25     -     -    52     -     -     -     -     -     - |
 GOPE |   -75     -     -   152     -     -     -    60     -     - |
 GRAC |    11     -     -   -22     -     -     -     -     -     - |
 GRAS |   -98     -    86    55     -     -     -     -     -     - |
 GRAZ |   -68    46    88   -45     -     -     -     -     -     - |
 GUAM |   -34     -     -    69     -     -     -     -     -     - |
 GUUG |     -     -    31   -53     -     -     -     -     -     - |
 HARB |  -123    22     X    63    93     -     -   -50     -     - |
 HERS |   -67   -13   149  -106     -     -     -  -117     -     - |
 HERT |    48     -   -58     -     -     -     -     -     -     - |
 HLFX |     8   -25     -     -     -     -     -     -     -     - |
 HNLC |   -52     -     -   105     -     -     -     -     -     - |
 HOB2 |   -28    28   -37    42    43     3     -   -28     -     - |
 HOFN |  -100     -    86   -55    82     -     -   -50     -     - |
 HOLB |   -38     -     -    42    25     -     -   -18     -     - |
 HRAG |  -141     -     -     -   208     -     -     -     -     - |
 HRAO |    51   -38     -   -63   -13     -     -    -5     -     - |
 IENG |    14  -215     -   102     -     -     -    79     -     - |
 IISC |  -161     -   189   102     -   -67     -   -18     -     - |
 INVK |    19     -     -    -5   -25     -     -     -     -     - |
 IQAL |   -58     -    71     -     -     -     -     -     -     - |
 IRKJ |   -51   -38   -45    21   132     -   -50     -     -     - |
 ISBA |    15     -     -     -     -   -22     -     -     -     - |
 JFNG |  -100     -   120     -     -     -     -     -     -     - |
 JOG2 |  -100     -     -   151    38     -     -     -     -     - |
 JOZ2 |   -85     -   103     -     -     -     -     -     -     - |
 JOZE |   -30    18     -    50     -     -     -     -     -     - |
 JPLM |     -   -77     -    47     -     -     -     -     -     - |
 KARR |  -154     -   125   -38   190   -88     -   -50     -     - |
 KERG |    17     6   107    28     -  -180     -     -     -     - |
 KIR8 |   -68     -     -   138     -     -     -     -     -     - |
 KIRI |   -70     -     -     -     -   104     -   119     -     - |
 KIRU |    -1  -175     9   -33    93     -     -   -77     -     - |
 KIT3 |  -166     -   102   -36    72    75     -     -     -     - |
 KOKB |  -102    17     -   117     -    59 -4848   -70     -     - |
 KOKV |   -66     -    49    53     -     - -2558   -92     -     - |
 KOUG |  -101     -     -     -   149     - -4766    11     -     - |
 KOUR |   -50     -    30    52     -     - -3975   -19     -     - |
 KRGG |  -163     -     -   -37   267     -     -   -47     -     - |
 LAUT |    -7     -    52     -     -   -52     -   -12     -     - |
 LHAZ |   -89     -    54   -70   107    10     -   -51     -     - |
 LPGS |    -8    75   -35   127   -60     -     -     -     -     - |
 LROC |     -     -     -   -54     -    39     -     -     -     - |
 MAC1 |  -165     -    -5   112   170     -     -   -21     -     - |
 MAG0 |   -12     -     -    25     -     -     -     -     -     - |
 MAJU |    39     -   -42     -    -7     -     -     -     -     - |
 MAL2 |  -100     -   113    62   -35     -     -   -64     -     - |
 MANA |   -33     -     -    68     -     -     -     -     -     - |
 MAR6 |   -19   -54    42     -     -     -     -     -     -     - |
 MAR7 |   -24     -     -    48     -     -     -     -     -     - |
 MAS1 |  -170  -122    26   -65   327    -7     -  -151     -     - |
 MATE |     6   -33   -28    57     -     -     -   146     -     - |
 MAUI |   -23     -     -     -    34     -     -     -     -     - |
 MAW1 |    40     -  -112    41    47     -     -  -107     -     - |
 MAYG |  -160     -   194     -     -     -     -     -     -     - |
 MBAR |     -     -    36     6     -   -50     -    23     -     - |
 MCIL |  -242     -   232    62     -    30     -     -     -     - |
 MCM4 |   -36    60    30    15   -21     0     -   -33     -     - |
 MDO1 |   -66    27    87     -     -   -21     -    74     -     - |
 MEDI |   121  -402     -     -     -     -    74     -     -     - |
 METG |   -47     -     -     -    69     -     -     -     -     - |
 MGUE |   -89     -   194     -  -100     -     -    27     -     - |
 MIZU |    29   -46     -   -31     -     -     -     -     -     - |
 MKEA |   -74     -    65    40     -     - -3961   -18     -     - |
 MOBS |   -39     -    20     -    33     -     -     -     -     - |
 MONP |  -112     -   135     -     -     -     -     -     -     - |
 MORP |  -146     -     -   299     -     -     -     -     -     - |
 MQZG |   -44     -    54     -     -     -     -     -     -     - |
 NANO |   -38     -    -9    93     -     -     -     -     -     - |
 NICO |   -82     -    37   -30    98     -     -    -9     -     - |
 NIST |    28     X     -   -57     -     -     -    20     -     - |
 NKLG |   -25     -    50    -7   -33    14     -   -44     -     - |
 NLIB |  -172  -336     4   120   313     - -5689    27     -     - |
 NNOR |   -98    51    74     -    32     -     -     -     -     - |
 NOVM |   -81    76     -   125     -     -     -  -179     -     - |
 NRC1 |   -14   -39     -    53     -     - -2530    99     -     - |
 NRIL |   -61     -    -4   -14   133   -28     -    -8     -     - |
 NTUS |     2     -     -    -4     -     -     -   124     -     - |
 NYA1 |   -12     -    23   -13     -     -     -     -     -     - |
 NYA2 |   131     -     -   -69  -143     -     -    13     -     - |
 NYAL |   -32   -27     -    81     -     -   -44     -     -     - |
 OHI2 |  -169     -   188    27     -     - -3301    97     -     - |
 OHI3 |   -34     -   155     -  -149     9     -     -     -     - |
 ONS1 |  -189     -     -     -   279     -     -     -     -     - |
 ONSA |   -51   -15    32    60     -     - -4033   -26     -     - |
 OPMT |   -64     -     -   130     -     -     -     -     -     - |
 OUS2 |   -40     -    31    68     7   -34     -   -42     -     - |
 OWMG |     -     -    68     -     -   -84     -     -     -     - |
 PADO |  -125     -     -     -   184     -     -     -     -     - |
 PALM |     -     -     -   -73    53     -     -     -     -     - |
 PARC |  -177     -    84    55    -8   128     -     -     -     - |
 PARK |   -20    66     -     -     -     -     -     -     -     - |
 PERT |   -95    67    85    12     -     -     -    -3     -     - |
 PETS |   -51     -    -5     -     -    85     -  -144     -     - |
 PIE1 |   -90   -18     -    35   115     -  -646   -52     -     - |
 PIMO |  -139     -     -   -27   225     -     -   -14     -     - |
 PNGM |     -     -    30     -     -   -37     -   -97     -     - |
 POL2 |    12     -     -   -24     -     -     -    35     -     - |
 POLV |    14     -     -   -29     -     -     -     -     -     - |
 POTS |   125     -  -161    16     -     -     -    96     -     - |
 POVE |   -71     -    46    67     -     -     -     -     -     - |
 PRDS |     5     3     -   -11     -     -  -749     7     -     - |
 PTBB |   -17    15     X    25     -     -     -     -     -     - |
 PTGG |     -     -   -19     -     -    24     -     -     -     - |
 QAQ1 |    45   -51   -29   -13     -     -     -   -45     -     - |
 QUIN |   -48     -    58     -     -     -     -     -     -     - |
 RABT |   -21     -     -    43     -     -     -     -     -     - |
 RAEG |     -   -17     -     -     -     8     -     -     -     - |
 RAMO |   -31     -    38     -     -     -     -     -     -     - |
 REUN |   -65     -    81    -4     -     -     -   -32     -     - |
 REYK |   -74     -     -   -68   159     -     -   -33     -     - |
 RGDG |  -172     -     -     -   255     -     -    51     -     - |
 RIO2 |     4     -     -    -9     -     -     -  -115     -     - |
 RIOP |   -15     -     -    30     -     -     -     -     -     - |
 SALU |  -120     -    35    66     -    90     -     -     -     - |
 SANT |   -35     -     -    71     -     -     -   -40     -     - |
 SAVO |  -125     -    74   131     -     -     -     -     -     - |
 SCH2 |   -28    81   -26    30     -    16     -   -54     -     - |
 SCOR |   -69     -    22    53    88   -53     -     -     -     - |
 SCRZ |    -2     -     -     -     3     -     -     -     -     - |
 SCUB |    53     -   -86   -18    40     -     -     1     -     - |
 SEYG |  -101     -    42     -   167   -70     -  -140     -     - |
 SFER |     3   -95   -35   -54   119     -     -   -17     -     - |
 SGOC |    61     -     -    45  -123     -     -     -     -     - |
 SHAO |   -41     -     -    83     -     -     -     -     -     - |
 SOFI |   -51     -    76   -24     -     -     -    35     -     - |
 SPT0 |   -31    16     -    53     -     - -6067    15     -     - |
 SSIA |  -106     -    42   -75   145    15     -   -41     -     - |
 STFU |   -74     -     -     -   109     -     -   -17     -     - |
 STHL |  -136     -    89    96     -    24     -    35     -     - |
 STJO |    27    41     -   153   -99   -71     -    73     -     - |
 STK2 |  -155     -     -     -   229     -     -     -     -     - |
 STR1 |     -   -36     -     -    16     -     -     -     -     - |
 SUTH |  -110     -    63    57    43     -     -   -37     -     - |
 SUTM |   -54    49     -    81     X     -     -     -     -     - |
 SUWN |   -90    57     -   148     -     -     -     -     -     - |
 SVTL |     -   -44    -7     -    29     - -1570   142     -     - |
 SYOG |  -262     -   254    -8   109   -27     -   -94     -     - |
 TASH |   -47     -     -    40    40     -     -   -46     -     - |
 TEHN |   -10     -    43   -51    -1     -     -     -     -     - |
 THTI |    26  -105    20   -22     -     -     -     -     -     - |
 THU2 |   -31     -    15    39     -     -     -   -71     -     - |
 TIDB |   -26    50     -    23     -     -     -    78     -     - |
 TIXI |     X     -   -50     -   125   -69     -   -88     -     - |
 TLSE |  -145    16    49    -3   151     -     -     -     -     - |
 TONG |   -88     -     -     -   130     -     -  -105     -     - |
 TOW2 |   -72     -   112   -52     8     0     -    -6     -     - |
 TRO1 |  -137     -    92    -9    97     -     -     -     -     - |
 TSKB |   -89    98     -   123     -     -     -  -341     -     - |
 TWTF |   -12    54     -    39   -34     -     -   -38     -     - |
 UCAL |   -78     -     -     -   115     -     -     -     -     - |
 UFPR |   -23     -    30    -5     -     -     -     -     -     - |
 ULAB |   177     -  -227   106   -61     -     -     -     -     - |
 UNB3 |   -10     -    98     -  -105     -     -     -     -     - |
 UNSA |  -121     -    77    -1     -    86     -    32     -     - |
 URUM |   113     -  -179     2     -    51     -   -29     -     - |
 USN7 |   -77    57     -   121     -     -     -    14     -     - |
 USUD |   -26    43     -    30     -     - -4624     -     -     - |
 VILL |   -33    18    30    55   -35     -     -   -46     -     - |
 VIS0 |   -35     -     -    72     -     -     -     -     -     - |
 VOIM |   -54     -   105    96  -171    53     -     -     -     - |
 WARK |  -208    85     -     -   269     -     -   100     -     - |
 WES2 |   -41    93     -    27     -     -     -  -134     -     - |
 WHIT |  -122   -25    60    52     -    80     -    46     -     - |
 WILL |   -51    49     -    74     -     -     -     -     -     - |
 WIND |    13     -   -87    20    73     -     -     9     -     - |
 WSRT |   -17   -54     -    68     -     -     -    23     -     - |
 WTZ3 |   -24     -     -    50     -     -     -     -     -     - |
 WTZR |    19     -    25   -81     -     -  -124   -53     -     - |
 WTZS |   -58     -     -   119     -     -     -     -     -     - |
 WUH2 |    19     -     -   -89    32     -     -     -     -     - |
 XMIS |  -161     -   128   -42     -   111     -    -3     -     - |
 YAKT |   -90     -   108     -     -     -     -     -     -     - |
 YAR2 |   -66   220     -     -     -     -     -     -     -     - |
 YARR |   -69     -     -     -   101     -     -     -     -     - |
 YEL2 |   -64     -    78     -     -     - -4488     -     -     - |
 YELL |    40    15     -    56  -107     -     -   130     -     - |
 YSSK |   -72     -    31     -     -    69     -    36     -     - |
 ZAMB |     1     -   -18   -38     -    48     -   -20     -     - |
 ZECK |   -60     5    26    76     -     - -1840   -12     -     - |
 ZIM2 |  -111     -   134     -     -     -     -     -     -     - |
 ZIMM |   -79     -     -   161     -     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   grg   jpl   mit   igr   ngs   sio | NEPO    RMS
 -----+-------------------------------------------------------------+-------------
    1 |     5    12     5    16     8     6    30     6   590     - | 2880    438
    2 |     6    16     9     9     7     7    45    22   652     - | 2880    252
    3 |     4    13    11    15     6     6    11    10   245     - | 2880    186
    4 |     6    13     7    21     8     7    25    16   359     - | 2880    155
    5 |     5    15     7     8     8     6    18     7   483     - | 2880    368
    6 |     5    19     5    10     6     6    48    15   325     - | 2880    172
    7 |     5    17     7    13     6     8    19    15   812     - | 2880    633
    8 |     4    14     5     6     7     8    29     8  2063     - | 2880   1006
   10 |     5    11    10     7     6    10    19     6   690     - | 2880    113
   11 |     4    13     -    13     8    10    68    31   396     - | 2880    352
   12 |     4    16     9     9     7     6    25     9   514     - | 2880    378
   13 |     5    18     5    11     8     7    19     9   636     - | 2880    336
   14 |     4    14     5    13     6     6    22    19   267     - | 2880    264
   15 |     4    14     5     9     7     7    16     9   361     - | 2880    293
   16 |     6    17     8    13    10     6    26     6   496     - | 2880    350
   17 |     5    16     5    12     7     7    20    24  2428     - | 2880    441
   18 |     5    20    10    10     7     7    18    17   476     - | 2880    249
   19 |     6    19     5    13     6     8    26    13   491     - | 2880    222
   20 |     4    18     6     9     5     7    26     6   465     - | 2880    243
   21 |     6    14     6    13     9     6    67    12   472     - | 2880    420
   22 |     4    13     6    11     6     5    16     7   414     - | 2880    320
   23 |     5    16     6     8     5     7    27     5   984     - | 2880    184
   24 |     4    12     5     9     7     6    19     9  1642     - | 2880   1476
   25 |     5    18     7     9     6     6    21    13   213     - | 2880    169
   26 |     5    17     8    12     9     7    22    13   386     - | 2880    111
   27 |     4    17     6    15     9     7    35    13   298     - | 2880    222
   28 |     4    16     5    10     6     6    15    11  1906     - | 2880    413
   29 |     5    20     9     8     7     7    34    16   489     - | 2880    379
   30 |     5    16     5    11     7     7    20    17   422     - | 2880    220
   31 |     5    14     7     5     6     6    32     8  1343     - | 2880    287
   32 |     5    11    10     6     7    11    27     8   314     - | 2880    208
 -----+-------------------------------------------------------------+-------------
 ABMF |    10     -     -    18    15    13     -     9     -     - |  288   2992
 ABPO |     6     -     -    13     -     -     -     9     -     - |  288   1948
 ALBH |    13    24     -    15     -    11     -    22     -     - |  288 172645
 ALGO |     5    11     -    13     -     -    14     9     -     - |  288     23
 ALIC |     5     -     7     8     9     -     -     5     -     - |  288   2488
 ANTC |     6     -     -     -     -     9     -     -     -     - |  288   5346
 AREG |     8     -     9     -     9     -     -    13     -     - |  288   5750
 AREQ |     5    11     -    13     -     -     -     8     -     - |  288   5735
 ARTU |     5     -     -     -     7     5     -     7     -     - |  288    >>>
 ASCG |     7     -     8     -     -    11     -     6     -     - |  288   7098
 ASPA |    13     -    15    22     -     -     -     -     -     - |  287   6152
 AUCK |    14     -    12    18     -     -     -     -     -     - |  288   3389
 BADG |     5    18     -     -     -     -     -     -     -     - |  288     35
 BAKE |     7     -     6    10    11    15     -     -     -     - |  288   2272
 BJFS |     6     -     7     9    11     6     -    11     -     - |  288   3119
 BOGT |     8     -     9    12    15     9     -     6     -     - |  288   6675
 BOR1 |     8    24     -    12     -     -     -    14     -     - |  288   4400
 BRAZ |    11     -    10    18     -     -     -     -     -     - |  288   6459
 BREW |     7    24     -     -     -     -    14     -     -     - |  288     33
 BRST |     8     -    10     -    14     -     -    10     -     - |  288   1124
 BRUX |     5     -     -     7     8     -    10     7     -     - |  288     15
 CAS1 |     6     -    10     -    11    19     -     7     -     - |  288    >>>
 CCJ2 |    10     -    10    15    11     -     -     -     -     - |  288   2989
 CEBR |     -    20     7     -     -     -     -    20     -     - |  288     20
 CEDU |     4     -     5     8     -     -     -     -     -     - |  288   2176
 CHAN |     -    14     -     8     -     -     -     -     -     - |  288     74
 CHOF |     5     -     -     -     7     -     -    10     -     - |  288    >>>
 CHPG |     7     -     -     -    10     -     -     -     -     - |  288   8316
 CHPI |     7     -     -    12     -     8     -     7     -     - |  288   2339
 CHTI |     9     -     -    17    12     -     -    13     -     - |  288   3275
 CHUR |     6    13     6     8     -     -     -     7     -     - |  288   2110
 CKIS |     9     -    12     -    13    14     -     -     -     - |  288   6430
 CNMR |     8     -     -    19     -    15     -    10     -     - |  288   7722
 CORD |     5     -     -     9     -     -     -     -     -     - |  288   5842
 CPVG |     5     -     9     -    10     7     -     6     -     - |  288  13467
 CRO1 |     9    17    10     -     -     -     -     -     -     - |  288     28
 CUSV |     -     -     8    13     -    14     -     4     -     - |  288   6654
 DAEJ |     6     8     -    10     9     -     -     -     -     - |  288   2139
 DARW |    14     -    13    18    10    10     -     7     -     - |  288   2570
 DAV1 |     5     -     9     8    11    17     -     5     -     - |  288   2177
 DGAR |     7     -    12    13    18    14     -     6     -     - |  288   1752
 DJIG |     -     -     8     -    11     6     -     8     -     - |  288   3449
 DLF1 |     5     -     -     -     7     -     -     -     -     - |  288   1200
 DRAO |     7     X     9     8     -     -     -    10     -     - |  218 199405
 DUBO |     6     -     X     -     8     -     -     -     -     - |  287    >>>
 FAA1 |    12     -    11    17    13    16     -    15     -     - |  288  15248
 FAIR |     5    11     -    10     9     -     -     8     -     - |  288   4560
 FALK |     -     -     5     8     -     -     -     9     -     - |  288   2542
 FLIN |     5     -     4     8    11     -     -     6     -     - |  288 139104
 GAMB |     -     -    13     -     -    16     -    13     -     - |  218   5798
 GCGO |     -     -     4     7     -     -     -    12     -     - |  288   4380
 GLPS |     9     -     7    11    16     8     -     6     -     - |  288   6639
 GLSV |     6     -     6     7     8     -     -     -     -     - |  288   5147
 GMSD |    13     -    14     -    18     -     -     -     -     - |  288   2178
 GODE |     6    21     7    17    15     -     -     5     -     - |  288     46
 GOL2 |     7    25     -     -     -     -     -     7     -     - |  266    106
 GOLD |     5     -     5    14     -     -    17     -     -     - |  288     58
 GOP6 |     5     -     -    11     -     -     -     -     -     - |  288   3829
 GOPE |     6     -     -    12     -     -     -     7     -     - |  288     38
 GRAC |     3     -     -     7     -     -     -     -     -     - |  288   6400
 GRAS |     4     -     5     7     -     -     -     -     -     - |  288   1145
 GRAZ |     7    19     8    12     -     -     -     -     -     - |  288   4292
 GUAM |     9     -     -    19     -     -     -     -     -     - |  275   8580
 GUUG |     -     -     9    16     -     -     -     -     -     - |  285   7175
 HARB |    31    40     X    22    16     -     -    23     -     - |  288   2405
 HERS |     6    14     5     6     -     -     -     9     -     - |  288     27
 HERT |     5     -     6     -     -     -     -     -     -     - |  288   4016
 HLFX |     4    15     -     -     -     -     -     -     -     - |  288   6507
 HNLC |     8     -     -    17     -     -     -     -     -     - |  287   3629
 HOB2 |    11    26    14    17    17    11     -     7     -     - |  288   1542
 HOFN |     7     -     7    10    10     -     -     7     -     - |  288   3115
 HOLB |     6     -     -    16    16     -     -     8     -     - |  288   2884
 HRAG |     7     -     -     -    11     -     -     -     -     - |  288   2611
 HRAO |    10    19     -    15    10     -     -    12     -     - |  288     36
 IENG |     6    22     -     9     -     -     -     9     -     - |  288     49
 IISC |     7     -     8    14     -    12     -     5     -     - |  288   3233
 INVK |     4     -     -    10     6     -     -     -     -     - |  288   3386
 IQAL |     8     -     9     -     -     -     -     -     -     - |  288   2606
 IRKJ |     4     7     7     9     8     -    13     -     -     - |  288    101
 ISBA |     5     -     -     -     -     7     -     -     -     - |  288   4392
 JFNG |     4     -     5     -     -     -     -     -     -     - |  288   2206
 JOG2 |    13     -     -    20    16     -     -     -     -     - |  287   8341
 JOZ2 |     6     -     7     -     -     -     -     -     -     - |  288   4675
 JOZE |     6    17     -     9     -     -     -     -     -     - |  288   3661
 JPLM |     -    11     -     7     -     -     -     -     -     - |  288   5835
 KARR |     8     -    11    14    16    11     -     6     -     - |  288   4233
 KERG |    13    22    14    20     -    15     -     -     -     - |  288   2484
 KIR8 |     4     -     -     7     -     -     -     -     -     - |  288   1356
 KIRI |     8     -     -     -     -    12     -    10     -     - |  288   6494
 KIRU |     7    29     6     7     9     -     -     7     -     - |  288   2503
 KIT3 |     6     -     6    11    10     8     -     -     -     - |  288   5253
 KOKB |    10    21     -    14     -    10    17     8     -     - |  288    229
 KOKV |     8     -     9    17     -     -    21     8     -     - |  288    235
 KOUG |     7     -     -     -    11     -    23    13     -     - |  288    960
 KOUR |    10     -    10    15     -     -    29    20     -     - |  288     25
 KRGG |    12     -     -    19    17     -     -    11     -     - |  288   3740
 LAUT |    14     -    16     -     -    12     -    13     -     - |  287   2420
 LHAZ |     6     -     9    11    11     8     -     6     -     - |  288   7507
 LPGS |    16    22    21    20    20     -     -     -     -     - |  288   7869
 LROC |     -     -     -    10     -     7     -     -     -     - |  288   6166
 MAC1 |     8     -     8    12    14     -     -     5     -     - |  288   1982
 MAG0 |     5     -     -    10     -     -     -     -     -     - |  124   6507
 MAJU |    16     -    16     -    17     -     -     -     -     - |  288   4692
 MAL2 |    14     -    12    20    19     -     -    13     -     - |  288  15076
 MANA |     9     -     -    19     -     -     -     -     -     - |  287   8109
 MAR6 |     5    14     5     -     -     -     -     -     -     - |  288   2858
 MAR7 |     3     -     -     7     -     -     -     -     -     - |  288   1114
 MAS1 |     5    12     7    10    11    10     -     8     -     - |  288   3317
 MATE |     5    18     6     8     -     -     -     7     -     - |  288     77
 MAUI |     6     -     -     -     9     -     -     -     -     - |  288    >>>
 MAW1 |     7     -     8     6    11     -     -    10     -     - |  288   2436
 MAYG |    10     -    12     -     -     -     -     -     -     - |  288   6894
 MBAR |     -     -    11    16     -    13     -     7     -     - |  288   4907
 MCIL |    15     -    13    17     -    10     -     -     -     - |  288   6784
 MCM4 |     6    11    12    12    11    27     -    10     -     - |  288   3433
 MDO1 |     5     9     6     -     -     7     -     5     -     - |  288   2333
 MEDI |     5    16     -     -     -     -    16     -     -     - |  288     27
 METG |     4     -     -     -     7     -     -     -     -     - |  288   3145
 MGUE |     8     -    13     -     9     -     -    16     -     - |  288     23
 MIZU |     5    19     -     6     -     -     -     -     -     - |  288   3020
 MKEA |     9     -     9    14     -     -    30    10     -     - |  288     60
 MOBS |     4     -     7     -    10     -     -     -     -     - |  288  87380
 MONP |     5     -     6     -     -     -     -     -     -     - |  288   3551
 MORP |     8     -     -    16     -     -     -     -     -     - |  288   4072
 MQZG |     9     -    11     -     -     -     -     -     -     - |  288   3529
 NANO |     7     -     7    12     -     -     -     -     -     - |  288   2908
 NICO |     9     -     6    22    11     -     -     5     -     - |  288   6831
 NIST |     4     X     -     8     -     -     -     8     -     - |  288     19
 NKLG |    10     -    12    18    11    14     -     6     -     - |  288   3627
 NLIB |     7    15     8    12    12     -    18    13     -     - |  288     19
 NNOR |     9    22     8     -    12     -     -     -     -     - |  288    207
 NOVM |     8    27     -    10     -     -     -    19     -     - |  288     31
 NRC1 |     5    12     -    13     -     -    16     5     -     - |  288     19
 NRIL |     4     -     5    10     5     6     -     4     -     - |  288  12539
 NTUS |     6     -     -    12     -     -     -    10     -     - |  288   8260
 NYA1 |     7     -     7    16     -     -     -     -     -     - |  288   4226
 NYA2 |     4     -     -    11     7     -     -     5     -     - |  288   1856
 NYAL |     5    10     -    13     -     -    11     -     -     - |  288    298
 OHI2 |     6     -     7     8     -     -    30    11     -     - |  288    202
 OHI3 |     7     -    10     -    12    20     -     -     -     - |  288    198
 ONS1 |     5     -     -     -     7     -     -     -     -     - |  288   1038
 ONSA |     5    19     4     9     -     -    14     8     -     - |  288     25
 OPMT |     5     -     -    10     -     -     -     -     -     - |  288     37
 OUS2 |    10     -    13    18    17    10     -     8     -     - |  288   3770
 OWMG |     -     -     8     -     -    10     -     -     -     - |  288   3672
 PADO |     4     -     -     -     6     -     -     -     -     - |  288   4588
 PALM |     -     -     -    10     7     -     -     -     -     - |  288   3239
 PARC |     7     -     8    12    10     8     -     -     -     - |  288   3355
 PARK |     4    12     -     -     -     -     -     -     -     - |  288    >>>
 PERT |    11    23     7    13     -     -     -     7     -     - |  288   2933
 PETS |     9     -    13     -     -    16     -    14     -     - |  288    >>>
 PIE1 |     6    21     -    10    12     -    14    17     -     - |  288     18
 PIMO |    16     -     -    15    21     -     -    17     -     - |  288  11028
 PNGM |     -     -     9     -     -    11     -     6     -     - |  286   5286
 POL2 |     3     -     -     6     -     -     -     5     -     - |  288   5647
 POLV |     4     -     -     8     -     -     -     -     -     - |  288   7175
 POTS |     6     -     5    10     -     -     -     7     -     - |  288   5931
 POVE |     8     -     8    11     -     -     -     -     -     - |  288   5665
 PRDS |     5    14     -     9     -     -    18     9     -     - |  288     94
 PTBB |     6    16     X    11     -     -     -     -     -     - |  288     26
 PTGG |     -     -     9     -     -    11     -     -     -     - |  288   4397
 QAQ1 |     7    11     6     9     -     -     -     7     -     - |  288   2343
 QUIN |     4     -     5     -     -     -     -     -     -     - |  288   6965
 RABT |     6     -     -    12     -     -     -     -     -     - |  288   5634
 RAEG |     -     8     -     -     -     3     -     -     -     - |  288   5459
 RAMO |     6     -     7     -     -     -     -     -     -     - |  288    >>>
 REUN |    11     -    12    19     -     -     -     7     -     - |  288   2706
 REYK |     6     -     -    10    10     -     -     7     -     - |  288   2811
 RGDG |     9     -     -     -    13     -     -    10     -     - |  288   4205
 RIO2 |     6     -     -    12     -     -     -     8     -     - |  279   7729
 RIOP |     5     -     -     9     -     -     -     -     -     - |  288   5912
 SALU |    12     -    14    20     -    21     -     -     -     - |  288   4716
 SANT |     6     -     -    12     -     -     -     7     -     - |  288   2909
 SAVO |     7     -     8    12     -     -     -     -     -     - |  288   5706
 SCH2 |     5    11     6     8     -     9     -     3     -     - |  288   3858
 SCOR |     6     -     6     9    10    12     -     -     -     - |  288   2315
 SCRZ |     7     -     -     -    10     -     -     -     -     - |  288   9219
 SCUB |     9     -    10    16    11     -     -    11     -     - |  288   3731
 SEYG |     8     -    12     -    14    10     -     8     -     - |  288   4845
 SFER |    10    13     8    11    15     -     -    14     -     - |  288     39
 SGOC |    10     -     -    22    15     -     -     -     -     - |  288   7861
 SHAO |     6     -     -    13     -     -     -     -     -     - |  288   9125
 SOFI |     5     -     6    10     -     -     -     7     -     - |  288   7492
 SPT0 |     4    10     -     8     -     -    21     9     -     - |  288     21
 SSIA |    14     -    14    18    18    14     -     9     -     - |  288   6230
 STFU |     7     -     -     -    10     -     -    18     -     - |  288   3648
 STHL |     7     -     9    16     -     9     -     6     -     - |  288   7522
 STJO |     8    10     -    10    11     6     -     7     -     - |  288   6121
 STK2 |     5     -     -     -     8     -     -     -     -     - |  288   6471
 STR1 |     -    10     -     -     5     -     -     -     -     - |  288   1190
 SUTH |     9     -     8    10    13     -     -     6     -     - |  288   2188
 SUTM |     9    23     -    17     X     -     -     -     -     - |  287   4903
 SUWN |     6    19     -    10     -     -     -     -     -     - |  288   2222
 SVTL |     -    17     9     -     8     -    19     7     -     - |  288     91
 SYOG |     6     -     7     8    10    11     -     7     -     - |  288   2535
 TASH |     5     -     -     6     9     -     -     6     -     - |  288   1859
 TEHN |     7     -     8    11    11     -     -     -     -     - |  288   8376
 THTI |    13    23    14    16     -     -     -     -     -     - |  288   6550
 THU2 |     5     -     5    12     -     -     -     9     -     - |  288   2452
 TIDB |     6     6     -    13     -     -     -    16     -     - |  288     34
 TIXI |     X     -    11     -    12    21     -    13     -     - |  269    >>>
 TLSE |     5    16     7    11    12     -     -     -     -     - |  288   4832
 TONG |     9     -     -     -    14     -     -    15     -     - |  284   2824
 TOW2 |     9     -    11    15    13     8     -     6     -     - |  288   2130
 TRO1 |     5     -     5     7     8     -     -     -     -     - |  288   5527
 TSKB |     6    24     -    10     -     -     -    13     -     - |  288   5213
 TWTF |     9    17     -    16    12     -     -    10     -     - |  288     41
 UCAL |     7     -     -     -    10     -     -     -     -     - |  288   1786
 UFPR |     8     -     7    11     -     -     -     -     -     - |  288   7216
 ULAB |     5     -     9     9     9     -     -     -     -     - |  288   8173
 UNB3 |    10     -    11     -    11     -     -     -     -     - |  288   1144
 UNSA |     8     -     7    13     -     9     -     6     -     - |  288   6201
 URUM |    10     -    12    16     -     9     -     6     -     - |  288   6034
 USN7 |     7    16     -    12     -     -     -     8     -     - |  288     20
 USUD |     8    28     -     8     -     -    24     -     -     - |  288     32
 VILL |     6    16     7     9    12     -     -     7     -     - |  288   2341
 VIS0 |     7     -     -    14     -     -     -     -     -     - |  270   3531
 VOIM |     8     -    10    17    12    10     -     -     -     - |  288   5191
 WARK |     9    16     -     -    11     -     -    24     -     - |  288   3421
 WES2 |     6    17     -    15     -     -     -    11     -     - |  288    990
 WHIT |     7    10     5    11     -     8     -     4     -     - |  288  53183
 WILL |     4     8     -    10     -     -     -     -     -     - |  288   5614
 WIND |    10     -    11    14    16     -     -     6     -     - |  288   3970
 WSRT |     7    27     -    11     -     -     -    15     -     - |  288   3807
 WTZ3 |     5     -     -    11     -     -     -     -     -     - |  288   4547
 WTZR |     6     -     6     8     -     -    20     6     -     - |  288     18
 WTZS |     4     -     -     9     -     -     -     -     -     - |  288    295
 WUH2 |    12     -     -    21    19     -     -     -     -     - |  288   8921
 XMIS |    15     -    16    23     -    16     -     8     -     - |  288   9221
 YAKT |     7     -     8     -     -     -     -     -     -     - |  288    >>>
 YAR2 |     5    17     -     -     -     -     -     -     -     - |  287    >>>
 YARR |     8     -     -     -    12     -     -     -     -     - |  288   1526
 YEL2 |     3     -     4     -     -     -    15     -     -     - |  288     39
 YELL |     4    24     -     9    10     -     -    10     -     - |  288     20
 YSSK |     5     -     8     -     -     6     -     5     -     - |  288    >>>
 ZAMB |     7     -    10    14     -     8     -     5     -     - |  288   3896
 ZECK |     5    17     6     7     -     -    18     7     -     - |  288     32
 ZIM2 |     4     -     5     -     -     -     -     -     -     - |  288   4900
 ZIMM |     4     -     -     8     -     -     -     -     -     - |  288   4871
 -----+-------------------------------------------------------------+-------------
 TOT  |     6    16     8    12     9     8    30    11   890     - |




CLOCK JUMP CORRECTIONS APPLIED
------------------------------

CEN | STA/SAT | EPOCH           |     JUMP(ps)
----+---------+-----------------+-------------
cod |   TIXG  | 2151-4  0:10:00 |  -527437696
cod |   TIXG  | 2151-4  0:15:00 |   472520457
cod |   TIXG  | 2151-4  0:20:00 |  -527547534
cod |   TIXG  | 2151-4  0:25:00 |   472425401
cod |   TIXG  | 2151-4  0:30:00 |   472409258
cod |   TIXG  | 2151-4  0:35:00 |  -527646894
cod |   DRAO  | 2151-4 20:40:00 |         595
esa |   DRAO  | 2151-4  8:10:00 |       -1232
esa |   DRAO  | 2151-4  8:30:00 |        1218
esa |   HARB  | 2151-4 10:45:00 |       -1286
esa |   MAW1  | 2151-4 20:05:00 |        1229
esa |   DRAO  | 2151-4 20:40:00 |       -1426
esa |   DAV1  | 2151-4 21:05:00 |         866
esa |   DAV1  | 2151-4 21:15:00 |        1286
grg |   SUTM  | 2151-4  7:00:00 |        -704



-----------------------------------------------------------------------------------------------------
-----------------------------------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN     MEAN     MEAN     MEAN   | HADAMARD DEVIATION AT TAU =  |
      | NREPO NBEPO  BRKS  USED    WGT1(%)  WGT2(%)  WGT3(%)  WGT4(%) |     300s     3600s    21600s |
------+---------------------------------------------------------------+------------------------------+
 YEL2 |   288   288     0   288     2.30     4.20     1.53     1.53   | 3.00e-14  6.47e-15  2.27e-15 |
 BREW |   288   288     0   288     3.51     4.19     4.17     4.17   | 2.08e-14  4.19e-15  2.78e-15 |
 NIST |   288   285     1   288     2.31     4.19     4.17     4.17   | 4.49e-14  5.06e-15  2.59e-15 |
 NRC1 |   288   286     1   288     3.34     4.19     3.65     3.65   | 3.05e-14  5.19e-15  3.35e-15 |
 ONSA |   288   288     0   288     4.13     4.19     3.67     3.67   | 1.79e-14  5.09e-15  3.37e-15 |
 PRDS |   288   287     1   288     2.73     4.19     2.09     2.09   | 2.80e-14  7.26e-15  7.22e-15 |
 PTBB |   288   288     0   288     3.03     4.19     4.17     4.17   | 2.93e-14  7.26e-15  3.59e-15 |
 SPT0 |   288   288     0   288     4.20     4.19     3.08     3.08   | 1.85e-14  5.20e-15  3.09e-15 |
 YELL |   288   288     0   288     2.89     4.19     3.28     3.28   | 2.51e-14  5.87e-15  2.74e-15 |
 ZECK |   288   288     0   288     2.66     4.19     0.69     0.69   | 2.89e-14  7.08e-15  1.84e-15 |
 IENG |   288   288     0   288     3.23     4.19     2.37     2.37   | 2.29e-14  6.42e-15  4.76e-15 |
 HERS |   288   288     0   288     3.22     4.19     2.57     2.57   | 1.64e-14  4.22e-15  3.23e-15 |
 MGUE |   288   286     0   288     2.66     4.19     1.93     1.93   | 2.76e-14  6.95e-15  2.44e-15 |
 CEBR |   288   287     1   288     3.38     4.19     2.10     2.10   | 2.86e-14  7.26e-15  3.10e-15 |
 OPMT |   288   285     1   288     2.23     4.18     4.17     4.17   | 4.14e-14  5.30e-15  5.18e-15 |
 TWTF |   288   283     2   288     2.11     3.87     1.82     1.82   | 5.29e-14  1.54e-14  2.81e-15 |
 HRAO |   288   285     1   288     2.08     3.77     0.65     0.65   | 4.84e-14  9.21e-15  2.41e-15 |
 OHI2 |   288   285     1   288     2.04     3.63     0.65     0.65   | 3.90e-14  1.32e-14  1.53e-14 |
 SFER |   288   288     0   288     1.92     3.24     0.84     0.84   | 4.13e-14  1.01e-14  4.67e-15 |
 KOKB |   288   288     0   288     1.70     2.51     0.41     0.41   | 3.63e-14  1.29e-14  8.74e-15 |
 KOKV |   288   288     0   288     1.69     2.48     1.49     1.49   | 3.51e-14  1.19e-14  9.54e-15 |
 KOUR |   288   288     0   288     1.54     2.07     0.96     0.96   | 5.05e-14  1.00e-14  2.36e-15 |
 PIE1 |   288   288     0   288     1.48     1.90     3.34     3.34   | 2.33e-14  3.86e-15  2.38e-15 |
 NOVM |   288   288     0   288     1.29     1.45     0.98     0.98   | 6.00e-14  7.79e-15  2.99e-15 |
 IRKJ |   288   288     0   288     1.24     1.35     0.38     0.38   | 5.26e-14  8.25e-15  5.69e-15 |
 OHI3 |   288   288     0   288     1.22     1.31     0.50     0.50   | 6.37e-14  1.47e-14  1.41e-14 |
 USN7 |   288   288     0   288     1.19     1.24     0.31     0.31   | 4.15e-14  1.00e-14  1.82e-15 |
 GOL2 |   266   266     0   266     1.13     1.22     0.29     0.29   | 1.64e-13  2.51e-14  9.02e-15 |
 WTZR |   288   288     0   288     1.09     1.03     1.41     1.41   | 4.59e-14  7.37e-15  2.89e-15 |
 BRUX |   288   288     4    61     0.79     0.87     0.58     0.58   | 1.78e-14  4.22e-15  2.42e-15 |
 USUD |   288   288     0   288     1.00     0.87     0.71     0.71   | 3.01e-14  6.46e-15  3.39e-15 |
 BADG |   288   288     0   288     0.94     0.77     0.58     0.58   | 2.26e-14  4.58e-15  5.92e-15 |
 MEDI |   288   288     0   288     0.83     0.60     0.84     0.84   | 4.49e-14  8.26e-15  4.22e-15 |
 SVTL |   288   288     0   288     0.82     0.59     2.26     2.26   | 2.46e-14  1.91e-14  1.12e-14 |
 NLIB |   288   288     0   288     0.75     0.50     0.10     0.10   | 4.11e-14  4.57e-15  2.76e-15 |
 MATE |   288   288     0   288     0.63     0.34     0.49     0.49   | 6.84e-14  1.33e-14  1.03e-14 |
 GOPE |   288   288     0   288     0.52     0.23     0.23     0.23   | 4.02e-14  1.16e-14  5.33e-15 |
 G32  |   288   288     0   288     1.26     0.20     2.31     2.31   | 5.68e-14  2.01e-14  2.26e-14 |
 G04  |   288   288     0   288     4.18     0.19     4.17     4.17   | 6.69e-14  2.15e-14  2.05e-14 |
 G18  |   288   288     0   288     4.18     0.16     4.17     4.17   | 6.95e-14  1.82e-14  3.59e-14 |
 G27  |   288   288     0   288     4.18     0.15     4.17     4.17   | 5.79e-14  2.11e-14  3.41e-14 |
 G06  |   288   288     0   288     4.18     0.15     4.17     4.17   | 6.94e-14  2.26e-14  1.37e-14 |
 G01  |   288   281     2   288     4.18     0.09     4.17     4.17   | 8.92e-14  3.04e-14  3.60e-14 |
 G23  |   288   288     0   288     0.54     0.08     3.78     3.78   | 7.23e-14  2.04e-14  2.06e-14 |
 G14  |   288   288     0   288     0.28     0.03     1.26     1.26   | 6.68e-14  2.29e-14  1.89e-14 |
 MKEA |   288   288     0   288     0.15     0.02     0.08     0.08   | 3.30e-14  7.33e-15  7.94e-15 |
 G25  |   288   288     0   288     0.38     0.02     1.88     1.88   | 6.00e-14  1.87e-14  1.46e-14 |
 CHAN |   288   288     0   288     0.14     0.02     0.01     0.01   | 8.49e-14  1.42e-14  4.42e-15 |
 G26  |   288   288     1   288     0.55     0.02     2.10     2.10   | 7.06e-14  2.82e-14  8.78e-15 |
 G02  |   288   288     0   288     0.17     0.01     0.92     0.92   | 5.62e-13  5.89e-14  3.07e-14 |
 G31  |   288   288     0   288     0.16     0.01     0.22     0.22   | 6.01e-13  6.58e-14  2.81e-14 |
 G10  |   288   288     0   288     0.24     0.01     0.64     0.64   | 1.12e-13  3.14e-14  1.08e-14 |
 G16  |   288   288     0   288     0.15     0.01     0.47     0.47   | 6.39e-13  6.46e-14  4.74e-14 |
 G22  |   288   288     0   288     0.21     0.01     0.46     0.46   | 7.25e-13  6.43e-14  4.13e-14 |
 G15  |   288   288     0   288     0.14     0.01     0.67     0.67   | 6.77e-13  7.13e-14  3.23e-14 |
 G11  |   288   288     0   288     0.14     0.01     0.14     0.14   | 6.52e-13  6.54e-14  3.99e-14 |
 G07  |   288   288     0   288     0.14     0.01     0.24     0.24   | 6.86e-13  6.80e-14  5.91e-14 |
 G19  |   288   288     0   288     0.14     0.01     0.28     0.28   | 6.71e-13  7.73e-14  2.62e-14 |
 G29  |   288   288     0   288     0.13     0.01     0.08     0.08   | 7.35e-13  7.43e-14  4.35e-14 |
 G03  |   288   288     0   288     0.34     0.01     0.14     0.14   | 6.06e-14  1.84e-14  1.85e-14 |
 ABPO |   288   286     2     0     0.00     0.00     0.00     0.00   | 3.31e-12  6.45e-13  1.53e-13 |
 ALGO |   288   287     1     0     0.00     0.00     0.00     0.00   | 1.83e-14  4.35e-15  1.56e-15 |
 ALIC |   288   283     2     0     0.00     0.00     0.00     0.00   | 3.69e-12  5.14e-13  2.37e-13 |
 AREQ |   288   288     3     0     0.00     0.00     0.00     0.00   | 6.73e-13  5.14e-13  4.59e-13 |
 BOR1 |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.59e-12  6.80e-13  6.37e-13 |
 CEDU |   288   281     2     0     0.00     0.00     0.00     0.00   | 3.23e-12  4.49e-13  1.86e-13 |
 CHUR |   288   282     2     0     0.00     0.00     0.00     0.00   | 3.23e-12  9.31e-13  2.24e-13 |
 CRO1 |   288   288     0     0     0.00     0.00     0.00     0.00   | 4.35e-14  1.30e-14  1.83e-15 |
 DAEJ |   288   277     5     0     0.00     0.00     0.00     0.00   | 2.43e-12  6.71e-13  1.32e-13 |
 DARW |   288   276     3     0     0.00     0.00     0.00     0.00   | 3.09e-12  4.31e-13  3.39e-13 |
 DGAR |   288   282     2     0     0.00     0.00     0.00     0.00   | 3.37e-12  5.54e-13  1.36e-13 |
 DRAO |   218   184    24     0     0.00     0.00     0.00     0.00   | 9.79e-11  3.95e-11  3.68e-13 |
 FLIN |   288   239    36     0     0.00     0.00     0.00     0.00   | 1.08e-10  3.24e-11  1.76e-11 |
 G05  |   288   288     0     0     0.00     0.00     0.00     0.00   | 8.20e-13  7.19e-14  5.37e-14 |
 G08  |   288   288     0     0     0.00     0.00     0.00     0.00   | 9.99e-13  2.68e-13  1.33e-13 |
 G12  |   288   288     1     0     0.00     0.00     0.00     0.00   | 6.56e-13  7.13e-14  4.57e-14 |
 G13  |   288   285     2     0     0.00     0.00     0.00     0.00   | 6.35e-13  1.01e-13  2.34e-14 |
 G17  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.24e-12  1.32e-13  4.54e-14 |
 G20  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.10e-12  1.08e-13  2.01e-14 |
 G21  |   288   288     0     0     0.00     0.00     0.00     0.00   | 8.57e-13  1.01e-13  4.35e-14 |
 G24  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.35e-12  3.90e-13  1.11e-13 |
 G28  |   288   288     0     0     0.00     0.00     0.00     0.00   | 7.75e-13  7.64e-14  3.63e-14 |
 G30  |   288   288     0     0     0.00     0.00     0.00     0.00   | 7.07e-14  2.63e-14  2.63e-14 |
 GLSV |   288   287     2     0     0.00     0.00     0.00     0.00   | 1.27e-12  6.23e-13  7.10e-13 |
 GMSD |   288   273     7     0     0.00     0.00     0.00     0.00   | 3.60e-12  8.56e-13  2.20e-13 |
 GODE |   288   288     0     0     0.00     0.00     0.00     0.00   | 2.64e-14  9.80e-15  5.09e-15 |
 GRAS |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.46e-12  4.22e-13  6.49e-14 |
 HARB |   288   282     5     0     0.00     0.00     0.00     0.00   | 1.91e-12  1.18e-12  2.49e-13 |
 HOB2 |   288   285     1     0     0.00     0.00     0.00     0.00   | 7.50e-13  1.79e-13  2.23e-13 |
 HOFN |   288   265     6     0     0.00     0.00     0.00     0.00   | 3.70e-12  8.05e-13  4.22e-13 |
 JOZ2 |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.64e-12  7.40e-13  6.77e-13 |
 KARR |   288   288     2     0     0.00     0.00     0.00     0.00   | 1.74e-12  5.58e-13  5.39e-13 |
 KERG |   288   281     5     0     0.00     0.00     0.00     0.00   | 2.17e-12  6.13e-13  2.37e-13 |
 KIRU |   288   288     0     0     0.00     0.00     0.00     0.00   | 3.27e-13  2.72e-13  3.38e-13 |
 MAC1 |   287   233    27     0     0.00     0.00     0.00     0.00   | 2.44e-11  1.86e-12  3.29e-13 |
 MAR6 |   288   274     3     0     0.00     0.00     0.00     0.00   | 3.45e-12  4.69e-13  4.08e-13 |
 MAW1 |   288   248     6     0     0.00     0.00     0.00     0.00   | 2.91e-12  4.56e-13  2.62e-13 |
 MDO1 |   288     0     0     0     0.00     0.00     0.00     0.00   | 9.01e-27  7.50e-28  1.25e-28 |
 MIZU |   288     0     0     0     0.00     0.00     0.00     0.00   | 9.01e-27  7.50e-28  1.25e-28 |
 MOBS |   263    41   158     0     0.00     0.00     0.00     0.00   | 5.01e-09  4.45e-10  7.65e-11 |
 NANO |   288   287     0     0     0.00     0.00     0.00     0.00   | 3.35e-12  3.92e-13  2.49e-13 |
 NNOR |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.28e-12  1.03e-13  1.99e-14 |
 NYAL |   288   286     1     0     0.00     0.00     0.00     0.00   | 4.49e-13  1.62e-13  2.11e-14 |
 PERT |   288   283     2     0     0.00     0.00     0.00     0.00   | 2.87e-12  5.81e-13  2.88e-13 |
 QAQ1 |   288   250     6     0     0.00     0.00     0.00     0.00   | 3.80e-12  1.01e-12  2.15e-13 |
 QUIN |   288     0     0     0     0.00     0.00     0.00     0.00   | 9.01e-27  7.50e-28  1.25e-28 |
 REYK |   288     0     1     0     0.00     0.00     0.00     0.00   | 0.00e+00  0.00e+00  0.00e+00 |
 SANT |   288     0     1     0     0.00     0.00     0.00     0.00   | 7.38e-23  6.15e-24  1.02e-24 |
 SCH2 |   288     0     0     0     0.00     0.00     0.00     0.00   | 0.00e+00  0.00e+00  0.00e+00 |
 STR1 |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.14e-12  2.82e-13  1.75e-13 |
 SUTH |   288     0     0     0     0.00     0.00     0.00     0.00   | 0.00e+00  0.00e+00  0.00e+00 |
 SUWN |   288   282     2     0     0.00     0.00     0.00     0.00   | 2.46e-12  7.92e-13  1.94e-13 |
 SYOG |   288   285     1     0     0.00     0.00     0.00     0.00   | 1.53e-12  7.99e-13  2.95e-13 |
 TIDB |   288   287     1     0     0.00     0.00     0.00     0.00   | 1.01e-13  1.02e-14  3.07e-15 |
 TLSE |   288   258    20     0     0.00     0.00     0.00     0.00   | 6.09e-12  1.14e-12  2.98e-13 |
 TOW2 |   288   287     0     0     0.00     0.00     0.00     0.00   | 2.88e-12  3.92e-13  2.96e-13 |
 TRO1 |   288   288     0     0     0.00     0.00     0.00     0.00   | 9.64e-13  2.34e-13  2.41e-13 |
 TSKB |   288     0     0     0     0.00     0.00     0.00     0.00   | 1.80e-26  1.50e-27  2.50e-28 |
 VILL |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.32e-12  3.31e-13  2.96e-13 |
 ZIMM |   288     0     0     0     0.00     0.00     0.00     0.00   | 4.50e-27  3.75e-28  6.25e-29 |
 GPST |   288   285     1     0     0.00     0.00     0.00     0.00   | 4.82e-14  6.23e-15  1.53e-15 |
 ALBH |   288   249    29     0     0.00     0.00     0.00     0.00   | 7.84e-11  3.83e-11  2.13e-11 |
 GOLD |   288   288     0     0     0.00     0.00     0.00     0.00   | 2.14e-14  6.50e-15  3.75e-15 |
 IISC |   288     0     0     0     0.00     0.00     0.00     0.00   | 0.00e+00  0.00e+00  0.00e+00 |
 THU2 |   288   250    10     0     0.00     0.00     0.00     0.00   | 4.04e-12  1.12e-12  2.71e-13 |
 HOLB |   288     0     0     0     0.00     0.00     0.00     0.00   | 0.00e+00  0.00e+00  0.00e+00 |
 BRST |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.52e-12  3.57e-13  8.03e-14 |
 PADO |   288     0     0     0     0.00     0.00     0.00     0.00   | 0.00e+00  0.00e+00  0.00e+00 |
 WES2 |   286   270     9     0     0.00     0.00     0.00     0.00   | 1.90e-12  4.26e-13  8.64e-14 |
 BAKE |   288   268     4     0     0.00     0.00     0.00     0.00   | 3.17e-12  9.22e-13  2.56e-13 |
 MONP |   288   284     2     0     0.00     0.00     0.00     0.00   | 1.10e-12  3.42e-13  3.42e-13 |
 SCOR |   288   244    13     0     0.00     0.00     0.00     0.00   | 4.04e-12  1.14e-12  2.16e-13 |
 MBAR |   288     0     0     0     0.00     0.00     0.00     0.00   | 0.00e+00  0.00e+00  0.00e+00 |
 PARC |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.18e-12  4.29e-13  3.88e-13 |
 IQAL |   288     0     0     0     0.00     0.00     0.00     0.00   | 0.00e+00  0.00e+00  0.00e+00 |
 TASH |   288   288     0     0     0.00     0.00     0.00     0.00   | 2.62e-12  8.50e-13  1.95e-13 |
 YARR |   288   288     0     0     0.00     0.00     0.00     0.00   | 2.91e-12  4.10e-13  1.29e-13 |
 STK2 |   288     0     0     0     0.00     0.00     0.00     0.00   | 9.01e-27  7.50e-28  1.25e-28 |
 ZAMB |   288     0     0     0     0.00     0.00     0.00     0.00   | 0.00e+00  0.00e+00  0.00e+00 |
 MQZG |   288     0     0     0     0.00     0.00     0.00     0.00   | 0.00e+00  0.00e+00  0.00e+00 |
 ZIM2 |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.41e-12  6.04e-13  7.01e-13 |
 FALK |   288     0     0     0     0.00     0.00     0.00     0.00   | 9.01e-27  7.50e-28  1.25e-28 |
 HNLC |   287     0     1     0     0.00     0.00     0.00     0.00   | 9.01e-27  7.50e-28  1.25e-28 |
 UNB3 |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.90e-12  5.41e-13  9.63e-14 |
 KRGG |   288   282     3     0     0.00     0.00     0.00     0.00   | 2.45e-12  6.48e-13  3.75e-13 |
 KIRI |   288     0     0     0     0.00     0.00     0.00     0.00   | 0.00e+00  0.00e+00  0.00e+00 |
 TONG |   284     0     0     0     0.00     0.00     0.00     0.00   | 0.00e+00  0.00e+00  0.00e+00 |
 KOUG |   288   288     0     0     0.00     0.00     0.00     0.00   | 2.87e-13  4.47e-13  6.94e-14 |
 METG |   288     0     0     0     0.00     0.00     0.00     0.00   | 1.84e-23  1.54e-24  2.56e-25 |
 NYA2 |   288   288     0     0     0.00     0.00     0.00     0.00   | 3.07e-12  1.01e-12  1.88e-13 |
 PNGM |   286   283     1     0     0.00     0.00     0.00     0.00   | 2.20e-12  6.86e-13  6.42e-13 |
 CHOF |   288   277     0     0     0.00     0.00     0.00     0.00   | 4.16e-12  3.69e-13  2.57e-13 |
 HRAG |   288   288     0     0     0.00     0.00     0.00     0.00   | 8.61e-13  2.30e-13  4.13e-13 |
 MAYG |   288   284     4     0     0.00     0.00     0.00     0.00   | 2.01e-12  8.93e-13  1.04e-12 |
 ONS1 |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.52e-12  3.47e-13  6.30e-14 |
 UCAL |   288   281     2     0     0.00     0.00     0.00     0.00   | 2.99e-12  4.82e-13  2.45e-13 |
 WARK |   288     0     0     0     0.00     0.00     0.00     0.00   | 2.25e-27  1.88e-28  3.13e-29 |
 LAUT |   287   272     4     0     0.00     0.00     0.00     0.00   | 4.33e-12  5.35e-13  2.89e-13 |
 OWMG |   288   285     1     0     0.00     0.00     0.00     0.00   | 1.91e-12  6.11e-13  4.50e-13 |
 DLF1 |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.55e-12  3.61e-13  6.09e-14 |
 GOP6 |   288   288     2     0     0.00     0.00     0.00     0.00   | 7.64e-13  1.97e-13  5.03e-13 |
 MAR7 |   288   286     1     0     0.00     0.00     0.00     0.00   | 1.28e-12  3.60e-13  8.24e-14 |
 KIR8 |   288   282     2     0     0.00     0.00     0.00     0.00   | 2.13e-12  5.13e-13  8.82e-14 |
 WTZS |   288   288     0     0     0.00     0.00     0.00     0.00   | 3.42e-13  9.85e-14  1.42e-14 |
------+---------------------------------------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:                                         | 1.21e-21  3.67e-20  5.26e-19 |
----------------------------------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                                                   |     REYK      REYK      QUIN |
----------------------------------------------------------------------+------------------------------+
