
 cls-file Version 2.0
 GPS week: 1924   Day: 3   MJD: 57715                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 brd |    96     0   2976      0      20     -24    808    808      0   1774   1774      0    0.00
 cod |   288     0  20741     13    -753    -115     17     17     17    143    193     87   17.18
 emr |   288     0  23835     58   -1117    -403     20     20     20     95    125     71   14.25
 esa |   288     0  21569    703   -1775   -1008     15     12     16    179    244    106   20.40
 gfz |   288     0  26184     23    -241    -381     12     10     12     87     88     86   26.42
 iga |    96     0   2976      1      20     -22    101    101      0    170    170      0    0.00
 igc |   288     0   7200      0     225    -390     83     83      0    421    421      0    0.00
 igu |    96     0   2880      0      18     -23    689    689      0   1200   1200      0    0.00
 jpl |   288     0  17238    292    1737    -149     14     12     16     88     90     86   21.75
 ngs |    96     0   2976      0      20     -24    752    752      0   1718   1718      0    0.00
 usn |   288     0  23077    323   -2170     263     35     44     28    133    145    126    0.00
 whu |   288     0  22361    848   -1626    3189     35     39     32    117    119    116    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igc   igu   jpl   ngs   usn   whu |
 -----+-------------------------------------------------------------------------+
    1 |   227   189    22  -378    72   -72   446  -227   104   286   237    85 |
    2 | -2266  -265   -63   329   -46   109    76  -329    -2 -2247  -212   -51 |
    3 |  -575   132   -27  -298    30  -136     -   311   156  -560    94   -57 |
    5 | -1265   -59   170  -254    90   -83   508  -413    64 -1452   273   106 |
    6 |  -597   -73   230  -107    18   -86  -290  -905   -14  -403   173    13 |
    7 |   221   138    61  -282    72   -64   -41 -2051    29    93   179    24 |
    8 |  1428  -116   199    73   -53    76   280   813   -43   779    33  -221 |
    9 | -1090    39    34    20   -47   -79     -   -35   -14  -800   -12   -23 |
   10 |   321    19   -59  -123    93  -226  -133  1268    26   240    85   182 |
   11 |  3298    93  -125   -21   -80    59     -   714   126  3522   -28   -85 |
   12 | -1727   253  -137  -178    39  -185  -587 -1158    10 -1882   -30   -42 |
   13 |  3436   103  -174    13   -35  -110   369  1679    64  3344   -59    21 |
   14 |   116  -126     4   175   -63   117  -308 -1275    10   506   -88   -61 |
   15 | -1289   -94   161  -142   -15   -92   486   159   122 -1365   211    25 |
   16 |  2032  -184    67   187   -33   176   652    72   -34  2000   -35  -134 |
   17 |   273   269   -52  -376   127   -61   178  1854    21  -511   173   -33 |
   18 |  2174   -77   -78    87    66   117  -294   215   -50  2284    38    64 |
   19 | -2050  -174   -33   403   -95   120   -54   300  -103 -1719  -190  -138 |
   20 |  1214  -148   -21   292   -21    65   351  -523  -118  1236   -21   117 |
   21 |  2109  -353   178   365   -25   183     -  1006  -150  1866   -77   -65 |
   22 | -2704  -445   178   488   -44   234     -  -581  -170 -2514   -67  -170 |
   23 |  -780   177  -113   -20   -65    12  -900  -901    33  -522  -114  -125 |
   24 | -1223   279  -191  -225    53  -203     -     -    51  -957   107    51 |
   25 |  -259    52  -209    80    41    49  -356  -155   -29   -55   -67  -106 |
   26 |   519    52   -82   -49    72   -88   278  1587   -29   502    -4   136 |
   27 |   -50   140   -41   -18    93    21   277   220  -179  -116    55    11 |
   28 |  2312  -129    13   191  -109   125  -100    11    46  2202  -153  -180 |
   29 | -1613   209   -13  -421   109  -225   451 -1763   105 -1817   254    77 |
   30 |  -475   224  -118   -23    22    38  -577  -536  -105  -345   -43  -190 |
   31 | -1310   329   -50  -331   117   -60  -502  -806   -59 -1336    44   -20 |
   32 |  -410     5   181  -220    64   267  -213  1447     6  -262   223   104 |
 -----+-------------------------------------------------------------------------+
 ADIS |     -     -     -  -123    95     -     -     -     -     -   316   140 |
 ALRT |     -    22   -49     -    12     -     -     -     -     -    11    87 |
 AMC2 |     -  -116    70     -     -     -     -     -    46     -   -43   118 |
 AREV |     -     -    36    55   -49     -     -     -   -14     -    63     - |
 ARTU |     -     -   -78    74   -15     -     -     -     -     -   -44   104 |
 ASPA |     -   -73   -69   -26   101     -     -     -     -     -  -145    30 |
 BAKE |     -     -   -12   107   -76     -     -     -     -     -    16    21 |
 BJFS |     -   -15     -     -    10     -     -     -     -     -     -   -48 |
 BJNM |     -   173    44     -  -137     -     -     -     -     -     -     - |
 BRFT |     -     -     -    32   -25     -     -     -     -     -    76     - |
 BRST |     -    55   -67     -     -     -     -     -     -     -     -    33 |
 BRUX |     -    62    22     -   -52     -     -     -     -     -     -     - |
 CCJ2 |     -     -     -     -  -173     -     -     -   211     -  -211  -498 |
 CHPI |     -     -     6    30    30     -     -     -   -68     -    45   110 |
 CHTI |     -   -53    35   -65    45     -     -     -    23     -   -14   -10 |
 CORD |     -    38    54     -   -36     -     -     -   -21     -     7     - |
 CUSV |     -     -   -87    41    15     -     -     -     -     -   -73     5 |
 DAEJ |     -   -14    17     -     -     -     -     -     -     -     -     - |
 DGAV |     -     -   -57    10     4     -     -     -    22     -   -17    80 |
 FAA1 |     -   -43     -     X    28     -     -     -     -     -     -     - |
 GLPS |     -    63     -    41   -22     -     -     -   -62     -    78    59 |
 GLSV |     -   141    25     -   -35     -     -     -   -85     -     -     - |
 GUAT |     -   -73   -25   154   -49     -     -     -     -     -   -59  -103 |
 HARB |     -   -30    36     -     -     -     -     -     -     -    64   144 |
 HOB2 |     -   114    -4    63  -119     -     -     -     -     -     X    93 |
 HYDE |     -     -   -63    82   -29     -     -     -     -     -   -28   -15 |
 IENG |     -    76    -2     -   -48     -     -     -     -     -   104     - |
 INEG |     -   -40     -     -    26     -     -     -     -     -   -56     X |
 INVK |     -   -98     -     -    64     -     -     -     -     -   291   117 |
 ISPA |     -     -   147   -31   -43     -     -     -   -11     -   207     4 |
 KELY |     -     -   -10     -  -150     -     -     -   189     -  -128   -55 |
 KOKV |     -     -    96     9   -58     -     -     -     -     -    38   -27 |
 LHAZ |     -     -   192  -470   186     -     -     -     -     -   175     X |
 MGUE |     -     -   -61    42     -     -     -     -     -     -     -     - |
 NIST |     -     -    -5     -     3     -     -     -     -     -     -   -38 |
 NKLG |     -  -107    -4     X    72     -     -     -     -     -   -32   167 |
 NNOR |     -     -     4    -3     -     -     -     -     -     -     -    14 |
 NRIL |     -  -119    23   -14    47     -     -     -    36     -   -85    99 |
 NRMD |     -   -69   -61   115     -     -     -     -     -     -  -176  -125 |
 NYA1 |     -    50     4     -   -35     -     -     -     -     -  -159    63 |
 OHI2 |     -   -19    11     -     6     -     -     -     -     -   -47   -77 |
 ORID |     -     -     -    52     -     -     -     -   -49     -     -     - |
 OUS2 |     -     -     -   -57    44     -     -     -     -     -     -     - |
 PALV |     -     -    62     -   -38     -     -     -     5     -     -     - |
 PBRI |     -     -   -75   110     -     -     -     -   -50     -     -     - |
 PDEL |     -    -1    17     -    -5     -     -     -    -4     -    36     - |
 PETS |     -     -    29    92   -87     -     -     -     -     -   -63   -23 |
 PIMO |     -     -    68   -77   -91     -     -     -   140     -   -10   -73 |
 PNGM |     -     -     -   177     -     -     -     -  -167     -   -72     - |
 PTBB |     -   -51   -20    64    -3     -     -     -     -     -   -42     - |
 QAQ1 |     -    29     -   -25     -     -     -     -     -     -     -     - |
 RAMO |     -   204     -     -  -133     -     -     -     -     -     -    36 |
 RBAY |     -   -66     7    64    -1     -     -     -     -     -     4   112 |
 RESO |     -     -    99     -   -53     -     -     -     -     -    23   -22 |
 REUN |     -  -133   -99    84    77     -     -     -     -     -     -     5 |
 RIO2 |     -     -     -  -123    95     -     -     -     -     -     -     - |
 RIOP |     -   -41   -65     -    60     -     -     -     -     -   -27   -13 |
 SSIA |     -   -71     -     -     -     -     -     -    56     -  -123     - |
 STHL |     -   -23   -10     X   -27     -     -     -    58     -    43     - |
 TASH |     -     -     -   -13    10     -     -     -     -     -     -     - |
 THTI |     -     -   -48     -     -     -     -     -    31     -  -135   -44 |
 THU3 |     -    -6  -106     -    59     -     -     -     -     -   -22     - |
 TIXI |     -    13     -    76   -29     -     -     -   -47     -   -48    95 |
 TLSE |     -   -13  -109     -    67     -     -     -     -     -   -54     - |
 TRO1 |     -   -13   -36     -    28     -     -     -     -     -  -373     - |
 TUVA |     -     -     -    90     -     -     -     -   -85     -  -100     - |
 ULAB |     -     -     -   -70    54     -     -     -     -     -     -     9 |
 UNSA |     -     -     -     9    -7     -     -     -     -     -     -     9 |
 URUM |     -   -26     -    80   -44     -     -     -     X     -     -     X |
 USN7 |     -   -85     -     -    55     -     -     -     -     -   -82     - |
 VALD |     -     -     -    41     -     -     -     -   -38     -     -     0 |
 WAB2 |     -    58    21     -   -49     -     -     -     -     -     -     - |
 WIND |     -   -79     -   -42    83     -     -     -     -     -     -     - |
 XMIS |     -     -    76    73   -69     -     -     -   -31     -   -92     2 |
 YKRO |     -     -    87   -10     -     -     -     -   -46     -     -    76 |
 YSSK |     -   -53   -22     -     5     -     -     -    50     -   -15     - |
 ZAMB |     -     -    56    56   -86     -     -     -    21     -     -    41 |
 -----+-------------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igc   igu   jpl   ngs   usn   whu | NEPO    RMS
 -----+-------------------------------------------------------------------------+-------------
    1 |   362    16    11     9     9    85    92   222     9   414    43    37 |  288    163
    2 |   370    21    10    10     9    66    40   368    11   338    52    49 |  288    212
    3 |   627    14     9     6     9   152     -   300     9   492    39    25 |  288    160
    5 |   479    27    12     8     9    61    28   291    15   473    45    47 |  288    272
    6 |   284    10    32    11     9    57    56   429    12   236    67    33 |  288    107
    7 |   847    29    18     9    12    60    49  1309     9  1035    55    32 |  288    284
    8 |  1745    16    11     9    13    55    60  1230    10  1509    53    61 |  288    957
    9 |   536    17    22     9    10   147     -   323     8   492    32    18 |  288    360
   10 |   378    16    14    10     7   138    72   992    13   209    22    17 |  288    214
   11 |   654    24    18     9     9    67     -   377    14   593    43    43 |  288    354
   12 |  1232    11    13     8     7   149    51   930     9  1212    47    44 |  288    364
   13 |   675    18    22    11    16    42    47   755    12   658    36    40 |  288    286
   14 |   749    16    17     9     9    65    37   727    14   751    29    40 |  288    272
   15 |   624    30    43    31    15    52   170   319    14   496    23    50 |  288    331
   16 |   415    11    34    20    12    84    38   410    14   493    84    44 |  288    401
   17 |  1751    20     9    19     9   100   117   978    10  1555    50    37 |  288    394
   18 |   292    14    14     8    11   174    54   238    12   252    33    39 |  288    238
   19 |   885    21    13    23     8    63    37   306     9   796    54    46 |  288    301
   20 |   294    21    21     9    14    85    51   293    13   378    31    31 |  288    218
   21 |   701    11    12     9     9    22     -   778    14   737    33    43 |  288    322
   22 |   381    14    14     7     8   142     -   633    10   347    37    33 |  288    252
   23 |   329    22    15     9    11    76   149   550     8   315    30    52 |  288    184
   24 |  1731     8    33    12    10   150     -     -    11  1658    40    17 |  288   1164
   25 |   306    16    25     7    12   119    64   205    13   293    37    17 |  288    215
   26 |   343    18    26    14    14    63    61   814     8   262    58    36 |  288    191
   27 |   370    18    18    10    11    26    66   254    15   366    47    59 |  288    285
   28 |  1459    11    22    15    11    84   111  1353    13  1309    33    47 |  288    917
   29 |   842    14    14    11    15   138    49  1153    14   692    40    52 |  288    387
   30 |   461    12    18    11    12    78   119   590     9   403    35    21 |  288    275
   31 |   507    14    18    13    12    91    53   282    19   483    47    27 |  288    234
   32 |   611    19    13    10     9   181   166   570    12   591    46    31 |  288    264
 -----+-------------------------------------------------------------------------+-------------
 ADIS |     -     -     -    11     9     -     -     -     -     -    24    26 |  288    >>>
 ALRT |     -    12    16     -     8     -     -     -     -     -    15    21 |  288   5614
 AMC2 |     -    11    18     -     -     -     -     -     7     -    19    37 |  288     34
 AREV |     -     -    14     6    11     -     -     -    12     -    23     - |  288   3778
 ARTU |     -     -    20    10    10     -     -     -     -     -    21    17 |  288   8150
 ASPA |     -    22    31    13    13     -     -     -     -     -    30    29 |  288   6235
 BAKE |     -     -    26    14     7     -     -     -     -     -    26    47 |  288   2504
 BJFS |     -    13     -     -     8     -     -     -     -     -     -    14 |  288   3426
 BJNM |     -    11    28     -    12     -     -     -     -     -     -     - |  201     48
 BRFT |     -     -     -    13    10     -     -     -     -     -    35     - |  288   3307
 BRST |     -     7     9     -     -     -     -     -     -     -     -    22 |  288   1911
 BRUX |     -    16     7     -    10     -     -     -     -     -     -     - |  288    109
 CCJ2 |     -     -     -     -     9     -     -     -    11     -    25    30 |  288   7362
 CHPI |     -     -    12    11    10     -     -     -    12     -    25    20 |  288   5694
 CHTI |     -    17    20    11    12     -     -     -    11     -    24    19 |  288   5724
 CORD |     -    11    11     -    11     -     -     -    14     -    24     - |  288   5088
 CUSV |     -     -    25    13    12     -     -     -     -     -    42    41 |  288   4492
 DAEJ |     -    18    22     -     -     -     -     -     -     -     -     - |  279   4457
 DGAV |     -     -    34    12    19     -     -     -    16     -    32    48 |  288   3073
 FAA1 |     -    38     -     X    24     -     -     -     -     -     -     - |  141   3579
 GLPS |     -     9     -     8    10     -     -     -    14     -    22    50 |  288   6100
 GLSV |     -    14     6     -     7     -     -     -     9     -     -     - |  287   2013
 GUAT |     -    14    19     8    11     -     -     -     -     -    34    56 |  288   2801
 HARB |     -     9    11     -     -     -     -     -     -     -    19    34 |  288   1442
 HOB2 |     -     9    31    12    14     -     -     -     -     -     X    23 |  288     27
 HYDE |     -     -    18     8     9     -     -     -     -     -    27    21 |  288   3515
 IENG |     -    24    10     -    18     -     -     -     -     -    28     - |  288     40
 INEG |     -     7     -     -     4     -     -     -     -     -    25     X |  288   6043
 INVK |     -    13     -     -     8     -     -     -     -     -    29    20 |  288   3846
 ISPA |     -     -    34    12    14     -     -     -    17     -    20    18 |  288  15066
 KELY |     -     -    24     -    12     -     -     -    15     -    17    24 |  288   5993
 KOKV |     -     -    19    12    13     -     -     -     -     -    32    39 |  288    176
 LHAZ |     -     -    24    38    16     -     -     -     -     -    29     X |  288   4670
 MGUE |     -     -    18    12     -     -     -     -     -     -     -     - |  276     29
 NIST |     -     -    27     -    15     -     -     -     -     -     -    21 |  287     38
 NKLG |     -    18    16     X    10     -     -     -     -     -    16    23 |  288   8421
 NNOR |     -     -    22    15     -     -     -     -     -     -     -    47 |  288    320
 NRIL |     -    13     8    11     8     -     -     -    11     -    15    10 |  288   6251
 NRMD |     -    20    25    17     -     -     -     -     -     -    36    19 |  288   5054
 NYA1 |     -     9    12     -     5     -     -     -     -     -    14    15 |  288   6513
 OHI2 |     -    16    18     -    12     -     -     -     -     -    31    61 |  288     40
 ORID |     -     -     -     5     -     -     -     -     5     -     -     - |  276   2760
 OUS2 |     -     -     -    15    11     -     -     -     -     -     -     - |  288    >>>
 PALV |     -     -    12     -    12     -     -     -    12     -     -     - |  288   7202
 PBRI |     -     -    17     9     -     -     -     -     9     -     -     - |  288   1292
 PDEL |     -    14    10     -    13     -     -     -     8     -    16     - |  288   2421
 PETS |     -     -    14    11    11     -     -     -     -     -    27    14 |  288   7764
 PIMO |     -     -    34    15    24     -     -     -    24     -    43    50 |  288   5529
 PNGM |     -     -     -    18     -     -     -     -    17     -    46     - |  276   8093
 PTBB |     -    21     7    10    11     -     -     -     -     -    14     - |  288     29
 QAQ1 |     -    11     -     9     -     -     -     -     -     -     -     - |  276    >>>
 RAMO |     -    12     -     -     8     -     -     -     -     -     -    18 |  288    >>>
 RBAY |     -    28    15    24    13     -     -     -     -     -    47    23 |  261   6424
 RESO |     -     -     7     -     4     -     -     -     -     -    11    20 |  287   5603
 REUN |     -    12    29    14    16     -     -     -     -     -     -    19 |  288   6441
 RIO2 |     -     -     -    14    10     -     -     -     -     -     -     - |  288    >>>
 RIOP |     -    17    14     -    11     -     -     -     -     -    20    62 |  288   6039
 SSIA |     -    17     -     -     -     -     -     -    13     -    18     - |  288   5288
 STHL |     -    42    26     X    18     -     -     -    34     -    18     - |  288  14835
 TASH |     -     -     -    53    41     -     -     -     -     -     -     - |  252    >>>
 THTI |     -     -    18     -     -     -     -     -    12     -    84    46 |  284   5745
 THU3 |     -    13    15     -     6     -     -     -     -     -    20     - |  288   6755
 TIXI |     -    15     -     7    11     -     -     -     8     -    24    15 |  288    >>>
 TLSE |     -    23    24     -    15     -     -     -     -     -    32     - |  288   1645
 TRO1 |     -    15    14     -     9     -     -     -     -     -    18     - |  288   7201
 TUVA |     -     -     -    49     -     -     -     -    46     -    43     - |  275   4326
 ULAB |     -     -     -    13    10     -     -     -     -     -     -    16 |  276    >>>
 UNSA |     -     -     -    11     8     -     -     -     -     -     -    40 |  288    >>>
 URUM |     -    24     -    14    11     -     -     -     X     -     -     X |  288    >>>
 USN7 |     -    13     -     -     8     -     -     -     -     -    13     - |  288     38
 VALD |     -     -     -     6     -     -     -     -     5     -     -    24 |  288   2392
 WAB2 |     -    19    10     -    14     -     -     -     -     -     -     - |  288     28
 WIND |     -    17     -    14    11     -     -     -     -     -     -     - |  288    >>>
 XMIS |     -     -    18    10    11     -     -     -    13     -    34    32 |  288   5789
 YKRO |     -     -    17    14     -     -     -     -    15     -     -    35 |  288  12463
 YSSK |     -    14     9     -    11     -     -     -    10     -    17     - |  288   6154
 ZAMB |     -     -    35    17    17     -     -     -    20     -     -    29 |  288   9118
 -----+-------------------------------------------------------------------------+-------------
 TOT  |   808    18    20    15    12   102    84   690    14   752    36    36 |
-----------------------------------------------------------------------------------------------------
-----------------------------------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN     MEAN     MEAN     MEAN   | HADAMARD DEVIATION AT TAU =  |
      | NREPO NBEPO  BRKS  USED    WGT1(%)  WGT2(%)  WGT3(%)  WGT4(%) |     300s     3600s    21600s |
------+---------------------------------------------------------------+------------------------------+
 AMC2 |   288   288     0   288     7.42     7.42     7.41     7.41   | 3.33e-14  4.72e-15  1.50e-15 |
 OHI2 |   288   285     1   288     5.15     7.42     3.70     3.70   | 5.52e-14  8.86e-15  3.80e-15 |
 PTBB |   288   288     0   288     7.36     7.42     7.41     7.41   | 2.94e-14  5.22e-15  4.08e-15 |
 WAB2 |   288   288     0   288     7.42     7.42     1.23     1.23   | 3.17e-14  5.59e-15  2.18e-15 |
 IENG |   288   285     1   288     6.39     7.42     2.35     2.35   | 5.78e-14  7.80e-15  1.69e-15 |
 KOKV |   288   283     2   288     4.97     7.42     7.41     7.41   | 8.21e-14  1.21e-14  1.15e-14 |
 HOB2 |   288   287     1   288     2.21     7.37     2.62     2.62   | 3.99e-14  8.22e-15  2.63e-15 |
 NIST |   287   287     0   287     7.19     7.36     7.38     7.38   | 3.53e-14  6.22e-15  1.43e-15 |
 MGUE |   276   276     0   276     7.07     7.09     7.08     7.08   | 3.50e-14  7.53e-15  2.37e-15 |
 G06  |   288   288     0   288     4.14     5.31     5.82     5.82   | 5.52e-14  1.80e-14  1.06e-14 |
 BJNM |   201   201     0   201     1.65     5.10     2.03     2.03   | 4.76e-14  7.38e-15         - |
 G30  |   288   288     0   288     7.41     4.86     7.41     7.41   | 5.66e-14  2.82e-14  2.84e-14 |
 G25  |   288   288     0   288     7.41     4.15     7.41     7.41   | 5.67e-14  1.91e-14  2.79e-14 |
 G09  |   288   279     4   288     4.61     2.24     0.65     0.65   | 7.54e-14  3.11e-14  4.62e-14 |
 G10  |   288   286     1   288     2.01     1.70     0.38     0.38   | 9.08e-14  2.91e-14  8.59e-15 |
 USN7 |   288   288     0   288     0.90     1.68     7.41     7.41   | 3.55e-14  6.03e-15  8.72e-16 |
 G27  |   288   288     0   288     5.71     1.53     0.41     0.41   | 4.95e-14  3.91e-14  4.04e-14 |
 BRUX |   288   288     0   288     0.81     1.36     0.17     0.17   | 2.92e-14  8.11e-15  3.08e-15 |
 G18  |   288   288     0   288     0.52     1.14     0.62     0.62   | 8.75e-13  7.81e-14  2.22e-14 |
 G23  |   288   288     0   288     0.59     0.42     2.82     2.82   | 5.24e-13  5.12e-14  1.66e-14 |
 G02  |   288   288     0   288     0.58     0.40     2.24     2.24   | 5.63e-13  6.02e-14  3.12e-14 |
 G01  |   288   288     0   288     0.80     0.40     3.02     3.02   | 8.14e-14  2.22e-14  2.44e-14 |
 G31  |   288   288     0   288     0.53     0.35     0.58     0.58   | 6.23e-13  5.67e-14  1.09e-14 |
 G16  |   288   288     0   288     0.51     0.33     1.28     1.28   | 6.58e-13  7.36e-14  5.61e-14 |
 G07  |   288   288     0   288     0.50     0.32     0.67     0.67   | 6.57e-13  6.77e-14  3.37e-14 |
 G15  |   288   288     0   288     0.50     0.32     1.89     1.89   | 7.21e-13  6.41e-14  4.09e-14 |
 G19  |   288   288     0   288     0.50     0.32     0.74     0.74   | 6.85e-13  6.90e-14  1.70e-14 |
 G14  |   288   288     0   288     0.49     0.31     1.83     1.83   | 6.72e-13  6.92e-14  2.40e-14 |
 G29  |   288   288     0   288     0.49     0.31     0.23     0.23   | 6.57e-13  8.07e-14  4.00e-14 |
 G32  |   288   288     0   288     1.10     0.29     1.22     1.22   | 5.94e-14  1.99e-14  3.24e-14 |
 G12  |   288   288     0   288     0.45     0.27     2.47     2.47   | 7.26e-13  6.57e-14  4.22e-14 |
 G22  |   288   288     0   288     0.68     0.24     1.32     1.32   | 6.62e-13  6.63e-14  2.93e-14 |
 G26  |   288   288     0   288     1.03     0.17     0.40     0.40   | 7.85e-14  1.80e-14  1.81e-14 |
 G03  |   288   288     0   288     0.91     0.17     0.41     0.41   | 6.81e-14  1.88e-14  1.23e-14 |
 G05  |   288   288     0     0     0.00     0.00     0.00     0.00   | 8.44e-13  7.93e-14  2.59e-14 |
 G08  |   288   288     0     0     0.00     0.00     0.00     0.00   | 7.66e-13  2.25e-13  1.05e-13 |
 G11  |   288   288     0     0     0.00     0.00     0.00     0.00   | 7.24e-13  6.85e-14  4.83e-14 |
 G13  |   288   288     0     0     0.00     0.00     0.00     0.00   | 6.21e-13  7.08e-14  2.70e-14 |
 G17  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.02e-12  9.59e-14  4.10e-14 |
 G20  |   288   288     0     0     0.00     0.00     0.00     0.00   | 9.16e-13  9.26e-14  1.74e-14 |
 G21  |   288   288     0     0     0.00     0.00     0.00     0.00   | 8.93e-13  9.98e-14  2.77e-14 |
 G24  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.06e-12  3.15e-13  7.16e-14 |
 G28  |   288   288     1     0     0.00     0.00     0.00     0.00   | 7.97e-13  1.01e-13  2.62e-14 |
 GLSV |   287   219    22     0     0.00     0.00     0.00     0.00   | 4.15e-12  6.37e-13  1.91e-13 |
 NNOR |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.33e-12  1.56e-13  2.90e-14 |
 PDEL |   288   249    13     0     0.00     0.00     0.00     0.00   | 4.24e-12  1.00e-12  1.80e-13 |
 GPST |   288   287     1     0     0.00     0.00     0.00     0.00   | 2.80e-14  5.33e-15  4.16e-15 |
 DAEJ |   279     0     0     0     0.00     0.00     0.00     0.00   | 9.01e-27  7.50e-28  1.25e-28 |
 TLSE |   288   285     1     0     0.00     0.00     0.00     0.00   | 1.83e-12  7.20e-13  1.93e-13 |
 HARB |   288   288     0     0     0.00     0.00     0.00     0.00   | 2.60e-13  3.14e-13  1.50e-13 |
 BRST |   288   285     1     0     0.00     0.00     0.00     0.00   | 1.72e-12  8.79e-13  2.22e-13 |
 BAKE |   286   251    16     0     0.00     0.00     0.00     0.00   | 3.78e-12  8.75e-13  1.86e-13 |
 CHTI |   288     0     0     0     0.00     0.00     0.00     0.00   | 0.00e+00  0.00e+00  0.00e+00 |
 AREV |   288   288     0     0     0.00     0.00     0.00     0.00   | 7.60e-13  6.96e-13  4.58e-13 |
 PBRI |   288   288     0     0     0.00     0.00     0.00     0.00   | 9.68e-13  2.65e-13  8.63e-14 |
------+---------------------------------------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:                                         | 7.16e-22  8.83e-20  2.87e-18 |
----------------------------------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                                                   |     CHTI      CHTI      DAEJ |
----------------------------------------------------------------------+------------------------------+
