
 cls-file Version 2.0
 GPS week: 1900   Day: 2   MJD: 57546                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 brd |    96     0   2976     34      10     197    607    607      0   2357   2357      0    0.00
 cod |   288     0  20563     28    -599     238     18     16     20    147    205     77   16.90
 emr |   288     0  13772     27   -1556     774     25     26     22    105    122     59   11.37
 esa |   288     0  21020    813    -125   -1329     14     14     14    208    236    182   21.99
 gfz |   288     0  24642    866    -219     -82     11      9     12    114     97    122   27.22
 iga |    96     0   2976      3     210    -111     31     31      0    159    159      0    0.00
 igu |    96     0   2976      3     194     -79    630    630      0   1479   1479      0    0.00
 jpl |   288     0  16030      0     746      31     13     11     16    125     99    152   22.52
 ngs |    96     0   2976     55     -76     158    529    529      0   1719   1719      0    0.00
 usn |   288     0  18921    212   -2202     679     61     86     44    179    150    192    0.00
 whu |   288     0  20303    536  -12201     -71     51     49     52    153    162    145    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn   whu |
 -----+-------------------------------------------------------------------+
    1 |  -842   242  -127  -374    50  -130   -10   188  -517     -   141 |
    2 | -2094  -103   132   151   -62    -3 -1273   -62 -1870   -35   -63 |
    3 |    -7   109  -338  -228   215  -192   257    51   -34   176   -90 |
    5 | -2916    39    21  -183   109    33   -76     8 -2665   191   -19 |
    6 |  -534     4  -107  -160   153   -60  -371    22  -227   252  -102 |
    7 |   319    39     9  -212    92    21  1508    61   -44    79   -47 |
    8 |   731  -135    67    96    71    86  1641  -112   823    48  -271 |
    9 | -1262  -111  -109     5   195   -48  -208  -102 -1027    76   -41 |
   10 |   262    35   -13  -145    29   347  2930    87   435    65   150 |
   11 |  2407    54  -138    65   -64  -133  1328    42  2689     -   -71 |
   12 | -1700   280   -22  -179   -18   -48  -437    -1 -1366  -102  -189 |
   13 |  1682    15   -97  -105    77  -224  1524    47  1939     -   -15 |
   14 |  1391  -237    24   153   -30  -115 -1036    53  1602     -  -137 |
   15 | -1469   -87   139  -109    53     1  1148    37 -1135   122   -33 |
   16 |  1530  -335   -18   221    65    55  -413   -35  1796   -31  -101 |
   17 | -1594    74   -10  -290   175    49   459    21 -1429    15    -8 |
   18 |  2186    49   126     7    83  -161  -300  -207  2184    90  -134 |
   19 | -2049  -282    71   432   -86   174  -751  -142 -1753  -200   -24 |
   20 |  1673  -190    97   292   -70    41 -1014  -104  1653     -  -106 |
   21 |  1326  -422   131   462     X   153    -7  -200  1444     -  -114 |
   22 | -3537  -406   106   424    19   227  -883  -185 -3185     -  -136 |
   23 | -2249   142  -227   -47    45  -177  -472     0 -1905   -31  -233 |
   24 |  2564   204   -28  -338    80  -134 -5041    95  2604    41   -60 |
   25 |   415   205  -121   -87   -19  -114   543    15   399    -6  -116 |
   26 |   121    79  -120   -65    85   -75  1669   -37   200   -20    58 |
   27 |  -758   148  -118   -81   147   -36   378  -149  -335   -42  -144 |
   28 | 10651  -260   105   243   -24    54   346   -66  3562   -73  -167 |
   29 | -2451   296    64  -434    76   -18 -1319    77 -2190   253  -115 |
   30 | -1005   114    -9   -79    30    -2    24   -40  -830   -24  -191 |
   31 |   365   329   -94  -290    70   -62   278    -1   244  -136  -160 |
   32 |   473   -63   130   -78     X   507  -583    58   902     -   -13 |
 -----+-------------------------------------------------------------------+
 ADIS |     -     -     -   128   217     -     -  -387     -   443   326 |
 ALGO |     -   -58    87     -     -     -     -     -     -   -80    55 |
 ALRT |     -    44     -     -   -27     -     -     -     -   -29    80 |
 AMC2 |     -   -77   105     -     -     -     -     5     -   -62     - |
 AREV |     -     -     -    34   -28     -     -     -     -     -     - |
 ARTU |     -     -     -    68   -55     -     -     -     -   -66    73 |
 ASPA |     -    89     -   -10   -48     -     -     -     -   113    68 |
 BAKE |     -     -     -    56   -45     -     -     -     -   -62    -2 |
 BJNM |     -    -4     -     -     3     -     -     -     -     -     - |
 BRFT |     -     -     -   129  -104     -     -     -     -   -23     - |
 BRUX |     -    82     -     -   -51     -     -     -     -     -     - |
 CHAN |     -     -     -    12   -70     -     -    73     -     -    49 |
 CHPI |     -     -     -    55     4     -     -   -52     -   240    83 |
 CHTI |     -     1     -   -33     -     -     -    30     -     -    32 |
 CORD |     -    20     -     -   -14     -     -     3     -    33     - |
 CRO1 |     -     -   -15     -     6     -     -     -     -   -63     - |
 CUSV |     -     -     -   101   -81     -     -     -     -    94   106 |
 DAEJ |     -    -6     9     -     -     -     -     -     -     -     - |
 DGAV |     -     -     -    26   -39     -     -    22     -     -    58 |
 GMSD |     -     -     -   727  -588     -     -     -     -   481     - |
 GOL2 |     -     -    60   -31     -     -     -     -     -     -     - |
 GUAT |     -   -44     -    95   -49     -     -     -     -  -104   -12 |
 HARB |     -   -18    26     -     -     -     -     -     -    -2   115 |
 HOB2 |     -   123    46    60  -144     -     -     -     -    89   147 |
 HYDE |     -    -8     -   110   -84     -     -     -     -   -39    89 |
 IENG |     -    84   -20     -   -44     -     -     -     -   -46     - |
 INEG |     -     -     -     -   134     -     -  -162     -     -     X |
 ISPA |     -     -     -    48    -7     -     -   -39     -    29    19 |
 KELY |     -     -     -     -   -90     -     -   109     -  -162   -77 |
 KOKV |     -     -     -    37   -30     -     -     -     -     -    74 |
 LHAZ |     -     -     -  -499   404     -     -     -     -  -809     X |
 MAL2 |     -   -54     -    46    -5     -     -     -     -    17   -45 |
 MBAR |     -   -73     -    25    -3     -     -    34     -     -     - |
 NIST |     -     3    -5     -     -     -     -     -     -     -     - |
 NKLG |     -   -11     -   127   -96     -     -     -     -    95   110 |
 NNOR |     -     -    47   -24     -     -     -     -     -     -   -54 |
 NRIL |     -   -61     -    72   -28     -     -     9     -  -142    78 |
 NRMD |     -  -131     -     X     -     -     -    98     -     -    39 |
 NYA1 |     -    62    81     -   -72     -     -     -     -  -411    31 |
 OHI2 |     -   -32     -     -     2     -     -    22     -   -54   -46 |
 OPMT |     -    21   -31     -     -     -     -     -     -     1     - |
 OUS2 |     -     -     -   -14    12     -     -     -     -  -164     - |
 PALV |     -     -     -    44   -36     -     -     -     -     -     - |
 PBRI |     -     -     -   219   -92     -     -   -94     -     -     - |
 PDEL |     -     1     -     -  -114     -     -   134     -   -29     - |
 PETS |     -     -     -    -5   -69     -     -    88     -   -11     5 |
 PIMO |     -   -39     -    54  -102     -     -   100     -   207     - |
 POHN |     -     -     -  -578     -     -     -   565     -     -     - |
 PTBB |     -    63    41   -48   -17     -     -     -     -   -35     - |
 QAQ1 |     -    34    29   -41     -     -     -     -     -     -     - |
 RBAY |     -   177     -     X  -110     -     -     -     -    53    70 |
 RESO |     -     4     -     -    -3     -     -     -     -  -111    64 |
 REUN |     -  -131     -   106    -2     -     -     5     -   -53    88 |
 RIO2 |     -     -     -   -87    70     -     -     -     -   -11     - |
 RIOP |     -     3     -     -    -2     -     -     -     -   -32    82 |
 STHL |     -    -6     -    78   -59     -     -     0     -    15     - |
 SYDN |     -   -12    17     -     -     -     -     -     -    77    36 |
 THU3 |     -     8   -12     -     X     -     -     -     -  -109     - |
 TIXI |     -    81     -     X   -40     -     -   -11     -   -76   133 |
 TLSE |     -     5     -     -    -3     -     -     -     -  -114     - |
 TRO1 |     -   -68     -     -    42     -     -     -     -     -     - |
 TWTF |     -    72     -     -   -45     -     -     -     -     -   191 |
 ULAB |     -     -     -  -100    81     -     -     -     -     -    94 |
 UNSA |     -     -     -  -179   145     -     -     -     -     -   113 |
 VALD |     -     -     -   -45     -     -     -    44     -     -   -28 |
 WAB2 |     -    90    14     -   -62     -     -     -     -    70     - |
 WIND |     -   -45     -    21    11     -     -     -     -     -     - |
 XMIS |     -     -     -     -  -151     -     -   182     -   108   109 |
 ZAMB |     -   -19     -   110   -14     -     -   -77     -     -   205 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn   whu | NEPO    RMS
 -----+-------------------------------------------------------------------+-------------
    1 |   378    16    15     8     8    20   193     9   462     -    38 |  288    162
    2 |   252    18    16    12    11    26   512    11   344   111    53 |  288    225
    3 |   273    16    19    13    11    17   166    11   333    60    28 |  288     82
    5 |   447    11    15    16     8    12   321    16   530    86    37 |  288    423
    6 |   382    15    21    13     8    30   203    12   276    87    23 |  288    168
    7 |   771    22    23    12     8    35   433     8   464    61    49 |  288    374
    8 |   781    17    16    21    10    41   878    10   809    84    87 |  288    801
    9 |   549    16    16    14     7    29   228    12   255    50    27 |  288    196
   10 |   409    15    29    12     9     9   973     9   327    53    22 |  288    193
   11 |   390    18    25    15     8    21   569    12   452     -    51 |  288    397
   12 |   384    14    25     9    10    38   394    12   250    55    70 |  288    321
   13 |   516    17    25    15     8    28  1200    10   471     -    63 |  288    300
   14 |   428    24    38    22     7    33   327    12   412     -    38 |  288    256
   15 |   296    22    17    18     7    31   475    11   289    88    40 |  288    230
   16 |   519    14    44    12    16    32   374     9   461    72    39 |  288    373
   17 |   383    14    35    11    16    48   399    12   349   173    56 |  288    343
   18 |   301    23    29    16    10    16   248     9   275   105    41 |  288    259
   19 |   489    12    28    18     9    39   429    12   479   101    33 |  288    175
   20 |   700    18    39    11    10    26   388    14   628     -    18 |  288    248
   21 |   479    20    22    13     X    35   197    12   497     -    95 |  288    277
   22 |   654    17    33     8    13    19   411    11   445     -    30 |  288    200
   23 |   416    20    15    10     9    46   284    13   390    83    52 |  288    184
   24 |  1552    10    23    16     8    49  1346     9  1612    69    55 |  288   1797
   25 |   414    18    30    10    12    23   271    10   340    80    66 |  288    182
   26 |   427    16    34    19     9    23  1209    12   324    78    33 |  288    211
   27 |   467    12    24    24    10    17   369    16   330   117    53 |  288    248
   28 |  1532     9    20    12     9    43   627    13   535    63    59 |  288    416
   29 |   462    12    29     8     9    62   769    13   589   125    48 |  288    322
   30 |   534    23    15    14     8    31   416    10   550    78    52 |  288    283
   31 |   390    16    24     8     9    28   286    15   675    80    46 |  288    252
   32 |  1039    12    36    17     X    20  1455     9   721     -    23 |  288    306
 -----+-------------------------------------------------------------------+-------------
 ADIS |     -     -     -    12    13     -     -    15     -    41    39 |  288    >>>
 ALGO |     -    13    20     -     -     -     -     -     -    33    36 |  288     34
 ALRT |     -    13     -     -     8     -     -     -     -    38    22 |  288   5717
 AMC2 |     -    23    33     -     -     -     -    26     -    39     - |  288     39
 AREV |     -     -     -     7     6     -     -     -     -     -     - |  288   6026
 ARTU |     -     -     -     9     7     -     -     -     -    35    72 |  288   8508
 ASPA |     -    27     -    14    13     -     -     -     -    26    20 |  288   8681
 BAKE |     -     -     -     7     5     -     -     -     -    23    46 |  288   3239
 BJNM |     -    14     -     -     9     -     -     -     -     -     - |  238     48
 BRFT |     -     -     -    19    16     -     -     -     -    61     - |  288   3462
 BRUX |     -    18     -     -    11     -     -     -     -     -     - |  287     40
 CHAN |     -     -     -    12    13     -     -    10     -     -    28 |  288     69
 CHPI |     -     -     -    16    16     -     -    21     -    42    49 |  288   3773
 CHTI |     -    21     -     9     -     -     -    11     -     -    88 |  288   4483
 CORD |     -    20     -     -    12     -     -    10     -    24     - |  288   4377
 CRO1 |     -     -    28     -    12     -     -     -     -    36     - |  288     30
 CUSV |     -     -     -    14    12     -     -     -     -    53    34 |  288   8267
 DAEJ |     -    10    14     -     -     -     -     -     -     -     - |  279   2903
 DGAV |     -     -     -    12    11     -     -    13     -     -   110 |  288  10699
 GMSD |     -     -     -    13    10     -     -     -     -    27     - |  275   4462
 GOL2 |     -     -    19    10     -     -     -     -     -     -     - |  288    166
 GUAT |     -    17     -    12    12     -     -     -     -    35    55 |  264   3212
 HARB |     -    12    18     -     -     -     -     -     -    50    55 |  288    881
 HOB2 |     -    14    19    11    11     -     -     -     -    22    62 |  288     25
 HYDE |     -    29     -    18    12     -     -     -     -    81    54 |  288   3754
 IENG |     -    17    19     -    11     -     -     -     -    21     - |  288     61
 INEG |     -     -     -     -     9     -     -    11     -     -     X |  288   3575
 ISPA |     -     -     -    14    13     -     -    16     -    27    26 |  288  10738
 KELY |     -     -     -     -     8     -     -    10     -    20    27 |  288   8473
 KOKV |     -     -     -     9     8     -     -     -     -     -    60 |  288    149
 LHAZ |     -     -     -     9     7     -     -     -     -   114     X |  288   5833
 MAL2 |     -    27     -    17    18     -     -     -     -    83    73 |  273   7269
 MBAR |     -    30     -    26    32     -     -    22     -     -     - |  288    >>>
 NIST |     -    13    19     -     -     -     -     -     -     -     - |  288     38
 NKLG |     -    12     -    10     9     -     -     -     -    46    25 |  288   5020
 NNOR |     -     -    23    12     -     -     -     -     -     -    60 |  273  53825
 NRIL |     -    12     -    15    11     -     -    11     -    23    27 |  288   7764
 NRMD |     -    14     -     X     -     -     -    11     -     -    39 |  245   3364
 NYA1 |     -     9    17     -     9     -     -     -     -    47    24 |  288   3627
 OHI2 |     -    16     -     -    12     -     -    15     -    29    23 |  288     30
 OPMT |     -    11    17     -     -     -     -     -     -    39     - |  288     38
 OUS2 |     -     -     -    11     9     -     -     -     -    89     - |  288    >>>
 PALV |     -     -     -     8     6     -     -     -     -     -     - |  288   2769
 PBRI |     -     -     -    13    13     -     -    14     -     -     - |  288   3875
 PDEL |     -    23     -     -    24     -     -    16     -    35     - |  288   2615
 PETS |     -     -     -    13    12     -     -    11     -    38    24 |  288   9585
 PIMO |     -    16     -    14    13     -     -    14     -    29     - |  288   7690
 POHN |     -     -     -    38     -     -     -    37     -     -     - |  236  12152
 PTBB |     -    15    12     9    10     -     -     -     -    38     - |  288    106
 QAQ1 |     -    30    37    15     -     -     -     -     -     -     - |  282  20078
 RBAY |     -    19     -     X    12     -     -     -     -    20    20 |  288   5485
 RESO |     -    19     -     -    12     -     -     -     -    47    27 |  288   6433
 REUN |     -    17     -    15    15     -     -    21     -    46    40 |  288   5463
 RIO2 |     -     -     -     8     6     -     -     -     -    36     - |  288    >>>
 RIOP |     -    29     -     -    18     -     -     -     -    35    70 |  288   6432
 STHL |     -    18     -    14    11     -     -    13     -    35     - |  288  12217
 SYDN |     -     8    12     -     -     -     -     -     -    52    83 |  286    756
 THU3 |     -    24    36     -     X     -     -     -     -    32     - |  271   5131
 TIXI |     -    32     -     X    20     -     -    22     -    44    38 |  285    >>>
 TLSE |     -    19     -     -    12     -     -     -     -    48     - |  288   1477
 TRO1 |     -    11     -     -     7     -     -     -     -     -     - |  288   3378
 TWTF |     -    35     -     -    22     -     -     -     -     -    96 |  285     47
 ULAB |     -     -     -    16    13     -     -     -     -     -    29 |  288    >>>
 UNSA |     -     -     -    14    11     -     -     -     -     -    39 |  288    >>>
 VALD |     -     -     -     9     -     -     -     9     -     -    45 |  288   3842
 WAB2 |     -    28    16     -    16     -     -     -     -    21     - |  288     30
 WIND |     -    20     -    15    12     -     -     -     -     -     - |  288    >>>
 XMIS |     -     -     -     -    12     -     -    15     -    41    98 |  288   8654
 ZAMB |     -    22     -    13     9     -     -     8     -     -    36 |  288   8000
 -----+-------------------------------------------------------------------+-------------
 TOT  |   607    19    25    14    12    32   631    14   529    62    51 |
-----------------------------------------------------------------------------------------------------
-----------------------------------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN     MEAN     MEAN     MEAN   | HADAMARD DEVIATION AT TAU =  |
      | NREPO NBEPO  BRKS  USED    WGT1(%)  WGT2(%)  WGT3(%)  WGT4(%) |     300s     3600s    21600s |
------+---------------------------------------------------------------+------------------------------+
 AMC2 |   288   280     4   288     8.28     8.27     8.28     8.28   | 5.79e-14  1.70e-14  1.99e-15 |
 OHI2 |   288   288     0   288     2.43     8.27     1.70     1.70   | 3.98e-14  7.03e-15  2.90e-15 |
 PTBB |   288   288     0   288     8.28     8.27     8.28     8.28   | 3.80e-14  8.09e-15  8.73e-15 |
 WAB2 |   288   285     1   288     8.28     8.27     1.40     1.40   | 4.54e-14  9.41e-15  3.38e-15 |
 IENG |   288   288     0   288     7.54     8.27     2.88     2.88   | 4.82e-14  1.47e-14  4.25e-15 |
 KOKV |   288   285     1   288     6.04     8.27     8.28     8.28   | 6.33e-14  8.95e-15  3.34e-15 |
 NIST |   288   288     0   288     8.23     8.22     8.28     8.28   | 4.33e-14  9.62e-15  1.58e-15 |
 HOB2 |   288   288     0   288     2.20     8.18     2.86     2.86   | 3.55e-14  8.11e-15  1.92e-15 |
 G06  |   288   279     3   288     5.18     6.90     7.73     7.73   | 7.61e-14  2.59e-14  1.50e-14 |
 BJNM |   238   238     0   238     1.63     5.51     3.10     3.10   | 6.11e-14  1.03e-14  6.96e-15 |
 GOL2 |   288   288     0   288     1.58     4.37     2.75     2.75   | 8.40e-14  1.30e-14  6.20e-15 |
 G03  |   288   288     3   288     6.36     3.26     1.04     1.04   | 5.53e-14  1.82e-14  8.50e-15 |
 G09  |   288   286     0   288     5.99     2.74     0.81     0.81   | 6.57e-14  2.39e-14  2.41e-14 |
 TWTF |   285   285     0   285     1.21     2.58     2.91     2.91   | 1.60e-13  1.68e-14  3.14e-15 |
 G18  |   288   288     0   288     0.67     1.47     0.78     0.78   | 7.87e-13  6.51e-14  3.45e-14 |
 G01  |   288   288     0   288     2.69     0.84     8.13     8.13   | 8.12e-14  3.06e-14  2.22e-14 |
 G10  |   288   288     0   288     0.90     0.70     0.19     0.19   | 8.00e-14  2.49e-14  5.91e-15 |
 G30  |   288   288     0   288     2.17     0.63     8.28     8.28   | 7.36e-14  2.96e-14  3.23e-14 |
 G23  |   288   288     0   288     0.72     0.54     4.33     4.33   | 5.54e-13  5.79e-14  9.13e-15 |
 G25  |   288   288     0   288     1.65     0.51     2.78     2.78   | 6.64e-14  2.41e-14  2.04e-14 |
 G31  |   288   288     0   288     0.65     0.45     0.76     0.76   | 5.81e-13  5.94e-14  2.46e-14 |
 G16  |   288   288     0   288     0.62     0.42     1.70     1.70   | 6.89e-13  6.86e-14  5.51e-14 |
 G07  |   288   288     0   288     0.61     0.41     0.88     0.88   | 6.52e-13  6.66e-14  2.33e-14 |
 G15  |   288   288     0   288     0.61     0.40     2.61     2.61   | 6.51e-13  6.45e-14  2.30e-14 |
 G19  |   288   288     0   288     0.60     0.40     0.96     0.96   | 7.10e-13  8.47e-14  1.46e-14 |
 G14  |   288   288     0   288     0.60     0.39     2.34     2.34   | 7.23e-13  7.36e-14  3.03e-14 |
 G29  |   288   288     0   288     0.59     0.38     0.30     0.30   | 7.35e-13  7.89e-14  2.16e-14 |
 G32  |   288   288     0   288     4.47     0.37     1.07     1.07   | 6.87e-14  2.18e-14  2.61e-14 |
 G26  |   288   285     1   288     8.27     0.34     0.82     0.82   | 8.00e-14  3.37e-14  1.44e-14 |
 G22  |   288   288     0   288     0.80     0.25     1.44     1.44   | 6.82e-13  7.30e-14  1.78e-14 |
 G05  |   288   288     0    89     0.16     0.10     2.35     2.35   | 6.70e-13  6.76e-14  3.94e-14 |
 ALGO |   288   287     1     0     0.00     0.00     0.00     0.00   | 3.75e-14  1.04e-14  3.15e-15 |
 BRFT |   288     0     0     0     0.00     0.00     0.00     0.00   | 4.50e-27  3.75e-28  6.25e-29 |
 CHAN |   288   288     0     0     0.00     0.00     0.00     0.00   | 9.52e-14  1.45e-14  9.13e-15 |
 CRO1 |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.06e-13  1.39e-14  2.36e-15 |
 G02  |   288   288     0     0     0.00     0.00     0.00     0.00   | 5.18e-13  6.67e-14  2.24e-14 |
 G08  |   288   288     0     0     0.00     0.00     0.00     0.00   | 7.28e-13  2.73e-13  7.75e-14 |
 G11  |   288   288     0     0     0.00     0.00     0.00     0.00   | 8.25e-13  8.28e-14  5.11e-14 |
 G12  |   288   288     0     0     0.00     0.00     0.00     0.00   | 6.04e-13  6.44e-14  3.91e-14 |
 G13  |   288   288     0     0     0.00     0.00     0.00     0.00   | 6.15e-13  6.30e-14  2.63e-14 |
 G17  |   288   288     0     0     0.00     0.00     0.00     0.00   | 9.27e-13  9.06e-14  3.84e-14 |
 G20  |   288   288     0     0     0.00     0.00     0.00     0.00   | 9.97e-13  8.01e-14  1.93e-14 |
 G21  |   288   288     0     0     0.00     0.00     0.00     0.00   | 9.49e-13  9.46e-14  3.29e-14 |
 G24  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.05e-12  3.11e-13  2.27e-13 |
 G27  |   288   288     0     0     0.00     0.00     0.00     0.00   | 6.72e-14  3.28e-14  2.51e-14 |
 G28  |   288   288     0     0     0.00     0.00     0.00     0.00   | 6.90e-13  7.58e-14  1.84e-14 |
 NNOR |   273   269     2     0     0.00     0.00     0.00     0.00   | 3.94e-11  1.23e-11  3.27e-12 |
 PDEL |   288   240    16     0     0.00     0.00     0.00     0.00   | 4.27e-12  1.24e-12  1.94e-13 |
 GPST |   288   285     1     0     0.00     0.00     0.00     0.00   | 6.44e-14  8.44e-15  2.06e-15 |
 TLSE |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.62e-12  7.23e-13  1.36e-13 |
 HARB |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.40e-12  3.49e-13  6.82e-14 |
 SYDN |   286   286     0     0     0.00     0.00     0.00     0.00   | 6.92e-13  1.77e-13  8.61e-14 |
 BRUX |   287   283     1     0     0.00     0.00     0.00     0.00   | 5.11e-14  1.91e-14  4.97e-15 |
 OPMT |   288   288     0     0     0.00     0.00     0.00     0.00   | 4.60e-14  1.22e-14  5.64e-15 |
------+---------------------------------------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:                                         | 6.00e-22  6.82e-20  2.37e-18 |
----------------------------------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                                                   |     BRFT      BRFT      BRFT |
----------------------------------------------------------------------+------------------------------+
