
 cls-file Version 2.0
 GPS week: 1896   Day: 6   MJD: 57522                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 brd |    96     0   2976     46     268    -371    748    748      0   2233   2233      0    0.00
 cod |   288     0  17514    302    -731     275     15     15     15    163    215     74   22.03
 emr |   288     0  12656      0   -1488    1561     15     16     11    105    123     38   23.25
 esa |   288     0  17704      0    -489    1117     12     11     12    198    249    126   27.65
 iga |    96     0   2976     17  -13405   -1885     41     41      0    263    263      0    0.00
 igc |   288     0   8587      0    4987    -271    167    167      0  10801  10801      0    0.00
 igu |    96     0   2976     17  -13346   -2110    920    920      0   1636   1636      0    0.00
 jpl |   288     0  16917      0    3019    -459     12     11     13    135    133    137   27.07
 ngs |    96     0   2976     22  -13240   -2119    735    735      0   2079   2079      0    0.00
 usn |   288     0  14079      0   -1728    1673     66     75     58    201    185    211    0.00
 whu |   288     0  14649      0   -9245    -479     47     50     42    171    192    134    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   iga   igc   igu   jpl   ngs   usn   whu |
 -----+-------------------------------------------------------------------+
    1 |  -223   266   -83  -362  -114  -102  -198   224     1     -   216 |
    2 | -2455  -147    56   155   -85  -160 -1505   -87 -2354  -161  -116 |
    3 |   264    65    22  -104   -89  -100   462    36   274   127   -41 |
    5 | -1501    46    70  -196    51   446 -1180   103 -1391   229   152 |
    6 |   158   -15   147   -99   -91    -6  -807   -14   -60     -   -46 |
    7 | -2361    50    53  -155    75   113 -1238    72 -2317   139    74 |
    8 |  3436  -119   134   157     4  -172 -2578  -179  2802    99  -187 |
    9 |   199   -10    -1    92   -28  -394   176   -85    30    53    -6 |
   10 |   760    92    25   -70  1193  -328  1967   -25   491    79   264 |
   11 |  1998    80   -41   -24  -126   226  -848    -6  2131     -   -34 |
   12 | -1753   325   -66  -309  -156  -331 -1167   108 -1618     -  -109 |
   13 |  2815    59   -64  -102  -153   -40  1846   112  2756     -    55 |
   14 |  2689   -95   -57   193   -43   -18   122   -72  2362   -63   -99 |
   15 | -1641   -36    40   -46    95   109   -49    42 -1717     -    64 |
   16 |   939  -285    57   293   -16   244   -95  -117   869    50   -80 |
   17 | -1782   166   -24  -242    35   166   241   133 -1532     -   125 |
   18 |  2526    28  -538   162  -336     -  -957   273  2743  -457  -700 |
   19 | -2506  -196   -18   321    27  -131   860  -153 -2416  -272  -170 |
   20 |  1561  -234    55   388   -40   246  -246  -253  1718    -1    22 |
   21 |  1418  -383    -4   559    99   212   982  -256  1620   -94   -88 |
   22 | -3437  -484   150   458    93    11 -1011  -202 -3327  -191  -153 |
   23 | -1049   172  -102   -61  -191  -516   -13    10 -1165  -121  -194 |
   24 | -2784   277   -18  -351  -122    82  1861   149 -1730   129   106 |
   25 |  -690   305  -122   -87  -231  -132  -279   -55  -524    -7  -193 |
   26 |   198   155    24  -119   -84    64  1658   -25   206    54    15 |
   27 | -1422   157    75  -108   -27   -42   -40   -82 -1031     -   -79 |
   28 |  5147  -204    24   221   -28   -17  4004   -80  4704     -   -93 |
   29 | -3266   398   -25  -479   -13   226  -264   187 -2686   211    95 |
   30 |   525   132    44  -129   -83  -377  -375   -13   282   -73  -173 |
   31 | -1149   352   -92  -307   -94  -253  1473   107 -1180     -   -40 |
   32 |  2028     7   122   -17   616    33 -2459   -93  1636   166    93 |
 -----+-------------------------------------------------------------------+
 AMC2 |     -  -101    55     -     -     -     -    35     -   -70     - |
 ASPA |     -   136     -   -38     -     -     -   -74     -   218   127 |
 BRST |     -   -33     -    26     -     -     -     -     -     -    81 |
 CGGN |     -     -     -    13     -     -     -   -13     -  -194     - |
 CHPI |     -     -     -    54     -     -     -   -55     -  -119    64 |
 CHTI |     -    33     -    46     -     -     -   -72     -     -    50 |
 DAEJ |     -    49   -46     -     -     -     -     -     -     -     - |
 DGAV |     -     -     -    29     -     -     -   -30     -    29   128 |
 GMSD |     -     -     -    15     -     -     -   -16     -  -189     - |
 GOL2 |     -     -   -29    24     -     -     -     -     -  -117     - |
 HARB |     -   -51    49     -     -     -     -     -     -   -89   232 |
 HERS |     -   -12    12     -     -     -     -     -     -   -22     - |
 HYDE |     -     X     -    63     -     -     -   -64     -    72    39 |
 IENG |     -   -24    23     -     -     -     -     -     -   108     - |
 IRKM |     -     -    54     -     -     -     -   -46     -     -     - |
 ISPA |     -     -     -   103     -     -     -  -105     -   -31   144 |
 MBAR |     -   -50     -    40     -     -     -     -     -     -     - |
 MGUE |     -     -     -    56     -     -     -   -57     -     -     - |
 NIST |     -     0     0     -     -     -     -     -     -     -     - |
 NKLG |     -  -131     -   105     -     -     -     -     -  -224    91 |
 NRIL |     -   -49     -    68     -     -     -   -29     -   -59   155 |
 NYA1 |     -     4    -3     -     -     -     -     -     -   879   140 |
 OHI2 |     -    44     -     -     -     -     -   -36     -  -142    -5 |
 OPMT |     -   -38    36     -     -     -     -     -     -    51     - |
 PDEL |     -     6     -     -     -     -     -    -5     -    50     - |
 PETS |     -     -     -   -19     -     -     -    19     -    72   -60 |
 PIMO |     -  -165     -   -42     -     -     -   177     -   -85     - |
 POHN |     -     -     -  -589     -     -     -   602     -     -     - |
 POLV |     -     -     -   -50     -     -     -    51     -   166     - |
 PTBB |     -    16    17   -28     -     -     -     -     -    25     - |
 QAQ1 |     -    19     -   -15     -     -     -     -     -     -     - |
 RBAY |     -  -121     -    96     -     -     -     -     -  -156    62 |
 REUN |     -  -112     -    93     -     -     -    -3     -  -238    40 |
 RIGA |     -     -     -    40     -     -     -   -41     -    72     - |
 SSIA |     -     -     -   193     -     -     -  -197     -   -73     - |
 STHL |     -    28     -    -2     -     -     -   -21     -   -10     - |
 THU3 |     -   -50    -3     -     -     -     -    43     -    16     - |
 TIXI |     -   -36     -    56     -     -     -   -28     -   -19    78 |
 URUM |     -   -41     -    11     -     -     -    22     -     -   -52 |
 VALD |     -     -     -   -16     -     -     -    16     -     -  -119 |
 WAB2 |     -     8    -8     -     -     -     -     -     -   126     - |
 WIND |     -  -102     -    81     -     -     -     -     -     -     - |
 YKRO |     -   -76     -  -152     -     -     -   217     -     -   -62 |
 ZAMB |     -   -81     -   100     -     -     -   -36     -     -   195 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   iga   igc   igu   jpl   ngs   usn   whu | NEPO    RMS
 -----+-------------------------------------------------------------------+-------------
    1 |   393    17    20     9    23   110   359     9   445     -    50 |  288    131
    2 |   548    10     9    10    25    88   796     7   522    94    27 |  288    174
    3 |   439    34    17    13    26   337   295     9   317    58    34 |  288    131
    5 |   443    10    13    11    36    83   829     9   459    86    53 |  288    414
    6 |   341    13     9    10    20    83   447     7   247     -    42 |  288    151
    7 |   268     7    22     9    48    72   374    16   352    35    43 |  288    193
    8 |  1450    17    20    10    55   359  1593    23  1470    75    51 |  288   1564
    9 |   405     8    14    10    39   116   173     9   453    37    45 |  288    173
   10 |   825     8    10     9    56   355   677    10   827    63    48 |  288    165
   11 |   726    20    16     9    31   163   373     9   596     -    73 |  288    313
   12 |   601    11    15     9    56    62   750     8   548     -    50 |  288    322
   13 |  1232    12     8     6    42    79  1465    11  1072     -    27 |  288    400
   14 |  1051    17    10    16    46    57   230     8   778    56    46 |  288    228
   15 |   276     8    16     7    49    69   226    15   235     -    67 |  288    241
   16 |   753     8    15    10    51    53   419    11   568    63    75 |  288    337
   17 |   370    11    24    15    51   108   271    10   382     -    48 |  288    267
   18 |   372    13    12     8    31     -   452     9   345    76    60 |  288    345
   19 |   221    11    22    16    43   160   337    11   290   107    62 |  288    221
   20 |   341     9    12     9    30    61   297     9   340    75    66 |  288    326
   21 |   289    10    10     9    43   374   363    12   348    87    62 |  288    260
   22 |   728    15    20     8    41   320   707     9   677    83    25 |  288    303
   23 |   494    22    15    14    49   106   332    12   510    64    32 |  288    219
   24 |  1868    19     9     7    31    78  2628    12  1872   118    31 |  288   1954
   25 |   145    18    21     8    36    82   143    13   219    85    27 |  288    189
   26 |   420    13    23    21    33    68  1095    11   393    70    37 |  288    149
   27 |   567    26    11    10    35    99   303    16   531     -    55 |  288    273
   28 |  1696    13    31    21    42    75  2007    15  1585     -    28 |  288    348
   29 |   880    13    17     8    62   185   421    13   951    79    87 |  288    398
   30 |   455    11    14     9    33    99   387    11   400    44    49 |  288    232
   31 |  1079    14    21    19    49    69  1092    10  1080     -    57 |  288    478
   32 |   729    14    13    12    40   104  2147    10   899    60    42 |  288    335
 -----+-------------------------------------------------------------------+-------------
 AMC2 |     -    17    12     -     -     -     -    11     -    14     - |  288     23
 ASPA |     -    14     -     8     -     -     -    10     -    28    21 |  288   7885
 BRST |     -    11     -     8     -     -     -     -     -     -    33 |  288   6806
 CGGN |     -     -     -    22     -     -     -    22     -    49     - |  263   4091
 CHPI |     -     -     -     8     -     -     -     8     -    44    23 |  288   4341
 CHTI |     -    13     -     9     -     -     -    11     -     -    78 |  288   3722
 DAEJ |     -    13    12     -     -     -     -     -     -     -     - |  280   3231
 DGAV |     -     -     -    10     -     -     -    10     -    38    36 |  288   9060
 GMSD |     -     -     -     7     -     -     -     7     -    27     - |  288   4824
 GOL2 |     -     -    19    16     -     -     -     -     -    21     - |  288    109
 HARB |     -     9     8     -     -     -     -     -     -    24    45 |  288   1362
 HERS |     -    15    14     -     -     -     -     -     -    19     - |  288     58
 HYDE |     -     X     -    12     -     -     -    12     -    41    40 |  288   3906
 IENG |     -    14    13     -     -     -     -     -     -    20     - |  288     37
 IRKM |     -     -     8     -     -     -     -     7     -     -     - |  288    197
 ISPA |     -     -     -    14     -     -     -    14     -    46    40 |  288  13959
 MBAR |     -    12     -    10     -     -     -     -     -     -     - |  288    >>>
 MGUE |     -     -     -     4     -     -     -     4     -     -     - |  288     19
 NIST |     -     6     6     -     -     -     -     -     -     -     - |  287     21
 NKLG |     -    15     -    12     -     -     -     -     -    42    24 |  276   6870
 NRIL |     -    12     -     6     -     -     -     9     -    23    10 |  288   6399
 NYA1 |     -     9     8     -     -     -     -     -     -    27    30 |  285   3255
 OHI2 |     -    17     -     -     -     -     -    14     -    21   117 |  288     85
 OPMT |     -     8     8     -     -     -     -     -     -    29     - |  288     36
 PDEL |     -    10     -     -     -     -     -     8     -    21     - |  288   2501
 PETS |     -     -     -     7     -     -     -     7     -    55    21 |  288  10114
 PIMO |     -    15     -    15     -     -     -    13     -    36     - |  288   8002
 POHN |     -     -     -    27     -     -     -    28     -     -     - |  276  11027
 POLV |     -     -     -     7     -     -     -     7     -    20     - |  275   2994
 PTBB |     -    10    11    11     -     -     -     -     -    20     - |  288     44
 QAQ1 |     -    12     -    10     -     -     -     -     -     -     - |  283    >>>
 RBAY |     -    33     -    26     -     -     -     -     -    42    35 |  264   4933
 REUN |     -    12     -    10     -     -     -    10     -    31    34 |  288   4879
 RIGA |     -     -     -     7     -     -     -     7     -    27     - |  276   6635
 SSIA |     -     -     -    16     -     -     -    16     -    32     - |  275   7515
 STHL |     -    30     -    14     -     -     -    17     -    50     - |  288  14414
 THU3 |     -     7     7     -     -     -     -     8     -    23     - |  288   5739
 TIXI |     -    18     -    18     -     -     -    30     -   263    26 |  288    >>>
 URUM |     -    19     -     8     -     -     -    13     -     -    11 |  288    >>>
 VALD |     -     -     -     9     -     -     -     9     -     -    35 |  288   5133
 WAB2 |     -    18    17     -     -     -     -     -     -    28     - |  288     18
 WIND |     -    10     -     8     -     -     -     -     -     -     - |  288    >>>
 YKRO |     -    13     -    12     -     -     -    13     -     -    36 |  288  16018
 ZAMB |     -    16     -     7     -     -     -    13     -     -    24 |  288  11037
 -----+-------------------------------------------------------------------+-------------
 TOT  |   749    15    15    12    41   167   920    12   736    66    48 |
-----------------------------------------------------------------------------------------------------
-----------------------------------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN     MEAN     MEAN     MEAN   | HADAMARD DEVIATION AT TAU =  |
      | NREPO NBEPO  BRKS  USED    WGT1(%)  WGT2(%)  WGT3(%)  WGT4(%) |     300s     3600s    21600s |
------+---------------------------------------------------------------+------------------------------+
 AMC2 |   288   288     0   288     8.10     8.11     8.10     8.10   | 3.85e-14  6.54e-15  1.88e-15 |
 PTBB |   288   288     0   288     8.10     8.11     8.10     8.10   | 3.64e-14  9.59e-15  2.64e-15 |
 HERS |   288   288     0   288     8.10     8.11     8.10     8.10   | 3.85e-14  8.15e-15  3.08e-15 |
 NIST |   287   284     1   287     8.05     8.08     8.07     8.07   | 7.55e-14  8.19e-15  2.01e-15 |
 MGUE |   288   288     0   288     8.04     8.07     8.10     8.10   | 3.90e-14  7.45e-15  2.08e-15 |
 WAB2 |   288   288     0   288     8.04     8.06     1.62     1.62   | 3.35e-14  1.19e-14  1.76e-15 |
 G03  |   288   286     1   288     5.69     5.91     1.20     1.20   | 5.74e-14  1.45e-14  1.85e-14 |
 GOL2 |   288   288     0   288     1.28     5.78     2.78     2.78   | 8.46e-14  1.34e-14  5.58e-15 |
 IENG |   288   284     2   201     4.38     5.49     2.42     2.42   | 5.24e-14  1.13e-14  3.78e-15 |
 OHI2 |   288   288     0   200     1.29     5.46     1.26     1.26   | 3.70e-14  5.40e-15  1.31e-15 |
 G09  |   288   285     2   267     5.11     4.42     0.89     0.89   | 7.53e-14  3.16e-14  1.66e-14 |
 G06  |   288   272     5   152     2.35     4.12     4.11     4.11   | 9.42e-14  2.91e-14  1.09e-14 |
 G27  |   288   288     0   288     7.25     3.12     0.55     0.55   | 5.67e-14  1.83e-14  3.78e-14 |
 G18  |   288   288     0   288     0.62     2.63     0.92     0.92   | 8.04e-13  6.82e-14  3.86e-14 |
 IRKM |   288   288     0   288     0.64     1.46     0.13     0.13   | 1.43e-13  2.09e-14  1.43e-14 |
 G01  |   288   288     0   288     1.83     1.38     8.10     8.10   | 6.07e-14  1.83e-14  6.55e-15 |
 G30  |   288   288     0   288     1.50     1.02     8.10     8.10   | 6.56e-14  2.52e-14  2.02e-14 |
 G10  |   288   288     0   288     0.70     0.96     0.19     0.19   | 7.51e-14  2.08e-14  2.13e-14 |
 G23  |   288   288     0   288     0.68     0.96     4.82     4.82   | 5.26e-13  6.36e-14  1.46e-14 |
 G02  |   288   288     0   288     0.66     0.92     3.84     3.84   | 5.49e-13  6.38e-14  1.91e-14 |
 G25  |   288   288     0   288     1.16     0.85     3.17     3.17   | 6.17e-14  1.67e-14  2.19e-14 |
 G31  |   288   288     0   288     0.61     0.80     0.89     0.89   | 5.66e-13  6.15e-14  3.58e-14 |
 G07  |   288   288     0   288     0.58     0.74     1.03     1.03   | 6.66e-13  6.56e-14  1.13e-14 |
 G15  |   288   288     0   288     0.57     0.73     3.01     3.01   | 6.88e-13  6.76e-14  2.68e-14 |
 G19  |   288   288     0   288     0.57     0.73     1.13     1.13   | 6.66e-13  6.96e-14  2.95e-14 |
 G16  |   288   288     0   288     0.57     0.73     1.94     1.94   | 6.04e-13  6.80e-14  4.40e-14 |
 G14  |   288   288     0   288     0.57     0.72     2.73     2.73   | 7.14e-13  7.80e-14  2.47e-14 |
 G29  |   288   288     0   288     0.56     0.69     0.36     0.36   | 6.35e-13  7.11e-14  3.88e-14 |
 G32  |   288   288     0   288     2.79     0.60     1.10     1.10   | 6.09e-14  3.24e-14  1.13e-14 |
 G26  |   288   288     0   288     8.09     0.50     0.60     0.60   | 6.76e-14  2.34e-14  1.70e-14 |
 G22  |   288   288     0   288     0.73     0.44     1.66     1.66   | 6.84e-13  7.35e-14  3.76e-14 |
 G13  |   288   278     5   288     0.77     0.31     0.96     0.96   | 9.14e-13  1.68e-13  3.39e-14 |
 G05  |   288   288     0     0     0.00     0.00     0.00     0.00   | 7.94e-13  8.07e-14  4.89e-14 |
 G08  |   288   288     0     0     0.00     0.00     0.00     0.00   | 7.78e-13  1.87e-13  1.38e-13 |
 G11  |   288   288     0     0     0.00     0.00     0.00     0.00   | 7.43e-13  7.38e-14  4.21e-14 |
 G12  |   288   288     0     0     0.00     0.00     0.00     0.00   | 7.62e-13  7.57e-14  3.72e-14 |
 G17  |   288   288     0     0     0.00     0.00     0.00     0.00   | 8.86e-13  8.12e-14  1.67e-14 |
 G20  |   288   288     0     0     0.00     0.00     0.00     0.00   | 8.72e-13  9.20e-14  2.64e-14 |
 G21  |   288   288     0     0     0.00     0.00     0.00     0.00   | 9.80e-13  1.04e-13  1.87e-14 |
 G24  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.08e-12  2.90e-13  1.04e-13 |
 G28  |   288   288     0     0     0.00     0.00     0.00     0.00   | 8.02e-13  7.18e-14  1.57e-14 |
 GPST |   288   288     0     0     0.00     0.00     0.00     0.00   | 2.66e-14  6.18e-15  1.41e-15 |
 HARB |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.39e-12  4.22e-13  1.39e-13 |
 BRST |   288     0     0     0     0.00     0.00     0.00     0.00   | 0.00e+00  0.00e+00  0.00e+00 |
 OPMT |   288   288     0     0     0.00     0.00     0.00     0.00   | 3.74e-14  7.44e-15  4.20e-15 |
------+---------------------------------------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:                                         | 6.18e-22  7.29e-20  2.68e-18 |
----------------------------------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                                                   |     BRST      BRST      OHI2 |
----------------------------------------------------------------------+------------------------------+
