
 cls-file Version 2.0
 GPS week: 1774   Day: 3   MJD: 56665                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 brd |    96     0   2971      0      -5     -57   2068   2068      0   4653   4653      0    0.00
 cod |   288     0  24454    722    -550     -21     27     32     23     93     73    102   14.94
 emr |   288     0  18955    866    1078   -2179     22     23     21    103     80    120   19.04
 esa |   288     0  26271    298      22   -1396     13     14     13     91    100     85   31.30
 iga |    96     0   2971     15      -5     -68     36     36      0     71     71      0    0.00
 igu |    96     0   2779     18     -94     224   1088   1088      0   2433   2433      0    0.00
 jpl |   288     0  25045    566    2030    -802     12     12     12     76     84     72   34.72
 ngs |    96     0   2971      2      16     -81   1769   1769      0   3958   3958      0    0.00
 usn |   288     0  22065    472    -150   -2595     52     68     39    140    167    120    0.00
 whu |   288     0  15146    605   -7380   14896    106    105    109    589    701    345    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   iga   igu   jpl   ngs   usn   whu |
 -----+-------------------------------------------------------------+
    1 |  2490     0   -36   -33   -32     -    48  2286  -137  -320 |
    2 |   948   -22     6   108     7   299   -91   -76   609   839 |
    3 | -8605   -25  -184   122   -25 -6786     X -6738   -84    30 |
    4 |   112   -42    27   -33    19  -323    33 -1469   162  -335 |
    5 |  -442   -15    -6   -73    16  1063    76  -315   123  -647 |
    6 | -5693   -19  -105    72    13 -2296     X -5511   -46  -130 |
    7 |  1028   -13   -21  -162   -92  -529   163   510   -50  -372 |
    8 | -5492  -135    31   -43   -80 -5831    79 -4013   187    40 |
    9 | -7651   -84   -49   -35   -62 -4324    95 -6051   -44  -262 |
   10 | -7445  -108    54   114    27  1915   -86 -5133  -195  -256 |
   11 |  5052    24   -60  -129   -57  1588   139  4186   192   395 |
   12 | -1248    69    32    32    20   476   -76  -779     4  -315 |
   13 |  6608   -86   -76    30    33  1977    52  5632   -89   -18 |
   14 |  4521   -14   -91   134   140  1488   -65  4161    61   221 |
   15 |  -224    34   -82   -48   -27   566    73  -500    39  -479 |
   16 |  3234    44   -41   -44   -22   775    45  3188    37   105 |
   17 | -1875     X     X  -183  -108  -129   165 -1744    82  -403 |
   18 |  4936    83    -6  -152     3   545   105  4217   150   191 |
   19 |  2492    16    -6   -11    -8  2361     6  1911   -35   474 |
   20 |  3416    33  -109   -19   -67  1117    63  3207   -78   -94 |
   21 |  4549    56   -78    -6    67   747    24  4295     7   195 |
   22 | -2063   -19   -19   128   128   809   -95 -1808    54   161 |
   23 |  1127    28     5   -67   -20  1274    46   858    -8   243 |
   24 |  4609    37    41   -65     1   985    20  4130   -14  -561 |
   25 |  1800     7    33   -69   -30   420    41  1814   -82  -267 |
   26 | -4508    -5   123   -67    13   781    -5 -3907    -3  -216 |
   27 |   972    -8   -75    62    83     -   -11   977     X  3018 |
   28 |  5642   -98    81    30   -54  1514   -36  5151    21    34 |
   29 | -1587    74  -118  -157   -33 -1305   169 -2035  -107 -1609 |
   31 | -3599   137   114  -146    53   799    10 -2746   100  -188 |
   32 | -3189   -71  -105   187    88   133   -80 -3883  -140   -50 |
 -----+-------------------------------------------------------------+
 ABPO |     -     -     -    82     -     -   -74     -     -     - |
 ALGO |     -   424  -333     -     -     -     -     -   480     - |
 ALIC |     -   -52     -    25     -     -     -     -  -142  -142 |
 AMC2 |     -   -50    59     -     -     -   -10     -    -9     - |
 ANKR |     -     -     -   -80     -     -    72     -     -     - |
 AREQ |     -    33     -     -     -     -   -14     -     -     - |
 ARTU |     -     X     -   124     -     -  -111     -    -3     - |
 AUCK |     -  -127     -   -51     -     -    99     -   -44     - |
 BOGT |     -     -     -    34     -     -   -31     -    27     - |
 BRFT |     -     -     -   -47     -     -    42     -     -     - |
 BRMU |     -    71     -   -27     -     -    -7     -     -     - |
 CAS1 |     -  -113     -    54     -     -     -     -   -90  -226 |
 CEDU |     -     -     -   -66     -     -    60     -   -48   -68 |
 CGGN |     -     -     -   -55     -     -    50     -     -     - |
 CHPI |     -     -     -    78     -     -   -71     -  -104     - |
 CHTI |     -    45     -   -72     -     -    40     -     -     - |
 CHUM |     -     -     -   170     -     -  -153     -     -     - |
 CHUR |     -    -2     -    91     -     -   -78     -    18     - |
 COCO |     -    97     -   -35     -     -   -10     -    15  -124 |
 CONT |     -     -    89     -     -     -   -49     -     -     - |
 CRO1 |     -     -    87     -     -     -   -48     -    80     - |
 CUSV |     -     -     -   275     -     -  -248     -     -     - |
 DARW |     -    58     -    26     -     -   -48     -   -88  -549 |
 DAV1 |     -     2     -    -1     -     -     -     -   -32  -225 |
 DGAV |     -     -     -   -14     -     -    13     -     -     - |
 DRAO |     -     -     -   -44     -     -    40     -    10     - |
 DUBO |     -   -45     -    22     -     -     -     -   -25     - |
 FAA1 |     -  -246     -   117     -     -     -     -     -     - |
 GLPS |     -   -48     -     2     -     -    19     -    -5     - |
 GLSV |     -   163     -   -78     -     -     -     -    23     - |
 GMSD |     -     -     -   -27     -     -    25     -     -     - |
 GODZ |     -     -   -12     7     -     -     -     -     -     - |
 GUAT |     -   -74     -    36     -     -     -     -     -     - |
 HARB |     -   -20   -97     -     -     -    62     -   -70     - |
 HERS |     -   -67    52     -     -     -     -     -     -     - |
 HOB2 |     -    68   276   -70     -     -  -120     -   156  -127 |
 HOLB |     -    52     -   -25     -     -     -     -   -61     - |
 HYDE |     -   101     -   -31     -     -   -15     -    41     - |
 IENG |     -   -16    13     -     -     -     -     -     -     - |
 IRKM |     -     -    66     -     -     -   -36     -     -     - |
 JPLM |     -     -     -    70     -     -   -63     -    16   116 |
 KARR |     -    91     -     X     -     -   -39     -   -96    47 |
 KIRU |     -    32     3   -18     -     -     -     -     -    89 |
 KOKB |     -   -74   -16     -     -     -    40     -    40     - |
 KOUR |     -   -74    33    39     -     -   -20     -     -     - |
 MAG0 |     -    14     -    -7     -     -     -     -     -     - |
 MAL2 |     -   -50     -    95     -     -   -61     -     -     - |
 MAS1 |     -   -51   -51    88     -     -   -26     -   -25     - |
 MATE |     -     -    27    10     -     -   -24     -   -53     - |
 MAW1 |     -    72     -   -61     -     -     8     -    54  -110 |
 MBAR |     -     -     -    10     -     -    -9     -    49     - |
 METS |     -   -18    14     -     -     -     -     -     -     - |
 MIZU |     -    -9     7     -     -     -     -     -     -     - |
 NIST |     -   -26    20     -     -     -     -     -     -     - |
 NKLG |     -  -186     -    71     -     -    45     -  -120     - |
 NNOR |     -     -   -20    12     -     -     -     -    82     - |
 NRC1 |     -    62   -48     -     -     -     -     -     -     - |
 NTUS |     -   215     -  -103     -     -     -     -     -     - |
 NYA1 |     -     5     X    -3     -     -     -     -   116     - |
 NYAL |     -     -   117     -     -     -   -64     -  -391   320 |
 PARK |     -     -   150   -91     -     -     -     -     -     X |
 PDEL |     -    85     -     -     -     -   -37     -    37     - |
 PETS |     -     -     -   -11     -     -    10     -     -     - |
 PIE1 |     -     -   399  -243     -     -     -     -  -286     - |
 PIMO |     -     -     -   -89     -     -    80     -    75     - |
 PTBB |     -   -26    20     -     -     -     -     -     -   197 |
 QAQ1 |     -     -   -31   -31     -     -    45     -   -25     - |
 SCH2 |     -  -111     -    94     -     -   -33     -    41    94 |
 SEY1 |     -     -     -    80     -     -   -73     -     -     - |
 SPT0 |     -   190  -149     -     -     -     -     -     -   256 |
 STHL |     -  -157     -    -4     -     -    70     -     -     - |
 STK2 |     -     -     -   -19     -     -    18     -     -  -339 |
 SVTL |     -     -   194  -118     -     -     -     -     -     - |
 SYDN |     -    13     X     -     -     -    -6     -     -   299 |
 THU3 |     -   -97   -95     -     -     -    93     -   -54     - |
 TIXI |     -     -     -    -6     -     -     5     -  -101     - |
 TOW2 |     -    41     -    37     -     -   -50     -    41  -129 |
 TRO1 |     -    -5     -     -     -     -     2     -  -192     - |
 USN3 |     -   -16    12     -     -     -     -     -    13     - |
 VACS |     -     -     -   244     -     -  -220     -     -     - |
 VALD |     -     -     -    52     -     -   -47     -     -     - |
 VILL |     -     -    44   -27     -     -     -     -    27    91 |
 WAB2 |     -    13   -10     -     -     -     -     -     -     - |
 WES2 |     -     0     -     0     -     -     -     -     -     - |
 WHIT |     -     -     -   -18     -     -    17     -     -     - |
 WSRT |     -    -9     7     -     -     -     -     -   -12     X |
 WTZA |     -    14   -11     -     -     -     -     -     -  -109 |
 WTZR |     -   129  -101     -     -     -     -     -   -18  1107 |
 YELL |     -     5   -95   -22     -     -    68     -    -5     - |
 ZAMB |     -    71     -    52     -     -   -76     -    29     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   iga   igu   jpl   ngs   usn   whu | NEPO    RMS
 -----+-------------------------------------------------------------+-------------
    1 |   867    38    25     9    41     -    13  1324    48   186 |  288    891
    2 |  1484    31    27    14    23   466    18   972    91    63 |  288    249
    3 |  2729    30    27    12    36  2148     X  2930    70   267 |  287   1877
    4 |  3282    16    25    11    26  1305    13  2549    63    71 |  288    835
    5 |   519    22    20    12    36   466    10   386    44   100 |  288    155
    6 |  1550    31    26    12    37   917     X  1879    63   254 |  287   1010
    7 |  1552    31    13    14    31   695     8  1042    46    72 |  288    243
    8 |  5555    44    14    20    23  2095    14  4629    56    84 |  288   3014
    9 |  5666    41    14    21    33  3014    14  4473    66    85 |  288   3933
   10 |  3875    34    24    10    27  2168     8  2640    66    70 |  288   1615
   11 |  1168    18    25    12    26   508    11   578    51   109 |  288    389
   12 |   683    39    38    21    33   237    14   395    64   102 |  288    297
   13 |  1614    30    27    15    19   774    12  1217    57    79 |  288    455
   14 |   505    26    23    10    32   580    15   464    83    78 |  288    156
   15 |   475    27    25    17    22   280    12   421    53    69 |  288    222
   16 |   682    36    18    12    30   405    13   623    77    79 |  288    410
   17 |   732     X     X    10   104   377     9   660   145    80 |  280    336
   18 |   810    52    28    12    25   343    18   657    48    47 |  288    319
   19 |   969    25    26    11    38   909    12   839    78    92 |  288    224
   20 |   899    28    32     9    27   391     9   774    80    76 |  288    272
   21 |   681    31    28    13    33   256     9   711    40    68 |  288    246
   22 |  1006    28    20    21    31   691    17  1400    53    43 |  288    257
   23 |   252    30    24    12    22   251     9   368    65    83 |  288    174
   24 |  2690    47    27     9    28  1739    13  3516    73    43 |  288   2502
   25 |   289    25    13    13    22   359    11   265    42    61 |  288    203
   26 |  1016    37    25    10    24   325    12   980    69    90 |  288    316
   27 |   375    29    31    17    21     -    15   373     X    93 |  288    257
   28 |   829    34    12    27    39  1061    19   924    92    84 |  288    585
   29 |  2079    28    13    17    66   738    11  1261    45   122 |  282    208
   31 |  1842    26    24    11    39   365    11  1445   107    79 |  288    261
   32 |  1712    36    22    12    25   607    15  1349    67    48 |  288    768
 -----+-------------------------------------------------------------+-------------
 ABPO |     -     -     -    12     -     -    11     -     -     - |  276  20332
 ALGO |     -    28    22     -     -     -     -     -    18     - |  180     29
 ALIC |     -    18     -     9     -     -     -     -    18   163 |  273   3013
 AMC2 |     -    22    13     -     -     -     7     -    14     - |  288     22
 ANKR |     -     -     -     8     -     -     7     -     -     - |  288    >>>
 AREQ |     -    41     -     -     -     -    18     -     -     - |  288   4711
 ARTU |     -     X     -    14     -     -    13     -   110     - |  276  16654
 AUCK |     -    29     -    15     -     -    10     -    31     - |  288   6978
 BOGT |     -     -     -    10     -     -     9     -    38     - |  276  22072
 BRFT |     -     -     -     8     -     -     7     -     -     - |  276   3196
 BRMU |     -    16     -    11     -     -     9     -     -     - |  288   2959
 CAS1 |     -    27     -    13     -     -     -     -    23    28 |  276   4873
 CEDU |     -     -     -     9     -     -     8     -    18    23 |  276    >>>
 CGGN |     -     -     -    10     -     -     9     -     -     - |  276  23578
 CHPI |     -     -     -    16     -     -    15     -    52     - |  276  11739
 CHTI |     -    24     -    13     -     -     9     -     -     - |  288  11233
 CHUM |     -     -     -    10     -     -     9     -     -     - |  288  18488
 CHUR |     -    22     -    11     -     -    11     -    18     - |  288   5516
 COCO |     -    30     -    20     -     -    18     -    25    32 |  287  15816
 CONT |     -     -    23     -     -     -    13     -     -     - |  288     63
 CRO1 |     -     -    30     -     -     -    16     -    39     - |  273     44
 CUSV |     -     -     -     9     -     -     8     -     -     - |  288  11430
 DARW |     -    20     -    16     -     -    12     -    28   158 |  269   3665
 DAV1 |     -    39     -    18     -     -     -     -    19    29 |  276   2637
 DGAV |     -     -     -    16     -     -    15     -     -     - |  276  10972
 DRAO |     -     -     -     7     -     -     6     -    16     - |  235   8831
 DUBO |     -    10     -     5     -     -     -     -    13     - |  276  10341
 FAA1 |     -    34     -    16     -     -     -     -     -     - |  276  16787
 GLPS |     -    24     -    11     -     -    12     -    44     - |  288  24630
 GLSV |     -    15     -     7     -     -     -     -    28     - |  288   2188
 GMSD |     -     -     -    14     -     -    13     -     -     - |  288   4431
 GODZ |     -     -    17    10     -     -     -     -     -     - |  276  13592
 GUAT |     -    16     -     7     -     -     -     -     -     - |  276   3511
 HARB |     -    34    19     -     -     -    11     -    37     - |  288   1591
 HERS |     -    18    14     -     -     -     -     -     -     - |  288     21
 HOB2 |     -    29    47    21     -     -    21     -    18    56 |  288     27
 HOLB |     -    20     -     9     -     -     -     -    17     - |  276  11880
 HYDE |     -    19     -    11     -     -     9     -    13     - |  288   3835
 IENG |     -    12     9     -     -     -     -     -     -     - |  288     67
 IRKM |     -     -    19     -     -     -    10     -     -     - |  288    272
 JPLM |     -     -     -     9     -     -     8     -    21    56 |  288    >>>
 KARR |     -    19     -     X     -     -     8     -    19    93 |  287  14817
 KIRU |     -    15     9    12     -     -     -     -     -    29 |  288  13551
 KOKB |     -    36    28     -     -     -    23     -    46     - |  288     34
 KOUR |     -    17    25    14     -     -    19     -     -     - |  288     29
 MAG0 |     -    10     -     5     -     -     -     -     -     - |  287   7795
 MAL2 |     -    27     -    14     -     -    11     -     -     - |  288  10237
 MAS1 |     -    32    16    14     -     -    11     -    18     - |  288   3284
 MATE |     -     -    13     9     -     -     9     -    23     - |  288    257
 MAW1 |     -    32     -    11     -     -    12     -    32    32 |  288   3129
 MBAR |     -     -     -    12     -     -    11     -    25     - |  288    >>>
 METS |     -    13    10     -     -     -     -     -     -     - |  287    804
 MIZU |     -    20    15     -     -     -     -     -     -     - |  264    384
 NIST |     -    11     8     -     -     -     -     -     -     - |  285     26
 NKLG |     -    31     -    15     -     -    13     -    27     - |  288  14547
 NNOR |     -     -    53    32     -     -     -     -    30     - |  276    563
 NRC1 |     -    28    22     -     -     -     -     -     -     - |  288     19
 NTUS |     -    13     -     6     -     -     -     -     -     - |  222   2844
 NYA1 |     -    16     X     7     -     -     -     -    15     - |  198  15253
 NYAL |     -     -    28     -     -     -    15     -   195    50 |  282    348
 PARK |     -     -    34    21     -     -     -     -     -     X |  144   2821
 PDEL |     -    17     -     -     -     -     7     -    33     - |  288   3455
 PETS |     -     -     -    10     -     -     9     -     -     - |  288   9399
 PIE1 |     -     -    30    18     -     -     -     -    21     - |  287     27
 PIMO |     -     -     -    15     -     -    13     -    29     - |  288  17492
 PTBB |     -    23    18     -     -     -     -     -     -   314 |  285     35
 QAQ1 |     -     -    31    21     -     -    23     -    34     - |  288   6959
 SCH2 |     -    17     -    10     -     -     8     -    19   125 |  288   9014
 SEY1 |     -     -     -    14     -     -    12     -     -     - |  272  12954
 SPT0 |     -    11     9     -     -     -     -     -     -    39 |  228     29
 STHL |     -    42     -    23     -     -    12     -     -     - |  288  24895
 STK2 |     -     -     -     7     -     -     6     -     -    26 |  276  11045
 SVTL |     -     -    15     9     -     -     -     -     -     - |  288     15
 SYDN |     -    22     X     -     -     -     9     -     -    47 |  285    658
 THU3 |     -    11     9     -     -     -     8     -    18     - |  288   7236
 TIXI |     -     -     -     7     -     -     7     -    24     - |  288    >>>
 TOW2 |     -    42     -    16     -     -    16     -    24    45 |  288   5570
 TRO1 |     -    16     -     -     -     -     7     -    22     - |  288  15464
 USN3 |     -    20    16     -     -     -     -     -    17     - |  288     20
 VACS |     -     -     -    16     -     -    14     -     -     - |  276   9612
 VALD |     -     -     -     6     -     -     6     -     -     - |  276   9941
 VILL |     -     -    16    10     -     -     -     -    20   180 |  276   4682
 WAB2 |     -    11     8     -     -     -     -     -     -     - |  195     19
 WES2 |     -    23     -    11     -     -     -     -     -     - |  276   3700
 WHIT |     -     -     -     6     -     -     6     -     -     - |  276   5212
 WSRT |     -     8     6     -     -     -     -     -    21     X |  288     26
 WTZA |     -     8     6     -     -     -     -     -     -    36 |  288    722
 WTZR |     -    25    19     -     -     -     -     -    25   125 |  288     29
 YELL |     -    17    17     6     -     -     9     -    13     - |  288     70
 ZAMB |     -    30     -    18     -     -    15     -    51     - |  288  24691
 -----+-------------------------------------------------------------+-------------
 TOT  |  2068    27    23    14    36  1088    12  1769    53   107 |
-----------------------------------------------------------------------------------------------------
-----------------------------------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN     MEAN     MEAN     MEAN   | HADAMARD DEVIATION AT TAU =  |
      | NREPO NBEPO  BRKS  USED    WGT1(%)  WGT2(%)  WGT3(%)  WGT4(%) |     300s     3600s    21600s |
------+---------------------------------------------------------------+------------------------------+
 AMC2 |   288   285     1   288     6.02     6.05     6.05     6.05   | 4.76e-14  6.20e-15  2.26e-15 |
 NRC1 |   288   288     0   288     6.02     6.05     6.05     6.05   | 2.42e-14  4.44e-15  1.53e-15 |
 USN3 |   288   288     0   288     5.54     6.05     6.05     6.05   | 3.43e-14  5.81e-15  1.06e-15 |
 WSRT |   288   288     1   288     6.02     6.05     6.05     6.05   | 2.33e-14  5.77e-15  1.83e-15 |
 WTZR |   288   288     0   288     5.41     6.05     6.04     6.04   | 4.35e-14  7.87e-15  3.47e-15 |
 YELL |   288   287     1   288     6.02     6.05     6.05     6.05   | 2.70e-14  5.53e-15  1.98e-15 |
 HERS |   288   285     1   288     5.33     6.05     6.05     6.05   | 5.75e-14  8.19e-15  1.13e-15 |
 PIE1 |   287   287     0   287     5.43     6.03     6.02     6.02   | 2.54e-14  5.98e-15  3.00e-15 |
 IENG |   288   288     0   288     4.85     6.01     6.05     6.05   | 4.03e-14  1.06e-14  2.17e-15 |
 NIST |   285   285     1   285     5.93     5.99     5.98     5.98   | 3.82e-14  6.24e-15  3.23e-15 |
 PTBB |   285   285     0   285     5.80     5.98     5.98     5.98   | 3.95e-14  6.92e-15  3.45e-15 |
 HOB2 |   288   285     1   288     3.24     5.93     1.41     1.41   | 5.98e-14  8.85e-15  2.51e-15 |
 SPT0 |   228   228     0   228     4.70     4.72     4.74     4.74   | 2.58e-14  6.66e-15  1.48e-15 |
 KOKB |   288   285     1   288     2.63     4.37     3.13     3.13   | 1.00e-13  1.18e-14  2.68e-15 |
 SVTL |   288   287     1   288     2.52     4.03     0.11     0.11   | 2.62e-14  6.28e-15  1.92e-15 |
 WAB2 |   195   195     0   195     4.00     4.02     0.40     0.40   | 3.07e-14  6.40e-15         - |
 CRO1 |   273   272     1   273     2.27     3.44     5.72     5.72   | 9.80e-14  1.62e-14  3.24e-15 |
 MATE |   288   288     0   288     2.27     3.26     1.23     1.23   | 3.65e-14  6.93e-15  2.88e-14 |
 G25  |   288   288     0   288     4.64     1.66     3.77     3.77   | 5.04e-14  2.01e-14  2.29e-14 |
 G26  |   288   288     0   288     1.10     0.30     0.19     0.19   | 1.74e-13  6.61e-14  3.92e-14 |
 G18  |   288   288     0   288     0.48     0.23     0.26     0.26   | 6.92e-13  6.83e-14  3.94e-14 |
 MIZU |   264   264     0   264     0.49     0.17     0.06     0.06   | 3.65e-13  1.16e-13  3.02e-14 |
 IRKM |   288   288     0   288     0.49     0.15     0.03     0.03   | 1.85e-13  1.86e-14  1.62e-14 |
 WTZA |   288   288     0   288     0.42     0.11     0.70     0.70   | 5.04e-13  1.35e-13  7.69e-14 |
 G04  |   288   288     0   288     0.44     0.09     0.08     0.08   | 5.06e-13  1.41e-13  8.42e-14 |
 G31  |   288   288     0   288     0.48     0.09     0.34     0.34   | 5.77e-13  6.70e-14  2.83e-14 |
 G23  |   288   288     0   288     0.47     0.08     1.45     1.45   | 5.36e-13  5.60e-14  1.28e-14 |
 G02  |   288   288     0   288     0.47     0.08     1.16     1.16   | 5.30e-13  5.37e-14  2.14e-14 |
 SYDN |   285   285     0   285     0.35     0.08     0.03     0.03   | 5.44e-13  1.49e-13  5.58e-14 |
 G27  |   288   288     0   288     0.64     0.08     0.02     0.02   | 6.18e-14  3.53e-14  3.52e-14 |
 G19  |   288   288     0   288     0.44     0.07     0.40     0.40   | 5.46e-13  7.36e-14  1.86e-14 |
 G07  |   288   288     0   288     0.42     0.07     0.35     0.35   | 6.14e-13  6.17e-14  2.69e-14 |
 G16  |   288   288     0   288     0.42     0.07     0.68     0.68   | 6.36e-13  6.92e-14  6.08e-14 |
 G14  |   288   288     0   288     0.42     0.07     0.94     0.94   | 6.41e-13  6.02e-14  1.44e-14 |
 G29  |   282   282     0   282     0.40     0.07     0.14     0.14   | 8.58e-13  2.24e-13  1.02e-13 |
 G05  |   288   288     0   288     0.40     0.06     0.54     0.54   | 6.89e-13  7.16e-14  1.37e-14 |
 G15  |   288   288     0   288     0.40     0.06     0.97     0.97   | 6.93e-13  5.97e-14  2.56e-14 |
 G12  |   288   288     0   288     0.39     0.06     1.45     1.45   | 7.44e-13  7.66e-14  3.28e-14 |
 G06  |   287   284     1   287     0.38     0.06     2.59     2.59   | 1.06e-12  3.25e-13  2.25e-13 |
 G28  |   288   288     0   288     0.37     0.06     0.29     0.29   | 5.88e-13  6.31e-14  2.92e-14 |
 G11  |   288   288     0   288     0.36     0.05     0.18     0.18   | 6.20e-13  6.06e-14  5.00e-14 |
 G32  |   288   288     0   288     1.13     0.04     0.30     0.30   | 2.16e-13  7.66e-14  1.05e-13 |
 ALGO |   180   180     0     0     0.00     0.00     0.00     0.00   | 7.25e-13  3.34e-13         - |
 BRFT |   276     0     0     0     0.00     0.00     0.00     0.00   | 4.50e-27  3.75e-28  6.25e-29 |
 G01  |   288   264     6     0     0.00     0.00     0.00     0.00   | 1.22e-12  3.45e-13  1.25e-13 |
 G03  |   287   287     0     0     0.00     0.00     0.00     0.00   | 1.37e-12  4.21e-13  2.14e-13 |
 G08  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.40e-12  5.52e-13  3.95e-13 |
 G09  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.30e-12  4.92e-13  4.06e-13 |
 G10  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.23e-12  4.39e-13  1.88e-13 |
 G13  |   288   278     4     0     0.00     0.00     0.00     0.00   | 1.05e-12  2.44e-13  4.73e-14 |
 G17  |   280   280     0     0     0.00     0.00     0.00     0.00   | 1.27e-12  3.04e-13  1.65e-13 |
 G20  |   288   288     0     0     0.00     0.00     0.00     0.00   | 9.33e-13  1.05e-13  2.61e-14 |
 G21  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.06e-12  1.03e-13  2.41e-14 |
 G22  |   288   288     0     0     0.00     0.00     0.00     0.00   | 7.77e-13  7.47e-14  1.61e-14 |
 G24  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.15e-12  3.77e-13  5.43e-14 |
 GLSV |   288   213    32     0     0.00     0.00     0.00     0.00   | 7.13e-12  8.30e-13  1.42e-13 |
 KOUR |   288   288     0     0     0.00     0.00     0.00     0.00   | 6.08e-14  1.17e-14  3.02e-15 |
 METS |   287   287     0     0     0.00     0.00     0.00     0.00   | 4.35e-13  1.28e-13  7.05e-14 |
 NNOR |   276   275     0     0     0.00     0.00     0.00     0.00   | 1.68e-12  3.01e-13  4.19e-14 |
 NYAL |   282   272     5     0     0.00     0.00     0.00     0.00   | 7.70e-13  2.12e-13  4.97e-14 |
 VILL |   276   276     0     0     0.00     0.00     0.00     0.00   | 1.03e-12  6.71e-13  2.30e-13 |
 GPST |   288   288     1     0     0.00     0.00     0.00     0.00   | 2.13e-14  4.01e-15  1.73e-15 |
 HARB |   288   288     0     0     0.00     0.00     0.00     0.00   | 2.70e-13  3.08e-13  1.48e-13 |
 GODZ |   276   261    12     0     0.00     0.00     0.00     0.00   | 3.26e-12  1.40e-12  1.19e-12 |
 CONT |   288   288     0     0     0.00     0.00     0.00     0.00   | 5.44e-14  2.58e-14  4.47e-15 |
 PARK |   143   122    13     0     0.00     0.00     0.00     0.00   | 7.19e-12  8.64e-13         - |
------+---------------------------------------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:                                         | 1.48e-22  1.94e-20  2.70e-19 |
----------------------------------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                                                   |     BRFT      BRFT      BRFT |
----------------------------------------------------------------------+------------------------------+
