
 cls-file Version 2.0
 GPS week: 1768   Day: 4   MJD: 56624                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 brd |    96     0   2976     12    -743     616   2168   2168      0   4066   4066      0    0.00
 cod |   288     0  31029    126   -1268     781     21     21     21    121    119    121   11.73
 emr |   288     0  22830    295   -1191    2484     17     19     16    141     64    174   14.73
 esa |   288     0  31330    838   -1798    1676     10     10     10    108    140     92   26.39
 gfz |   288     0  36729    133      52    -117     11     12     10     79     53     85   24.81
 iga |    96     0   2976      2    -935    1088     24     24      0     69     69      0    0.00
 igu |    96     0   2784     12    -805     810   1530   1530      0   3119   3119      0    0.00
 jpl |   288     0  24109    327    3761      36     13     12     13    108    107    109   22.35
 ngs |    96     0   2976     32    -847     865   1523   1523      0   3165   3165      0    0.00
 usn |   288     0  30800    320   -1557    1526     39     47     36    128    147    121    0.00
 whu |   288     0  30273    877    2772   -6700     31     27     32    292    186    326    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn   whu |
 -----+-------------------------------------------------------------------+
    1 |  1590   -38    -7     2   -50   -86     -    77  1466  -153  -470 |
    2 | -1410  -434  -141   191   -11  -202   536   108 -1459   -19    65 |
    3 | -9163    93    13    39   -73   -42 -2483   -22 -7039   -72  -211 |
    4 | -2470   -37    72  -104    -1    17 -3338    96 -2537   152    51 |
    5 |   264    87    55  -184   -59    30   750   201   -83   215  -295 |
    6 |  2865   147   -33    32   -78    -1  2389    -7   564    -4  -210 |
    7 |  1375   138   112  -209   -45    37   786   151  1196    27  -175 |
    8 |-11758   -63    -1    19    35   -31 -9729   -27 -6524   -89    66 |
    9 |  2463    -7   -17   -21    -5   -11  6010    44   -74   -37   -82 |
   10 | -2035    20   -60   143   -53    14 -6183   -80 -4865  -171  -150 |
   11 |  3703    80   -11  -155    29   -50  -248   116  3481     7   -72 |
   12 |  1087    75     6   -41     8    53   106    -4   704   -23  -257 |
   13 |  3029    87    63  -100   -52    26   660    89  2985    50   -94 |
   14 |  3367    51   -44    35   -37   -44   -38     2  3255    19  -144 |
   15 |  -298   138    31   -55  -133    35  -117   120  -106   179  -351 |
   16 |  2562    -1    -7   -14    11   -53  -249     9  2459   -75   -50 |
   17 |   553   125    72  -290    15    17  3082   212   524   148  -226 |
   18 |  3232    64   -18   -46     9   -43   630    22  3431    24   -54 |
   19 |  -813   -48   -11    94   -49   -58   288   -24  -784  -233   -95 |
   20 |  3107   -38   -77    73    -8   -68   586    -6  3067  -282  -132 |
   21 |  3271    24     2    91  -108    26   474    -2  3357   -99   -76 |
   22 | -2019   -65    -9   228   -24   -25  -881  -202 -1557  -222  -116 |
   23 |   285    47   121  -165   -71    54   521   169   432    13   -38 |
   24 |  3322    10    58  -121     7   123     -    92  2677   170  -195 |
   25 |  1210   -72    63   -97    19    16  -466    90   813   -85  -190 |
   26 | -3960    83   -20   -22   -68    77  -402    70 -3921   136   -46 |
   27 |   908    31   -71    81    45    19  1498  -114  1046     X     X |
   28 |  1384   -77   -54   144   -12    15  1006   -81  2091   -84   -42 |
   29 | -2942   204    25  -285    19    60  -345   191 -2680   134  -253 |
   31 | -1652   173   107  -276    56   112    81   102 -1243   171  -165 |
   32 | -2599   -69     5   125   -43   -43  3786   -67 -2535  -228  -209 |
 -----+-------------------------------------------------------------------+
 ADIS |     -     -     -   276  -293     -     -     -     -     -   483 |
 ALGO |     -   512  -408     -     -     -     -     -     -   465   589 |
 ALRT |     -   -46     -     -    22     -     -     -     -   -52    37 |
 AMC2 |     -   -31    28   -22     -     -     -    24     -   -24    55 |
 ANKR |     -     -     -     -   -63     -     -    70     -     -     - |
 AREQ |     -   -37     -    89   -16     -     -   -70     -     -   110 |
 ARTU |     -    18     -    13   -80     -     -    64     -   -23     1 |
 ASPA |     -   -32     -     X   140     -     -  -139     -   -95  -171 |
 BAKE |     -     -     -    63   -67     -     -     -     -    72    59 |
 BDOS |     -     -     -     -   120     -     -  -133     -     -   -29 |
 BJCO |     -     -     -   -46    48     -     -     -     -     -     - |
 BOGT |     -     -     -   -69  -114     -     -   205     -   -95    38 |
 BRFT |     -   -95     -    65   100     -     -  -139     -   -31     - |
 BRMU |     -    22     -     7   101     -     -  -132     -    65   -33 |
 BRST |     -  -101     -    45     -     -     -     -     -     -  -139 |
 BRUX |     -    98     -     -   -46     -     -     -     -     -     - |
 CAS1 |     -   -97     -    22    22     -     -     -     -  -151  -170 |
 CEDU |     -     -     -   -19    20     -     -     -     -    81   -70 |
 CHPI |     -     -     -     9    -5     -     -    -5     -   -30   102 |
 CHTI |     -   -14     -    53     -     -     -   -50     -     -   -23 |
 CHUR |     -    58     -    23     -     -     -   -57     -    59     - |
 COCO |     -     -     -    13   -14     -     -     -     -   -15   -41 |
 CONT |     -     -   -25     -     -     -     -    17     -     -     - |
 CONZ |     -     -  -357     -   212     -     -     -     -  -112  1189 |
 CRO1 |     -     -   131     -   -78     -     -     -     -    70     - |
 CUSV |     -     -     -   144  -154     -     -     X     -     -  -503 |
 DARW |     -     -     -   -67    71     -     -     -     -   343  -145 |
 DAV1 |     -  -119     -     6    49     -     -     -     -   -89  -237 |
 DGAV |     -     -     -     6     4     -     -   -10     -     -    77 |
 DRAO |     -    40     -     -     -     -     -   -21     -    14   -88 |
 DUBO |     -    21     -    30   -41     -     -     -     -    17     - |
 FAA1 |     -  -290     -   118    12     -     -     -     -     -     - |
 GLPS |     -    17     -    29    -9     -     -   -32     -   -42   139 |
 GLSV |     -   -67     -     -    32     -     -     -     -  -100     - |
 GMSD |     -     -     -   -52    55     -     -     -     -     -     - |
 GODE |     -     -    65     -   -39     -     -     -     -    58     - |
 GODZ |     -     -     8    -4     -     -     -     -     -     -    60 |
 GRAS |     -    50     -     -   154     -     -  -197     -     -    -8 |
 GRAZ |     -   -30     -     2    12     -     -     -     -     -     - |
 GUAT |     -   -89     -    -2    44     -     -     -     -    47  -240 |
 GUUG |     -     -     -  -125   133     -     -     -     -    64  -200 |
 HARB |     -   -39  -414   270     -     -     -     -     -    53   150 |
 HERS |     -    -5     4     -     -     -     -     -     -     -     - |
 HOB2 |     -   122  -335   121   153     -     -  -157     -   256    39 |
 HOFN |     -  -134     -     -    64     -     -     -     -  -115     - |
 HRAO |     -     -   -21     -    12     -     -     -     -   120     - |
 HYDE |     -     -     -    25   105     -     -  -146     -    89    -8 |
 IENG |     -   -12     9     -     -     -     -     -     -     -     - |
 INVK |     -    23     -     -   -11     -     -     -     -   -62    88 |
 ISPA |     -     -     -   -20    21     -     -     -     -   -31    92 |
 JPLM |     -     -   -66    58     2     -     -   -26     -   -14     - |
 KARR |     -  -101     -    66   -23     -     -     -     -  -156     - |
 KERG |     -     -     -    -9    10     -     -     -     -   -63  -196 |
 KIRU |     -    38    24   -30     -     -     -     -     -     -     - |
 KIT3 |     -     -     -   -61    65     -     -     -     -   167     - |
 KOKB |     -    -6    66     -     -     -     -   -40     -  -144    98 |
 KOUR |     -   -38    68     7   -30     -     -     -     -     -    49 |
 LPGS |     -     -     -   -69    73     -     -     -     -   -50    93 |
 MAC1 |     -   -90     -   -72   119     -     -     -     -   -51   -80 |
 MAG0 |     -   113     -     -   -53     -     -     -     -     -     - |
 MAL2 |     -   -37     -    41    14     -     -   -44     -     -   -48 |
 MAR6 |     -     -     8     -     -     -     -    -5     -     -     - |
 MAS1 |     -   -95   -59   117   -60     -     -    17     -   -81     - |
 MATE |     -     -   -80     -    47     -     -     -     -    -2     - |
 MAW1 |     -   -12     -    26   135     -     -  -174     -    90   -58 |
 MCIL |     -     -     -   -19    20     -     -     -     -  -236  -193 |
 MCM4 |     -    76     -     -   -36     -     -     -     -   -33    16 |
 METS |     -    29    63     -   -51     -     -     -     -     -     - |
 MIZU |     -    -3     3     -     -     -     -     -     -     -     - |
 MOBK |     -     -     -   -80     -     -     -    95     -     -     - |
 MORP |     -     -     -     -   122     -     -  -135     -     -    88 |
 NANO |     -   -87     -   -27    70     -     -     -     -   -68  -125 |
 NICO |     -   -80     -   -62   104     -     -     -     -  -107  1388 |
 NIST |     -    37   -29     -     -     -     -     -     -     -    -5 |
 NKLG |     -  -127     -    50    57     -     -   -61     -    18  -109 |
 NNOR |     -     -   -44   -41     -     -     -    77     -    21   -40 |
 NRC1 |     -    83   -84     -    11     -     -     -     -     -     X |
 NRIL |     -  -100     -    17   -73     -     -   114     -   -85    -4 |
 NTUS |     -    12     -    -5     X     -     -     -     -     -  -253 |
 NURK |     -     -     -   -53    56     -     -     -     -     -     - |
 NYA1 |     -   118  -410     -   186     -     -     -     -   126   283 |
 NYAL |     -     -    88     -     -     -     -   -58     -   -48     - |
 OHI2 |     -     -     -     -    89     -     -   -99     -    88   184 |
 ONSA |     -   -88   275     -  -122     -     -     -     -     -     4 |
 PALV |     -     -     -    23   -24     -     -     -     -     -     - |
 PARK |     -     -   154   -86     -     -     -     -     -     -     - |
 PDEL |     -    29     -     -    92     -     -  -117     -    58     - |
 PETS |     -     -     -    42   -69     -     -    28     -     -    85 |
 PIMO |     -     -     -   -13   -23     -     -    41     -    25     - |
 POTS |     -     -     -   -23    24     -     -     -     -   286     - |
 PRDS |     -  -272   448  -135     -     -     -     -     -     -  -267 |
 PTBB |     -   -33    26     -     -     -     -     -     -     -     - |
 QAQ1 |     -   -23    25   -26     -     -     -    26     -   -45     - |
 RABT |     -   108     -     -     -     -     -   -57     -    46   200 |
 RESO |     -   128     -     -   -60     -     -     -     -     -     8 |
 REUN |     -  -196     -     -    93     -     -     -     -  -157  -243 |
 REYK |     -     -     -    31   -33     -     -     -     -     -  1064 |
 RIO2 |     -     -     -  -116   123     -     -     -     -     -     - |
 SCH2 |     -    80     -   -33  -101     -     -   108     -   101     5 |
 SHAO |     -    93     -     -   -44     -     -     -     -   109     - |
 SPT0 |     -    94   -75     -     -     -     -     -     -     -     - |
 SSIA |     -    -5     -     -     -     -     -     2     -    53     - |
 STHL |     -   110     -   -43  -143     -     -   152     -     -     - |
 SUWN |     -     -     -   102     -     -     -  -120     -    78     - |
 SVTL |     -     -   362  -202     -     -     -     -     -     -     - |
 SYDN |     -  -358   285     -     -     -     -     -     -     -  -544 |
 SYOG |     -   132   -70     X   -21     -     -     -     -    19  -144 |
 THU3 |     -  -120   -15     -   -91     -     -   174     -   -34     - |
 TIDB |     -     -    75     -   -45     -     -     -     -   -32     - |
 TIXI |     -     -     -    22   -23     -     -     -     -  -102    72 |
 TLSE |     -  -131     -     -    62     -     -     -     -     -     - |
 TOW2 |     -   -39     -    50   132     -     -  -184     -     5  -112 |
 TRO1 |     -    40     -     -   -19     -     -     -     -   -12     - |
 TSKB |     -  -326   -69   365  -121     -     -     -     -  -140     - |
 TWTF |     -    23     0     -   -11     -     -     -     -    83    73 |
 UNSA |     -     -     -     X   -37     -     -    41     -     -   202 |
 URUM |     -     -     -   109   -19     -     -  -107     -     -    90 |
 USN3 |     -    19   -15     -     -     -     -     -     -     9     - |
 VACS |     -     -     -   254     -     -     -  -300     -     -     - |
 VILL |     -     -    46    31   -61     -     -     -     -   -11     - |
 WAB2 |     -    35   -28     -     -     -     -     -     -     -     - |
 WES2 |     -     -    19     -   -11     -     -     -     -     -     - |
 WHIT |     -   -25     X   -46   -24     -     -    91     -   -31    52 |
 WIND |     -     -     -   -77    82     -     -     -     -  -190     - |
 WSRT |     -   179   150     -  -174     -     -     -     -    61   122 |
 WTZA |     -    15   -12     -     -     -     -     -     -     -     - |
 WTZR |     -    11    -9     -     -     -     -     -     -    33  1074 |
 XMIS |     -     -     -     -   123     -     -  -137     -     -   -62 |
 YAKT |     -   -18    59  -111     -     -     -    96     -     -   -23 |
 YELL |     -     -  -164    48    28     -     -    24     -    52   130 |
 YSSK |     -     -     -    34   -74     -     -    41     -     -     - |
 ZAMB |     -    34     -    37   -66     -     -    14     -   -58    75 |
 ZECK |     -   138     -    33   -98     -     -     -     -     -    66 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn   whu | NEPO    RMS
 -----+-------------------------------------------------------------------+-------------
    1 |   382    26    19    10     7    19     -    10   321    58    28 |  288    147
    2 |   592    20    14    13     9    13   482     8   602    36    25 |  288    250
    3 |  5103    27    20    11    21    19  2279    10  4342    35    34 |  288   2408
    4 |  1349    19    11    11    13    12  1539    14  1333    25    17 |  288    814
    5 |   751    15    16    14    11    21   519    13   596    42    16 |  288    300
    6 |  1828    27    16    12    12    25  1224    12  2473    40    31 |  288    680
    7 |   728     9    12     7     7    29   627     8   489    25    27 |  288    245
    8 |  5732    17    15     7    10    20  3568    11  3890    30    37 |  288   4841
    9 |  4949    15    18     5    10    20  3329     8  2545    24    35 |  288   2747
   10 |  6113    25    12     9     8    17  4925    11  2485    30    33 |  288   1074
   11 |   955    22    14    10     9    15   360    12   759    39    27 |  288    304
   12 |   957    31    28    13     7    35   357     8   808    83    15 |  288    320
   13 |   779    34    23     7     8    21   462    11   721    38    33 |  288    292
   14 |   605    12    15    14    12    22   521    15   414    56    27 |  288    180
   15 |   485    28    40    15    16    33   363    20   470    38    21 |  288    312
   16 |   651    18    18     9    14    39   356    13   746    45    22 |  288    402
   17 |   708    19    10     9     9    15  1113    15   653    46    29 |  288    344
   18 |   407    22    33     8     8    19   609    10   468    30    27 |  288    307
   19 |   666    15    15    18    12    32   464    16   664    58    31 |  288    229
   20 |   335    19    20     6     8    21   523    11   379    66    18 |  288    256
   21 |   611    25    13    15     8    18   554    12   443    54    19 |  288    319
   22 |   970    23    22    11    11    31   634    12  1009    42    28 |  288    280
   23 |   593    13    16     6    11    29   282    11   533    42    25 |  288    277
   24 |  2372    27    33    14    17    29     -    11  2170    48    38 |  288   1814
   25 |  1014    25    20    11     9    22   553    12   955    58    26 |  288    187
   26 |   868    24    17    14    25    39   591    19   905    80    30 |  288    565
   27 |   345    25    12    11    16    19   749    12   353     X     X |  288    155
   28 |  1992    12    11     9    11    30   751     8  1821    55    21 |  288    563
   29 |   724    13    17     7    13    30   743     8   916    58    20 |  288    267
   31 |  1053    18    18    11     7    27   339    11   905    40    24 |  288    339
   32 |  1960    29    18     9    11    12  2370    12  1828    35    35 |  288   1270
 -----+-------------------------------------------------------------------+-------------
 ADIS |     -     -     -     6     6     -     -     -     -     -    25 |  228    >>>
 ALGO |     -    17    14     -     -     -     -     -     -    24    11 |  284     46
 ALRT |     -    11     -     -     5     -     -     -     -    19    17 |  288   5681
 AMC2 |     -    31    10    13     -     -     -     8     -    32    30 |  288     20
 ANKR |     -     -     -     -     7     -     -     8     -     -     - |  288    >>>
 AREQ |     -    30     -    11     9     -     -    14     -     -    25 |  288   2288
 ARTU |     -    17     -    11     9     -     -    14     -    36    12 |  288  11177
 ASPA |     -    25     -     X    22     -     -    19     -    37    42 |  288   8996
 BAKE |     -     -     -     4     5     -     -     -     -    19    18 |  276   3606
 BDOS |     -     -     -     -    19     -     -    22     -     -    45 |  287   4342
 BJCO |     -     -     -     8     8     -     -     -     -     -     - |  288   7219
 BOGT |     -     -     -    12    15     -     -    20     -    30    26 |  288  16994
 BRFT |     -    37     -    10    13     -     -    16     -    27     - |  288   3761
 BRMU |     -    24     -    14    16     -     -    17     -    30    44 |  288   3248
 BRST |     -    13     -     6     -     -     -     -     -     -    25 |  130   1602
 BRUX |     -    14     -     -     7     -     -     -     -     -     - |  288    367
 CAS1 |     -    18     -     9     8     -     -     -     -    18    32 |  288   3728
 CEDU |     -     -     -     9     9     -     -     -     -    46    26 |  288    >>>
 CHPI |     -     -     -    14    13     -     -    20     -    25    26 |  288   9520
 CHTI |     -    31     -     8     -     -     -    14     -     -    26 |  287   6707
 CHUR |     -    17     -    11     -     -     -     7     -    25     - |  288  13331
 COCO |     -     -     -     9    10     -     -     -     -    34    18 |  288  12444
 CONT |     -     -    17     -     -     -     -    11     -     -     - |  288     58
 CONZ |     -     -    14     -     8     -     -     -     -    23    40 |  279   3108
 CRO1 |     -     -    31     -    18     -     -     -     -    83     - |  265    >>>
 CUSV |     -     -     -     8     8     -     -     X     -     -    23 |  288   8885
 DARW |     -     -     -    13    14     -     -     -     -   120    41 |  288   4665
 DAV1 |     -    24     -    11     9     -     -     -     -    19    21 |  288   2841
 DGAV |     -     -     -    12    14     -     -    16     -     -    51 |  288   6822
 DRAO |     -    16     -     -     -     -     -     8     -    27    15 |  288   3618
 DUBO |     -    11     -     4     7     -     -     -     -    38     - |  288  40882
 FAA1 |     -    30     -    16    17     -     -     -     -     -     - |  288  12391
 GLPS |     -    25     -    10    10     -     -    13     -    23    17 |  288  21528
 GLSV |     -    23     -     -    11     -     -     -     -    21     - |  288   1922
 GMSD |     -     -     -     8     8     -     -     -     -     -     - |  288   3564
 GODE |     -     -    11     -     7     -     -     -     -    33     - |  288     91
 GODZ |     -     -    13     7     -     -     -     -     -     -    29 |  276   5503
 GRAS |     -    12     -     -     7     -     -    10     -     -    15 |  288   1906
 GRAZ |     -    16     -     7     7     -     -     -     -     -     - |  288   2643
 GUAT |     -    11     -     6     8     -     -     -     -    12    28 |  288   3453
 GUUG |     -     -     -    12    12     -     -     -     -    71    30 |  288   5383
 HARB |     -    33    21    20     -     -     -     -     -    29    36 |  288   2375
 HERS |     -    18    14     -     -     -     -     -     -     -     - |  288     18
 HOB2 |     -    19    36    10    15     -     -    13     -    25    31 |  288     75
 HOFN |     -    19     -     -     9     -     -     -     -    17     - |  288   1989
 HRAO |     -     -    22     -    13     -     -     -     -    28     - |  272  26028
 HYDE |     -     -     -    14    16     -     -    23     -    31    41 |  288   4839
 IENG |     -    16    13     -     -     -     -     -     -     -     - |  288     58
 INVK |     -    16     -     -     8     -     -     -     -    63    90 |  287   8978
 ISPA |     -     -     -    21    23     -     -     -     -    98    43 |  261  20932
 JPLM |     -     -    20     9    12     -     -     9     -    25     - |  288   3938
 KARR |     -    20     -     9    10     -     -     -     -    30     - |  288  11990
 KERG |     -     -     -     8     9     -     -     -     -    31    66 |  264   9865
 KIRU |     -    18    10     7     -     -     -     -     -     -     - |  288   2446
 KIT3 |     -     -     -     7     7     -     -     -     -    44     - |  288    >>>
 KOKB |     -    16    16     -     -     -     -    10     -    14    20 |  288     99
 KOUR |     -    22    19    10    14     -     -     -     -     -    57 |  288     32
 LPGS |     -     -     -    12    12     -     -     -     -    25    22 |  288    >>>
 MAC1 |     -    18     -     8     8     -     -     -     -    18    27 |  288   2386
 MAG0 |     -    17     -     -     8     -     -     -     -     -     - |  287   8820
 MAL2 |     -    18     -    10     7     -     -    13     -     -    34 |  288   9410
 MAR6 |     -     -    12     -     -     -     -     8     -     -     - |  288   4920
 MAS1 |     -    18    24    14    15     -     -    14     -    33     - |  288  12971
 MATE |     -     -    10     -     6     -     -     -     -    29     - |  288    277
 MAW1 |     -    31     -     9     9     -     -    11     -    21    20 |  288   3823
 MCIL |     -     -     -     8     8     -     -     -     -    33    18 |  252   7923
 MCM4 |     -    20     -     -     9     -     -     -     -    31    16 |  288  10694
 METS |     -    17    14     -     8     -     -     -     -     -     - |  287     85
 MIZU |     -    21    17     -     -     -     -     -     -     -     - |  288    538
 MOBK |     -     -     -    15     -     -     -    18     -     -     - |  288   6782
 MORP |     -     -     -     -     9     -     -    10     -     -    15 |  288   4476
 NANO |     -    16     -     9     7     -     -     -     -    21    61 |  288   3902
 NICO |     -    27     -    11    10     -     -     -     -    42    18 |  288   2727
 NIST |     -     9     7     -     -     -     -     -     -     -    45 |  288     14
 NKLG |     -    24     -    12    11     -     -    20     -    22    16 |  264   8834
 NNOR |     -     -    30    14     -     -     -    15     -    26    29 |  288    460
 NRC1 |     -    11    18     -    10     -     -     -     -     -     X |  288     12
 NRIL |     -    21     -     6     8     -     -    11     -    25    12 |  288   8686
 NTUS |     -    16     -     7     X     -     -     -     -     -    24 |  130   2778
 NURK |     -     -     -    12    13     -     -     -     -     -     - |  288    >>>
 NYA1 |     -    14    10     -     5     -     -     -     -    21    12 |  288   6619
 NYAL |     -     -    11     -     -     -     -     8     -    19     - |  246    482
 OHI2 |     -     -     -     -    12     -     -    14     -    39    28 |  287    >>>
 ONSA |     -    12    12     -     8     -     -     -     -     -    14 |  288     17
 PALV |     -     -     -     7     8     -     -     -     -     -     - |  288  11992
 PARK |     -     -    17    10     -     -     -     -     -     -     - |  230   3270
 PDEL |     -    20     -     -    10     -     -     9     -    28     - |  288   3277
 PETS |     -     -     -     9     9     -     -    12     -     -    13 |  288  10525
 PIMO |     -     -     -    17    18     -     -    18     -    58     - |  288  14873
 POTS |     -     -     -     7     8     -     -     -     -    25     - |  288    >>>
 PRDS |     -    15     9     8     -     -     -     -     -     -    21 |  288    116
 PTBB |     -    13    11     -     -     -     -     -     -     -     - |  288     33
 QAQ1 |     -    16    20     8     -     -     -    12     -    11     - |  288   7820
 RABT |     -    23     -     -     -     -     -    12     -    22    17 |  288  14675
 RESO |     -    15     -     -     7     -     -     -     -     -    14 |  288   9300
 REUN |     -    30     -     -    14     -     -     -     -    47    32 |  288   3494
 REYK |     -     -     -     8     8     -     -     -     -     -    47 |  288   2351
 RIO2 |     -     -     -    11    12     -     -     -     -     -     - |  288    >>>
 SCH2 |     -    18     -     9     7     -     -    12     -    26    19 |  288   3704
 SHAO |     -    26     -     -    12     -     -     -     -    28     - |  288   9393
 SPT0 |     -    18    14     -     -     -     -     -     -     -     - |  288     34
 SSIA |     -    25     -     -     -     -     -    13     -    20     - |  288   9576
 STHL |     -    19     -    10    11     -     -    13     -     -     - |  288  25687
 SUWN |     -     -     -    10     -     -     -    12     -    20     - |  288   3375
 SVTL |     -     -    13     7     -     -     -     -     -     -     - |  288    110
 SYDN |     -    17    13     -     -     -     -     -     -     -    48 |  286    815
 SYOG |     -    16     9     X     8     -     -     -     -    20    15 |  288    606
 THU3 |     -    19    11     -     6     -     -    10     -    21     - |  288   6152
 TIDB |     -     -    17     -    10     -     -     -     -    64     - |  288     37
 TIXI |     -     -     -     6     6     -     -     -     -    25    15 |  288    >>>
 TLSE |     -    12     -     -     6     -     -     -     -     -     - |  288   1586
 TOW2 |     -    20     -    10    14     -     -    11     -    56    56 |  288   4473
 TRO1 |     -    11     -     -     5     -     -     -     -    21     - |  288   5600
 TSKB |     -    42    22    28    21     -     -     -     -    51     - |  288   6204
 TWTF |     -    35    17     -    17     -     -     -     -    32    50 |  288     26
 UNSA |     -     -     -     X    13     -     -    15     -     -    97 |  287    >>>
 URUM |     -     -     -     8     9     -     -    13     -     -    15 |  288    >>>
 USN3 |     -    22    17     -     -     -     -     -     -    24     - |  288     24
 VACS |     -     -     -    14     -     -     -    17     -     -     - |  288   5197
 VILL |     -     -    14     8     8     -     -     -     -    18     - |  288   2317
 WAB2 |     -    14    11     -     -     -     -     -     -     -     - |  288     30
 WES2 |     -     -    23     -    14     -     -     -     -     -     - |  275   3785
 WHIT |     -    23     X     7     9     -     -     9     -    16    13 |  288  10019
 WIND |     -     -     -    10    11     -     -     -     -    39     - |  288    >>>
 WSRT |     -    17    15     -     9     -     -     -     -    19    16 |  287     14
 WTZA |     -    13    10     -     -     -     -     -     -     -     - |  288    780
 WTZR |     -    10     8     -     -     -     -     -     -    25    37 |  288     26
 XMIS |     -     -     -     -     9     -     -    10     -     -    31 |  288   2581
 YAKT |     -    39    15    15     -     -     -    10     -     -    15 |  288   8398
 YELL |     -     -    11     8     7     -     -     8     -    32    14 |  288     34
 YSSK |     -     -     -     8     6     -     -    10     -     -     - |  287   9885
 ZAMB |     -    27     -    11    11     -     -    15     -    26    29 |  288  24144
 ZECK |     -    19     -     8     7     -     -     -     -     -    15 |  288     59
 -----+-------------------------------------------------------------------+-------------
 TOT  |  2168    21    18    11    11    25  1531    13  1523    40    31 |
-----------------------------------------------------------------------------------------------------
-----------------------------------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN     MEAN     MEAN     MEAN   | HADAMARD DEVIATION AT TAU =  |
      | NREPO NBEPO  BRKS  USED    WGT1(%)  WGT2(%)  WGT3(%)  WGT4(%) |     300s     3600s    21600s |
------+---------------------------------------------------------------+------------------------------+
 AMC2 |   288   286     1   288     4.95     5.01     5.00     5.00   | 3.92e-14  5.30e-15  1.11e-15 |
 MATE |   288   288     0   288     4.34     5.01     0.57     0.57   | 2.62e-14  6.31e-15  2.99e-14 |
 NIST |   288   285     1   288     4.76     5.01     5.00     5.00   | 5.22e-14  4.69e-15  1.11e-15 |
 NRC1 |   288   285     1   288     4.95     5.01     5.00     5.00   | 5.05e-14  4.64e-15  2.00e-15 |
 ONSA |   288   288     0   288     4.68     5.01     5.00     5.00   | 3.44e-14  7.17e-15  2.08e-15 |
 PTBB |   288   288     0   288     4.60     5.01     5.00     5.00   | 4.20e-14  7.53e-15  1.19e-15 |
 TWTF |   288   285     1   288     3.57     5.01     5.00     5.00   | 5.42e-14  7.00e-15  2.05e-15 |
 USN3 |   288   285     1   288     4.30     5.01     5.00     5.00   | 5.80e-14  5.86e-15  1.14e-15 |
 WAB2 |   288   288     0   288     4.48     5.01     0.45     0.45   | 2.37e-14  8.68e-15  3.66e-15 |
 WTZR |   288   288     0   288     4.10     5.01     5.00     5.00   | 4.02e-14  1.06e-14  3.47e-15 |
 YELL |   288   285     1   288     4.95     5.01     5.00     5.00   | 4.40e-14  4.82e-15  1.51e-15 |
 ZECK |   288   288     0   288     4.69     5.01     5.00     5.00   | 3.02e-14  5.66e-15  3.57e-15 |
 HERS |   288   288     0   288     4.23     5.01     5.00     5.00   | 4.10e-14  7.96e-15  1.77e-15 |
 SPT0 |   288   288     0   288     4.93     4.99     5.00     5.00   | 2.67e-14  5.56e-15  2.71e-15 |
 WSRT |   287   284     1   287     4.93     4.99     4.98     4.98   | 5.39e-14  6.18e-15  2.68e-15 |
 IENG |   288   288     0   288     3.58     4.97     5.00     5.00   | 3.05e-14  8.63e-15  4.65e-15 |
 ALGO |   284   283     1   284     3.36     4.92     3.73     3.73   | 7.29e-14  2.11e-14  9.53e-15 |
 KOUR |   288   288     0   288     2.79     3.63     0.46     0.46   | 5.63e-14  1.36e-14  3.34e-15 |
 GODE |   288   285     1   288     2.19     2.23     0.64     0.64   | 9.66e-14  9.31e-15  1.07e-14 |
 KOKB |   288   287     1   288     2.04     1.94     2.73     2.73   | 9.31e-14  8.80e-15  1.04e-14 |
 HOB2 |   288   288     0   288     2.02     1.90     1.01     1.01   | 3.62e-14  1.18e-14  6.18e-15 |
 CRO1 |   265   261     1   265     1.79     1.64     4.60     4.60   | 1.06e-08  3.27e-09  1.94e-09 |
 TIDB |   288   285     1   288     1.77     1.45     5.00     5.00   | 9.98e-14  1.45e-14  2.33e-15 |
 SVTL |   288   288     0   288     1.43     0.96     0.07     0.07   | 2.35e-14  6.47e-15  7.12e-15 |
 MAR6 |   288   288     0   288     0.57     0.15     0.01     0.01   | 2.43e-13  6.63e-14  1.71e-13 |
 G26  |   288   288     0   288     0.86     0.13     0.17     0.17   | 1.79e-13  6.94e-14  5.94e-14 |
 PRDS |   288   287     1   288     0.48     0.11     0.05     0.05   | 3.00e-14  9.29e-15  5.74e-15 |
 G18  |   288   288     0   288     0.37     0.10     0.22     0.22   | 7.31e-13  7.31e-14  2.94e-14 |
 BRUX |   288   288     0   288     0.43     0.09     0.41     0.41   | 4.07e-13  9.38e-14  4.01e-14 |
 MIZU |   288   288     0   288     0.41     0.08     0.06     0.06   | 3.80e-13  1.08e-13  4.55e-14 |
 WTZA |   288   288     0   288     0.33     0.05     0.68     0.68   | 4.75e-13  1.15e-13  9.92e-14 |
 G04  |   288   288     0   288     0.35     0.04     0.07     0.07   | 4.66e-13  1.20e-13  1.03e-13 |
 G31  |   288   288     0   288     0.37     0.04     0.30     0.30   | 5.81e-13  6.29e-14  2.09e-14 |
 SYDN |   286   286     0   286     0.27     0.04     0.03     0.03   | 6.09e-13  1.62e-13  4.47e-14 |
 G23  |   288   288     0   288     0.36     0.04     1.26     1.26   | 6.18e-13  6.26e-14  2.70e-14 |
 G02  |   288   288     0   288     0.36     0.03     0.73     0.73   | 5.39e-13  6.28e-14  3.15e-14 |
 G01  |   288   288     0   288     0.84     0.03     0.99     0.99   | 8.71e-14  2.36e-14  1.41e-14 |
 G19  |   288   288     0   288     0.34     0.03     0.36     0.36   | 6.23e-13  6.97e-14  1.77e-14 |
 G07  |   288   288     0   288     0.33     0.03     0.31     0.31   | 7.19e-13  6.39e-14  2.97e-14 |
 G16  |   288   288     0   288     0.33     0.03     0.61     0.61   | 6.43e-13  7.35e-14  4.92e-14 |
 G14  |   288   288     0   288     0.32     0.03     0.84     0.84   | 6.33e-13  7.64e-14  1.25e-14 |
 G29  |   288   288     0   288     0.32     0.03     0.11     0.11   | 6.32e-13  6.01e-14  2.08e-14 |
 G15  |   288   288     0   288     0.31     0.03     0.87     0.87   | 7.32e-13  6.83e-14  3.84e-14 |
 G05  |   288   288     0   288     0.31     0.03     0.47     0.47   | 7.37e-13  7.85e-14  3.54e-14 |
 G12  |   288   288     0   288     0.30     0.03     1.29     1.29   | 7.29e-13  8.35e-14  3.74e-14 |
 G06  |   288   288     0   288     0.29     0.02     0.23     0.23   | 6.12e-13  2.22e-13  8.31e-14 |
 G11  |   288   288     0   288     0.28     0.02     0.16     0.16   | 6.59e-13  6.47e-14  3.82e-14 |
 G28  |   288   288     0   288     0.28     0.02     0.25     0.25   | 7.14e-13  7.72e-14  2.05e-14 |
 G27  |   288   288     0   288     0.32     0.02     0.01     0.01   | 4.37e-14  2.26e-14  1.57e-14 |
 G32  |   288   288     0   288     0.86     0.02     0.26     0.26   | 2.34e-13  6.12e-14  1.99e-13 |
 BRFT |   288     0     0     0     0.00     0.00     0.00     0.00   | 4.50e-27  3.75e-28  6.25e-29 |
 CHUR |   288   288     2     0     0.00     0.00     0.00     0.00   | 7.50e-13  3.14e-13  2.07e-13 |
 G03  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.17e-12  4.09e-13  2.18e-13 |
 G08  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.42e-12  3.42e-13  2.73e-13 |
 G09  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.39e-12  5.23e-13  4.24e-13 |
 G10  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.23e-12  3.62e-13  6.93e-14 |
 G13  |   288   288     0     0     0.00     0.00     0.00     0.00   | 7.41e-13  8.03e-14  3.25e-14 |
 G17  |   288   288     0     0     0.00     0.00     0.00     0.00   | 9.61e-13  9.36e-14  4.03e-14 |
 G20  |   288   288     0     0     0.00     0.00     0.00     0.00   | 8.79e-13  9.20e-14  2.34e-14 |
 G21  |   288   288     0     0     0.00     0.00     0.00     0.00   | 8.54e-13  8.88e-14  3.27e-14 |
 G22  |   288   286     0     0     0.00     0.00     0.00     0.00   | 7.30e-13  8.00e-14  3.21e-14 |
 G24  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.05e-12  2.93e-13  1.31e-13 |
 G25  |   288   284     5     0     0.00     0.00     0.00     0.00   | 5.50e-14  3.73e-14  1.70e-14 |
 GLSV |   288   253     7     0     0.00     0.00     0.00     0.00   | 3.62e-12  5.18e-13  9.34e-14 |
 HOFN |   288   242    15     0     0.00     0.00     0.00     0.00   | 4.22e-12  8.82e-13  1.97e-13 |
 MAC1 |   288   267     8     0     0.00     0.00     0.00     0.00   | 3.63e-12  8.41e-13  1.81e-13 |
 METS |   287   287     0     0     0.00     0.00     0.00     0.00   | 4.20e-13  2.80e-14  7.86e-15 |
 NNOR |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.44e-12  1.82e-13  4.30e-14 |
 NYAL |   246   227     7     0     0.00     0.00     0.00     0.00   | 8.90e-13  1.44e-13  4.94e-14 |
 GPST |   288   287     1     0     0.00     0.00     0.00     0.00   | 2.64e-14  3.36e-15  8.55e-16 |
 SUWN |   288     0     0     0     0.00     0.00     0.00     0.00   | 0.00e+00  0.00e+00  0.00e+00 |
 XMIS |   288   238    16     0     0.00     0.00     0.00     0.00   | 4.17e-12  9.23e-13  1.87e-13 |
 SYOG |   288   288     0     0     0.00     0.00     0.00     0.00   | 6.52e-13  1.97e-13  6.38e-14 |
 TLSE |   288   285     3     0     0.00     0.00     0.00     0.00   | 2.72e-12  7.43e-13  1.15e-13 |
 GRAS |   288   277     4     0     0.00     0.00     0.00     0.00   | 2.77e-12  7.99e-13  1.62e-13 |
 HARB |   288   288     0     0     0.00     0.00     0.00     0.00   | 3.31e-13  4.03e-13  1.99e-13 |
 REYK |   288   252    13     0     0.00     0.00     0.00     0.00   | 4.13e-12  1.04e-12  1.50e-13 |
 BRST |   130   126     2     0     0.00     0.00     0.00     0.00   | 2.41e-12  8.30e-13         - |
 CONT |   288   288     0     0     0.00     0.00     0.00     0.00   | 5.19e-14  2.38e-14  5.72e-15 |
------+---------------------------------------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:                                         | 6.41e-22  9.24e-20  3.37e-18 |
----------------------------------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                                                   |     SUWN      SUWN      BRFT |
----------------------------------------------------------------------+------------------------------+
