
 cls-file Version 2.0
 GPS week: 1684   Day: 1   MJD: 56033                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 brx |    96     0   2304      0       0       0      0      0      0      0      0      0  100.00
 brd |    96     0   2304      0  166008       0      0      0      0      0      0      0    0.00
 cod |     0     0      0      0       0       0      0      0      0      0      0      0    0.00
 emx |    96     0   2304      0  164305    2548   4225   4225      0   7333   7333      0    0.00
 esx |    96     0   2304      0  163094    4578   4234   4234      0   4369   4369      0    0.00
 gfz |    96     0   2304      0       0    2281   4235   4235      0   7021   7021      0    0.00
 grg |    96     0   2304      0  163396    1974   4217   4217      0  21648  21648      0    0.00
 iac |    96     0   2304      0  166761      42   4233   4233      0   7230   7230      0    0.00
 mcc |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brx   brd   cod   emx   esx   gfz   grg   iac   mcc |
 -----+-------------------------------------------------------+
  101 |     0     0     - -3427   854 -3653-61778 -4078     - |
  102 |     0     0     -  4836   151  4266-26717  5552     - |
  103 |     0     0     -  4978  -105  3757 28690  2138     - |
  104 |     0     0     -  3670  -797  3815  8221  2452     - |
  105 |     0     0     - -5060  -387 -5386 -2480 -5309     - |
  106 |     0     0     -  5132 -1551  6157 23391  8283     - |
  107 |     0     0     -  -511   110 -1101 15658 -2700     - |
  108 |     0     0     -  1306   -57  -431 15284 -3358     - |
  109 |     0     0     -  2687   694  3699  8864  6966     - |
  110 |     0     0     -  -780  -809  -457-13119  3257     - |
  111 |     0     0     - -3055  1248 -2937 -3980 -2532     - |
  112 |     0     0     -  3964 -1715  3457  3550  4286     - |
  113 |     0     0     -  6539   -27  5692  1634  6252     - |
  114 |     0     0     --16013  -127-13648-20563-11070     - |
  115 |     0     0     - -3186  1310 -2249-27401  -356     - |
  116 |     0     0     - -2462  -742 -1452  2314  -398     - |
  117 |     0     0     -  2960   362  2324  2654   798     - |
  118 |     0     0     --12954   487-12076  1475-11395     - |
  119 |     0     0     -  2820  -113  2185 32973  -741     - |
  120 |     0     0     - -2926  -160 -2834  4881 -4119     - |
  121 |     0     0     - -1516 -1316 -2124 -3792 -5218     - |
  122 |     0     0     - 11843  2348 12076 35922 12964     - |
  123 |     0     0     - -4085   -80 -4121-21343 -6037     - |
  124 |     0     0     -  5237   422  5040 -4337  4362     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brx   brd   cod   emx   esx   gfz   grg   iac   mcc | NEPO    RMS
 -----+-------------------------------------------------------+-------------
  101 |     0     0     -  1205  1189  1224  1134  1239     - |   96    861
  102 |     0     0     -  1686  1633  1642  1621  1682     - |   96    592
  103 |     0     0     -  2320  2278  2229  2243  2245     - |   96   2369
  104 |     0     0     -  1297  1284  1289  1359  1386     - |   96    811
  105 |     0     0     -  1716  1711  1704  1714  1735     - |   96   1849
  106 |     0     0     -  3838  3783  3829  3803  3780     - |   96   2034
  107 |     0     0     -  3828  3871  3860  3992  3936     - |   96   2476
  108 |     0     0     -  3056  2996  3057  2836  3057     - |   96    507
  109 |     0     0     -  3719  3738  3772  3810  3856     - |   96   3605
  110 |     0     0     -  4342  4283  4278  4290  4207     - |   96   2890
  111 |     0     0     -  3314  3320  3315  3292  3405     - |   96   2873
  112 |     0     0     -  4442  4429  4413  4443  4423     - |   96   4685
  113 |     0     0     -  2807  2875  2823  2773  2835     - |   96   1573
  114 |     0     0     -  3966  4034  3991  4013  3955     - |   96   2441
  115 |     0     0     - 10252 10264 10311 10225 10259     - |   96   6539
  116 |     0     0     -  5021  5144  5142  5074  5102     - |   96   4409
  117 |     0     0     -  2282  2241  2263  2233  2217     - |   96   2101
  118 |     0     0     - 10163 10175 10152 10053 10134     - |   96   7181
  119 |     0     0     -  1518  1454  1484  1527  1459     - |   96    744
  120 |     0     0     -  2093  2304  2214  2338  2281     - |   96   2003
  121 |     0     0     -  2926  2917  2948  2891  2860     - |   96   2835
  122 |     0     0     -  6019  6045  6014  6091  6058     - |   96   5492
  123 |     0     0     -  1165  1137  1200  1061  1170     - |   96    897
  124 |     0     0     -  1124  1087  1079  1119  1126     - |   96   1048
 -----+-------------------------------------------------------+-------------
 TOT  |     0     0     -  4225  4235  4235  4218  4233     - |
