
 cls-file Version 2.0
 GPS week: 1631   Day: 2   MJD: 55663                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 brd |    96     0   2766     24      22    -127   2266   2266      0   4591   4591      0    0.00
 cod |   288     0  22520    240    -983     396     33     47     21     87     90     86   28.73
 emr |   288     0  13121     84   -1988     213     46     55     24     92     99     77   25.37
 esa |   288     0  25515    439   -1702   -1332     36     55     22    105    140     83   24.11
 gfz |   288   288  20314  11185    -141     568    391      0    391    780      0    780    0.00
 iga |    96     0   2855     11    -517     715     66     66      0    100    100      0    0.00
 igu |    96     0   2670      1    -274    1256   2218   2218      0   3866   3866      0    0.00
 jpl |   288     0  24157    303     -33     160     41     66     21    102    104    101   21.78
 ngs |    96     0   2855     17    -369     406   2086   2086      0   3841   3841      0    0.00
 usn |   288     0  16540     59    -827     450     71     86     54    135    166    103    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------------+
    2 |  -247    30    -1    23     X   114   896   -65  -485     - |
    3 | -6217   -81    57    14     X   -19  9652    25 -5417   162 |
    4 |  -943    35    -8   -31     X    15 -1333    -3 -1406   192 |
    5 |    -3   111   -48  -206     X  -126   483   137   -11    50 |
    6 |     -    50   -56     -     -   -15     -     - -1818     - |
    7 |    98   -13    19  -146     X   -64  2590   157   242   127 |
    8 | -6966   -17    17   -25     X   -41 -2106    34 -5735   292 |
   10 |  8162   -86   145    42     X    33   960  -101  4067   114 |
   11 |  3300    22    21   -51     X    20   730     3  4163    44 |
   12 |  -852    72   -14   -32     X   157  1175   -44  -669    66 |
   13 |  3118    96  -132    96     X    51  -383   -81  3575     2 |
   14 |  2952    97   -41    -1     X   -10   -47   -80  3130   -26 |
   15 |  -717   114   -16  -193     X   -67   -38    82  -324    21 |
   16 |  3740    -5    24   -13     X   -18   787    -7  3919   -45 |
   17 |  4763   107    46  -259     X   -33  1343    92  3020   131 |
   18 |  3735   138   -12  -123     X    37  -158   -32  3630     6 |
   19 |   -84    36  -121   125     X   -80  -570   -44   275  -142 |
   20 |  3906    10    29   -73     X  -106   431    35  3975   -19 |
   21 |  2455    64   -16   -61     X    67   547     3  2685    74 |
   22 | -5059   -30  -156   177     X   -68 -1989    16 -3502    37 |
   23 |   941    87    42   -49     X   164   645  -110   859    58 |
   24 |  2972   -48    65     6     X    71  1992   -17    25   177 |
   25 | -1092   133  -162    12     X   -78  1425     X  -375  -368 |
   26 | -5639    68    30  -116     X   -40     -     - -4607     - |
   27 | -1573     X    54     X     X   -33-12528   -63 -2210   111 |
   28 |  5049    25   -16    32     X    81 -1995   -50  4613   148 |
   29 | -2273    25   158  -349     X   -48   496   169 -1855   173 |
   30 | -8293   106    24  -100     X    33 -4757   -57 -6022   156 |
   31 |   417   113    21  -236     X    15   603    89   229   -71 |
   32 | -5282     0    48   -14     X   -39 -1419   -36 -4691    91 |
 -----+-------------------------------------------------------------+
 ALGO |     -   -44    72    78     -     -     -  -111     -    32 |
 AMC2 |     -    13     -    90     -     -     -  -116     -   -17 |
 AREQ |     -  -140    75    76   809     -     -    13     -     - |
 ASPA |     -   -92     -   242   514     -     -  -114     -     - |
 AUCK |     -   -18     -    65   665     -     -   -48     -  -145 |
 BAN2 |     -     -     -   -44     -     -     -    49     -     - |
 BJCO |     -     -     -    65     -     -     -   -72     -     - |
 BOGT |     -    -9     -     5   437     -     -     6     -     - |
 BRFT |     -   -29     -   -81     X     -     -   127     -     - |
 BRMU |     -   -32     -     1   659     -     -    41     -     - |
 BRST |     -     3     -    -4     -     -     -     -     -     - |
 CAGZ |     -     -     -  -117     -     -     -   130     -   -19 |
 CAS1 |     -   -40     -    47   632     -     -     -     -   101 |
 CHAN |     -     -     -   -53     -     -     -    59     -     - |
 CHAT |     -    51     -     -   685     -     -   -67     -    14 |
 CHPI |     -     -     -    22     -     -     -   -25     -   -58 |
 CHTI |     -   -32     -    38     -     -     -     -     -     - |
 CHUR |     -   -58   -12    38     -     -     -    50     -     - |
 CRO1 |     -   -69   102     -   722     -     -   -28     -   -72 |
 DAEJ |     -  -118    23    17     -     -     -   110     -   -12 |
 DGAR |     -   -78     -     -   734     -     -   103     -     - |
 DRAO |     -    61   -69     -   557     -     -     -     -   -22 |
 DUBO |     -     -     -    50   760     -     -   -56     -     - |
 FAA1 |     -  -152     -   182     X     -     -     -     -     - |
 FLIN |     -   362     -     X     -     -     -  -477     -     - |
 GLSV |     -   -32     -   -20   726     -     -    63     -     - |
 HERS |     -  -101     -   121     -     -     -     -     -  -128 |
 HOB2 |     -   108  -122     -   610     -     -    -1     -     2 |
 HRAO |     -    87     -  -103     -     -     -     -     -    20 |
 IQAL |     -     -     -    49     -     -     -   -55     -     - |
 ISPA |     -   -31     -     0   857     -     -    41     -   -58 |
 KOUR |     -    -1     -    12   453     -     -   -11     -   -10 |
 LPGS |     -   -60    55     -     X     -     -    14     -    17 |
 MAL2 |     -     -     -    -7   708     -     -     8     -     - |
 MAS1 |     -    34     -    95   594     -     -  -149     -   -87 |
 MAW1 |     -    16     -   -19   895     -     -     -     -     - |
 MCM4 |     -     -   -48     -     -     -     -    55     -   -52 |
 NANO |     -   -22     -    26   709     -     -     -     -     - |
 NRIL |     -     -     -    -8   684     -     -     9     -     - |
 NRMD |     -   -14     -    17     -     -     -     -     -   -48 |
 NTUS |     -   -30     -    35   617     -     -     -     -     - |
 NYA1 |     -   -46     -    54     -     -     -     -     -   -37 |
 OHI2 |     -     -     -   135   731     -     -  -150     -     - |
 ONSA |     -     -    33   -35   711     -     -     -     -   -88 |
 PDEL |     -   -40     -     -   607     -     -    53     -     - |
 PERT |     -   -80   -34     8   487     -     -   136     -    25 |
 PETS |     -     -     -   -26   568     -     -    29     -     - |
 PIMO |     -     -     -   -59   698     -     -    65     -   -67 |
 PRDS |     -   -58     -    24     -     -     -    50     -  -117 |
 QAQ1 |     -  -130    65   -58     -     -     -   160     -     - |
 QUIN |     -     -     -    57     -     -     -   -63     -     - |
 RABT |     -     -     -   -26     -     -     -    29     -     - |
 REUN |     -    13     -   -15     -     -     -     -     -     - |
 REYK |     -     -     -    48   611     -     -   -53     -     - |
 RIO2 |     -     -     -  -111     -     -     -   123     -     - |
 SHAO |     -   -19     -   -33     -     -     -    63     -   -80 |
 STJO |     -     -   -41    53   630     -     -   -11     -    38 |
 SUTH |     -    92     -     -     -     -     -  -121     -   -84 |
 SVTL |     -     -     -    -9     -     -     -    10     -     - |
 SYDN |     -   -49     -    -8     -     -     -    74     -   -81 |
 SYOG |     -   112  -127     -   661     -     -     -     -     - |
 THU3 |     -     4     -     -     X     -     -    -5     -   -57 |
 TIXI |     -   -27     -     7   636     -     -    28     -     - |
 TLSE |     -   -22     -     -     -     -     -    30     -     - |
 TOW2 |     -    24     -   148   590     -     -  -189     -     - |
 TSKB |     -   -98     -   117   775     -     -     -     -     - |
 UCLU |     -   -78     -     -     -     -     -   103     -     - |
 ULAB |     -     -     -   -19   809     -     -    21     -     - |
 VIS0 |     -     -     -    28     -     -     -   -31     -     - |
 WHIT |     -     -   -12     7   572     -     -     6     -  -128 |
 WTZR |     -  -143     -   171     X     -     -     -     -  -219 |
 YAKT |     -   -88     -   105     -     -     -     -     -   -55 |
 YELL |     -  -104    41   224     X     -     -  -159     -     - |
 YSSK |     -     -     -    38   877     -     -   -42     -     - |
 ZECK |     -     -     -   -89   656     -     -    98     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn | NEPO    RMS
 -----+-------------------------------------------------------------+-------------
    2 |   627    68    65    81     X    84   400    69   580     - |  288    207
    3 |  2411    47    41    34     X    52  4945    32  2716    87 |  288   2272
    4 |  2768    56    56    59     X    71  1684    69  2062    55 |  288    703
    5 |   370    40    56    64     X    62   410    57   431    59 |  288    202
    6 |     -    36    41     -     -    63     -     -  1788     - |  270    >>>
    7 |   971    53    54    62     X    77  1190    98   766   153 |  288    327
    8 |  3552    75    67    61     X   108  2048    89  3771   142 |  287   2272
   10 |  3278    26    47    34     X    46  2142    27  3138    44 |  288   1893
   11 |  1906    38    65    45     X    63   792    58  1401    69 |  288    627
   12 |   534    52    76    51     X    41   736    64   455    45 |  288    227
   13 |   364    46    45    52     X    81   595    84   502    68 |  288    310
   14 |  1003    42    48    77     X    57   324    80   692    73 |  288    228
   15 |   525    47    54    60     X    46   384    59   503    99 |  288    233
   16 |   570    47    41    40     X    45   504    72   498    76 |  288    272
   17 |  2814    33    32    41     X    33  1014    60  2475    60 |  288    220
   18 |   641    45    63    74     X    72   396    73   466    90 |  288    253
   19 |   628    46    36    40     X    53   402    55   515    58 |  288    240
   20 |   446    63    70    77     X    38   404    84   382    98 |  288    216
   21 |   705    38    62    49     X    33   763    47   555    52 |  288    362
   22 |  2998    28    54    71     X    60  1314    67  2691    94 |  288    351
   23 |   568    40    59    66     X    62   335    71   333    84 |  288    189
   24 |  3873    80    92    78     X    91  5489    95  3527   112 |  288   2114
   25 |  1470    29    39    39     X    44  1036     X  1266    66 |  288    199
   26 |  2885    33    67    41     X    74     -     -  3211     - |  288   1205
   27 |  5532     X    34     X     X   192  5069    39  5699   193 |  234   4464
   28 |  1823    44    51    56     X    45  1618    66  1920    65 |  288    314
   29 |  1001    49    51    24     X    35   466    45  1000    90 |  288    224
   30 |  5744    29    46    29     X    30  6092    23  4063    76 |  288   1401
   31 |   555    49    52    62     X    45   322    92   406    53 |  288    322
   32 |  1182    32    49    38     X    34  1629    34  1332    68 |  288    953
 -----+-------------------------------------------------------------+-------------
 ALGO |     -    21    13    11     -     -     -     8     -    23 |  288    225
 AMC2 |     -    30     -    16     -     -     -    25     -    17 |  288     33
 AREQ |     -    12    12     9   416     -     -    12     -     - |  288  20238
 ASPA |     -    20     -    22   393     -     -    25     -     - |  288  10271
 AUCK |     -    15     -    13   394     -     -    18     -    36 |  288   5447
 BAN2 |     -     -     -    16     -     -     -    18     -     - |  287  11946
 BJCO |     -     -     -    22     -     -     -    25     -     - |  286   8430
 BOGT |     -    18     -    11   389     -     -    22     -     - |  288  22381
 BRFT |     -    18     -    20     X     -     -    27     -     - |  288   2959
 BRMU |     -    16     -    15   410     -     -    10     -     - |  288   2500
 BRST |     -     8     -     9     -     -     -     -     -     - |  276   3358
 CAGZ |     -     -     -     9     -     -     -    10     -    31 |  275    >>>
 CAS1 |     -    52     -    62   306     -     -     -     -    55 |  204   3676
 CHAN |     -     -     -    11     -     -     -    12     -     - |  288   8328
 CHAT |     -    15     -     -   362     -     -    20     -    33 |  287   9214
 CHPI |     -     -     -    10     -     -     -    11     -   120 |  288  18587
 CHTI |     -    13     -    15     -     -     -     -     -     - |  276   4832
 CHUR |     -    43    49    65     -     -     -    69     -     - |  288  13163
 CRO1 |     -    22    23     -   377     -     -    11     -    53 |  288     76
 DAEJ |     -    27    19    12     -     -     -     9     -    38 |  287   1444
 DGAR |     -    20     -     -   432     -     -    26     -     - |  287  27978
 DRAO |     -     9    10     -   383     -     -     -     -    29 |  288   8841
 DUBO |     -     -     -    11   397     -     -    12     -     - |  276  17347
 FAA1 |     -    17     -    20     X     -     -     -     -     - |  288   8482
 FLIN |     -    32     -     X     -     -     -    42     -     - |  186    >>>
 GLSV |     -    12     -    11   411     -     -    12     -     - |  288   1852
 HERS |     -    12     -    15     -     -     -     -     -    17 |  288     35
 HOB2 |     -    25    17     -   396     -     -    21     -    62 |  288     39
 HRAO |     -    13     -    16     -     -     -     -     -    71 |  288    318
 IQAL |     -     -     -    19     -     -     -    21     -     - |  276   5288
 ISPA |     -    24     -    18   383     -     -    21     -    58 |  288  25959
 KOUR |     -    19     -    20   375     -     -    14     -    34 |  288    137
 LPGS |     -    19    13     -     X     -     -    15     -   121 |  288  13916
 MAL2 |     -     -     -    17   428     -     -    19     -     - |  288    >>>
 MAS1 |     -    10     -    10   400     -     -    12     -    64 |  288   3548
 MAW1 |     -    53     -    64   236     -     -     -     -     - |  193   4407
 MCM4 |     -     -    38     -     -     -     -    44     -    99 |  278   9355
 NANO |     -    12     -    14   379     -     -     -     -     - |  288   3051
 NRIL |     -     -     -    21   412     -     -    24     -     - |  285  10375
 NRMD |     -    20     -    23     -     -     -     -     -    36 |  276   9208
 NTUS |     -    11     -    13   421     -     -     -     -     - |  275   3263
 NYA1 |     -    10     -    12     -     -     -     -     -    34 |  276    430
 OHI2 |     -     -     -    25   388     -     -    28     -     - |  263    >>>
 ONSA |     -     -     8     8   427     -     -     -     -    22 |  288     15
 PDEL |     -     7     -     -   401     -     -     9     -     - |  288   2700
 PERT |     -    13    14    15   401     -     -    19     -    53 |  288   1197
 PETS |     -     -     -     8   395     -     -     8     -     - |  288  10456
 PIMO |     -     -     -    10   395     -     -    11     -    37 |  288  20146
 PRDS |     -    15     -     8     -     -     -    15     -    14 |  288  12804
 QAQ1 |     -    18    13     9     -     -     -    13     -     - |  288   6495
 QUIN |     -     -     -     8     -     -     -     9     -     - |  288  12995
 RABT |     -     -     -     6     -     -     -     7     -     - |  276  13971
 REUN |     -    42     -    51     -     -     -     -     -     - |  264  15475
 REYK |     -     -     -     8   400     -     -     9     -     - |  275    >>>
 RIO2 |     -     -     -    12     -     -     -    13     -     - |  288  12161
 SHAO |     -     9     -    11     -     -     -    13     -    42 |  288   4676
 STJO |     -     -    11    13   353     -     -     9     -    18 |  288  60186
 SUTH |     -    18     -     -     -     -     -    24     -    75 |  287  20662
 SVTL |     -     -     -     7     -     -     -     7     -     - |  287     25
 SYDN |     -    15     -    13     -     -     -    21     -    81 |  287    722
 SYOG |     -    36    41     -   385     -     -     -     -     - |  286    610
 THU3 |     -    18     -     -     X     -     -    23     -    20 |  288  10254
 TIXI |     -    33     -    19   400     -     -    48     -     - |  288   5263
 TLSE |     -     9     -     -     -     -     -    11     -     - |  288   5638
 TOW2 |     -    12     -    14   395     -     -    16     -     - |  288   2952
 TSKB |     -    11     -    13   398     -     -     -     -     - |  276   1088
 UCLU |     -     6     -     -     -     -     -     7     -     - |  288   3756
 ULAB |     -     -     -    10   413     -     -    11     -     - |  287  10174
 VIS0 |     -     -     -     8     -     -     -     9     -     - |  288  13601
 WHIT |     -     -    35    77   341     -     -    45     -    71 |  285   7465
 WTZR |     -    11     -    13     X     -     -     -     -    22 |  288     53
 YAKT |     -    18     -    22     -     -     -     -     -    37 |  237   8818
 YELL |     -    21    27    20     X     -     -    15     -     - |  288     16
 YSSK |     -     -     -    32   400     -     -    35     -     - |  287  11143
 ZECK |     -     -     -     8   411     -     -     9     -     - |  276  19565
 -----+-------------------------------------------------------------+-------------
 TOT  |  2266    33    47    37   391    67  2218    42  2086    71 |




CLOCK JUMP CORRECTIONS APPLIED
------------------------------

CEN | STA/SAT | EPOCH           |     JUMP(ps)
----+---------+-----------------+-------------
emr |   SYOG  | 1631-2 22:45:00 |        1447
gfz |   *REF  | 1631-2  6:05:00 |       -1080
jpl |   POL2  | 1631-2  0:15:00 |      -14492
jpl |   POL2  | 1631-2  0:20:00 |        4359
jpl |   POL2  | 1631-2  0:25:00 |       -5351
jpl |   POL2  | 1631-2  0:30:00 |        3793
jpl |   POL2  | 1631-2  0:40:00 |       -8771
jpl |   POL2  | 1631-2  0:45:00 |        4993



---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 ONSA |   288     0     0   288   22.70   | 2.82e-14  5.30e-15  7.97e-16 |
 AMC2 |   288     0     0   288   19.91   | 2.88e-14  5.66e-15  3.22e-15 |
 SVTL |   287     0     0   286   18.13   | 2.15e-14  4.90e-15  1.15e-15 |
 HERS |   288     0     0   288   12.40   | 3.16e-14  6.79e-15  1.68e-15 |
 HOB2 |   288     0     0   288    6.31   | 3.53e-14  7.61e-15  3.70e-15 |
 YELL |   288     0     0   288    5.84   | 2.77e-14  4.24e-15  2.14e-15 |
 WTZR |   288     0     0   143    5.14   | 4.10e-14  1.60e-14  3.85e-15 |
 CRO1 |   288     0     0   288    5.09   | 8.52e-14  1.49e-14  4.49e-15 |
 KOUR |   288     0     0   288    2.15   | 3.99e-14  1.98e-14  1.16e-14 |
 ALGO |   288     1     0   261    0.92   | 2.67e-14  8.03e-15  1.27e-14 |
 G25  |   288     0     0   288    0.65   | 6.97e-14  2.98e-14  1.84e-14 |
 G06  |   270     0     1   256    0.14   | 5.16e-13  1.25e-13  5.44e-14 |
 G31  |   288     0     2   115    0.12   | 6.12e-13  7.05e-14  3.43e-14 |
 HRAO |   288     0     0   143    0.11   | 3.82e-14  1.50e-14  2.27e-14 |
 G07  |   288     0     0   143    0.09   | 5.60e-13  6.44e-14  1.75e-14 |
 SYDN |   287     0     0   285    0.08   | 5.12e-13  1.71e-13  6.78e-14 |
 G04  |   288     0     0   288    0.05   | 4.30e-13  1.66e-13  6.46e-14 |
 SYOG |   286     0     0   285    0.04   | 6.52e-13  1.79e-13  6.37e-14 |
 G32  |   288     0     0   288    0.04   | 2.29e-13  9.00e-14  1.09e-13 |
 DAEJ |   287     0     0   286    0.03   | 8.27e-13  2.57e-13  8.52e-14 |
 G26  |   288     0     0   143    0.02   | 4.90e-13  1.21e-13  9.09e-14 |
 TSKB |   276     0     0   276    0.02   | 1.13e-12  2.90e-13  6.69e-14 |
 G30  |   288     0     0   288    0.02   | 1.38e-12  3.90e-13  8.54e-14 |
 PERT |   288     0     0   288    0.01   | 1.21e-13  1.87e-13  1.39e-13 |
 G10  |   288     0     0   288    0.01   | 1.20e-12  4.12e-13  1.83e-13 |
 NYA1 |   276     1     3    19    0.00   | 9.27e-13  2.19e-13  3.65e-14 |
 GPST |   288     0     0     0    0.00   | 2.39e-14  4.86e-15  1.28e-15 |
 YAKT |   237     0     0     0    0.00   |        -         -         - |
 MAW1 |   193     0     0     0    0.00   |        -         -         - |
 CHTI |   276     0     0     0    0.00   |        -         -         - |
 YSSK |   287     0     0     0    0.00   |        -         -         - |
 REYK |   275     0     0     0    0.00   |        -         -         - |
 OHI2 |   263     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 G29  |   288     0     6     0    0.00   | 5.92e-13  6.97e-14  1.56e-14 |
 G28  |   288     0     6     0    0.00   | 6.59e-13  6.68e-14  2.34e-14 |
 G27  |   234     0     0     0    0.00   | 1.41e-12  7.33e-13         - |
 G24  |   288     0     0     0    0.00   | 1.43e-12  5.12e-13  1.89e-13 |
 G23  |   288     0     6     0    0.00   | 5.68e-13  5.90e-14  1.56e-14 |
 G22  |   288     1     6     0    0.00   | 5.78e-13  6.20e-14  2.88e-14 |
 G21  |   288     0     6     0    0.00   | 1.00e-12  1.54e-13  2.58e-14 |
 G20  |   288     0     6     0    0.00   | 8.37e-13  8.96e-14  1.68e-14 |
 G19  |   288     0     6     0    0.00   | 5.93e-13  5.88e-14  1.63e-14 |
 G18  |   288     0     6     0    0.00   | 6.33e-13  6.79e-14  2.82e-14 |
 G17  |   288     0     6     0    0.00   | 5.88e-13  6.80e-14  1.46e-14 |
 G16  |   288     0     6     0    0.00   | 6.57e-13  5.79e-14  2.94e-14 |
 G15  |   288     0     6     0    0.00   | 6.48e-13  6.93e-14  2.47e-14 |
 G14  |   288     0     6     0    0.00   | 5.48e-13  6.12e-14  2.15e-14 |
 G13  |   288     0     6     0    0.00   | 8.08e-13  9.71e-14  3.17e-14 |
 G12  |   288     0     6     0    0.00   | 6.18e-13  6.34e-14  2.40e-14 |
 G11  |   288     0     5     0    0.00   | 6.49e-13  6.61e-14  3.60e-14 |
 G08  |   287     0     0     0    0.00   | 1.45e-12  5.00e-13  1.89e-13 |
 G05  |   288     0     6     0    0.00   | 5.84e-13  6.74e-14  2.10e-14 |
 G03  |   288     0     0     0    0.00   | 1.33e-12  3.88e-13  1.52e-13 |
 G02  |   288     0     6     0    0.00   | 5.43e-13  5.49e-14  1.43e-14 |
 ZECK |   276     0     0     0    0.00   |        -         -         - |
 WHIT |   285     0     0     0    0.00   | 1.41e-12  5.01e-13  6.79e-13 |
 VIS0 |   288     0     0     0    0.00   |        -         -         - |
 ULAB |   287     0     0     0    0.00   |        -         -         - |
 UCLU |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 TLSE |   288     0     0     0    0.00   |        -         -         - |
 TIXI |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 SUTH |   287     0     0     0    0.00   |        -         -         - |
 STJO |   288     0     0     0    0.00   |        -         -         - |
 SHAO |   288     0     0     0    0.00   | 1.41e-13  2.70e-13  4.14e-13 |
 RIO2 |   288     0     0     0    0.00   |        -         -         - |
 REUN |   264     0     0     0    0.00   |        -         -         - |
 RABT |   276     0     0     0    0.00   |        -         -         - |
 QUIN |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 PRDS |   288     0     0     0    0.00   | 5.06e-13  6.41e-13  1.41e-12 |
 PIMO |   288     0     0     0    0.00   |        -         -         - |
 PETS |   288     0     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   275     0     0     0    0.00   |        -         -         - |
 NRMD |   276     0     0     0    0.00   |        -         -         - |
 NRIL |   285     0     0     0    0.00   |        -         -         - |
 NANO |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   278     2     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 4.57e-13  6.78e-13  4.85e-13 |
 MAL2 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IQAL |   276     0     0     0    0.00   | 5.11e-13  9.13e-13  3.94e-13 |
 GLSV |   288     0     0     0    0.00   |        -         -         - |
 FLIN |   186     1     0     0    0.00   |        -         -         - |
 FAA1 |   288     0     0     0    0.00   |        -         -         - |
 DUBO |   276     0     1     0    0.00   | 7.24e-13  6.21e-13  1.24e-12 |
 DRAO |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   287     0     0     0    0.00   |        -         -         - |
 CHUR |   288     0     0     0    0.00   | 8.83e-13  3.81e-13  9.16e-13 |
 CHPI |   288     0     0     0    0.00   |        -         -         - |
 CHAN |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   204     0     0     0    0.00   |        -         -         - |
 CAGZ |   275     0     0     0    0.00   |        -         -         - |
 BRST |   276     0     0     0    0.00   |        -         -         - |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BRFT |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 BJCO |   286     0     0     0    0.00   |        -         -         - |
 BAN2 |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.92e-17  3.50e-16  2.10e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     SVTL      YELL      ONSA |
------------------------------------------+------------------------------+
