
 cls-file Version 2.0
 GPS week: 1608   Day: 1   MJD: 55501                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 brd |    96     0   2902      0     105    -264   2556   2556      0   4007   4007      0    0.00
 cod |   288     0  27325    830    -266     -93     22     21     23     83     82     83   14.09
 emr |   288     0  23139   1121   -1145    2535     13     14     13     66     85     53   24.69
 esa |   288     0  29361   1333     713   -1189     17     16     18     99    113     91   19.61
 gfz |   288     0  31647    396     118       0     18     20     17     87     56     97   17.45
 iga |    96     0   2878      1      77     -97     37     37      0     69     69      0    0.00
 igu |    96     0   2878      5      29      54   1895   1895      0   3196   3196      0    0.00
 jpl |   288     0  24700   1127    1446    2378     14     15     14     75     92     65   24.16
 ngs |    96     0   2902      0      57     -47   2285   2285      0   3687   3687      0    0.00
 usn |   288     0  23422     34    -996    2416     45     63     31    133    133    133    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------------+
    1 |  -298   301     -     -  -243     -     -     -  -215     - |
    2 | -1037   -48    62   -22   -27    88   990     1  -496   101 |
    3 |  1115     0   -48     3   -40   -41 -7685    76  -256   176 |
    4 | -1084   -73    10  -106    11    15  2608   110  -957   142 |
    5 |  -276   138    -9  -219     5    -8   965   103  -121    25 |
    6 | -3935    11   -73     6   -58   -55  1271   105 -4078   106 |
    7 |  -742   -19   -32  -116    76    15   610    84  -445   -76 |
    8 | -1679   -75     X    28    30    44  1862     X -1795    37 |
    9 | -3914    50     X   -59    26   -52 -6996     X -4026   181 |
   10 | -5770   -30  -109   164    11   116 -1367   -13 -5135    39 |
   11 |  1629   -28   161   -65    83   -57   -83  -156  2124   -60 |
   12 |  -790   123     8    69   -57   126  1506   -95  -500   -23 |
   13 |  4646    18    26    76    20    38    94  -113  4445    27 |
   14 |  2810    76   -64   103    27   -12   747   -82  2799    12 |
   15 |    -8   119   -10  -169     9   -35   -87    70   -37    97 |
   16 |  3344    52  -130   -31   -16   -39   813   139  3308    95 |
   17 |  -310    23    80  -291    34   -36  1230   116  -125   117 |
   18 |  3019   178    44  -164   -13   -48   -66    -6  2899    65 |
   19 |   978     6   -75   125    26   -80   366   -48   913  -216 |
   20 |  4460     4   -69    18    73   -53  2335     0  4357     5 |
   21 |  3083    -6     9   -47    94    21  1321   -36  2984   -60 |
   23 |  -512    84   165   -15    17    67  1236  -217  -351   -92 |
   24 |  1735   -51   -46    30    29   -23 -1351    32  1687   178 |
   25 |  1469    12     -   -39    34   -80   123     -  1365     - |
   26 | -4464    -4    -1     3     1     5  -588     0 -4213    88 |
   27 | -3224    21     X    -2   -16   -18 -5788     X -2122   185 |
   28 |  7965   -21    41    27     9    94  3865   -59  6863    87 |
   29 | -3254    38   118  -220   -16   -56   -99    47 -2643    61 |
   30 | -2582   101   -40   -65    17   -21 -1921    23 -3749   163 |
   31 |   414   149  -141    10   123    72  2776   -40   155   188 |
   32 | -3182    -4  -127   125    42    20   789     X -2955   119 |
 -----+-------------------------------------------------------------+
 ADIS |     -     -     -  -293   330     -     -     -     -     - |
 ALBH |     -     -  -104     -     -     -     -   107     -   -50 |
 ALGO |     -   -53    27     -     -     -     -     4     -   -92 |
 ALIC |     -    72     -     X   -58     -     -     -     -     - |
 AMC2 |     -    33     -   -18     -     -     -    -5     -   -64 |
 ANKR |     -     -     -    20     -     -     -   -16     -     - |
 AREQ |     -   -28   -18    53    50     -     -   -45     -     - |
 ASPA |     -     -     -   280  -315     -     -     -     -     - |
 AUCK |     -     X     -   176  -198     -     -     -     -  -596 |
 BAKE |     -     -     -   -12    14     -     -     -     -     - |
 BJFS |     -   -44     -     -    36     -     -     -     -     - |
 BOGT |     -     -     -   148  -151     -     -   -11     -     - |
 BOR1 |     -   108     -     -   263     -     -  -253     -    88 |
 BREW |     -     -    23     -     -     -     -   -23     -    -4 |
 BRFT |     -    23     -    69   -44     -     -   -33     -     - |
 BRMU |     -   -35     -    68   -48     -     -     -     -     - |
 BRUS |     -   -13    31     -   -34     -     -     -     -    -6 |
 CAS1 |     -   -97     -    70     X     -     -     -     -  -119 |
 CCJM |     -     -     -    95  -107     -     -     -     -     - |
 CHPI |     -     -     -   153     -     -     -  -124     -  -139 |
 CHUR |     -    75     2   -92    27     -     -     -     -     - |
 CONZ |     -     -     -   183  -206     -     -     -     -     - |
 CRO1 |     -     -    -9     -   -44     -     -    41     -    35 |
 DAEJ |     -    56     -     -     -     -     -   -33     -    49 |
 DARW |     -     -  -121   188   -32     -     -     -     -     - |
 DAV1 |     -    20     -     X   -16     -     -     -     -     - |
 DGAR |     -     X     -   -36     -     -     -    29     -     - |
 DRAO |     -    29     5     -   -30     -     -     -     -    60 |
 DUBO |     -     -     -    24   -27     -     -     -     -     - |
 FAA1 |     -   101     -    30  -114     -     -     -     -     - |
 FAIR |     -     -   -49     -     -     -     -    50     -     - |
 FLIN |     -     -     -   -70     -     -     -    57     -     - |
 GLPS |     -     -     -    -3   -19     -     -    16     -   -67 |
 GLSV |     -    32     -   -30    75     -     -   -48     -     - |
 GOPE |     -    14     -     -     -     -     -    -8     -     - |
 GRAZ |     -   -15     -    11     -     -     -     -     -     - |
 GUAT |     -  -181     -     9     7     -     -    93     -     - |
 GUUG |     -     -     -    22   -35     -     -     9     -     - |
 HARB |     -    50    58  -116     -     -     -     6     -     - |
 HOB2 |     -    87   -80    -7    28     -     -     -     -    28 |
 HOFN |     -     -     -     -   -18     -     -    13     -   -16 |
 HOLB |     -   -71     -     -     -     -     -    42     -     - |
 HYDE |     -    26     -   -41    19     -     -     -     -     - |
 IENG |     -   -49    28     -     -     -     -     0     -   -63 |
 IISC |     -     -     -   -40   -44     -     -    64     -    93 |
 KARR |     -   -40     -     -    32     -     -     -     -     - |
 KELY |     -     -     -  -127   143     -     -     -     -     - |
 KERG |     -     -    59   -74     X     -     -     -     -     - |
 KIRU |     -     -   -72    58     9     -     -    21     -     - |
 KOSG |     -    -9     -     -     7     -     -     -     -     - |
 KOUR |     -    53   -30   102  -106     -     -    -9     -     8 |
 LAMA |     -    -4     -     -     3     -     -     -     -     - |
 LHAZ |     -     -     -    69   -78     -     -     -     -     - |
 LMMF |     -     -     -    18     -     -     -   -15     -     - |
 LPGS |     -     X   -62     -    17     -     -    51     -   -44 |
 MAC1 |     -     -     -    -8    80     -     -   -52     -   -34 |
 MAL2 |     -     -     -    -2     2     -     -     -     -     - |
 MAR6 |     -     -   -50     -     -     -     -    51     -     - |
 MAS1 |     -    32    84     X   -42     -     -   -74     -   -17 |
 MATE |     -     -    56    22  -101     -     -     -     -    75 |
 MAW1 |     -    15     -    13   -26     -     -     -     -     - |
 MDO1 |     -     -   -28  -164    66     -     -    98     -   104 |
 MDVJ |     -  -362     -     -   292     -     -     -     -  -445 |
 MIZU |     -    28   -16     -     -     -     -     -     -    56 |
 MKEA |     -     -     -     -   -91     -     -    66     -    27 |
 NANO |     -     2     -   -27    27     -     -     -     -     - |
 NICO |     -   -50     -    64   -29     -     -     -     -     - |
 NIST |     -   -15     8     -     -     -     -     -     -    56 |
 NNOR |     -     -    28   -35     -     -     -     -     -    17 |
 NRC1 |     -     -     9     -   -13     -     -     -     -    46 |
 NTUS |     -  -138     -    60    52     -     -     -     -     - |
 NURK |     -     -     -     7    -8     -     -     -     -     - |
 NYA1 |     -   -19     -   -18   136     -     -   -73     -    56 |
 OHI2 |     -   -25     -     -    20     -     -     -     -     - |
 ONSA |     -   -24     4     -   -21     -     -    25     -   -26 |
 PALM |     -     -     -   -16    18     -     -     -     -     - |
 PDEL |     -    -7     -    29   -26     -     -     -     -     - |
 PERT |     -     -   -12     7    54     -     -   -32     -   -95 |
 PIE1 |     -     -    40     5  -117     -     -    40     -     - |
 PIMO |     -     -     -   -42   -24     -     -    51     -    13 |
 PRDS |     -  -113    42   -88     -     -     -    94     -  -105 |
 PTBB |     -    18   -10     -     -     -     -     -     -     3 |
 QAQ1 |     -     -    24    38     -     -     -   -51     -     - |
 QUIN |     -     -     -    60     -     -     -   -48     -     - |
 RABT |     -    24     -     -     -     -     -   -14     -     - |
 REUN |     -    61     -   -11   -39     -     -     -     -     - |
 REYK |     -     -     -    94  -106     -     -     -     -     - |
 SCH2 |     -   -40    40   -57    37     -     -     -     -    14 |
 SCUB |     -     -     -     6     -     -     -    -5     -     - |
 SEY1 |     -     -     -  -144    70     -     -    53     -     - |
 SHAO |     -    78     -    -2     -     -     -   -44     -  -109 |
 SPT0 |     -   -10     6     -     -     -     -     -     -     6 |
 STJO |     -     -    30    40   -42     -     -   -33     -     6 |
 SUTM |     -     -    72   -42   -55     -     -     -     -     - |
 SYOG |     -   -85    56     -   -11     -     -     -     -     - |
 THTI |     -     -    33     -     -     -     -   -33     -   168 |
 THU3 |     -  -127     6     -   133     -     -   -28     -  -120 |
 TIDB |     -     -   -64     -    29     -     -    45     -   -30 |
 TLSE |     -    28    20   106     -     -     -  -120     -     - |
 TOW2 |     -   -87     -   124   -51     -     -     -     -     - |
 TSKB |     -   -84    48     -     -     -     -     -     -   -28 |
 TWTF |     -     5    -3     -     -     -     -     -     -  -149 |
 ULAB |     -     -     -   -13     9     -     -     4     -     - |
 UNSA |     -     -     -     X   -95     -     -    68     -     - |
 URUM |     -     -     -   -84    94     -     -     -     -     3 |
 USN3 |     -   -16     9     -     -     -     -     -     -   -19 |
 USNO |     -    23   -13     -     -     -     -     -     -    30 |
 VILL |     -     -   -53    66     -     -     -     -     -     - |
 VIS0 |     -     -     -     7     -     -     -    -6     -     - |
 WES2 |     -     -     4     -    -6     -     -     -     -    14 |
 WHIT |     -   -26    57  -112    51     -     -     -     -    11 |
 WILL |     -   -87    38     -     -     -     -    12     -  -124 |
 WSRT |     -    78    17     -    -9     -     -   -56     -    48 |
 WTZR |     -    43     X     -   -35     -     -     -     -    54 |
 WUHN |     -     -   -90     -   128     -     -     -     -  -255 |
 XMIS |     -     -     -    65   -73     -     -     -     -     - |
 YAR2 |     -   -31    72     -   -77     -     -     -     -  -115 |
 YELL |     -  -164   101   -90    90     -     -     -     -     - |
 YKRO |     -     -     -    44     2     -     -   -35     -     - |
 ZWE2 |     -     9     -   -40   -76     -     -    92     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn | NEPO    RMS
 -----+-------------------------------------------------------------+-------------
    1 |   696    30     -     -    25     -     -     -   510     - |   79    141
    2 |  1675    17    12    11    15    31   868    17  1217    66 |  288    244
    3 |  3912    17    15    13    19    23  3970    12  4230    42 |  288   1449
    4 |  1235    11    10    14    18    23  1176    18   976    25 |  288    812
    5 |   792    28    13    19    25    37   832    18   603    76 |  288    300
    6 |  1090    12    14    11    15    27  1913    13  1162    39 |  288    790
    7 |   895    19    15     9    16    29   683    11   812    57 |  288    235
    8 |  2460    25     X    20    16    44  3343     X  2342    76 |  285   2028
    9 |  7448    24     X    17    25    36  5338     X  5563    63 |  286   2751
   10 |  2151    15    15    16    14    37  1583    17  2168    59 |  288   1819
   11 |  1447    16    20    18    21    26   385    17  1248    68 |  288    388
   12 |   786    19    14    14    47    39   464    26   669    84 |  288    263
   13 |  1285    18    17    12    14    36   305    11  1031    52 |  288    425
   14 |   422    15    13    11    20    26   275     9   511    62 |  288    218
   15 |   627    14    17    28    12    33   316    14   519    47 |  288    180
   16 |   602    32    12    13    20    24   459    11   467    40 |  288    281
   17 |   714    13    12    12    16    23   753    14   712    52 |  288    188
   18 |   498    16    13    13    16    29   281    15   560    58 |  288    316
   19 |   566    12    15    14    19    29   283    12   620    74 |  288    166
   20 |   778    30    22    17    21    20  1279    11   703    43 |  288    210
   21 |   845    25    12    25    12   125   904    21   704   113 |  288    354
   23 |   935    24    16    13    14    32   623    13   589    72 |  288    300
   24 |  4169    15    17    22    22    46  2635    19  4286    61 |  288   3242
   25 |   646    47     -    13    25    24   304     -   460     - |  288    224
   26 |  1577    18    12    14    17    45  1427    16  1236    37 |  288   1144
   27 |  6996    25     X    15    20    32  4216     X  6607    50 |  287   4965
   28 |  1585    22    12    15    17    32  1484    14  1576    62 |  288    632
   29 |  1210    20    17    20    20    28   499    16  1041    49 |  288    162
   30 |  5377    21    12    12    15    18  3169    13  4562   122 |  288   1714
   31 |   715    21    14    14    18    17  1289    12   612    54 |  288    398
   32 |   983    26    19    18    24    29   584     X  1239    39 |  288   1087
 -----+-------------------------------------------------------------+-------------
 ADIS |     -     -     -    10    11     -     -     -     -     - |  276    >>>
 ALBH |     -     -    17     -     -     -     -    18     -    20 |  288   7489
 ALGO |     -    22     8     -     -     -     -     7     -    15 |  288 298262
 ALIC |     -    11     -     X     9     -     -     -     -     - |  288   3381
 AMC2 |     -    26     -    10     -     -     -     9     -    21 |  288     24
 ANKR |     -     -     -    10     -     -     -     8     -     - |  288    >>>
 AREQ |     -    35    13     8    15     -     -    10     -     - |  287  12935
 ASPA |     -     -     -    32    37     -     -     -     -     - |  240   4933
 AUCK |     -     X     -    21    23     -     -     -     -    36 |  285   4188
 BAKE |     -     -     -    10    12     -     -     -     -     - |  276   4492
 BJFS |     -    15     -     -    12     -     -     -     -     - |  288  13767
 BOGT |     -     -     -    13    15     -     -     8     -     - |  288  13125
 BOR1 |     -    27     -     -     5     -     -    14     -    21 |  288   5340
 BREW |     -     -    11     -     -     -     -    11     -    15 |  288     42
 BRFT |     -    16     -    22    20     -     -    12     -     - |  288    114
 BRMU |     -    16     -    19    26     -     -     -     -     - |  288   3198
 BRUS |     -     8     6     -     7     -     -     -     -    17 |  288  55935
 CAS1 |     -    14     -    10     X     -     -     -     -    62 |  251   3936
 CCJM |     -     -     -    28    32     -     -     -     -     - |  269   1282
 CHPI |     -     -     -    15     -     -     -    12     -    57 |  204  10351
 CHUR |     -    27     9    11    13     -     -     -     -     - |  288   6642
 CONZ |     -     -     -    23    26     -     -     -     -     - |  276     42
 CRO1 |     -     -    10     -    22     -     -    13     -    28 |  287    >>>
 DAEJ |     -    13     -     -     -     -     -     7     -    17 |  287    587
 DARW |     -     -    14    19    18     -     -     -     -     - |  288   4127
 DAV1 |     -    12     -     X    10     -     -     -     -     - |  285   3255
 DGAR |     -     X     -    18     -     -     -    15     -     - |  252   7107
 DRAO |     -    37    17     -    12     -     -     -     -    13 |  288     34
 DUBO |     -     -     -    13    14     -     -     -     -     - |  276  45169
 FAA1 |     -    29     -    28    23     -     -     -     -     - |  288   7062
 FAIR |     -     -     9     -     -     -     -     9     -     - |  288   6212
 FLIN |     -     -     -    39     -     -     -    31     -     - |  288   4309
 GLPS |     -     -     -    17    11     -     -    10     -    20 |  288  13318
 GLSV |     -    16     -    10    11     -     -     8     -     - |  288   1852
 GOPE |     -    16     -     -     -     -     -    10     -     - |  288    290
 GRAZ |     -    12     -     9     -     -     -     -     -     - |  288   5335
 GUAT |     -    29     -    13    14     -     -    12     -     - |  288   3622
 GUUG |     -     -     -    44    21     -     -    25     -     - |  288   4714
 HARB |     -    51    20    19     -     -     -    17     -     - |  288  56424
 HOB2 |     -    26    13     9    21     -     -     -     -    50 |  280    >>>
 HOFN |     -     -     -     -    11     -     -     8     -    28 |  287    >>>
 HOLB |     -    14     -     -     -     -     -     8     -     - |  288   3135
 HYDE |     -    28     -    12    17     -     -     -     -     - |  288   3774
 IENG |     -    11     8     -     -     -     -    10     -    23 |  288     38
 IISC |     -     -     -    16    35     -     -    20     -    37 |  288  15386
 KARR |     -    13     -     -    11     -     -     -     -     - |  288   9808
 KELY |     -     -     -    14    15     -     -     -     -     - |   96   8292
 KERG |     -     -    32    40     X     -     -     -     -     - |  136    >>>
 KIRU |     -     -    14    11    14     -     -    10     -     - |  288   3457
 KOSG |     -    17     -     -    14     -     -     -     -     - |  288   4235
 KOUR |     -    44    33    16    21     -     -    19     -    68 |  288    174
 LAMA |     -    18     -     -    15     -     -     -     -     - |  288   2942
 LHAZ |     -     -     -    17    19     -     -     -     -     - |  237    >>>
 LMMF |     -     -     -    14     -     -     -    12     -     - |  276   5390
 LPGS |     -     X    10     -    15     -     -    10     -    61 |  286  13694
 MAC1 |     -     -     -    17    29     -     -    19     -    46 |  287   8279
 MAL2 |     -     -     -    12    14     -     -     -     -     - |  264    >>>
 MAR6 |     -     -     5     -     -     -     -     5     -     - |  177    575
 MAS1 |     -    16    15     X    17     -     -    11     -    26 |  288   3021
 MATE |     -     -    11    17    12     -     -     -     -    38 |  288     41
 MAW1 |     -    20     -    27    19     -     -     -     -     - |  288   3205
 MDO1 |     -     -     8    10    12     -     -     6     -    22 |  288   7373
 MDVJ |     -     7     -     -     6     -     -     -     -    15 |  288     18
 MIZU |     -    29    17     -     -     -     -     -     -    27 |  288    385
 MKEA |     -     -     -     -    15     -     -    11     -    39 |  288  16057
 NANO |     -    39     -    22    15     -     -     -     -     - |  288   3340
 NICO |     -    25     -    22    20     -     -     -     -     - |  288   3347
 NIST |     -    15     8     -     -     -     -     -     -    26 |  288     25
 NNOR |     -     -    16    20     -     -     -     -     -    30 |  276   1049
 NRC1 |     -     -     4     -     5     -     -     -     -    18 |  288     38
 NTUS |     -    28     -    16    20     -     -     -     -     - |  288   2804
 NURK |     -     -     -     9    11     -     -     -     -     - |  165    >>>
 NYA1 |     -    14     -     7     8     -     -     9     -    33 |  288    349
 OHI2 |     -    10     -     -     8     -     -     -     -     - |  287    >>>
 ONSA |     -    15     7     -    14     -     -     8     -    24 |  288     21
 PALM |     -     -     -    14    15     -     -     -     -     - |  288   4335
 PDEL |     -    24     -    23    16     -     -     -     -     - |  288   3482
 PERT |     -     -    10    10    11     -     -    15     -    24 |  288   2247
 PIE1 |     -     -    12     9    13     -     -     9     -     - |  288     23
 PIMO |     -     -     -    23    23     -     -    10     -    60 |  288  11904
 PRDS |     -    30    14    11     -     -     -    15     -    12 |  288   9039
 PTBB |     -    17    10     -     -     -     -     -     -    17 |  288     30
 QAQ1 |     -     -     6     9     -     -     -     6     -     - |  287   6479
 QUIN |     -     -     -     7     -     -     -     6     -     - |  288   5723
 RABT |     -    26     -     -     -     -     -    15     -     - |  288   9250
 REUN |     -    22     -     9    16     -     -     -     -     - |  288   5841
 REYK |     -     -     -     8     9     -     -     -     -     - |  251    >>>
 SCH2 |     -    17    10    11     9     -     -     -     -    13 |  288   5061
 SCUB |     -     -     -    10     -     -     -     8     -     - |  288  12683
 SEY1 |     -     -     -    17    24     -     -    17     -     - |  285  13678
 SHAO |     -    20     -    13     -     -     -    10     -    19 |  288   2593
 SPT0 |     -    26    15     -     -     -     -     -     -    37 |  274     97
 STJO |     -     -     5     9    11     -     -     7     -    18 |  288  11561
 SUTM |     -     -    10    12    11     -     -     -     -     - |  288  11620
 SYOG |     -    15    10     -    12     -     -     -     -     - |  287   1062
 THTI |     -     -     8     -     -     -     -     8     -    65 |  288  12402
 THU3 |     -    35    12     -     6     -     -    13     -    28 |  288   6585
 TIDB |     -     -    10     -    16     -     -    15     -    34 |  288     53
 TLSE |     -    17    11    12     -     -     -    10     -     - |  288   8894
 TOW2 |     -    16     -    15    17     -     -     -     -     - |  288   3391
 TSKB |     -    22    13     -     -     -     -     -     -    32 |  288   1128
 TWTF |     -    10     6     -     -     -     -     -     -    32 |  288     29
 ULAB |     -     -     -    12     6     -     -    10     -     - |  288   9512
 UNSA |     -     -     -     X    14     -     -    10     -     - |  288    >>>
 URUM |     -     -     -    13    14     -     -     -     -    22 |  240    >>>
 USN3 |     -    17    10     -     -     -     -     -     -    18 |  288     28
 USNO |     -    23    13     -     -     -     -     -     -    16 |  288     39
 VILL |     -     -    11    14     -     -     -     -     -     - |  288   7297
 VIS0 |     -     -     -    53     -     -     -    43     -     - |  264  10746
 WES2 |     -     -    41     -    58     -     -     -     -    26 |  209     90
 WHIT |     -    27    11    12    10     -     -     -     -    16 |  288   5080
 WILL |     -    33    13     -     -     -     -    12     -    16 |  288  20361
 WSRT |     -    15     9     -    14     -     -     5     -    12 |  288     13
 WTZR |     -    15     X     -    12     -     -     -     -    15 |  288     32
 WUHN |     -     -     9     -    13     -     -     -     -    36 |  287  16161
 XMIS |     -     -     -    22    25     -     -     -     -     - |  265   2918
 YAR2 |     -    24     8     -    20     -     -     -     -    27 |  288   8626
 YELL |     -    21     9     7     9     -     -     -     -     - |  288     23
 YKRO |     -     -     -    10    19     -     -    15     -     - |  271  12714
 ZWE2 |     -    45     -    38    38     -     -    29     -     - |  288    >>>
 -----+-------------------------------------------------------------+-------------
 TOT  |  2556    23    14    18    19    38  1895    14  2285    45 |




CLOCK JUMP CORRECTIONS APPLIED
------------------------------

CEN | STA/SAT | EPOCH           |     JUMP(ps)
----+---------+-----------------+-------------
cod |   DGAR  | 1608-1  0:10:00 |        2411
cod |   DGAR  | 1608-1  0:20:00 |       13498
cod |   DGAR  | 1608-1  0:25:00 |       -9696
cod |   DGAR  | 1608-1  0:30:00 |        -673
cod |   DGAR  | 1608-1  0:35:00 |        -568
cod |   DGAR  | 1608-1  0:40:00 |        4453
cod |   LPGS  | 1608-1 13:00:00 |        1106
cod |   HARB  | 1608-1 17:40:00 |       -1559
emr |   HARB  | 1608-1 15:45:00 |       -1485
esa |   KERG  | 1608-1 10:55:00 |         544
esa |   HARB  | 1608-1 17:35:00 |       -1677
gfz |   CAS1  | 1608-1  1:40:00 |       -1787
gfz |   KERG  | 1608-1  8:55:00 |         605
jpl |   HARB  | 1608-1 15:45:00 |       -1385



---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 AMC2 |   288     0     0   288   10.36   | 3.47e-14  7.51e-15  2.82e-15 |
 MDVJ |   288     1     0   287   10.32   | 3.34e-14  4.04e-15  1.10e-15 |
 PIE1 |   288     0     0   288    8.83   | 4.73e-14  5.53e-15  2.31e-15 |
 YELL |   288     0     0   288    8.81   | 2.64e-14  6.58e-15  1.57e-15 |
 WSRT |   288     1     0   287    8.73   | 2.13e-14  3.50e-15  1.13e-15 |
 ONSA |   288     0     0   288    8.43   | 3.16e-14  5.51e-15  1.75e-15 |
 CONZ |   276     0     0   274    7.26   | 2.67e-14  8.04e-15  3.41e-15 |
 WTZR |   288     0     0   288    6.15   | 3.48e-14  5.93e-15  1.55e-15 |
 TWTF |   288     0     0   288    4.95   | 3.73e-14  6.32e-15  2.37e-15 |
 DRAO |   288     0     0   288    4.80   | 3.62e-14  8.31e-15  1.89e-15 |
 PTBB |   288     0     0   288    3.40   | 3.92e-14  5.66e-15  1.39e-15 |
 USN3 |   288     0     0   288    2.97   | 4.29e-14  6.24e-15  1.94e-15 |
 NIST |   288     0     0   143    2.29   | 3.95e-14  6.71e-15  2.71e-15 |
 MATE |   288     0     0   288    2.29   | 5.03e-14  9.54e-15  2.96e-15 |
 HOB2 |   280     0     0   279    1.69   | 3.34e-14  1.04e-14  5.93e-15 |
 NRC1 |   288     1     0   191    1.58   | 5.96e-14  7.42e-15  3.88e-15 |
 BRUS |   288     2     0   143    1.58   | 3.65e-14  5.29e-15  1.26e-15 |
 SPT0 |   274     0     0   272    1.54   | 4.52e-14  8.39e-15  2.48e-15 |
 USNO |   288     0     0   288    1.39   | 6.40e-14  7.55e-15  3.51e-15 |
 IENG |   288     0     0   288    1.13   | 3.70e-14  1.36e-14  2.76e-15 |
 TIDB |   288     0     0   288    0.63   | 9.57e-14  1.54e-14  2.66e-15 |
 BRFT |   288     0     0   288    0.34   | 5.37e-14  1.34e-14  1.08e-14 |
 G25  |   288     0     0   288    0.17   | 5.88e-14  2.64e-14  2.75e-14 |
 KOUR |   288     0     0   288    0.14   | 5.52e-14  1.86e-14  1.58e-14 |
 MIZU |   288     0     0   288    0.04   | 4.07e-13  1.42e-13  2.92e-14 |
 GOPE |   288     0     0   143    0.03   | 3.01e-13  9.43e-14  2.46e-14 |
 G06  |   288     0     0   288    0.02   | 6.17e-13  1.49e-13  7.20e-14 |
 G04  |   288     0     0   288    0.02   | 4.78e-13  1.30e-13  1.04e-13 |
 G26  |   288     0     0   288    0.02   | 4.69e-13  1.13e-13  1.20e-13 |
 G32  |   288     0     0   288    0.02   | 2.19e-13  8.72e-14  1.45e-13 |
 SYOG |   287     0     0   286    0.02   | 6.19e-13  1.52e-13  7.28e-14 |
 WES2 |   209     0     0   132    0.02   | 4.57e-14  5.53e-15         - |
 DAEJ |   287     0     0   286    0.01   | 8.10e-13  1.86e-13  4.11e-14 |
 G03  |   288     0     0   288    0.01   | 1.40e-12  3.25e-13  1.21e-13 |
 TSKB |   288     0     0   288    0.01   | 1.19e-12  3.05e-13  1.28e-13 |
 G30  |   288     0     0   288    0.01   | 1.39e-12  3.93e-13  1.72e-13 |
 HARB |   288     1     0   287    0.00   | 1.37e-12  3.03e-13  7.78e-14 |
 CCJM |   269     0     0   130    0.00   | 8.94e-13  2.23e-13  1.13e-13 |
 G10  |   288     0     0   288    0.00   | 1.31e-12  3.05e-13  2.25e-13 |
 PERT |   288     0     0   288    0.00   | 1.30e-13  2.94e-13  1.39e-13 |
 CHUR |   288     0     0   288    0.00   | 8.15e-13  2.61e-13  4.31e-13 |
 NYA1 |   288     0     3    20    0.00   | 8.13e-13  2.06e-13  2.68e-14 |
 GPST |   288     0     0     0    0.00   | 1.67e-14  2.72e-15  1.08e-15 |
 KELY |    96     0     0     0    0.00   |        -         -         - |
 G01  |    79     0     3     0    0.00   | 5.58e-13  6.96e-14         - |
 NURK |   165     0     0     0    0.00   |        -         -         - |
 KERG |   136     0     0     0    0.00   |        -         -         - |
 CHPI |   204     0     0     0    0.00   |        -         -         - |
 LHAZ |   237     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 REYK |   251     0     0     0    0.00   |        -         -         - |
 OHI2 |   287     2     0     0    0.00   |        -         -         - |
 HOFN |   287     0     0     0    0.00   |        -         -         - |
 G31  |   288     0     6     0    0.00   | 5.50e-13  7.91e-14  3.59e-14 |
 G29  |   288     0     6     0    0.00   | 5.88e-13  6.48e-14  1.39e-14 |
 G28  |   288     0     6     0    0.00   | 7.60e-13  7.48e-14  3.49e-14 |
 G27  |   287     0     0     0    0.00   | 1.28e-12  6.25e-13  5.26e-13 |
 G24  |   288     0     0     0    0.00   | 1.41e-12  4.71e-13  4.45e-13 |
 G23  |   288     0     6     0    0.00   | 5.50e-13  5.84e-14  2.52e-14 |
 G21  |   288     0     6     0    0.00   | 1.02e-12  1.20e-13  3.29e-14 |
 G20  |   288     1     6     0    0.00   | 8.09e-13  9.11e-14  1.90e-14 |
 G19  |   288     1     6     0    0.00   | 5.26e-13  6.75e-14  1.40e-14 |
 G18  |   288     0     6     0    0.00   | 7.09e-13  6.75e-14  3.71e-14 |
 G17  |   288     0     6     0    0.00   | 5.91e-13  6.74e-14  1.37e-14 |
 G16  |   288     0     5     0    0.00   | 5.30e-13  6.39e-14  3.18e-14 |
 G15  |   288     0     6     0    0.00   | 5.83e-13  6.16e-14  1.20e-14 |
 G14  |   288     0     6     0    0.00   | 5.25e-13  6.63e-14  2.07e-14 |
 G13  |   288     0     6     0    0.00   | 6.26e-13  9.15e-14  4.66e-14 |
 G12  |   288     0     6     0    0.00   | 6.19e-13  6.81e-14  3.19e-14 |
 G11  |   288     0     6     0    0.00   | 6.41e-13  7.20e-14  3.80e-14 |
 G09  |   286     0     0     0    0.00   | 1.33e-12  4.34e-13  2.01e-13 |
 G08  |   285     0     0     0    0.00   | 1.39e-12  4.98e-13  1.50e-13 |
 G07  |   288     0     6     0    0.00   | 6.05e-13  6.17e-14  1.54e-14 |
 G05  |   288     0     6     0    0.00   | 5.92e-13  8.52e-14  2.10e-14 |
 G02  |   288     0     6     0    0.00   | 5.56e-13  5.91e-14  2.06e-14 |
 ZWE2 |   288     0     0     0    0.00   |        -         -         - |
 YKRO |   271     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 XMIS |   265     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     1     0    0.00   | 1.53e-12  4.67e-13  3.57e-13 |
 VIS0 |   264     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 URUM |   240     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 ULAB |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 TLSE |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   |        -         -         - |
 SUTM |   288     0     0     0    0.00   |        -         -         - |
 STJO |   288     0     1     0    0.00   | 9.76e-13  7.26e-13  5.86e-13 |
 SHAO |   288     0     0     0    0.00   | 7.32e-14  1.04e-13  1.84e-13 |
 SEY1 |   285     0     0     0    0.00   |        -         -         - |
 SCUB |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 REUN |   288     0     0     0    0.00   |        -         -         - |
 RABT |   288     0     0     0    0.00   |        -         -         - |
 QUIN |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   287     0     0     0    0.00   |        -         -         - |
 PRDS |   288     0     0     0    0.00   | 5.56e-13  4.00e-13  5.54e-13 |
 PIMO |   288     0     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 PALM |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   276     0     5     0    0.00   | 1.25e-12  2.78e-13  1.09e-13 |
 NICO |   288     0     0     0    0.00   |        -         -         - |
 NANO |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 4.30e-13  6.27e-13  3.01e-13 |
 MAR6 |   177     0     2     0    0.00   | 2.53e-13  8.87e-14         - |
 MAL2 |   264     0     0     0    0.00   |        -         -         - |
 MAC1 |   287     0     0     0    0.00   |        -         -         - |
 LPGS |   286     0     0     0    0.00   |        -         -         - |
 LMMF |   276     0     0     0    0.00   |        -         -         - |
 LAMA |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   | 7.25e-13  5.58e-13  3.88e-13 |
 KARR |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HYDE |   288     0     0     0    0.00   |        -         -         - |
 HOLB |   288     0     0     0    0.00   |        -         -         - |
 GUUG |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GLSV |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 FLIN |   288     0     0     0    0.00   |        -         -         - |
 FAIR |   288     0     0     0    0.00   |        -         -         - |
 FAA1 |   288     0     0     0    0.00   |        -         -         - |
 DUBO |   276     0     0     0    0.00   |        -         -         - |
 DGAR |   252     0     0     0    0.00   |        -         -         - |
 DAV1 |   285     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   287     1     0     0    0.00   |        -         -         - |
 CAS1 |   251     0     0     0    0.00   |        -         -         - |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BREW |   288     0     6     0    0.00   | 9.69e-14  9.22e-15  2.50e-15 |
 BOR1 |   288     2     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 BJFS |   288     1     0     0    0.00   |        -         -         - |
 BAKE |   276     0     0     0    0.00   |        -         -         - |
 AUCK |   285     0     0     0    0.00   |        -         -         - |
 ASPA |   240     0     0     0    0.00   |        -         -         - |
 AREQ |   287     0     0     0    0.00   |        -         -         - |
 ANKR |   288     0     0     0    0.00   |        -         -         - |
 ALIC |   288     0     0     0    0.00   |        -         -         - |
 ALGO |   288     0     0     0    0.00   |        -         -         - |
 ALBH |   288     0     0     0    0.00   |        -         -         - |
 ADIS |   276     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 3.76e-17  4.51e-16  2.70e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     WSRT      WSRT      MDVJ |
------------------------------------------+------------------------------+
