
 cls-file Version 2.0
 GPS week: 1561   Day: 0   MJD: 55171                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 brd |    96     0   2848      6      52     -26   2194   2194      0   3433   3433      0    0.00
 emr |   288     0  21174    649      69     446     26     37     14    225    334    113   36.73
 esa |   288     0  25449    281    -787     669     38     62     16    168    205    146   24.58
 gfz |   277     0  21345   8591     385   -1796     43     52     33    264    289    241    0.00
 iga |    96     0   2752      2      76    -116    110    110      0    183    183      0    0.00
 igu |    96     0   2659      0      47       0   1604   1604      0   2513   2513      0    0.00
 jpl |   288     0  24062    218    1175     697     23     36     12    141    216     75   38.68
 ngs |    96     0   2848      5      98    -185   2010   2010      0   3331   3331      0    0.00
 usn |   288     0  18305     16    -713    1248     50     63     36    184    203    166    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   emr   esa   gfz   iga   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------+
    2 |  -306   183  -123   -49    18  -142   -96  -141   -59 |
    3 | -2158   383  -237  -250    -5  3020  -213 -1012  -191 |
    4 |   708  -308    83   218   -68   927   239   233   171 |
    5 |  1025  -416    75     X   201     -   343   996   303 |
    6 | -4936   137   -47  -141   -26  -554  -101 -4582    -6 |
    7 |    -2  -311    67   194  -101   -14   252    77    99 |
    8 | -2233   377  -133  -289    25  1007  -269 -2096  -210 |
    9 | -3052   203   -35  -121   -17 -5567  -171 -4151    59 |
   10 | -5996     X   121   -64    74 -1616   -77 -5481   -51 |
   11 |  3298    -5     1   157   -25 -1866     4  3507    34 |
   12 |  -533  -276   224     X   -80  -251   144  -273   120 |
   13 |  2710  -511   461   258    17 -1107   192  3177   235 |
   14 |  3810   166   -86     X   -56  -724  -107  3673    16 |
   15 |   258  -459   209   325   279  1552   320   477   291 |
   16 |  3216   431  -286     X   -17 -1229  -162  3345   -95 |
   17 |  1129  -301   -94   312   -44  -913   345   609   196 |
   18 |  3293   284  -304     X   -13  -246   -78  3506  -101 |
   19 |    57     X    28  -182  -238    76   -18   334  -138 |
   20 |  2595   621  -428     X  -458 -1074  -315  2771  -361 |
   21 |  3064   379  -329  -265   103  -103  -162  3343  -155 |
   22 | -3270   123   -88   -82   -30  -650   -55 -2477    28 |
   23 |   -63  -174   118    41   -46  -159    90   -32    64 |
   25 |   716    62    33   -53     -     -   -79   650     - |
   26 | -4089  -158   162    95   -93  2285    46 -3518   237 |
   27 | -1363   262   -59     X    31  4308  -212 -4384    17 |
   28 |  3744   198    15  -131   227  3249  -197  3454   -28 |
   29 | -2406  -489    62   410    49 -1813   425 -1833   283 |
   30 |  1661  -423   266   316   295  1144   232   193   427 |
   31 |   147  -441   141   375    53  1980   321   555   227 |
   32 | -1818   186  -277     X   -70 -2121     X -1851  -293 |
 -----+-------------------------------------------------------+
 ALBH |     -  -118     -     -     -     -   112     -  -128 |
 ALGO |     -    41   -62  -157     -     -     -     -   -58 |
 AREQ |     -   -70     -   139     -     -    67     -     - |
 ARTU |     -     -   -37     X     -     -    23     -     - |
 ASPA |     -     -  -162   -19     -     -   103     -     - |
 BOGT |     -     -    41  -223     -     -   -26     -   -54 |
 BRFT |     -     -    49   -47     -     -   -31     -     - |
 BRUS |     -   -16     -     -     -     -    15     -   -93 |
 CEDU |     -     -   -27     -     -     -    17     -     - |
 CHAT |     -     -    35   -50     -     -   -22     -     - |
 CHPI |     -     -   177     -     -     -  -113     -     - |
 CONZ |     -     -    58     -     -     -   -37     -     - |
 CRO1 |     -   -17    57     X     -     -   -20     -   -27 |
 DAEJ |     -   132  -176     -     -     -   -14     -   -41 |
 DARW |     -   135   132     X     -     -  -212     -     - |
 DRAO |     -    17   -25     -     -     -     -     -   -99 |
 FAIR |     -    13     -     X     -     -   -12     -     - |
 FLIN |     -     -   -80   -39     -     -    51     -     - |
 GLPS |     -     -    14   -88     -     -    -9     -     - |
 GODE |     -    -6    10  -102     -     -     -     -   -15 |
 GUAM |     -     -   -64     X     -     -    41     -  -162 |
 HARB |     -    10    28   569     -     -   -27     -   -68 |
 HLFX |     -  -197   294     -     -     -     -     -   298 |
 HOB2 |     -   105  -157     X     -     -     -     -   -33 |
 HOFN |     -     -  -134   -94     -     -    85     -  -220 |
 ISPA |     -     -    33    -2     -     -   -21     -   -71 |
 KERG |     -  -130   138     X     -     -    36     -   280 |
 KIRU |     -   -56    84     -     -     -     -     -     - |
 KOKB |     -   -11   -76     -     -     -    58     -  -158 |
 KOUR |     -     0    75     X     -     -   -48     -     3 |
 LPGS |     -   -85    12   113     -     -    73     -   -19 |
 MAR6 |     -    21     -     -     -     -   -20     -     - |
 MAS1 |     -   -18   132     X     -     -   -67     -    46 |
 MATE |     -    54     -  -120     -     -   -52     -     - |
 MBAR |     -     -  -116  -274     -     -    74     -  -262 |
 MCM4 |     -   -43    65     X     -     -     -     -   -15 |
 MDO1 |     -    -5     8     X     -     -     -     -   -50 |
 MIZU |     -    38     -     -     -     -   -36     -   -10 |
 NICO |     -     -    30   -43     -     -   -19     -     - |
 NNOR |     -     7   -44     -     -     -    22     -    21 |
 NRC1 |     -   -37    56     X     -     -     -     -   -21 |
 NRIL |     -     -   -96     -     -     -    61     -     - |
 NTUS |     -     -   166    35     -     -  -105     -     - |
 NYAL |     -   155     -    18     -     -  -148     -     - |
 ONSA |     -    69  -102     X     -     -     -     -   -76 |
 PDEL |     -     -   -24   -35     -     -    16     -     - |
 PERT |     -   -10    14     -     -     -     -     -   114 |
 PIE1 |     -   123  -106     X     -     -   -49     -     - |
 PIMO |     -     -   -65  -149     -     -    42     -     - |
 POL2 |     -     -   -31   -88     -     -    20     -     - |
 PRDS |     -   139     -     -     -     -  -132     -  -206 |
 QAQ1 |     -    37  -127     -     -     -    46     -     - |
 RABT |     -     -   -34     -     -     -    21     -     - |
 SCH2 |     -    60   -90   -89     -     -     -     -   -42 |
 SCUB |     -     -     4     -     -     -    -2     -     - |
 SEY1 |     -     -  -100   120     -     -    64     -     - |
 STJO |     -   -25   113     X     -     -   -48     -     - |
 SUTM |     -   114     -     X     -     -  -108     -     - |
 SYOG |     -    37   270     X     -     -  -157     -     - |
 THTI |     -    64   -20     X     -     -   -49     -    72 |
 THU3 |     -    73  -110     X     -     -     -     -   -90 |
 TIDB |     -   -70   -52     X     -     -   100     -    -5 |
 TOW2 |     -     -   177     X     -     -  -112     -     - |
 VILL |     -    -5     7   -60     -     -     -     -     - |
 WHIT |     -   105   -53  -174     -     -   -66     -  -210 |
 WILL |     -    63   -94     -     -     -     -     -  -246 |
 WTZR |     -  -542   809     X     -     -     -     -   605 |
 YAKT |     -    98  -131     -     -     -   -10     -    -4 |
 YELL |     -    31    43     X     -     -   -57     -     - |
 YKRO |     -     -   -80   -59     -     -    51     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   emr   esa   gfz   iga   igu   jpl   ngs   usn | NEPO    RMS
 -----+-------------------------------------------------------+-------------
    2 |   380    39    82    58    65   497    41   362    43 |  288    191
    3 |  5719    15    25    41   101  3666    19  5497    38 |  288   1388
    4 |  1490    39    41    18    76   964    32  1478    48 |  288    479
    5 |   517    18   101     X   108     -    63   640    56 |  285    345
    6 |  1545    18    22    20    84   874    20  1508    37 |  288    505
    7 |   660    62    77    42    87   592    18   669    44 |  288    320
    8 |  1818    39    57    47   119  1455    29  1918    81 |  288   1601
    9 |  4797    33    44    47   110  1928    25  3583    52 |  288   2840
   10 |  2198     X    64    51   180  2701    41  2062    83 |  273   1551
   11 |  1032    39    40    27   105  1238    33  1101    81 |  288    357
   12 |   780    49    79     X   132   623    33   752   102 |  288    340
   13 |   605    30    67    79    90   869    37   567    36 |  288    349
   14 |   666    38    76     X   122   915    30   449    70 |  288    195
   15 |   461    28    79    73   128   673    36   465    91 |  288    182
   16 |   778    47    67     X   132   722    46   723    79 |  288    382
   17 |  2261    17    27    74    92  1083    15  2070    28 |  288    256
   18 |   394    30    72     X   123   319    54   451    85 |  288    285
   19 |   498     X    15    12    77   209    10   516    31 |  288    182
   20 |   823    20    99     X   112   720    58   819    85 |  288    251
   21 |   611    42    67    55   159   335    34   636    70 |  288    378
   22 |  1149    37    77    76    51   879    47   996    65 |  288    388
   23 |   596    53    84    43    82   335    34   468    84 |  288    259
   25 |  1721    39    44    50     -     -    26  1921     - |  288    365
   26 |  1536    44    50    59    79  1380    32  1569    42 |  288    683
   27 |  6034    32    45     X   103  5002    22  5483    39 |  288   5500
   28 |  2219    31    77    88   143   869    45  1671    84 |  288    647
   29 |  1094    16    19    34   147  1213    19  1150    40 |  288    188
   30 |  4011    61    28    35    82  2058    52  3716    41 |  288   1534
   31 |   996    49    79    42   100  1094    30   962    68 |  288    368
   32 |  1034    37    55     X   127  1505     X  1265    41 |  214    891
 -----+-------------------------------------------------------+-------------
 ALBH |     -    13     -     -     -     -    12     -    21 |  288   4273
 ALGO |     -     6     9    33     -     -     -     -    16 |  288    121
 AREQ |     -    18     -    24     -     -    17     -     - |  288   2378
 ARTU |     -     -     7     X     -     -     5     -     - |  288  10209
 ASPA |     -     -    27    44     -     -    17     -     - |  288   7430
 BOGT |     -     -    17    29     -     -    11     -    35 |  288   7364
 BRFT |     -     -    11    38     -     -     7     -     - |  288     33
 BRUS |     -     8     -     -     -     -     8     -    27 |  288     30
 CEDU |     -     -    15     -     -     -    10     -     - |  288    483
 CHAT |     -     -    15    15     -     -    10     -     - |  287  11524
 CHPI |     -     -    10     -     -     -     6     -     - |  288  12848
 CONZ |     -     -    10     -     -     -     6     -     - |  276     18
 CRO1 |     -    12    18     X     -     -    12     -    28 |  288     61
 DAEJ |     -     8    13     -     -     -     9     -    33 |  288   1497
 DARW |     -    13    15     X     -     -    15     -     - |  288   4232
 DRAO |     -     7    11     -     -     -     -     -    17 |  288   1265
 FAIR |     -     8     -     X     -     -     8     -     - |  288   9369
 FLIN |     -     -     9    11     -     -     6     -     - |  288   4115
 GLPS |     -     -     8    25     -     -     5     -     - |  288   8587
 GODE |     -     9    14    19     -     -     -     -    32 |  288    106
 GUAM |     -     -    18     X     -     -    12     -    66 |  287  10314
 HARB |     -    16    41    30     -     -    33     -    44 |  288   1324
 HLFX |     -    12    18     -     -     -     -     -    27 |  140  33468
 HOB2 |     -    10    15     X     -     -     -     -    64 |  288     88
 HOFN |     -     -     9    37     -     -     6     -    53 |  287    >>>
 ISPA |     -     -    10    19     -     -     7     -    25 |  288  11288
 KERG |     -    11    23     X     -     -    18     -    30 |  288    525
 KIRU |     -    12    18     -     -     -     -     -     - |  288   1608
 KOKB |     -    18    14     -     -     -    13     -    27 |  288     58
 KOUR |     -    17    16     X     -     -    15     -    30 |  288    176
 LPGS |     -    29    24    41     -     -    17     -    28 |  288  23543
 MAR6 |     -     9     -     -     -     -     9     -     - |  288   1018
 MAS1 |     -    11    12     X     -     -     6     -    20 |  288   3361
 MATE |     -     8     -    72     -     -     8     -     - |  288     85
 MBAR |     -     -    15    28     -     -     9     -    32 |  288  10695
 MCM4 |     -     8    13     X     -     -     -     -    24 |  145   4519
 MDO1 |     -     8    12     X     -     -     -     -    17 |  288   4652
 MIZU |     -    44     -     -     -     -    41     -    88 |  278    315
 NICO |     -     -    12    14     -     -     7     -     - |  288   3495
 NNOR |     -    19    24     -     -     -    11     -    40 |  288   1061
 NRC1 |     -     5     8     X     -     -     -     -    17 |  288     23
 NRIL |     -     -    11     -     -     -     7     -     - |  288   8131
 NTUS |     -     -    14    21     -     -     9     -     - |  288   2932
 NYAL |     -    12     -    41     -     -    11     -     - |  288    103
 ONSA |     -     7    10     X     -     -     -     -    14 |  288     27
 PDEL |     -     -     9    41     -     -     6     -     - |  288   3778
 PERT |     -    10    15     -     -     -     -     -    65 |  288   5295
 PIE1 |     -    19    14     X     -     -    12     -     - |  287     28
 PIMO |     -     -    15    26     -     -     9     -     - |  288   9092
 POL2 |     -     -     7    15     -     -     5     -     - |  288   5977
 PRDS |     -    15     -     -     -     -    14     -    17 |  288   4285
 QAQ1 |     -    10     8     -     -     -     9     -     - |  288   5771
 RABT |     -     -     9     -     -     -     6     -     - |  288   8082
 SCH2 |     -     5     8    29     -     -     -     -    12 |  276   2442
 SCUB |     -     -    13     -     -     -     8     -     - |  288  10881
 SEY1 |     -     -    16    38     -     -    10     -     - |  288  10898
 STJO |     -    10    15     X     -     -     7     -     - |  288  22905
 SUTM |     -    13     -     X     -     -    12     -     - |  288  11617
 SYOG |     -    23    61     X     -     -    21     -     - |  288    821
 THTI |     -    22    22     X     -     -    24     -    58 |  288  10850
 THU3 |     -     9    13     X     -     -     -     -    15 |  288   5298
 TIDB |     -    11    16     X     -     -    12     -    42 |  288   9201
 TOW2 |     -     -    16     X     -     -    10     -     - |  276   3449
 VILL |     -    12    18    31     -     -     -     -     - |  288   7297
 WHIT |     -    15     9    46     -     -    11     -    20 |  288   2639
 WILL |     -     9    14     -     -     -     -     -    22 |  288  12528
 WTZR |     -    11    16     X     -     -     -     -    26 |  288     35
 YAKT |     -    12    24     -     -     -    11     -    36 |  288   7011
 YELL |     -     9     9     X     -     -     7     -     - |  288     21
 YKRO |     -     -    12    27     -     -     8     -     - |  288   9001
 -----+-------------------------------------------------------+-------------
 TOT  |  2194    26    38    43   110  1605    24  2010    51 |




CLOCK JUMP CORRECTIONS APPLIED
------------------------------

CEN | STA/SAT | EPOCH           |     JUMP(ps)
----+---------+-----------------+-------------
esa |   PETS  | 1561-0 11:25:00 |       -5285
gfz |   FAIR  | 1561-0 10:10:00 |        -503
gfz |   PIE1  | 1561-0 10:10:00 |   561134828
gfz |   PIE1  | 1561-0 10:15:00 |  -561135295
gfz |   HOB2  | 1561-0 10:30:00 |        1193
gfz |   GUAT  | 1561-0 12:25:00 |         843
gfz |   MCM4  | 1561-0 12:25:00 |       -2739
gfz |   ONSA  | 1561-0 12:25:00 |        -834
gfz |   PIE1  | 1561-0 16:05:00 |   561132568
gfz |   GUAT  | 1561-0 16:10:00 |        1714
gfz |   PIE1  | 1561-0 16:10:00 |  -561133080
gfz |   HARB  | 1561-0 16:20:00 |       -1442
gfz |   HARB  | 1561-0 22:15:00 |        -827
gfz |   LPGS  | 1561-0 22:30:00 |         665
jpl |   DGAR  | 1561-0  0:10:00 |       -1185
jpl |   DGAR  | 1561-0  0:15:00 |        3544
jpl |   DGAR  | 1561-0  0:20:00 |       -6665
jpl |   DGAR  | 1561-0  0:25:00 |       -1858
jpl |   DGAR  | 1561-0  0:30:00 |       -5527
jpl |   DGAR  | 1561-0  0:35:00 |        7077



---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 ONSA |   288     0     0   288   15.61   | 2.91e-14  6.24e-15  1.72e-15 |
 BRUS |   288     0     0   288   15.61   | 4.54e-14  9.55e-15  2.43e-15 |
 PIE1 |   287     0     0   286   15.50   | 4.87e-14  6.09e-15  1.30e-15 |
 YELL |   288     1     0   287   14.65   | 3.19e-14  4.78e-15  1.07e-15 |
 BRFT |   288     0     0   288    9.46   | 5.07e-14  1.24e-14  2.84e-15 |
 WTZR |   288     0     0   288    7.58   | 3.91e-14  9.98e-15  2.33e-15 |
 HOB2 |   288     2     0   286    7.03   | 6.49e-14  2.18e-14  6.71e-15 |
 CONZ |   276     0     0   131    3.72   | 3.83e-14  6.47e-15  1.84e-15 |
 NRC1 |   288     0     0   288    2.56   | 9.68e-14  1.00e-14  1.58e-15 |
 CRO1 |   288     0     2   146    1.80   | 1.15e-13  2.13e-14  4.52e-15 |
 ALGO |   288     0     0   143    1.55   | 2.82e-14  5.16e-15  7.21e-15 |
 KOKB |   288     0     0   288    1.37   | 8.77e-14  1.12e-14  5.51e-15 |
 MATE |   288     0     0   288    1.19   | 4.50e-14  7.39e-15  9.68e-15 |
 NYAL |   288     0     0   288    0.86   | 3.89e-14  1.49e-14  8.29e-15 |
 KOUR |   288     0     0   288    0.32   | 5.52e-14  1.62e-14  1.67e-14 |
 GODE |   288     0     0   288    0.25   | 4.75e-14  7.14e-15  6.10e-15 |
 G25  |   288     0     0   288    0.13   | 2.37e-13  8.31e-14  3.02e-14 |
 MIZU |   278     0     0   278    0.10   | 4.15e-13  1.48e-13  3.67e-14 |
 G04  |   288     0     0   288    0.09   | 4.36e-13  1.39e-13  5.51e-14 |
 CEDU |   288     1     0   142    0.07   | 2.47e-13  5.85e-14  2.40e-14 |
 G05  |   285     1     0   281    0.07   | 7.11e-13  1.65e-13  6.05e-14 |
 G32  |   214     0     0   212    0.06   | 2.19e-13  9.25e-14         - |
 G28  |   288     0     1    96    0.06   | 5.76e-13  6.12e-14  4.52e-14 |
 G06  |   288     0     0   288    0.05   | 5.08e-13  1.38e-13  3.23e-14 |
 G26  |   288     0     0   288    0.05   | 4.85e-13  1.19e-13  8.47e-14 |
 G18  |   288     0     3    74    0.04   | 6.27e-13  6.98e-14  2.63e-14 |
 G12  |   288     0     1    66    0.04   | 6.10e-13  7.44e-14  3.51e-14 |
 G16  |   288     0     2    89    0.03   | 6.61e-13  8.02e-14  4.37e-14 |
 KERG |   288     0     0   288    0.03   | 9.00e-13  2.36e-13  5.49e-14 |
 SYOG |   288     0     0   287    0.02   | 1.03e-12  2.57e-13  6.18e-14 |
 MAR6 |   288     0     0   210    0.02   | 2.70e-13  6.93e-14  8.60e-14 |
 G03  |   288     0     0   288    0.01   | 1.34e-12  4.01e-13  1.09e-13 |
 HARB |   288     0     0   288    0.01   | 1.14e-12  3.31e-13  1.01e-13 |
 G30  |   288     0     0   288    0.01   | 1.42e-12  5.19e-13  1.79e-13 |
 G08  |   288     0     0   288    0.01   | 1.30e-12  4.68e-13  1.68e-13 |
 G10  |   273     0     0   270    0.01   | 1.30e-12  4.38e-13  7.36e-14 |
 DAEJ |   288     0     0   288    0.01   | 1.63e-12  4.92e-13  1.13e-13 |
 KIRU |   288     0     0   143    0.00   | 7.50e-13  4.78e-13  1.66e-13 |
 DRAO |   288     0     0   143    0.00   | 8.41e-13  2.13e-13  9.12e-14 |
 GPST |   288     0     0     0    0.00   | 3.45e-14  6.05e-15  1.65e-15 |
 MCM4 |   145     0     0     0    0.00   |        -         -         - |
 HOFN |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 G31  |   288     0     6     0    0.00   | 5.68e-13  7.03e-14  4.71e-14 |
 G29  |   288     1     6     0    0.00   | 5.65e-13  6.66e-14  1.99e-14 |
 G27  |   288     0     0     0    0.00   | 1.39e-12  6.03e-13  6.49e-13 |
 G23  |   288     0     5     0    0.00   | 5.91e-13  5.76e-14  2.17e-14 |
 G22  |   288     0     6     0    0.00   | 1.50e-12  1.32e-13  3.10e-14 |
 G21  |   288     0     6     0    0.00   | 8.88e-13  1.08e-13  2.79e-14 |
 G20  |   288     0     6     0    0.00   | 8.64e-13  8.76e-14  2.34e-14 |
 G19  |   288     2     6     0    0.00   | 5.79e-13  7.02e-14  2.29e-14 |
 G17  |   288     0     6     0    0.00   | 6.49e-13  6.72e-14  2.50e-14 |
 G15  |   288     0     6     0    0.00   | 6.78e-13  6.29e-14  1.51e-14 |
 G14  |   288     0     6     0    0.00   | 5.60e-13  5.87e-14  2.16e-14 |
 G13  |   288     1     6     0    0.00   | 6.89e-13  1.27e-13  3.21e-14 |
 G11  |   288     0     6     0    0.00   | 7.36e-13  6.68e-14  3.77e-14 |
 G09  |   288     0     0     0    0.00   | 1.46e-12  4.37e-13  3.78e-13 |
 G07  |   288     0     6     0    0.00   | 6.25e-13  6.81e-14  1.83e-14 |
 G02  |   288     0     6     0    0.00   | 5.33e-13  7.29e-14  2.03e-14 |
 YKRO |   288     0     0     0    0.00   |        -         -         - |
 YAKT |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   276     0     0     0    0.00   |        -         -         - |
 TIDB |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   |        -         -         - |
 SUTM |   288     0     0     0    0.00   |        -         -         - |
 STJO |   288     0     0     0    0.00   |        -         -         - |
 SEY1 |   288     0     0     0    0.00   |        -         -         - |
 SCUB |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   276     0     0     0    0.00   |        -         -         - |
 RABT |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 PRDS |   288     1     0     0    0.00   | 4.52e-13  1.84e-13  3.34e-13 |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 5.36e-13  6.70e-13  5.74e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     1     4     0    0.00   | 1.03e-12  2.25e-13  8.93e-14 |
 NICO |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 2.49e-13  5.67e-13  2.77e-13 |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 HLFX |   140     0     0     0    0.00   |        -         -         - |
 GUAM |   287     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 FLIN |   288     0     0     0    0.00   |        -         -         - |
 FAIR |   288     2     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   |        -         -         - |
 CHPI |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     2     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   | 8.84e-13  9.01e-13  1.63e-13 |
 ALBH |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.71e-17  3.25e-16  1.95e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     ALGO      YELL      YELL |
------------------------------------------+------------------------------+
