
 GPS week: 1382   Day: 3   MJD: 53921                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2780      0    -0.11    -1.52     3.39     0.00      0
 cod |   288     0  26880    381    -0.34    -1.67     0.04    14.59      0
 emr |   288     0  22555     95  4295.14    52.38     0.03    20.99      0
 esa |   288     0  18661    448     0.91    -0.72     0.05    11.04      0
 gfz |   288     0  30028    919    -0.27     0.03     0.03    22.12      0
 iga |    96     0   2780      2    -0.17    -1.44     0.13     0.00      0
 igu |    96     0   2780      0    -0.15    -1.51     3.32     0.00      0
 jpl |   288     0  19850     83    -1.74    -0.31     0.03    20.09      0
 ngs |    96     0   2780      7    -0.06    -1.49     2.86     0.00      0
 usn |   288     0  29205    477    -1.69    -0.39     0.05    11.17      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------------+
    1 | -1373   -11   -62    64   -80    -3  -267   130    73    -7 |
    2 | -1449    77  -132  -128   135    22  1216    62 -1474  -105 |
    3 |  -427   -23  -105   -63    39    62 10734    66  -677    94 |
    4 | -1245   144   -90   -77    32    56  3602    98 -1311  -182 |
    5 | -2177  -105    -8   -45    39    81-12184    15 -2260    92 |
    6 |-23422   -73  -110   176    69    -5 -7233   -16-18259    25 |
    7 |  -824  -193    58   -66    -5   -88  -689   -27 -1085   267 |
    8 |  8927  -118   -56   116     X    30 -2955    45  6666    80 |
    9 | -5826     8  -152   207    47   -50-12774    19 -3498   -42 |
   10 | -1284  -175   148  -195    15    19  4608   -32 -1556   171 |
   11 |  7580   102  -113   -87    96    -2  4861   138  7413  -273 |
   13 |  2739   127  -199   194   194   174  -202    90  2901  -529 |
   14 |  2838    84  -122   134     6     8   393    73  2658  -156 |
   15 |  1249  -208   131    38  -115    56 14086    -4  -857   223 |
   16 |  3860   -29   -47    40   -27    30   406   115  3701   -65 |
   17 |   850    96  -172   154    32   -91 -2195    99   465  -195 |
   18 |  4923   -29   -85   -89    85   -73   407    99  4484   -76 |
   19 |   846    13  -101    11    27  -172  1715  -106   559   299 |
   20 |  4044   -36  -102   116   -47    -7  -357    51  3595   124 |
   21 |  6792    -4   -43  -109    49    43   977    52  6135     4 |
   22 | -2446   -23  -152   -28   105    -9 -1308   182 -2097  -196 |
   23 |  -438   245  -268   101   162    70  1709    -7  -757  -225 |
   24 | -2192   -35   -56    34    47   111  -888    -9 -1716    42 |
   25 |  -932   -22     -    27   -75  -120  2627    87 -2501     - |
   26 | -1500   -28   -97    95   129    12 -2772    74 -2331  -312 |
   27 | -2096     X   -84     X    79  -126 -8772   -22 -1371    39 |
   28 |  3080  -101   -19  -186    91    16   344    84  3676    22 |
   29 | -3321    -5   -70     -    80   -64 -1077    50 -2929  -113 |
   30 |  3134     2  -141   147   100    13  5625   143  1516  -399 |
 -----+-------------------------------------------------------------+
 ALBH |     -     -   -24     -     -     -     -    26     -     - |
 ALGO |     -     -   -72    32   -98     -     -   150     -    28 |
 ALRT |     -  -108     -     -  -103     -     -     -     -   346 |
 AMC2 |     -  -114   244   -88     -     -     -  -263     -   250 |
 AREQ |     -     -    67     -   -63     -     -     -     -     - |
 ARTU |     -     6     -    81    12     -     -     -     -  -111 |
 ASPA |     -     -     -     -   164     -     -     -     -  -325 |
 AUCK |     -   -94     -     -     -     -     -     -     -   122 |
 BAHR |     -     8    31     -   -72     -     -    32     -    14 |
 BAKO |     -   136     -     -     -     -     -     -     -  -178 |
 BILI |     -   -73     -     -     X     -     -     -     -    96 |
 BJFS |     -     -     -     -  -108     -     -     -     -   214 |
 BOGT |     -    17     -    90     -     -     -     -     -  -112 |
 BOR1 |     -    47     -     -   -87     -     -    59     -    15 |
 BRFT |     -   123     -     -   -41     -     -     -     -   -79 |
 BRUS |     -  -142   150     -     -     -     -     -     -   -96 |
 CAS1 |     -    -9     -   135   -66     -     -    -3     -    17 |
 CHUR |     -     -    81     -   -77     -     -     -     -     - |
 COCO |     -    24     -  -217   192     -     -  -118     -    16 |
 CRO1 |     -    15    45   -24    54     -     -   -56     -   -85 |
 DAEJ |     -   206   -86     -     -     -     -     -     -  -108 |
 DARW |     -     -   158     -  -213     -     -    -6     -   135 |
 DGAR |     -   -73     -     -   -19     -     -     -     -   133 |
 DRAO |     -   171   -77     -  -107     -     -    33     -    73 |
 DWH1 |     -   137   265     -     -     -     -  -375     -     - |
 FAIR |     -     -    62    45   -53     -     -   -32     -     - |
 FLIN |     -    70     -     -   -46     -     -     -     -     - |
 GLPS |     -    33     -     -    15     -     -   -62     -    38 |
 GODE |     -    62     -     -     -     -     -     -     -   -80 |
 GOLD |     -     -     -    62   -87     -     -   -69     -   236 |
 GRAS |     -     1     -     -    -6     -     -     -     -    11 |
 GRAZ |     -     -    71     -     -     -     -     -     -  -134 |
 GUAM |     -   -29     -  -304   138     -     -   -86     -   184 |
 GUAT |     -  -108     -     -   -37     -     -     -     -   214 |
 HOB2 |     -     8   165     -  -136     -     -    29     -  -104 |
 HRAO |     -     -     -     -  -111     -     -    50     -   123 |
 IENG |     -  -118    82     -     -     -     -     -     -     - |
 IISC |     -     -     -   -84    42     -     -     -     -     X |
 IRKT |     -     -   159  -100   -57     -     -     -     -   -86 |
 ISPA |     -     -     -     -   -10     -     -   -23     -    73 |
 JAB1 |     -   123     -    25   -94     -     -     -     -     - |
 JPLM |     -     -   210     -  -199     -     -     -     -     - |
 KARR |     -    35     -     -   -23     -     -     -     -     - |
 KERG |     -     -  -101   188   129     -     -   -27     -  -202 |
 KOKB |     -     -   171     -   -78     -     -   -47     -   -84 |
 KOUR |     -     -     -   190   -76     -     -    58     -  -140 |
 LAE1 |     -     -     -     -   -46     -     -     -     -    91 |
 LPGS |     -    -9    96   -66    57     -     -  -119     -    -1 |
 MAC1 |     -  -125     -    32    91     -     -     -     -   -49 |
 MALI |     -   156     -     -  -101     -     -     -     -     2 |
 MAS1 |     -   150   -48    89   -89     -     -    38     -   -86 |
 MATE |     -     -     -   -36    -3     -     -     -     -    42 |
 MAW1 |     -   151     -     -   -87     -     -     -     -   -24 |
 MBAR |     -   -58     -     -   -46     -     -     -     -   167 |
 MCM4 |     -     -  -110   169    36     -     -   -17     -     - |
 MDO1 |     -   209     -     -  -138     -     -     -     -     - |
 MKEA |     -     -     -   100    20     -     -     -     -  -138 |
 NLIB |     -   197     -     -  -273     -     -    94     -   103 |
 NNOR |     -     -   126   100     -     -     -  -186     -     - |
 NOUM |     -     -     -     -   446     -     -  -491     -     - |
 NPLD |     -   -28    19     -     -     -     -     -     -     - |
 NRC1 |     -     -    25     -  -102     -     -    52     -    60 |
 NRIL |     -  -137     -     -     X     -     -     -     -   179 |
 NTUS |     -     -     -  -189     -     -     -     -     -   187 |
 NYA1 |     -    65     -     -     -     -     -   -47     -     - |
 NYAL |     -     -     -     -    43     -     -     -     -   -86 |
 OHI2 |     -   -25     -   180    21     -     -     -     -  -189 |
 ONSA |     -     -   108  -188    -8     -     -     -     -     - |
 PDEL |     -    23     -     -   -11     -     -     -     -    -8 |
 PERT |     -   114   -42   -60   103     -     -     -     -  -213 |
 PIE1 |     -     -    49   -93     -     -     -     -     -     - |
 PIMO |     -     -     -    63   -31     -     -     -     -     - |
 PRDS |     -     -    43     -     -     -     -   -45     -     - |
 PTBB |     -   -35    24     -     -     -     -     -     -     - |
 QAQ1 |     -     -   -32     -     -     -     -     -     -    59 |
 QUIN |     -  -137     -     -     -     -     -     -     -   178 |
 RABT |     -   -45     -     -     -     -     -     -     -    58 |
 RESO |     -   -29     -     -    19     -     -     -     -     - |
 RIOG |     -   -86    54    98    36     -     -   -99     -    22 |
 SANT |     -   -34     -    -5    -2     -     -     -     -    53 |
 SCH2 |     -     -    86     -   -82     -     -     -     -     - |
 SPT0 |     -  -193   134     -     -     -     -     -     -     - |
 STJO |     -   132   -18     -   -45     -     -    -7     -   -38 |
 STR1 |     -     -   -68     -     -     -     -     -     -   128 |
 SUTM |     -     -    78     -   -97     -     -  -106     -   236 |
 SYOG |     -     -   -28     -   -80     -     -   124     -     - |
 THTI |     -     -     -  -172   132     -     -     -     -   -90 |
 THU3 |     -    19    17     -   198     -     -     -     -  -448 |
 TIDB |     -   124   -41   -59   -58     -     -     -     -    87 |
 TIXI |     -     -     -     -    60     -     -   -27     -   -71 |
 TOW2 |     -   124     -     -  -172     -     -    64     -    63 |
 TRO1 |     -   -90     -     -     -     -     -     -     -   117 |
 TSKB |     -   -63    11   -53   137     -     -  -101     -    23 |
 TWTF |     -  -104    72     -     -     -     -     -     -     - |
 UNSA |     -     -     -  -474    88     -     -     -     -   293 |
 URUM |     -  -153     -     -    26     -     -     -     -   148 |
 USN3 |     -    14     2     -     -     -     -   -19     -    12 |
 USNO |     -    38   -65     -     -     -     -     8     -    59 |
 USUD |     -     -   -18   -26     -     -     -     -     -    59 |
 VILL |     -     -     -   -88    44     -     -     -     -     - |
 WHIT |     -   -15     -     -     -     -     -     -     -    20 |
 WILL |     -   -80    56     -     -     -     -     -     -     - |
 WSRT |     -    -1    74     -   -91     -     -    20     -     7 |
 WTZR |     -     -    64    30   -75     -     -     -     -     - |
 YAR2 |     -  -163    42     -    68     -     -     -     -     - |
 YELL |     -   149   -47   -17    70     -     -  -105     -     - |
 ZAMB |     -   -25     -     -    16     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  8808    31    17    30    19    88  4101    19  6828    24 |  288   4.61
    2 |   868    47    27    29    29    82   958    53   582    74 |  288   0.30
    3 |  1382    46    41    61    24   154  6270    30  1512    62 |  288   1.56
    4 |  2386    49    21    28    39    77  1945    22  1972    35 |  288   0.79
    5 |   853    44    29    26    23    86  8218    38   629    38 |  288   1.31
    6 |  8207    77    29    63    26    88  5051    30  7952    43 |  288   0.95
    7 |  1236    17    15    28    16   118   618    27   885    24 |  288   0.30
    8 |  3095    84    44    71     X   153  1536    28  3260    84 |  288   1.09
    9 |  4374    97    64   115    60   194  4895    41  3272    42 |  288   2.10
   10 |  2515    60    23    21    24   131  3062    30  2260    51 |  288   1.98
   11 |  2231    47    26    44    23    87  1923    26  1826    60 |  288   0.25
   13 |   748    30    39    64    18   114   411    22   889    50 |  288   0.23
   14 |   532    29    24    29    33   114   569    21   714    44 |  288   0.24
   15 |  6091    51    20    27    28   108  8424    23  5123    91 |  288   3.63
   16 |   410    68    53    29    29   134   581    31   527    23 |  288   0.30
   17 |   763    19    20    49    23    65  1348    31   992    57 |  288   0.33
   18 |   591    65    36    22    27   144   733    19   704   111 |  288   0.35
   19 |   389    40    57    51    42   119   777    21   598    53 |  288   0.25
   20 |   821    58    21    21    23    90   634    32   947    38 |  288   0.26
   21 |   758    37    19    31    18   160   796    19   741    32 |  288   0.32
   22 |  1211    60    27    17    19   147   937    30  1019    71 |  288   0.35
   23 |   605    46    32    50    20    79   850    27   484    67 |  288   0.24
   24 |  2944    47    21    21    16   107  2923    25  2881    48 |  288   2.87
   25 |  6843   113     -    79    77   119  1899    44  4516     - |  288   1.69
   26 |  1977    41    40    28    21   119  2040    38  1889    79 |  288   0.44
   27 |  4496     X    49     X    36   349  4984    85  3924    32 |  276   3.06
   28 |  3180    48    19    24    20    85  1106    30  2731    45 |  288   0.32
   29 |  2001    43    34     -    28   143   715    43  1421    56 |  288   0.49
   30 |  2337    52    43    79    19   129  3215    40  2501    60 |  288   1.76
 -----+-------------------------------------------------------------+--------------
 ALBH |     -     -    15     -     -     -     -    15     -     - |  288   4.69
 ALGO |     -     -    16    53    23     -     -    19     -    15 |  288   0.03
 ALRT |     -    20     -     -    10     -     -     -     -    18 |  288   6.04
 AMC2 |     -    15    16    30     -     -     -    20     -    13 |  288   0.05
 AREQ |     -     -    16     -    15     -     -     -     -     - |  288  11.38
 ARTU |     -    40     -    22    26     -     -     -     -    60 |  288   9.59
 ASPA |     -     -     -     -    17     -     -     -     -    34 |  288    >>>
 AUCK |     -    27     -     -     -     -     -     -     -    35 |  288    >>>
 BAHR |     -    42    16     -    23     -     -    41     -    23 |  288   0.84
 BAKO |     -    19     -     -     -     -     -     -     -    25 |  288   4.18
 BILI |     -    24     -     -     X     -     -     -     -    32 |  286   9.45
 BJFS |     -     -     -     -    26     -     -     -     -    51 |  287   9.18
 BOGT |     -    18     -    25     -     -     -     -     -    24 |  288   8.90
 BOR1 |     -    40     -     -    25     -     -    40     -    57 |  288   0.34
 BRFT |     -    31     -     -    37     -     -     -     -    78 |  288   0.13
 BRUS |     -    20    16     -     -     -     -     -     -    28 |  288   0.08
 CAS1 |     -    13     -    29    27     -     -    31     -    20 |  264   6.60
 CHUR |     -     -    25     -    24     -     -     -     -     - |  278   0.20
 COCO |     -    39     -    36    18     -     -    25     -    51 |  288   5.88
 CRO1 |     -    32    31    42    30     -     -    23     -    27 |  288   0.05
 DAEJ |     -    34    22     -     -     -     -     -     -    21 |  288   6.37
 DARW |     -     -    18     -    16     -     -    22     -    25 |  288   3.98
 DGAR |     -    34     -     -    30     -     -     -     -    37 |  288  13.19
 DRAO |     -    21    17     -    22     -     -    20     -    19 |  288   0.07
 DWH1 |     -    30    26     -     -     -     -    14     -     - |  250   0.41
 FAIR |     -     -    29    34    31     -     -    20     -     - |  286   8.96
 FLIN |     -    39     -     -    26     -     -     -     -     - |  288   9.56
 GLPS |     -    25     -     -    13     -     -    31     -    28 |  288   7.55
 GODE |     -     9     -     -     -     -     -     -     -    11 |  288   0.07
 GOLD |     -     -     -    32    19     -     -    18     -    19 |  288   8.26
 GRAS |     -    36     -     -    23     -     -     -     -    39 |  288   7.10
 GRAZ |     -     -    14     -     -     -     -     -     -    26 |  288   4.35
 GUAM |     -    21     -    83    34     -     -    20     -    32 |  288  19.88
 GUAT |     -    55     -     -    24     -     -     -     -    39 |  288    >>>
 HOB2 |     -    53    26     -    29     -     -    36     -    26 |  288   0.12
 HRAO |     -     -     -     -    49     -     -    38     -    55 |  288   1.04
 IENG |     -    13     9     -     -     -     -     -     -     - |  288   0.10
 IISC |     -     -     -    39    20     -     -     -     -     X |  153  13.31
 IRKT |     -     -    17    25    20     -     -     -     -    50 |  288   0.18
 ISPA |     -     -     -     -    38     -     -    59     -    64 |  235   8.78
 JAB1 |     -    43     -    46    21     -     -     -     -     - |  288   8.17
 JPLM |     -     -    40     -    38     -     -     -     -     - |  288   2.36
 KARR |     -    23     -     -    15     -     -     -     -     - |  288   8.08
 KERG |     -     -    27    54    28     -     -    42     -    70 |  288   2.26
 KOKB |     -     -    24     -    32     -     -    30     -   116 |  288   0.05
 KOUR |     -     -     -    40    23     -     -    29     -    35 |  288  11.75
 LAE1 |     -     -     -     -    10     -     -     -     -    19 |  286  14.96
 LPGS |     -    29    24    39    35     -     -    25     -    50 |  288  24.18
 MAC1 |     -    33     -    49    29     -     -     -     -    54 |  288   6.25
 MALI |     -    26     -     -    29     -     -     -     -    54 |  288  19.81
 MAS1 |     -    26    17    34    22     -     -    24     -    25 |  288  13.67
 MATE |     -     -     -    51    18     -     -     -     -    65 |  288   0.11
 MAW1 |     -    26     -     -    12     -     -     -     -    34 |  288   6.71
 MBAR |     -    38     -     -    20     -     -     -     -    35 |  288  20.66
 MCM4 |     -     -    16    54    37     -     -    23     -     - |  288  29.85
 MDO1 |     -    16     -     -    10     -     -     -     -     - |  288  51.57
 MKEA |     -     -     -    54    15     -     -     -     -    32 |  288  17.90
 NLIB |     -    33     -     -    25     -     -    21     -    21 |  261 237.64
 NNOR |     -     -    23    40     -     -     -    24     -     - |  288  14.06
 NOUM |     -     -     -     -    27     -     -    30     -     - |  199    >>>
 NPLD |     -    24    17     -     -     -     -     -     -     - |  287   0.04
 NRC1 |     -     -    13     -    17     -     -    21     -    19 |  288   0.05
 NRIL |     -    24     -     -     X     -     -     -     -    31 |  286   7.12
 NTUS |     -     -     -    14     -     -     -     -     -    14 |  195  10.97
 NYA1 |     -    14     -     -     -     -     -    10     -     - |  288   0.07
 NYAL |     -     -     -     -    20     -     -     -     -    39 |  288   0.07
 OHI2 |     -    31     -    38    33     -     -     -     -   109 |  288   8.09
 ONSA |     -     -    16    27    14     -     -     -     -     - |  288   0.05
 PDEL |     -    25     -     -    18     -     -     -     -    25 |  288  55.21
 PERT |     -    22    15    56    26     -     -     -     -    31 |  288   2.79
 PIE1 |     -     -    31    59     -     -     -     -     -     - |  224   0.50
 PIMO |     -     -     -    35    17     -     -     -     -     - |  288  17.46
 PRDS |     -     -    14     -     -     -     -    15     -     - |  288  12.89
 PTBB |     -    28    19     -     -     -     -     -     -     - |  288   0.28
 QAQ1 |     -     -    28     -     -     -     -     -     -    54 |  284   5.80
 QUIN |     -    26     -     -     -     -     -     -     -    34 |  288  11.57
 RABT |     -    33     -     -     -     -     -     -     -    42 |  288  13.97
 RESO |     -    16     -     -    11     -     -     -     -     - |  288   7.30
 RIOG |     -    66    32   107    29     -     -    18     -    83 |  286  12.11
 SANT |     -    19     -    46    14     -     -     -     -    60 |  288   3.01
 SCH2 |     -     -    33     -    31     -     -     -     -     - |  278   8.38
 SPT0 |     -    12     8     -     -     -     -     -     -     - |  288   0.05
 STJO |     -    46    14     -    23     -     -    27     -    25 |  288   0.07
 STR1 |     -     -    52     -     -     -     -     -     -    97 |  274   3.77
 SUTM |     -     -    24     -    22     -     -    24     -    53 |  288  13.36
 SYOG |     -     -    34     -    34     -     -    64     -     - |  286   0.61
 THTI |     -     -     -    46    24     -     -     -     -    30 |  288   5.83
 THU3 |     -    19    17     -    14     -     -     -     -    56 |  288   7.06
 TIDB |     -    39    29    23    16     -     -     -     -    18 |  288   0.13
 TIXI |     -     -     -     -    14     -     -    16     -    24 |  287   8.36
 TOW2 |     -    34     -     -    26     -     -    35     -    57 |  288   3.46
 TRO1 |     -    18     -     -     -     -     -     -     -    23 |  288   7.40
 TSKB |     -    46    22    80    55     -     -    36     -    24 |  288   2.16
 TWTF |     -    28    20     -     -     -     -     -     -     - |  288   0.25
 UNSA |     -     -     -    19    18     -     -     -     -    32 |  288  15.13
 URUM |     -    44     -     -    29     -     -     -     -    17 |  228  16.98
 USN3 |     -    38    26     -     -     -     -    20     -    20 |  288   0.03
 USNO |     -    42    17     -     -     -     -    23     -    16 |  288   0.03
 USUD |     -     -    34    48     -     -     -     -     -    89 |  288   0.14
 VILL |     -     -     -    19     9     -     -     -     -     - |  288  11.72
 WHIT |     -    24     -     -     -     -     -     -     -    32 |  287   2.26
 WILL |     -    22    15     -     -     -     -     -     -     - |  288  77.38
 WSRT |     -    39    14     -    40     -     -    36     -    32 |  288   0.04
 WTZR |     -     -    64    72    56     -     -     -     -     - |  288   0.17
 YAR2 |     -    44    13     -    28     -     -     -     -     - |  288  19.90
 YELL |     -    37    34    62    52     -     -    23     -     - |  288   0.18
 ZAMB |     -    50     -     -    33     -     -     -     -     - |  281  24.91
 -----+-------------------------------------------------------------+--------------
 TOT  |  3389    41    28    48    28   133  3323    31  2857    48 |


 BEST CLOCK FIT: ALGO   288   0.03 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 WSRT |   288     0     0   288    9.97   | 3.76e-14  1.05e-14  2.59e-15 |
 BRUS |   288     0     0   288    9.97   | 5.10e-14  2.10e-14  6.07e-15 |
 AMC2 |   288     0     0   288    9.97   | 4.81e-14  1.28e-14  4.20e-15 |
 KOKB |   288     0     0   288    9.95   | 5.46e-14  1.00e-14  3.83e-15 |
 NPLD |   287     0     0   286    5.85   | 5.10e-14  1.16e-14  2.76e-15 |
 USN3 |   288     0     0   288    4.55   | 6.54e-14  1.37e-14  3.65e-15 |
 NLIB |   261     0     0   260    4.50   | 3.87e-14  9.88e-15  6.95e-15 |
 WTZR |   288     0     0   288    4.36   | 5.38e-14  1.63e-14  1.98e-14 |
 ONSA |   288     0     0   288    4.32   | 3.81e-14  1.26e-14  3.59e-15 |
 DRAO |   288     0     0   288    4.21   | 4.64e-14  1.60e-14  4.16e-15 |
 NRC1 |   288     0     0   288    4.07   | 3.70e-14  1.23e-14  3.54e-15 |
 ALGO |   288     0     0   288    3.58   | 3.48e-14  9.55e-15  2.97e-15 |
 YELL |   288     2     0   286    3.20   | 8.24e-14  2.39e-14  1.08e-14 |
 STJO |   288     0     0   288    2.56   | 3.07e-14  9.66e-15  4.13e-15 |
 CRO1 |   288     0     0   288    2.51   | 1.05e-13  1.86e-14  5.50e-15 |
 MATE |   288     0     0   288    2.03   | 4.70e-14  1.72e-14  8.06e-15 |
 NYA1 |   288     0     0   288    1.71   | 2.94e-14  1.32e-14  4.91e-15 |
 USNO |   288     0     0   166    1.56   | 5.33e-14  1.25e-14  2.79e-15 |
 PIE1 |   224     0     0   136    1.53   | 8.97e-14  1.53e-14         - |
 NYAL |   288     0     0   288    1.40   | 3.50e-14  7.40e-15  5.45e-15 |
 TIDB |   288     0     0   288    1.31   | 1.03e-13  1.86e-14  7.77e-15 |
 HOB2 |   288     0     0   288    1.18   | 1.58e-13  1.93e-14  9.19e-15 |
 CHUR |   278     0     0   276    1.00   | 5.33e-14  1.58e-14  1.86e-14 |
 TWTF |   288     0     0   288    0.85   | 5.47e-14  1.67e-14  3.15e-14 |
 IRKT |   288     1     0   287    0.64   | 5.93e-14  1.97e-14  1.44e-14 |
 BRFT |   288     0     0   288    0.59   | 4.86e-14  1.48e-14  1.57e-14 |
 SPT0 |   288     0     0   143    0.52   | 4.07e-14  1.01e-14  3.31e-15 |
 IENG |   288     0     0   143    0.49   | 4.75e-14  1.58e-14  7.04e-15 |
 PTBB |   288     0     0   288    0.32   | 3.22e-13  7.13e-14  2.88e-14 |
 GODE |   288     0     0   143    0.29   | 5.26e-14  1.88e-14  6.07e-15 |
 G07  |   288     0     0   288    0.23   | 2.99e-13  8.51e-14  3.08e-14 |
 G16  |   288     0     1   144    0.11   | 4.89e-13  5.85e-14  3.39e-14 |
 G04  |   288     0     0   288    0.08   | 4.35e-13  1.29e-13  1.01e-13 |
 G26  |   288     0     0   288    0.08   | 3.51e-13  1.19e-13  4.04e-14 |
 G05  |   288     0     0   288    0.08   | 1.80e-13  7.75e-14  1.06e-13 |
 G29  |   288     0     0   288    0.07   | 4.00e-13  1.17e-13  5.93e-14 |
 BOR1 |   288     0     0   288    0.07   | 4.57e-13  1.32e-13  2.48e-14 |
 USUD |   288     0     2    28    0.06   | 2.28e-13  3.39e-14  1.31e-14 |
 DWH1 |   250     0     0    95    0.05   | 3.57e-13  1.16e-13         - |
 HRAO |   288     0     0   288    0.04   | 1.55e-13  4.44e-14  1.13e-13 |
 BAHR |   288     0     0   288    0.02   | 3.45e-13  1.39e-13  6.20e-14 |
 G06  |   288     0     0   288    0.02   | 5.58e-13  1.92e-13  7.94e-14 |
 G03  |   288     0     0   288    0.02   | 3.91e-13  1.88e-13  1.59e-13 |
 SYOG |   286     0     0   140    0.02   | 7.44e-13  1.84e-13  5.05e-14 |
 G08  |   288     0     0   288    0.01   | 1.18e-12  3.87e-13  6.36e-14 |
 G25  |   288     0     0   288    0.01   | 3.18e-13  2.08e-13  2.31e-13 |
 G24  |   288     0     0   288    0.01   | 1.20e-12  4.77e-13  2.97e-13 |
 TSKB |   288     0     0   288    0.01   | 1.02e-12  2.85e-13  2.49e-13 |
 G09  |   288     0     0   287    0.01   | 1.41e-12  5.45e-13  2.31e-13 |
 KERG |   288     0     0   288    0.01   | 1.22e-12  3.89e-13  1.33e-13 |
 PERT |   288     0     0   288    0.01   | 1.96e-12  5.66e-13  3.26e-13 |
 TOW2 |   288     0     0   288    0.00   | 4.42e-13  5.30e-13  2.98e-13 |
 WHIT |   287     0     0   286    0.00   | 4.89e-13  2.71e-13  2.20e-13 |
 GPST |   288     0     0     0    0.00   | 2.57e-14  6.75e-15  1.83e-15 |
 URUM |   228     0     0     0    0.00   |        -         -         - |
 IISC |   153     0     0     0    0.00   |        -         -         - |
 ISPA |   235     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 NTUS |   195     0     0     0    0.00   |        -         -         - |
 LAE1 |   286     0     0     0    0.00   |        -         -         - |
 BJFS |   287     0     0     0    0.00   |        -         -         - |
 BILI |   286     0     0     0    0.00   |        -         -         - |
 G30  |   288     0     2     0    0.00   | 1.75e-12  8.87e-13  1.42e-13 |
 G28  |   288     0     6     0    0.00   | 6.35e-13  6.34e-14  2.92e-14 |
 G27  |   276     0     0     0    0.00   | 1.29e-12  5.15e-13  2.76e-13 |
 G23  |   288     0     5     0    0.00   | 5.39e-13  6.63e-14  2.63e-14 |
 G22  |   288     0     6     0    0.00   | 6.51e-13  6.90e-14  2.99e-14 |
 G21  |   288     1     6     0    0.00   | 8.99e-13  1.36e-13  3.08e-14 |
 G20  |   288     0     6     0    0.00   | 6.74e-13  8.05e-14  2.67e-14 |
 G19  |   288     0     6     0    0.00   | 6.17e-13  6.49e-14  1.80e-14 |
 G18  |   288     0     6     0    0.00   | 8.05e-13  7.95e-14  3.94e-14 |
 G17  |   288     0     6     0    0.00   | 6.31e-13  5.75e-14  1.99e-14 |
 G15  |   288     0     0     0    0.00   | 1.53e-12  5.52e-13  3.96e-13 |
 G14  |   288     0     6     0    0.00   | 5.53e-13  5.84e-14  3.08e-14 |
 G13  |   288     0     6     0    0.00   | 6.19e-13  6.08e-14  2.80e-14 |
 G11  |   288     0     6     0    0.00   | 6.06e-13  5.85e-14  2.47e-14 |
 G10  |   288     0     0     0    0.00   | 1.26e-12  4.82e-13  2.06e-13 |
 G02  |   288     0     6     0    0.00   | 5.13e-13  4.97e-14  2.64e-14 |
 G01  |   288     0     0     0    0.00   | 1.56e-12  6.81e-13  4.64e-13 |
 ZAMB |   281     2     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 4.77e-13  1.62e-13  3.88e-13 |
 SUTM |   288     0     0     0    0.00   |        -         -         - |
 STR1 |   274     0     0     0    0.00   |        -         -         - |
 SCH2 |   278     0     0     0    0.00   | 6.61e-13  3.33e-13  5.82e-13 |
 SANT |   288     0     0     0    0.00   | 1.87e-12  5.36e-13  3.60e-13 |
 RIOG |   286     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 RABT |   288     0     0     0    0.00   |        -         -         - |
 QUIN |   288     2     0     0    0.00   |        -         -         - |
 QAQ1 |   284     0     0     0    0.00   |        -         -         - |
 PRDS |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   288     1     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   286     0     0     0    0.00   |        -         -         - |
 NOUM |   199     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     0     0    0.00   |        -         -         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     1     0     0    0.00   |        -         -         - |
 MALI |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KOUR |   288     0     0     0    0.00   |        -         -         - |
 KARR |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 7.58e-13  1.89e-13  1.86e-13 |
 JAB1 |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     1     0     0    0.00   |        -         -         - |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GRAS |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 FLIN |   288     0     0     0    0.00   |        -         -         - |
 FAIR |   286     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   | 2.64e-13  4.82e-13  3.79e-13 |
 DAEJ |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.24e-13  6.38e-13  5.50e-13 |
 CAS1 |   264     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 BAKO |   288     0     0     0    0.00   |        -         -         - |
 AUCK |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
 ALBH |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.71e-17  3.26e-16  1.95e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      NYAL      WSRT |
------------------------------------------+------------------------------+
